GDACS_DR_1013930_9
info-gdacs@gdacs.org
2020-06-27T15:49:55-00:00
Actual
Alert
Public
1013930
Geo
Drought
Past
Severe
Unknown
Global Disaster Alert and Coordination System

Drought is on going in Madagascar
The Drought alert level is Orange.
https://www.gdacs.org/report.aspx?eventtype=DR&eventid=1013930
eventid
1013930
currentepisodeid
9
glide
version
0
fromdate
Fri, 21 Feb 2020 00:00:00 GMT
todate
Sat, 27 Jun 2020 17:49:55 GMT
eventtype
DR
alertlevel
Orange
alerttype
agricultural drought
link
https://www.gdacs.org/report.aspx?eventtype=DR&amp;eventid=1013930
country
Madagascar
eventname
Madagascar-2020
severity
Medium impact for agricultural drought in 142895 km2
population
vulnerability
sourceid
GDO
iso3
MDG
hazardcomponents
datemodified
Sat, 27 Jun 2020 17:49:55 GMT
Polygon
-15.725000000000007,45.897 -15.723000000000006,45.901 -15.714000000000006,45.905 -15.709000000000007,45.907 -15.705000000000005,45.906 -15.707000000000006,45.902 -15.719000000000007,45.895 -15.723000000000006,45.894 -15.725000000000007,45.897
Polygon
-15.813000000000011,45.973000000000006 -15.80800000000001,45.979 -15.801000000000011,45.981 -15.78400000000001,45.974000000000004 -15.78700000000001,45.971 -15.791000000000011,45.971 -15.798000000000011,45.977 -15.804000000000011,45.976 -15.812000000000012,45.969 -15.813000000000011,45.973000000000006
Polygon
-15.840999999999987,45.972000000000008 -15.837999999999987,45.981 -15.837999999999987,45.989 -15.833999999999985,45.995 -15.830000000000013,45.989 -15.830000000000013,45.984000000000009 -15.836000000000013,45.973000000000006 -15.839999999999986,45.97 -15.840999999999987,45.972000000000008
Polygon
-15.999999999999995,45.151 -15.999999999999995,45.27 -15.969999999999994,45.259999999999991 -15.946999999999992,45.263 -15.939999999999991,45.26700000000001 -15.93399999999999,45.264 -15.934999999999992,45.245000000000005 -15.943999999999992,45.23599999999999 -15.945999999999991,45.23 -15.950999999999992,45.210999999999991 -15.954999999999993,45.204 -15.985999999999994,45.173999999999992 -15.999999999999995,45.151
Polygon
-16.000999999999994,45.602 -15.999999999999995,46 -15.855999999999987,46 -15.855999999999987,45.978 -15.862999999999989,45.961000000000006 -15.860999999999988,45.960000000000008 -15.846999999999987,45.961000000000006 -15.831000000000012,45.952 -15.822000000000012,45.95 -15.815000000000012,45.952 -15.806000000000012,45.961000000000006 -15.79300000000001,45.962 -15.79000000000001,45.962 -15.781000000000009,45.925000000000004 -15.773000000000009,45.909 -15.76800000000001,45.905 -15.765000000000009,45.883 -15.76800000000001,45.878 -15.779000000000011,45.864000000000004 -15.795000000000011,45.841 -15.807000000000011,45.826000000000008 -15.812000000000012,45.829 -15.813000000000011,45.81 -15.815000000000012,45.804999999999993 -15.824000000000012,45.802000000000007 -15.821000000000012,45.792999999999992 -15.811000000000011,45.789000000000009 -15.812000000000012,45.78 -15.812000000000012,45.762 -15.810000000000011,45.749 -15.818000000000012,45.720999999999989 -15.817000000000011,45.718999999999994 -15.813000000000011,45.722 -15.80500000000001,45.751 -15.807000000000011,45.763 -15.806000000000012,45.766999999999996 -15.801000000000011,45.763 -15.79900000000001,45.739 -15.79600000000001,45.717 -15.791000000000011,45.698 -15.78600000000001,45.686 -15.775000000000009,45.670999999999992 -15.77400000000001,45.668 -15.778000000000009,45.667 -15.78700000000001,45.67199999999999 -15.79300000000001,45.669999999999995 -15.797000000000011,45.666 -15.800000000000011,45.656 -15.812000000000012,45.651 -15.818000000000012,45.644999999999996 -15.832000000000011,45.617 -15.839000000000013,45.609999999999992 -15.839999999999986,45.613 -15.836000000000013,45.618 -15.829000000000011,45.637 -15.835000000000012,45.642 -15.839999999999986,45.643 -15.836999999999986,45.634999999999991 -15.836999999999986,45.629 -15.845999999999986,45.61099999999999 -15.859999999999987,45.601 -15.862999999999989,45.602 -15.862999999999989,45.605 -15.855999999999987,45.608 -15.853999999999987,45.61099999999999 -15.861999999999988,45.617 -15.876999999999988,45.618 -15.88699999999999,45.633999999999993 -15.893999999999989,45.636 -15.91899999999999,45.632 -15.922999999999991,45.629 -15.925999999999991,45.62299999999999 -15.929999999999991,45.620999999999995 -15.946999999999992,45.620999999999995 -15.962999999999994,45.624 -15.967999999999993,45.619 -15.968999999999994,45.606 -15.976999999999993,45.606 -15.999999999999995,45.603 -16.000999999999994,45.602
Polygon
-16.000999999999994,45.351 -16.000999999999994,45.581 -15.989999999999995,45.576 -15.983999999999995,45.567 -15.970999999999993,45.557 -15.957999999999993,45.563 -15.953999999999992,45.561999999999991 -15.945999999999991,45.558 -15.952999999999992,45.547999999999995 -15.951999999999993,45.538000000000004 -15.965999999999994,45.49 -15.967999999999993,45.47 -15.968999999999994,45.465 -15.973999999999993,45.442 -15.985999999999994,45.415000000000006 -15.985999999999994,45.409 -15.980999999999995,45.390000000000008 -15.983999999999995,45.364 -15.983999999999995,45.35 -15.985999999999994,45.346 -15.989999999999995,45.344 -16.000999999999994,45.351
Polygon
-16.180000000000003,44.938 -16.174000000000003,44.930000000000007 -16.173000000000002,44.927 -16.172000000000004,44.924 -16.174000000000003,44.922 -16.176000000000002,44.923 -16.178000000000004,44.925 -16.180000000000003,44.938
Polygon
-16.230000000000008,44.828 -16.229000000000006,44.834 -16.224000000000007,44.84 -16.222000000000005,44.835 -16.226000000000006,44.828 -16.228000000000005,44.827 -16.230000000000008,44.828
Polygon
-19.327000000000005,44.376000000000005 -19.327000000000005,44.380000000000017 -19.308000000000003,44.376000000000005 -19.300000000000004,44.364000000000004 -19.305000000000003,44.364000000000004 -19.323000000000004,44.372000000000014 -19.327000000000005,44.376000000000005
Polygon
-19.538999999999962,44.472000000000008 -19.528999999999964,44.470000000000006 -19.526999999999962,44.466000000000015 -19.535999999999962,44.467000000000013 -19.538999999999962,44.472000000000008
Polygon
-19.585999999999967,44.44700000000001 -19.565999999999963,44.454000000000015 -19.559999999999963,44.454000000000015 -19.558999999999966,44.451000000000008 -19.581999999999965,44.445000000000007 -19.585999999999967,44.44700000000001
Polygon
-19.638999999999967,44.402000000000008 -19.636999999999968,44.404000000000018 -19.622999999999969,44.410000000000011 -19.615999999999968,44.415000000000006 -19.610999999999969,44.424000000000007 -19.607999999999969,44.422000000000004 -19.608999999999966,44.415000000000006 -19.612999999999968,44.409000000000006 -19.63499999999997,44.40100000000001 -19.638999999999967,44.402000000000008
Polygon
-19.754999999999974,44.397000000000013 -19.725999999999974,44.418000000000013 -19.722999999999974,44.418000000000013 -19.723999999999972,44.412000000000006 -19.727999999999973,44.408000000000008 -19.754999999999974,44.397000000000013
Polygon
-19.762999999999973,44.406000000000013 -19.762999999999973,44.409000000000006 -19.751999999999974,44.410000000000011 -19.752999999999975,44.406000000000013 -19.756999999999973,44.404000000000018 -19.762999999999973,44.406000000000013
Polygon
-19.88199999999998,44.449000000000005 -19.86999999999998,44.455000000000013 -19.859999999999978,44.457000000000008 -19.853999999999978,44.45600000000001 -19.856999999999978,44.445000000000007 -19.864999999999981,44.441000000000017 -19.871999999999979,44.443000000000012 -19.873999999999981,44.448000000000008 -19.88199999999998,44.449000000000005
Polygon
-20.067999999999966,44.426000000000009 -20.052999999999962,44.435000000000009 -20.048999999999964,44.434000000000005 -20.047999999999963,44.432000000000009 -20.067999999999966,44.426000000000009
Polygon
-20.394999999999982,44.229000000000006 -20.391999999999982,44.235000000000014 -20.385999999999981,44.239000000000011 -20.383999999999979,44.238000000000014 -20.383999999999979,44.236000000000011 -20.392999999999979,44.226000000000013 -20.394999999999982,44.229000000000006
Polygon
-21.125999999999966,43.714000000000013 -21.121999999999964,43.717000000000013 -21.111999999999963,43.712000000000018 -21.116999999999965,43.70900000000001 -21.122999999999966,43.710000000000008 -21.125999999999966,43.714000000000013
Polygon
-21.306999999999974,43.586000000000006 -21.303999999999974,43.58700000000001 -21.298999999999975,43.58400000000001 -21.291999999999973,43.580000000000013 -21.288999999999973,43.576000000000008 -21.287999999999972,43.57200000000001 -21.288999999999973,43.567000000000014 -21.292999999999974,43.563000000000009 -21.300999999999974,43.576000000000008 -21.306999999999974,43.586000000000006
Polygon
-22.999999999999982,44.000000000000007 -22.999999999999982,45 -22.999999999999982,46 -21.999999999999982,46 -20.999999999999986,46 -19.999999999999986,46 -18.999999999999989,46 -17.999999999999989,46 -16.999999999999993,46 -16.999999999999993,45 -16.139000000000003,45 -16.148000000000003,44.986 -16.154000000000003,44.969 -16.17,44.947 -16.174000000000003,44.945 -16.180000000000003,44.952999999999996 -16.189000000000004,44.986 -16.189000000000004,44.994 -16.195000000000004,44.997 -16.192000000000004,44.974 -16.192000000000004,44.96 -16.187000000000005,44.943000000000005 -16.191000000000003,44.936 -16.187000000000005,44.908 -16.185000000000002,44.894000000000005 -16.194000000000003,44.881000000000007 -16.215000000000003,44.867 -16.233000000000008,44.839 -16.243000000000006,44.833000000000006 -16.245000000000008,44.832000000000008 -16.246000000000006,44.83 -16.233000000000008,44.823 -16.234000000000005,44.808000000000007 -16.229000000000006,44.799 -16.228000000000005,44.783000000000008 -16.224000000000007,44.783000000000008 -16.214000000000006,44.794 -16.211000000000006,44.793 -16.208000000000006,44.787 -16.206000000000003,44.764 -16.211000000000006,44.713 -16.204000000000004,44.684 -16.205000000000005,44.633 -16.204000000000004,44.62700000000001 -16.196000000000005,44.615000000000009 -16.197000000000003,44.603000000000009 -16.192000000000004,44.531000000000006 -16.185000000000002,44.493000000000009 -16.189000000000004,44.492000000000012 -16.192000000000004,44.495000000000005 -16.195000000000004,44.510000000000005 -16.209000000000003,44.524000000000008 -16.210000000000004,44.524000000000008 -16.218000000000004,44.529000000000011 -16.224000000000007,44.528000000000013 -16.226000000000006,44.524000000000008 -16.225000000000005,44.522000000000006 -16.219000000000005,44.524000000000008 -16.209000000000003,44.515000000000015 -16.202000000000005,44.510000000000005 -16.197000000000003,44.493000000000009 -16.192000000000004,44.487000000000009 -16.183000000000003,44.483000000000004 -16.195000000000004,44.461000000000006 -16.201000000000004,44.45000000000001 -16.216000000000005,44.446000000000005 -16.239000000000008,44.445000000000007 -16.265000000000008,44.439000000000007 -16.301000000000009,44.427000000000007 -16.312000000000012,44.418000000000013 -16.314000000000011,44.412000000000006 -16.327000000000012,44.408000000000008 -16.33100000000001,44.407000000000011 -16.359000000000012,44.416000000000004 -16.361999999999988,44.414000000000009 -16.347000000000012,44.405000000000015 -16.359000000000012,44.402000000000008 -16.373999999999988,44.406000000000013 -16.429999999999989,44.440000000000005 -16.436999999999991,44.44400000000001 -16.438999999999989,44.445000000000007 -16.440999999999992,44.445000000000007 -16.440999999999992,44.44400000000001 -16.440999999999992,44.440000000000005 -16.442999999999991,44.440000000000005 -16.449999999999992,44.443000000000012 -16.45999999999999,44.45000000000001 -16.464999999999993,44.457000000000008 -16.492999999999995,44.469000000000008 -16.501999999999995,44.471000000000004 -16.518999999999995,44.469000000000008 -16.552999999999997,44.45900000000001 -16.557999999999996,44.44700000000001 -16.563999999999997,44.440000000000005 -16.568999999999996,44.433000000000007 -16.576999999999998,44.430000000000014 -16.581999999999997,44.431000000000012 -16.586,44.429000000000016 -16.583,44.425000000000004 -16.575999999999997,44.424000000000007 -16.554999999999996,44.429000000000016 -16.550999999999995,44.426000000000009 -16.550999999999995,44.422000000000004 -16.556999999999995,44.417000000000016 -16.577999999999996,44.411000000000008 -16.589999999999996,44.413000000000004 -16.633,44.435000000000009 -16.643,44.438000000000009 -16.651,44.441000000000017 -16.678000000000004,44.442000000000014 -16.690000000000005,44.441000000000017 -16.713000000000005,44.436000000000007 -16.728000000000005,44.429000000000016 -16.729000000000006,44.426000000000009 -16.733000000000004,44.410000000000011 -16.746000000000006,44.39800000000001 -16.774000000000008,44.382000000000012 -16.785000000000007,44.371000000000016 -16.795000000000009,44.359000000000016 -16.806000000000008,44.351000000000006 -16.817000000000011,44.344000000000015 -16.846000000000011,44.331000000000017 -16.859000000000012,44.334000000000017 -16.86300000000001,44.332000000000015 -16.864000000000011,44.324000000000012 -16.85100000000001,44.322000000000017 -16.85100000000001,44.319000000000017 -16.876999999999988,44.304000000000009 -16.882999999999988,44.306000000000004 -16.873999999999988,44.314000000000007 -16.885000000000012,44.314000000000007 -16.890000000000015,44.299000000000014 -16.911999999999988,44.294000000000004 -16.909999999999989,44.292000000000009 -16.896999999999988,44.290000000000006 -16.926999999999989,44.279000000000011 -16.94199999999999,44.272000000000013 -16.94499999999999,44.272000000000013 -16.935999999999989,44.283000000000015 -16.935999999999989,44.286000000000016 -16.936999999999991,44.290000000000006 -16.940999999999988,44.290000000000006 -16.946999999999989,44.290000000000006 -16.949999999999989,44.286000000000016 -16.948999999999991,44.285000000000011 -16.942999999999991,44.284000000000013 -16.945999999999991,44.279000000000011 -16.95399999999999,44.274000000000015 -16.957999999999991,44.268000000000008 -16.954999999999991,44.260000000000012 -16.961999999999989,44.257000000000005 -16.972999999999992,44.257000000000005 -16.984999999999992,44.250000000000014 -16.999999999999993,44.248000000000012 -17.002999999999993,44.247000000000014 -17.000999999999994,44.243000000000009 -16.999999999999993,44.243000000000009 -16.989999999999991,44.244000000000007 -16.974999999999991,44.250000000000014 -16.972999999999992,44.247000000000014 -16.977999999999991,44.242000000000004 -16.999999999999993,44.234000000000016 -17.002999999999993,44.233000000000004 -17.022999999999993,44.222000000000016 -17.026999999999994,44.226000000000013 -17.040999999999993,44.213000000000015 -17.071999999999996,44.195000000000007 -17.068999999999996,44.192000000000007 -17.046999999999993,44.204000000000008 -17.043999999999993,44.204000000000008 -17.043999999999993,44.201000000000015 -17.055999999999997,44.193000000000005 -17.075999999999997,44.184000000000005 -17.101,44.163000000000011 -17.105999999999998,44.160000000000004 -17.116999999999997,44.167000000000009 -17.121,44.175000000000011 -17.122,44.173000000000016 -17.119999999999997,44.158000000000008 -17.110999999999997,44.150000000000013 -17.098999999999997,44.148000000000017 -17.105999999999998,44.141000000000012 -17.122,44.131000000000007 -17.149,44.121000000000009 -17.166,44.131000000000007 -17.173000000000002,44.143000000000008 -17.174,44.143000000000008 -17.174,44.14200000000001 -17.174,44.135000000000005 -17.17,44.126000000000012 -17.198000000000004,44.120000000000005 -17.211000000000002,44.113000000000014 -17.191000000000003,44.118000000000009 -17.186,44.115000000000016 -17.186,44.112000000000016 -17.199,44.108000000000004 -17.214000000000002,44.097000000000008 -17.246000000000006,44.090000000000018 -17.254000000000005,44.08100000000001 -17.269000000000005,44.076000000000015 -17.282000000000007,44.063000000000017 -17.280000000000008,44.062000000000005 -17.264000000000006,44.071000000000005 -17.271000000000008,44.061000000000007 -17.314000000000007,44.031000000000013 -17.330000000000009,44.022000000000006 -17.36300000000001,44.019000000000013 -17.36300000000001,44.021000000000008 -17.36300000000001,44.022000000000006 -17.358000000000011,44.02600000000001 -17.356000000000009,44.02600000000001 -17.34800000000001,44.02600000000001 -17.344000000000008,44.029000000000018 -17.340000000000011,44.034000000000006 -17.341000000000008,44.035000000000004 -17.342000000000009,44.039000000000016 -17.347000000000008,44.032000000000011 -17.347000000000008,44.031000000000013 -17.34800000000001,44.031000000000013 -17.362000000000009,44.029000000000018 -17.36600000000001,44.02000000000001 -17.36600000000001,44.019000000000013 -17.367000000000012,44.019000000000013 -17.377000000000013,44.017000000000017 -17.372000000000011,44.015000000000008 -17.352000000000011,44.009000000000007 -17.35100000000001,44.004000000000005 -17.359000000000009,44.000000000000007 -17.378000000000011,43.991000000000007 -17.400999999999986,43.988000000000007 -17.405000000000012,43.987000000000009 -17.418999999999986,43.981000000000016 -17.411000000000012,43.979000000000006 -17.409999999999986,43.975000000000009 -17.426999999999989,43.966000000000008 -17.457999999999991,43.95300000000001 -17.471999999999991,43.946000000000012 -17.489999999999991,43.940000000000005 -17.493999999999993,43.939000000000007 -17.503999999999991,43.931000000000004 -17.508999999999993,43.935000000000009 -17.514999999999993,43.94700000000001 -17.520999999999994,43.95300000000001 -17.526999999999994,43.954000000000008 -17.539999999999992,43.95000000000001 -17.546999999999993,43.95900000000001 -17.552999999999994,43.961000000000006 -17.556999999999995,43.95900000000001 -17.555999999999994,43.957000000000015 -17.545999999999992,43.948000000000008 -17.525999999999993,43.948000000000008 -17.523999999999994,43.946000000000012 -17.517999999999994,43.933000000000014 -17.516999999999992,43.931000000000004 -17.551999999999992,43.932000000000016 -17.558999999999994,43.934000000000012 -17.575999999999997,43.930000000000007 -17.595999999999997,43.927000000000007 -17.606999999999996,43.932000000000016 -17.618999999999996,43.945000000000014 -17.627,43.95300000000001 -17.625999999999998,43.955000000000005 -17.618999999999996,43.955000000000005 -17.612999999999996,43.961000000000006 -17.612999999999996,43.965000000000011 -17.616999999999997,43.974000000000004 -17.608999999999998,43.982000000000014 -17.612999999999996,43.982000000000014 -17.618999999999996,43.976000000000006 -17.616999999999997,43.96200000000001 -17.625999999999998,43.960000000000008 -17.630999999999997,43.956000000000017 -17.628999999999998,43.95000000000001 -17.625999999999998,43.946000000000012 -17.615999999999996,43.934000000000012 -17.627999999999997,43.939000000000007 -17.639,43.94700000000001 -17.65,43.955000000000005 -17.649,43.96200000000001 -17.654,43.964000000000006 -17.671,43.976000000000006 -17.684,43.987000000000009 -17.693,43.991000000000007 -17.697000000000003,43.994000000000014 -17.698,44.000000000000007 -17.708000000000002,44.038000000000004 -17.713,44.052000000000007 -17.716,44.055000000000014 -17.720000000000002,44.055000000000014 -17.714000000000002,44.047000000000004 -17.718000000000004,44.031000000000013 -17.712000000000003,44.019000000000013 -17.71,44.000000000000007 -17.709000000000003,43.998000000000005 -17.712000000000003,43.997000000000007 -17.737000000000002,44.000000000000007 -17.740000000000002,44.000000000000007 -17.745000000000005,44.005000000000017 -17.757000000000005,44.02600000000001 -17.747000000000003,44.028000000000006 -17.746000000000002,44.030000000000015 -17.758000000000003,44.037000000000006 -17.769000000000005,44.038000000000004 -17.785000000000007,44.035000000000004 -17.809000000000008,44.037000000000006 -17.826000000000008,44.034000000000006 -17.842000000000009,44.035000000000004 -17.873000000000012,44.029000000000018 -17.876000000000012,44.025000000000006 -17.87700000000001,44.018000000000015 -17.896000000000011,44.01400000000001 -17.907000000000011,44.010000000000005 -17.925000000000011,44.010000000000005 -17.946000000000012,44.01400000000001 -17.952999999999989,44.012000000000008 -17.961999999999989,44.010000000000005 -17.983999999999991,44.012000000000008 -17.999999999999989,44.012000000000008 -18.048999999999992,44.012000000000008 -18.080999999999996,44.018000000000015 -18.094999999999995,44.018000000000015 -18.100999999999996,44.018000000000015 -18.105999999999995,44.019000000000013 -18.116999999999997,44.030000000000015 -18.130999999999997,44.035000000000004 -18.129999999999995,44.030000000000015 -18.115999999999996,44.021000000000008 -18.114999999999995,44.018000000000015 -18.118999999999996,44.016000000000005 -18.15,44.030000000000015 -18.160999999999998,44.032000000000011 -18.163,44.034000000000006 -18.162,44.044000000000011 -18.166,44.052000000000007 -18.171,44.040000000000006 -18.169999999999998,44.034000000000006 -18.202,44.044000000000011 -18.238000000000003,44.048000000000009 -18.251000000000005,44.046000000000006 -18.312000000000005,44.052000000000007 -18.355000000000008,44.049000000000007 -18.35400000000001,44.057000000000009 -18.35700000000001,44.058000000000007 -18.36000000000001,44.057000000000009 -18.365000000000009,44.047000000000004 -18.370000000000008,44.045000000000009 -18.408000000000012,44.039000000000016 -18.416000000000011,44.042000000000016 -18.430000000000014,44.060000000000009 -18.434999999999988,44.053000000000004 -18.454999999999988,44.062000000000005 -18.469000000000015,44.07200000000001 -18.498999999999988,44.103000000000016 -18.515999999999991,44.115000000000016 -18.525999999999989,44.116000000000014 -18.588999999999995,44.161000000000016 -18.594999999999995,44.163000000000011 -18.599999999999994,44.161000000000016 -18.605999999999995,44.155000000000008 -18.618999999999996,44.164000000000016 -18.685,44.200000000000017 -18.697,44.209000000000017 -18.71,44.210000000000015 -18.783000000000005,44.243000000000009 -18.819000000000006,44.25500000000001 -18.849000000000007,44.258000000000017 -18.867000000000008,44.257000000000005 -18.87700000000001,44.25200000000001 -18.878000000000007,44.244000000000007 -18.884000000000007,44.240000000000009 -18.902000000000008,44.244000000000007 -18.907000000000011,44.244000000000007 -18.91200000000001,44.244000000000007 -18.92400000000001,44.241000000000007 -18.954000000000011,44.244000000000007 -18.963999999999988,44.25200000000001 -18.969999999999988,44.266000000000005 -18.978000000000012,44.273000000000017 -18.981000000000012,44.277000000000008 -18.984000000000012,44.27600000000001 -18.978999999999989,44.259000000000015 -18.972000000000012,44.25200000000001 -18.975000000000012,44.243000000000009 -18.987999999999989,44.246000000000016 -18.992999999999988,44.244000000000007 -18.970999999999986,44.236000000000011 -18.947000000000013,44.233000000000004 -18.976999999999986,44.232000000000006 -18.998999999999988,44.235000000000014 -18.999999999999989,44.235000000000014 -19.044999999999991,44.234000000000016 -19.05599999999999,44.230000000000004 -19.065999999999992,44.234000000000016 -19.063999999999993,44.243000000000009 -19.064999999999991,44.25200000000001 -19.067999999999991,44.25500000000001 -19.077999999999992,44.249000000000017 -19.077999999999992,44.241000000000007 -19.073999999999991,44.232000000000006 -19.076999999999991,44.231000000000009 -19.097999999999992,44.241000000000007 -19.094999999999992,44.250000000000014 -19.103999999999992,44.262000000000015 -19.108999999999995,44.265000000000008 -19.099999999999994,44.25200000000001 -19.099999999999994,44.247000000000014 -19.103999999999992,44.246000000000016 -19.139999999999997,44.265000000000008 -19.150999999999996,44.26700000000001 -19.150999999999996,44.269000000000005 -19.145999999999997,44.272000000000013 -19.131999999999994,44.269000000000005 -19.121999999999996,44.275000000000013 -19.117999999999995,44.281000000000006 -19.117999999999995,44.283000000000015 -19.120999999999995,44.284000000000013 -19.132999999999996,44.275000000000013 -19.157999999999998,44.280000000000008 -19.165999999999997,44.292000000000009 -19.163999999999998,44.306000000000004 -19.176999999999996,44.322000000000017 -19.179,44.317000000000007 -19.169999999999998,44.308000000000014 -19.173,44.298000000000016 -19.179999999999996,44.297000000000011 -19.191,44.306000000000004 -19.198999999999998,44.306000000000004 -19.185,44.293000000000006 -19.176999999999996,44.290000000000006 -19.161999999999995,44.277000000000008 -19.157999999999998,44.273000000000017 -19.158999999999995,44.272000000000013 -19.161999999999995,44.271000000000015 -19.170999999999996,44.275000000000013 -19.221,44.318000000000005 -19.266000000000002,44.351000000000006 -19.287000000000003,44.364000000000004 -19.302000000000003,44.37700000000001 -19.308000000000003,44.381000000000014 -19.328000000000007,44.392000000000017 -19.35299999999998,44.415000000000006 -19.35599999999998,44.411000000000008 -19.365999999999982,44.422000000000004 -19.407999999999983,44.45000000000001 -19.429999999999986,44.45900000000001 -19.468999999999987,44.469000000000008 -19.507999999999964,44.469000000000008 -19.541999999999963,44.481000000000009 -19.547999999999963,44.470000000000006 -19.548999999999964,44.466000000000015 -19.549999999999965,44.46200000000001 -19.545999999999964,44.46200000000001 -19.542999999999964,44.458000000000006 -19.545999999999964,44.455000000000013 -19.565999999999963,44.458000000000006 -19.577999999999967,44.457000000000008 -19.596999999999966,44.44700000000001 -19.593999999999966,44.443000000000012 -19.589999999999968,44.441000000000017 -19.616999999999969,44.424000000000007 -19.631999999999969,44.424000000000007 -19.63799999999997,44.430000000000014 -19.64999999999997,44.413000000000004 -19.664999999999971,44.416000000000004 -19.664999999999971,44.422000000000004 -19.668999999999969,44.428000000000004 -19.68799999999997,44.437000000000005 -19.702999999999971,44.434000000000005 -19.720999999999972,44.441000000000017 -19.722999999999974,44.436000000000007 -19.710999999999974,44.430000000000014 -19.68799999999997,44.428000000000004 -19.67599999999997,44.422000000000004 -19.676999999999971,44.420000000000009 -19.679999999999971,44.418000000000013 -19.700999999999972,44.418000000000013 -19.722999999999974,44.423000000000009 -19.729999999999972,44.421000000000006 -19.742999999999974,44.412000000000006 -19.750999999999973,44.411000000000008 -19.758999999999975,44.414000000000009 -19.775999999999975,44.417000000000016 -19.775999999999975,44.415000000000006 -19.771999999999974,44.408000000000008 -19.760999999999974,44.39800000000001 -19.760999999999974,44.394000000000013 -19.783999999999978,44.381000000000014 -19.814999999999976,44.388000000000005 -19.831999999999979,44.397000000000013 -19.844999999999978,44.409000000000006 -19.84699999999998,44.420000000000009 -19.83799999999998,44.433000000000007 -19.83499999999998,44.451000000000008 -19.84099999999998,44.454000000000015 -19.842999999999979,44.44700000000001 -19.850999999999978,44.437000000000005 -19.851999999999979,44.452000000000005 -19.848999999999979,44.457000000000008 -19.841999999999977,44.460000000000008 -19.84399999999998,44.467000000000013 -19.856999999999978,44.46200000000001 -19.879999999999981,44.45900000000001 -19.879999999999981,44.46200000000001 -19.86999999999998,44.469000000000008 -19.871999999999979,44.472000000000008 -19.882999999999981,44.477000000000004 -19.888999999999982,44.468000000000011 -19.901999999999983,44.475000000000009 -19.915999999999983,44.480000000000011 -19.953999999999983,44.486000000000004 -19.963999999999984,44.487000000000009 -19.968999999999987,44.485000000000007 -19.973999999999986,44.479000000000013 -19.983999999999988,44.478000000000016 -19.986999999999959,44.484000000000009 -19.983999999999988,44.492000000000012 -19.985999999999986,44.493000000000009 -19.988999999999987,44.491000000000014 -19.991999999999987,44.475000000000009 -20.000999999999987,44.469000000000008 -20.006999999999987,44.465000000000018 -20.012999999999987,44.466000000000015 -20.01699999999996,44.474000000000004 -20.01399999999996,44.488000000000007 -20.020999999999987,44.502000000000017 -20.021999999999963,44.478000000000016 -20.015999999999963,44.464000000000006 -20.009999999999987,44.461000000000006 -20.000999999999987,44.465000000000018 -19.996999999999986,44.466000000000015 -19.986999999999959,44.466000000000015 -19.984999999999985,44.466000000000015 -19.982999999999986,44.465000000000018 -19.983999999999988,44.463000000000008 -19.994999999999987,44.460000000000008 -20.000999999999987,44.45900000000001 -20.033999999999963,44.451000000000008 -20.037999999999961,44.449000000000005 -20.042999999999964,44.441000000000017 -20.047999999999963,44.441000000000017 -20.047999999999963,44.45000000000001 -20.048999999999964,44.465000000000018 -20.054999999999964,44.446000000000005 -20.060999999999964,44.437000000000005 -20.069999999999965,44.431000000000012 -20.078999999999965,44.434000000000005 -20.088999999999967,44.427000000000007 -20.089999999999964,44.424000000000007 -20.081999999999965,44.427000000000007 -20.075999999999965,44.426000000000009 -20.076999999999966,44.423000000000009 -20.102999999999966,44.409000000000006 -20.107999999999965,44.404000000000018 -20.103999999999967,44.396000000000008 -20.108999999999966,44.38900000000001 -20.124999999999968,44.375000000000007 -20.127999999999968,44.373000000000012 -20.128999999999966,44.373000000000012 -20.136999999999968,44.37700000000001 -20.132999999999967,44.38300000000001 -20.135999999999967,44.391000000000005 -20.139999999999969,44.394000000000013 -20.147999999999968,44.38900000000001 -20.145999999999969,44.38600000000001 -20.139999999999969,44.382000000000012 -20.140999999999966,44.380000000000017 -20.160999999999969,44.375000000000007 -20.156999999999968,44.372000000000014 -20.143999999999966,44.374000000000009 -20.135999999999967,44.368000000000016 -20.133999999999968,44.367000000000004 -20.139999999999969,44.366000000000007 -20.171999999999969,44.356000000000016 -20.173999999999971,44.357000000000014 -20.174999999999969,44.360000000000014 -20.16399999999997,44.364000000000004 -20.188999999999972,44.359000000000016 -20.192999999999969,44.356000000000016 -20.191999999999972,44.349000000000011 -20.189999999999969,44.347000000000016 -20.183999999999969,44.353000000000009 -20.174999999999969,44.348000000000013 -20.194999999999972,44.336000000000013 -20.196999999999971,44.332000000000015 -20.197999999999972,44.331000000000017 -20.20499999999997,44.32500000000001 -20.230999999999973,44.314000000000007 -20.241999999999972,44.304000000000009 -20.246999999999971,44.297000000000011 -20.257999999999974,44.295000000000016 -20.290999999999976,44.280000000000008 -20.297999999999977,44.268000000000008 -20.307999999999975,44.263000000000012 -20.330999999999978,44.258000000000017 -20.338999999999977,44.272000000000013 -20.345999999999979,44.278000000000006 -20.359999999999978,44.278000000000006 -20.342999999999979,44.261000000000017 -20.339999999999979,44.256000000000007 -20.341999999999977,44.253000000000007 -20.359999999999978,44.25200000000001 -20.380999999999979,44.244000000000007 -20.38799999999998,44.247000000000014 -20.392999999999979,44.244000000000007 -20.40799999999998,44.233000000000004 -20.424999999999983,44.209000000000017 -20.433999999999983,44.198000000000015 -20.430999999999983,44.198000000000015 -20.41699999999998,44.207000000000008 -20.431999999999981,44.190000000000012 -20.438999999999982,44.173000000000016 -20.441999999999982,44.169000000000004 -20.445999999999984,44.162000000000013 -20.478999999999985,44.140000000000015 -20.488999999999987,44.138000000000012 -20.498999999999985,44.137000000000015 -20.518999999999959,44.123000000000005 -20.531999999999961,44.120000000000005 -20.532999999999987,44.118000000000009 -20.521999999999959,44.117000000000012 -20.519999999999985,44.117000000000012 -20.512999999999987,44.119000000000007 -20.492999999999984,44.132000000000005 -20.484999999999985,44.131000000000007 -20.481999999999985,44.127000000000017 -20.489999999999984,44.116000000000014 -20.504999999999985,44.111000000000004 -20.538999999999987,44.103000000000016 -20.550999999999963,44.098000000000006 -20.579999999999963,44.08400000000001 -20.592999999999964,44.08100000000001 -20.602999999999966,44.08400000000001 -20.625999999999966,44.078000000000017 -20.640999999999966,44.070000000000007 -20.661999999999967,44.066000000000017 -20.685999999999968,44.057000000000009 -20.711999999999971,44.042000000000016 -20.725999999999971,44.025000000000006 -20.732999999999972,44.005000000000017 -20.736999999999973,44.00200000000001 -20.741999999999972,44.000000000000007 -20.754999999999974,43.996000000000009 -20.759999999999973,43.998000000000005 -20.760999999999974,44.000000000000007 -20.761999999999972,44.00200000000001 -20.754999999999974,44.018000000000015 -20.753999999999973,44.033000000000008 -20.760999999999974,44.034000000000006 -20.773999999999972,44.02000000000001 -20.781999999999975,44.009000000000007 -20.780999999999974,44.006000000000014 -20.773999999999972,44.000000000000007 -20.758999999999972,43.988000000000007 -20.752999999999972,43.985000000000007 -20.738999999999972,43.984000000000009 -20.743999999999971,43.972000000000008 -20.746999999999971,43.964000000000006 -20.750999999999973,43.96200000000001 -20.752999999999972,43.966000000000008 -20.753999999999973,43.968000000000018 -20.775999999999975,43.970000000000013 -20.783999999999974,43.967000000000006 -20.785999999999973,43.96200000000001 -20.802999999999976,43.951000000000008 -20.811999999999976,43.944000000000017 -20.797999999999973,43.94700000000001 -20.772999999999975,43.964000000000006 -20.764999999999972,43.965000000000011 -20.758999999999972,43.963000000000008 -20.757999999999974,43.96200000000001 -20.756999999999973,43.957000000000015 -20.762999999999973,43.955000000000005 -20.767999999999972,43.957000000000015 -20.770999999999972,43.958000000000013 -20.776999999999973,43.956000000000017 -20.797999999999973,43.937000000000005 -20.800999999999974,43.934000000000012 -20.807999999999975,43.931000000000004 -20.826999999999977,43.921000000000014 -20.841999999999977,43.910000000000011 -20.845999999999975,43.910000000000011 -20.846999999999976,43.914000000000009 -20.842999999999975,43.924000000000007 -20.844999999999978,43.925000000000004 -20.860999999999979,43.912000000000006 -20.852999999999977,43.903000000000006 -20.853999999999978,43.90100000000001 -20.883999999999979,43.896000000000015 -20.899999999999981,43.887000000000008 -20.906999999999979,43.884000000000015 -20.915999999999979,43.883000000000017 -20.943999999999981,43.88000000000001 -20.957999999999984,43.872000000000014 -20.980999999999984,43.874000000000009 -20.999999999999986,43.870000000000005 -21.014999999999986,43.868000000000009 -21.037999999999986,43.865000000000009 -21.106999999999964,43.850000000000009 -21.125999999999966,43.839000000000013 -21.142999999999965,43.840000000000011 -21.150999999999968,43.838000000000008 -21.174999999999969,43.823000000000015 -21.189999999999969,43.820000000000007 -21.221999999999969,43.806000000000004 -21.246999999999971,43.788000000000011 -21.267999999999972,43.76700000000001 -21.285999999999973,43.729000000000013 -21.297999999999973,43.727000000000011 -21.314999999999973,43.733000000000004 -21.320999999999977,43.730000000000011 -21.322999999999976,43.726000000000013 -21.309999999999974,43.719000000000008 -21.291999999999973,43.714000000000013 -21.284999999999972,43.70600000000001 -21.280999999999974,43.69700000000001 -21.283999999999974,43.691000000000017 -21.293999999999972,43.680000000000014 -21.296999999999972,43.666000000000011 -21.285999999999973,43.681000000000012 -21.281999999999972,43.684000000000005 -21.279999999999973,43.684000000000005 -21.279999999999973,43.671000000000006 -21.279999999999973,43.664000000000016 -21.282999999999973,43.64800000000001 -21.283999999999974,43.643000000000015 -21.292999999999974,43.638000000000005 -21.296999999999972,43.639000000000017 -21.303999999999974,43.647000000000006 -21.318999999999974,43.654000000000018 -21.306999999999974,43.644000000000013 -21.289999999999974,43.629000000000012 -21.287999999999972,43.626000000000005 -21.286999999999974,43.624000000000009 -21.286999999999974,43.619000000000014 -21.287999999999972,43.598000000000006 -21.296999999999972,43.594000000000015 -21.300999999999974,43.592000000000013 -21.304999999999975,43.593000000000018 -21.310999999999975,43.590000000000018 -21.313999999999975,43.58400000000001 -21.306999999999974,43.577000000000005 -21.302999999999972,43.57200000000001 -21.304999999999975,43.561000000000007 -21.306999999999974,43.551000000000009 -21.302999999999972,43.545000000000016 -21.311999999999973,43.528000000000006 -21.312999999999974,43.528000000000006 -21.314999999999973,43.528000000000006 -21.328999999999976,43.541000000000004 -21.332999999999977,43.540000000000006 -21.335999999999977,43.536000000000008 -21.330999999999975,43.531000000000006 -21.331999999999976,43.524000000000008 -21.333999999999975,43.519000000000005 -21.342999999999975,43.51100000000001 -21.349999999999977,43.508000000000017 -21.367999999999977,43.512000000000008 -21.370999999999977,43.510000000000012 -21.348999999999975,43.499000000000009 -21.331999999999976,43.504000000000005 -21.319999999999975,43.50200000000001 -21.318999999999974,43.50200000000001 -21.320999999999977,43.498000000000012 -21.350999999999978,43.492000000000004 -21.368999999999978,43.492000000000004 -21.380999999999979,43.496000000000016 -21.390999999999977,43.496000000000016 -21.375999999999976,43.488000000000007 -21.365999999999978,43.486000000000011 -21.359999999999978,43.485000000000014 -21.388999999999978,43.479000000000006 -21.391999999999978,43.479000000000006 -21.415999999999979,43.483000000000004 -21.43399999999998,43.481000000000009 -21.43699999999998,43.480000000000004 -21.434999999999981,43.477000000000004 -21.422999999999981,43.473000000000013 -21.41699999999998,43.476000000000006 -21.40799999999998,43.477000000000004 -21.403999999999979,43.476000000000006 -21.379999999999978,43.472000000000016 -21.394999999999978,43.469000000000008 -21.41699999999998,43.469000000000008 -21.424999999999979,43.471000000000004 -21.428999999999981,43.471000000000004 -21.455999999999982,43.470000000000006 -21.477999999999984,43.46200000000001 -21.481999999999982,43.463000000000008 -21.472999999999981,43.480000000000004 -21.472999999999981,43.491000000000007 -21.475999999999981,43.494000000000014 -21.482999999999983,43.482000000000006 -21.486999999999984,43.471000000000004 -21.491999999999983,43.467000000000006 -21.500999999999983,43.464000000000006 -21.510999999999985,43.471000000000004 -21.517999999999986,43.471000000000004 -21.517999999999986,43.463000000000008 -21.524999999999984,43.461000000000013 -21.531999999999986,43.46200000000001 -21.537999999999986,43.480000000000004 -21.540999999999986,43.467000000000006 -21.536999999999985,43.460000000000015 -21.543999999999986,43.46200000000001 -21.549999999999986,43.484000000000016 -21.553999999999959,43.488000000000007 -21.555999999999987,43.484000000000016 -21.552999999999987,43.474000000000011 -21.553999999999959,43.469000000000008 -21.557999999999986,43.466000000000008 -21.57199999999996,43.472000000000016 -21.596999999999987,43.477000000000004 -21.609999999999964,43.473000000000013 -21.611999999999963,43.475000000000009 -21.599999999999987,43.487000000000009 -21.600999999999964,43.489000000000004 -21.616999999999962,43.484000000000016 -21.629999999999963,43.476000000000006 -21.621999999999964,43.475000000000009 -21.619999999999962,43.473000000000013 -21.620999999999963,43.470000000000006 -21.649999999999967,43.463000000000008 -21.658999999999967,43.466000000000008 -21.687999999999967,43.489000000000004 -21.691999999999968,43.488000000000007 -21.668999999999965,43.46200000000001 -21.648999999999965,43.459000000000017 -21.648999999999965,43.457000000000008 -21.659999999999965,43.44400000000001 -21.659999999999965,43.439000000000007 -21.655999999999967,43.433000000000007 -21.656999999999965,43.429000000000009 -21.671999999999965,43.425000000000011 -21.714999999999968,43.39500000000001 -21.724999999999969,43.388000000000012 -21.740999999999971,43.368000000000009 -21.749999999999972,43.350000000000016 -21.755999999999972,43.346000000000004 -21.78399999999997,43.337000000000018 -21.800999999999974,43.33400000000001 -21.815999999999974,43.336000000000006 -21.869999999999976,43.330000000000005 -21.878999999999976,43.335000000000008 -21.883999999999975,43.342000000000006 -21.890999999999977,43.345000000000006 -21.906999999999979,43.341000000000008 -21.918999999999979,43.332000000000008 -21.912999999999979,43.327000000000012 -21.917999999999978,43.31900000000001 -21.922999999999981,43.317000000000007 -21.93699999999998,43.320000000000007 -21.944999999999979,43.318000000000005 -21.95199999999998,43.311000000000007 -21.93099999999998,43.314000000000014 -21.917999999999978,43.309000000000005 -21.896999999999977,43.308000000000007 -21.885999999999978,43.310000000000009 -21.868999999999975,43.304000000000009 -21.867999999999977,43.301000000000016 -21.869999999999976,43.298000000000009 -21.889999999999976,43.295000000000009 -21.891999999999978,43.290000000000013 -21.911999999999978,43.277000000000015 -21.93099999999998,43.283000000000008 -21.943999999999981,43.286000000000008 -21.953999999999979,43.285000000000004 -21.96599999999998,43.280000000000008 -21.972999999999981,43.274000000000008 -21.97199999999998,43.27000000000001 -21.963999999999981,43.27000000000001 -21.95999999999998,43.265000000000015 -21.961999999999982,43.26100000000001 -21.96899999999998,43.259000000000007 -21.993999999999982,43.264000000000017 -22.000999999999983,43.263000000000005 -21.999999999999982,44.000000000000007 -22.999999999999982,44.000000000000007