GDACS_DR_1015249_12
info-gdacs@gdacs.org
2022-05-29T22:00:00-00:00
Actual
Alert
Public
1015249
Geo
Drought
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Drought is on going in Spain, Portugal
The Drought alert level is Green.
https://www.gdacs.org/report.aspx?eventtype=DR&eventid=1015249
eventid
1015249
currentepisodeid
12
glide
version
0
fromdate
Thu, 21 Oct 2021 00:00:00 GMT
todate
Mon, 30 May 2022 00:00:00 GMT
eventtype
DR
alertlevel
Green
alerttype
agricultural drought
link
https://www.gdacs.org/report.aspx?eventtype=DR&amp;eventid=1015249
country
Spain, Portugal
eventname
Spain - Portugal-2021
severity
Minor impact for agricultural drought in 31463 km2
population
vulnerability
sourceid
GDO
iso3
ESP
hazardcomponents
datemodified
Wed, 01 Jun 2022 16:27:47 GMT
Polygon
40.000000000000007,-6.99999999999997 40.000000000000007,-6.8739999999999721 40.000000000000007,-5.999999999999968 41,-5.999999999999968 41,-6.9129999999999887 41,-6.99999999999997 40.234000000000009,-6.99999999999997 40.122000000000007,-6.99999999999997 40.000000000000007,-6.99999999999997
Polygon
37.000000000000028,-8.9469999999999761 37.000000000000028,-8.9459999999999873 37.005000000000017,-8.9349999999999739 37.011000000000017,-8.9299999999999855 37.01900000000002,-8.926999999999973 37.022000000000013,-8.9209999999999727 37.023000000000017,-8.90699999999997 37.036000000000016,-8.89599999999998 37.042000000000016,-8.8949999999999676 37.041000000000004,-8.8879999999999786 37.042000000000016,-8.8639999999999741 37.049000000000028,-8.8569999999999851 37.055000000000028,-8.8549999999999844 37.065000000000012,-8.8229999999999791 37.066000000000017,-8.8019999999999854 37.063000000000024,-8.7889999999999731 37.068000000000019,-8.7839999999999847 37.071000000000012,-8.7719999999999825 37.073000000000008,-8.75499999999999 37.078000000000017,-8.7429999999999879 37.084000000000024,-8.734999999999987 37.08600000000002,-8.7229999999999848 37.08600000000002,-8.7189999999999852 37.084000000000024,-8.7099999999999724 37.085000000000015,-8.685999999999968 37.079000000000015,-8.6679999999999886 37.084000000000024,-8.6659999999999862 37.091000000000015,-8.6699999999999875 37.101000000000013,-8.6689999999999774 37.103000000000016,-8.6679999999999886 37.106000000000023,-8.6639999999999873 37.111000000000018,-8.6589999999999758 37.118000000000023,-8.6429999999999723 37.123000000000019,-8.61999999999998 37.122000000000007,-8.5919999999999757 37.119000000000021,-8.5799999999999734 37.116000000000007,-8.5739999999999732 37.114000000000011,-8.5669999999999824 37.119000000000021,-8.5639999999999716 37.118000000000023,-8.5419999999999678 37.118000000000023,-8.5349999999999788 37.116000000000007,-8.5299999999999869 37.109000000000016,-8.5269999999999762 37.105000000000018,-8.5189999999999753 37.106000000000023,-8.5159999999999858 37.100000000000023,-8.5019999999999847 37.101000000000013,-8.493999999999982 37.100000000000023,-8.493999999999982 37.088000000000022,-8.4499999999999762 37.08600000000002,-8.4299999999999731 37.091000000000015,-8.4009999999999785 37.090000000000025,-8.39599999999999 37.09200000000002,-8.3909999999999769 37.095000000000013,-8.3859999999999886 37.09800000000002,-8.3819999999999872 37.100000000000023,-8.3769999999999758 37.102000000000004,-8.3689999999999749 37.099000000000018,-8.3519999999999825 37.089000000000013,-8.3299999999999788 37.076000000000022,-8.3089999999999868 37.073000000000008,-8.3019999999999747 37.072000000000017,-8.2859999999999729 37.074000000000019,-8.27799999999997 37.082000000000022,-8.26299999999998 37.08700000000001,-8.2539999999999889 37.08600000000002,-8.2439999999999873 37.082000000000022,-8.2339999999999858 37.084000000000024,-8.2189999999999728 37.088000000000022,-8.2139999999999826 37.089000000000013,-8.20199999999998 37.090000000000025,-8.1819999999999773 37.074000000000019,-8.1269999999999811 37.070000000000022,-8.12299999999998 37.069000000000031,-8.1129999999999782 37.064000000000021,-8.0959999999999859 37.052000000000014,-8.0709999999999713 37.010000000000012,-7.9999999999999716 38.000000000000021,-7.9999999999999716 38.001000000000019,-8.8519999999999719 37.984000000000023,-8.8609999999999847 37.969000000000008,-8.871999999999975 37.968000000000018,-8.8789999999999871 37.95800000000002,-8.8879999999999786 37.952000000000019,-8.8879999999999786 37.952000000000019,-8.886999999999988 37.949000000000005,-8.8789999999999871 37.954000000000015,-8.8679999999999755 37.947000000000024,-8.8579999999999739 37.943000000000005,-8.8559999999999732 37.939000000000021,-8.836999999999982 37.932000000000016,-8.8159999999999883 37.924000000000014,-8.8069999999999773 37.908000000000008,-8.7999999999999865 37.89700000000002,-8.7999999999999865 37.895000000000017,-8.7979999999999858 37.879000000000012,-8.7959999999999852 37.866000000000021,-8.7919999999999838 37.858000000000018,-8.7919999999999838 37.850000000000016,-8.7959999999999852 37.834000000000017,-8.7929999999999744 37.820000000000014,-8.7929999999999744 37.796000000000006,-8.8019999999999854 37.778000000000027,-8.802999999999976 37.753000000000014,-8.8069999999999773 37.749000000000009,-8.8129999999999775 37.742000000000019,-8.8099999999999881 37.736000000000018,-8.7969999999999757 37.724000000000018,-8.7919999999999838 37.718000000000018,-8.7889999999999731 37.718000000000018,-8.7869999999999742 37.714000000000013,-8.7859999999999836 37.710000000000015,-8.7899999999999849 37.704000000000015,-8.7959999999999852 37.69400000000001,-8.7919999999999838 37.674000000000007,-8.7959999999999852 37.661000000000016,-8.802999999999976 37.649000000000015,-8.8059999999999867 37.636000000000017,-8.8079999999999874 37.633000000000031,-8.8089999999999762 37.630000000000017,-8.8099999999999881 37.630000000000017,-8.811999999999987 37.618000000000016,-8.8129999999999775 37.610000000000014,-8.811999999999987 37.603000000000023,-8.8149999999999782 37.599000000000025,-8.81999999999999 37.581000000000017,-8.811999999999987 37.576000000000008,-8.802999999999976 37.574000000000012,-8.8049999999999766 37.567000000000021,-8.8009999999999753 37.564000000000028,-8.7979999999999858 37.560000000000024,-8.7959999999999852 37.558000000000028,-8.7949999999999751 37.543000000000013,-8.7889999999999731 37.533000000000015,-8.7859999999999836 37.524000000000022,-8.7869999999999742 37.52200000000002,-8.7869999999999742 37.518000000000022,-8.7869999999999742 37.514000000000017,-8.7899999999999849 37.503000000000029,-8.7939999999999863 37.501000000000005,-8.7919999999999838 37.501000000000005,-8.7959999999999852 37.499000000000024,-8.7969999999999757 37.480000000000011,-8.7969999999999757 37.47300000000002,-8.7979999999999858 37.463000000000022,-8.7999999999999865 37.452000000000012,-8.8019999999999854 37.447000000000017,-8.8019999999999854 37.443000000000019,-8.7999999999999865 37.443000000000019,-8.7959999999999852 37.435000000000016,-8.8059999999999867 37.430000000000021,-8.8089999999999762 37.419000000000011,-8.8069999999999773 37.414000000000023,-8.8079999999999874 37.384000000000015,-8.82499999999998 37.377000000000024,-8.82999999999997 37.362000000000009,-8.8399999999999714 37.355000000000018,-8.8459999999999717 37.352000000000011,-8.8449999999999829 37.350000000000009,-8.8459999999999717 37.330000000000005,-8.8639999999999741 37.322000000000024,-8.871999999999975 37.321000000000012,-8.877999999999977 37.319000000000017,-8.8789999999999871 37.307000000000009,-8.8769999999999865 37.27800000000002,-8.8659999999999748 37.275000000000027,-8.8619999999999735 37.270000000000017,-8.8599999999999746 37.25200000000001,-8.8679999999999755 37.221000000000018,-8.8849999999999874 37.206000000000024,-8.89599999999998 37.198000000000022,-8.90399999999998 37.199000000000012,-8.9109999999999712 37.196000000000019,-8.9179999999999833 37.183000000000007,-8.9139999999999819 37.175000000000011,-8.9109999999999712 37.170000000000016,-8.90299999999997 37.165000000000028,-8.90299999999997 37.156000000000013,-8.9099999999999824 37.15300000000002,-8.9099999999999824 37.137000000000022,-8.9189999999999721 37.108000000000004,-8.9379999999999846 37.09800000000002,-8.9479999999999862 37.09800000000002,-8.9509999999999774 37.097000000000016,-8.9539999999999882 37.094000000000023,-8.9589999999999783 37.071000000000012,-8.96299999999998 37.068000000000019,-8.9649999999999785 37.050000000000018,-8.9809999999999821 37.023000000000017,-8.9969999999999839 37.020000000000032,-8.9919999999999725 37.01900000000002,-8.9859999999999722 37.022000000000013,-8.9839999999999716 37.02500000000002,-8.9839999999999716 37.027000000000022,-8.96699999999998 37.02500000000002,-8.96399999999999 37.021000000000022,-8.9599999999999884 37.014000000000031,-8.9529999999999781 37.008000000000024,-8.9489999999999768 37.004000000000012,-8.9479999999999862 37.000000000000028,-8.9469999999999761
Polygon
36.007000000000019,-5.6079999999999943 36.010000000000012,-5.6050000000000049 36.011000000000017,-5.6010000000000035 36.012000000000015,-5.5999999999999934 36.012000000000015,-5.5879999999999912 36.015000000000022,-5.5740000000000105 36.023000000000025,-5.5529999999999964 36.032000000000011,-5.5389999999999944 36.03700000000002,-5.5169999999999915 36.044000000000018,-5.504 36.050000000000018,-5.495000000000009 36.055000000000007,-5.4859999999999971 36.050000000000018,-5.4650000000000043 36.058000000000021,-5.4470000000000018 36.071000000000012,-5.43000000000001 36.077000000000012,-5.426000000000009 36.083000000000013,-5.4269999999999987 36.08600000000002,-5.4410000000000007 36.089000000000013,-5.4430000000000014 36.102000000000004,-5.4399999999999906 36.103000000000016,-5.4399999999999906 36.119000000000021,-5.437 36.131000000000022,-5.43799999999999 36.139000000000024,-5.4470000000000018 36.155000000000022,-5.4450000000000021 36.172000000000018,-5.4309999999999992 36.177000000000014,-5.4249999999999989 36.178000000000019,-5.4140000000000077 36.180000000000021,-5.4140000000000077 36.181000000000012,-5.4100000000000072 36.181000000000012,-5.396999999999994 36.180000000000021,-5.384000000000003 36.175000000000011,-5.3789999999999916 36.17300000000003,-5.3820000000000032 36.169000000000011,-5.3820000000000032 36.169000000000011,-5.3709999999999907 36.164000000000016,-5.35900000000001 36.156000000000013,-5.3519999999999985 36.153000000000027,-5.3519999999999985 36.152000000000015,-5.3599999999999994 36.149000000000022,-5.3660000000000005 36.145000000000024,-5.3660000000000005 36.144000000000013,-5.3660000000000005 36.139000000000024,-5.35900000000001 36.128000000000014,-5.3550000000000093 36.119000000000021,-5.3519999999999985 36.111000000000018,-5.3510000000000089 36.109000000000016,-5.3470000000000084 36.123000000000019,-5.3410000000000073 36.129000000000019,-5.341999999999997 36.152000000000015,-5.3390000000000066 36.177000000000014,-5.3359999999999959 36.208000000000027,-5.3250000000000046 36.236000000000011,-5.3130000000000033 36.244000000000014,-5.3059999999999912 36.243000000000023,-5.29999999999999 36.246000000000009,-5.29599999999999 36.27800000000002,-5.2809999999999979 36.301000000000016,-5.2649999999999952 36.310000000000024,-5.2569999999999943 36.311000000000014,-5.2520000000000042 36.310000000000024,-5.2480000000000038 36.312000000000026,-5.246000000000004 36.316000000000024,-5.244999999999993 36.35100000000002,-5.2320000000000011 36.357000000000021,-5.2280000000000006 36.374000000000017,-5.2210000000000107 36.379000000000005,-5.2170000000000094 36.380000000000017,-5.2110000000000092 36.386000000000017,-5.2059999999999977 36.409000000000013,-5.1839999999999939 36.415000000000013,-5.1759999999999931 36.422000000000025,-5.14800000000001 36.429000000000016,-5.1220000000000061 36.434000000000005,-5.1080000000000041 36.450000000000024,-5.08100000000001 36.452000000000012,-5.0699999999999985 36.450000000000024,-5.0659999999999972 36.450000000000024,-5.0590000000000073 36.46100000000002,-5.033000000000003 36.462000000000032,-5.01599999999999 36.460000000000008,-5.00600000000001 36.463000000000022,-5.0000000000000089 36.477000000000025,-4.9789999999999957 36.482000000000014,-4.9649999999999928 36.485000000000021,-4.9569999999999919 36.490000000000016,-4.9480000000000013 36.499000000000024,-4.9359999999999991 36.505000000000024,-4.9130000000000065 36.507000000000012,-4.8910000000000036 36.508000000000017,-4.8669999999999991 36.507000000000012,-4.8589999999999982 36.503000000000007,-4.8429999999999964 36.502000000000017,-4.8369999999999953 36.498000000000019,-4.8109999999999911 36.486000000000018,-4.7570000000000041 36.483000000000004,-4.7399999999999913 36.486000000000018,-4.7319999999999895 36.487000000000023,-4.7109999999999976 36.490000000000016,-4.694999999999995 36.504000000000019,-4.6760000000000028 36.506000000000022,-4.66299999999999 36.507000000000012,-4.6620000000000008 36.507000000000012,-4.66 36.505000000000024,-4.654 36.507000000000012,-4.6379999999999972 36.519000000000013,-4.6290000000000067 36.537000000000013,-4.6210000000000049 36.555000000000014,-4.6110000000000033 36.571000000000019,-4.5899999999999892 36.576000000000015,-4.5769999999999982 36.580000000000013,-4.558000000000006 36.581000000000024,-4.5549999999999953 36.581000000000024,-4.5489999999999942 36.588000000000015,-4.530000000000002 36.594000000000015,-4.5189999999999895 36.593000000000025,-4.512 36.598000000000013,-4.5079999999999991 36.599000000000004,-4.5099999999999989 36.64500000000001,-4.4759999999999938 36.661000000000016,-4.4610000000000021 36.664000000000023,-4.455000000000001 36.674000000000007,-4.449 36.681000000000019,-4.445 36.686000000000014,-4.443 36.705000000000027,-4.4309999999999974 36.709000000000024,-4.4260000000000073 36.716000000000015,-4.4100000000000055 36.722000000000016,-4.3940000000000028 36.717000000000006,-4.3519999999999968 36.713000000000022,-4.3399999999999945 36.711000000000027,-4.3270000000000035 36.713000000000022,-4.3150000000000013 36.714000000000013,-4.303 36.714000000000013,-4.290000000000008 36.710000000000015,-4.2489999999999917 36.712000000000018,-4.2319999999999993 36.715000000000025,-4.1959999999999944 36.715000000000025,-4.1810000000000027 36.72000000000002,-4.16000000000001 36.72500000000003,-4.1080000000000023 36.728000000000016,-4.10099999999999 36.730000000000018,-4.1000000000000014 36.741000000000014,-4.08900000000001 36.748000000000019,-4.077000000000008 36.749000000000009,-4.0659999999999954 36.748000000000019,-4.0599999999999952 36.744000000000021,-4.0419999999999927 36.742000000000019,-4.0330000000000013 36.744000000000021,-4.0239999999999894 36.740000000000023,-4.0009999999999968 36.740000000000023,-4.0000000000000071 36.733000000000011,-3.9789999999999934 36.72600000000002,-3.95699999999999 36.734000000000016,-3.9379999999999979 36.741000000000014,-3.921000000000006 36.742000000000019,-3.9110000000000045 36.743000000000009,-3.8959999999999915 36.741000000000014,-3.8839999999999897 36.752000000000024,-3.8620000000000076 36.754000000000019,-3.8449999999999944 36.754000000000019,-3.8349999999999929 36.753000000000014,-3.8240000000000021 36.750000000000021,-3.8099999999999996 36.745000000000012,-3.7990000000000088 36.741000000000014,-3.7879999999999963 36.738000000000021,-3.7770000000000055 36.732000000000021,-3.773000000000005 36.729000000000006,-3.7650000000000037 36.735000000000014,-3.7619999999999925 36.737000000000009,-3.7590000000000026 36.738000000000021,-3.7550000000000021 36.739000000000011,-3.7539999999999911 36.738000000000021,-3.7530000000000019 36.737000000000009,-3.7479999999999905 36.728000000000016,-3.73600000000001 36.729000000000006,-3.7269999999999981 36.732000000000021,-3.7189999999999968 36.733000000000011,-3.7140000000000066 36.734000000000016,-3.7040000000000051 36.73100000000003,-3.6909999999999923 36.730000000000018,-3.6780000000000013 36.740000000000023,-3.6659999999999995 36.743000000000009,-3.6619999999999986 36.743000000000009,-3.6470000000000073 36.742000000000019,-3.637999999999995 36.741000000000014,-3.6210000000000031 36.744000000000021,-3.6019999999999897 36.741000000000014,-3.5989999999999998 36.724000000000018,-3.5800000000000076 36.719000000000023,-3.5669999999999948 36.715000000000025,-3.5509999999999926 36.722000000000016,-3.5349999999999904 36.72500000000003,-3.5270000000000103 36.722000000000016,-3.5170000000000088 36.698000000000015,-3.4819999999999927 36.693000000000019,-3.4679999999999906 36.695000000000022,-3.4520000000000097 36.695000000000022,-3.4289999999999954 36.69400000000001,-3.4200000000000048 36.703000000000024,-3.4109999999999929 36.702000000000012,-3.406999999999992 36.712000000000018,-3.3730000000000082 36.716000000000015,-3.3619999999999961 36.718000000000018,-3.3630000000000067 36.729000000000006,-3.3499999999999943 36.738000000000021,-3.3379999999999925 36.739000000000011,-3.3290000000000015 36.742000000000019,-3.3179999999999894 36.738000000000021,-3.3049999999999979 36.744000000000021,-3.2829999999999946 36.748000000000019,-3.274000000000004 36.748000000000019,-3.2729999999999935 36.755000000000017,-3.2500000000000004 36.754000000000019,-3.2439999999999998 36.750000000000021,-3.2330000000000085 36.752000000000024,-3.2319999999999975 36.751000000000012,-3.2270000000000079 36.749000000000009,-3.2219999999999964 36.745000000000012,-3.2119999999999949 36.746000000000024,-3.207999999999994 36.749000000000009,-3.2039999999999935 36.750000000000021,-3.2030000000000038 36.750000000000021,-3.1870000000000016 36.750000000000021,-3.18199999999999 36.747000000000014,-3.1589999999999976 36.745000000000012,-3.1449999999999951 36.750000000000021,-3.1349999999999936 36.751000000000012,-3.1289999999999929 36.750000000000021,-3.1089999999999898 36.746000000000024,-3.0710000000000055 36.747000000000014,-3.0610000000000039 36.747000000000014,-3.0220000000000087 36.742000000000019,-3.0080000000000067 36.743000000000009,-3.0000000000000053 37.000000000000028,-3.0000000000000053 37.000000000000028,-4.0000000000000071 37.000000000000028,-5.0000000000000089 37.000000000000028,-5.999999999999968 36.181000000000012,-5.999999999999968 36.177000000000014,-5.9809999999999972 36.181000000000012,-5.9589999999999943 36.187000000000012,-5.9449999999999923 36.179000000000009,-5.9259999999999993 36.182000000000023,-5.9269999999999889 36.186000000000021,-5.9239999999999995 36.185000000000009,-5.9150000000000089 36.156000000000013,-5.873000000000002 36.127000000000024,-5.8420000000000085 36.114000000000011,-5.832000000000007 36.102000000000004,-5.8260000000000058 36.101000000000013,-5.8180000000000049 36.089000000000013,-5.8060000000000027 36.087000000000018,-5.8049999999999917 36.078000000000024,-5.7969999999999908 36.08100000000001,-5.78899999999999 36.088000000000022,-5.784 36.088000000000022,-5.775999999999998 36.083000000000013,-5.7659999999999965 36.071000000000012,-5.7510000000000048 36.060000000000016,-5.72399999999999 36.059000000000012,-5.7089999999999987 36.062000000000019,-5.7000000000000082 36.067000000000007,-5.6949999999999967 36.067000000000007,-5.6889999999999956 36.058000000000021,-5.6709999999999932 36.053000000000011,-5.652000000000001 36.044000000000018,-5.63900000000001 36.021000000000022,-5.6170000000000062 36.007000000000019,-5.6079999999999943