GDACS_FL_2020_1
info-gdacs@gdacs.org
2002-08-11T21:59:59-00:00
Actual
Alert
Public
2020
Geo
Flood
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green flood alert in South Korea
On 05/08/2002, a flood started in South Korea, lasting until 11/08/2002 (last update). The flood caused 21 killed and 26000 displaced .
http://www.gdacs.org/report.aspx?eventtype=FL&eventid=2020
eventid
2020
currentepisodeid
1
glide
0
version
1
fromdate
Sun, 04 Aug 2002 22:00:00 GMT
todate
Sun, 11 Aug 2002 21:59:59 GMT
eventtype
FL
alertlevel
Green
alerttype
automatic
link
http://www.gdacs.org/report.aspx?eventtype=FL&amp;eventid=2020
country
South Korea
eventname
severity
Magnitude 5.32
population
21 killed and 26000 displaced
vulnerability
sourceid
DFO
iso3
hazardcomponents
FL,dead=21,displaced=26000,main_cause=Heavy rain,severity=1,sqkm=29669.25
datemodified
Thu, 28 May 2015 11:47:27 GMT
Polygon
39.520230000000083,125.44001000000003 39.518005000000073,125.39787000000001 39.506550000000061,125.39874000000009 39.502785000000074,125.40483000000006 39.500095000000044,125.40151000000003 39.499725000000069,125.39648 39.497715000000085,125.39348000000007 39.48844500000007,125.38702 39.473541000000068,125.36153000000002 39.47165700000005,125.35879 39.469284000000073,125.3512300000001 39.465668000000051,125.34559000000002 39.460468000000049,125.34116000000006 39.452007000000037,125.33758 39.440739000000065,125.34352000000001 39.435131000000069,125.34573 39.434601000000043,125.35014000000001 39.434265000000039,125.35662000000002 39.438122000000078,125.35850000000005 39.435204000000056,125.36874 39.439495000000079,125.37210000000005 39.440983000000074,125.37893000000008 39.448681000000079,125.38386000000003 39.449249000000066,125.39066000000003 39.446953000000065,125.39119000000005 39.442932000000042,125.38548000000003 39.438625000000059,125.38300000000004 39.42547200000007,125.36228000000006 39.421776000000079,125.35068000000001 39.377983000000086,125.37269000000003 39.376682000000073,125.39003000000002 39.374805000000038,125.39658000000009 39.362350000000049,125.40235000000007 39.354900000000043,125.40518000000009 39.336521000000062,125.40226000000007 39.333221000000037,125.41348000000005 39.324543000000062,125.40955000000008 39.318066000000044,125.4131000000001 39.316010000000063,125.41759000000002 39.309811000000082,125.4194 39.309071000000074,125.42420000000004 39.310375000000079,125.42972000000009 39.314419000000044,125.43371000000002 39.314941000000033,125.44195000000002 39.317192000000034,125.44416000000001 39.322731000000033,125.45462000000009 39.320610000000045,125.45810000000006 39.314751000000058,125.45293000000004 39.304077000000063,125.43495000000007 39.303062000000068,125.42757000000006 39.297478000000069,125.41975000000002 39.296707000000083,125.41119000000003 39.293831000000068,125.40552000000002 39.282707000000073,125.40021000000002 39.279255000000035,125.40129000000002 39.276676000000066,125.40475000000004 39.275822000000062,125.41444000000001 39.27911800000004,125.42248000000006 39.278370000000052,125.42599000000007 39.275833000000034,125.42709000000002 39.269032000000038,125.42338000000007 39.253769000000034,125.43237000000011 39.251766000000089,125.42907000000002 39.257446000000073,125.41834000000006 39.26463700000005,125.41266000000007 39.265614000000085,125.40915000000007 39.264534000000083,125.40556000000004 39.264099000000044,125.40411000000006 39.257839000000047,125.3954 39.249435000000062,125.39164000000005 39.243149000000074,125.38440000000003 39.236900000000048,125.38835000000006 39.229816000000085,125.3875700000001 39.217903000000035,125.40165000000002 39.217350000000067,125.39399000000003 39.220650000000035,125.3882000000001 39.228046000000063,125.38399000000004 39.234394000000066,125.37416000000007 39.229023000000041,125.36696000000006 39.227104000000054,125.35867000000007 39.209122000000036,125.33877000000007 39.201424000000088,125.33386000000007 39.196507000000054,125.32667000000004 39.193176000000051,125.33423000000005 39.19180300000005,125.33419000000004 39.185677000000055,125.31697000000008 39.176418000000069,125.30938000000003 39.172180000000083,125.3025100000001 39.163509000000033,125.30081000000007 39.160618000000056,125.29574000000002 39.154255000000035,125.29292000000009 39.145073000000082,125.2944500000001 39.130524000000037,125.2881900000001 39.121624000000054,125.28649000000007 39.116890000000069,125.28196000000003 39.110336000000075,125.29029000000003 39.109642000000065,125.29117000000008 39.109749000000079,125.29881 39.10788000000008,125.30111000000011 39.105934000000047,125.29401000000007 39.100517000000082,125.28917000000001 39.095226000000082,125.29079000000002 39.090313000000037,125.28333000000009 39.084709000000089,125.27584000000002 39.080009000000075,125.26926000000003 39.078491000000042,125.26324 39.076168000000052,125.26102000000003 39.066460000000063,125.2577500000001 39.04449500000004,125.2459 39.024899000000062,125.23071000000004 39.018940000000043,125.22251000000006 39.002415000000042,125.21066000000008 38.99873400000007,125.21174000000008 38.994537000000037,125.21819000000005 38.993816000000038,125.21126000000004 38.995564000000059,125.20105000000001 38.987656000000072,125.19553000000008 38.986172000000067,125.18771000000004 38.983002000000056,125.18599000000006 38.97944300000006,125.18877000000009 38.974659000000088,125.18784000000005 38.975220000000036,125.1931800000001 38.97509800000006,125.20137 38.972694000000047,125.2049300000001 38.972061000000053,125.20432000000005 38.940865000000088,125.17864000000009 38.926006000000086,125.17313000000001 38.906906000000049,125.16706000000011 38.879845000000046,125.15097000000003 38.876583000000039,125.14485000000002 38.876221000000044,125.13840000000005 38.878674000000046,125.12762000000009 38.875031000000035,125.12637000000007 38.867722000000072,125.12502000000006 38.872402000000079,125.13363000000004 38.868198000000064,125.13908000000004 38.865433000000053,125.14019000000008 38.86362100000008,125.13898000000006 38.859695000000045,125.14093000000003 38.856430000000046,125.14495 38.85351600000007,125.15601000000004 38.851463000000081,125.15536000000009 38.848808000000076,125.14915000000008 38.847706000000073,125.14650000000006 38.842941000000053,125.14346 38.836994000000061,125.14302000000009 38.835999000000072,125.14826000000005 38.831215000000043,125.14668000000006 38.819202000000075,125.13850000000002 38.809608000000082,125.13709000000006 38.805721000000062,125.13671000000011 38.796722000000045,125.1411700000001 38.788170000000036,125.14623000000006 38.78398100000004,125.15081000000009 38.78550000000007,125.15640000000008 38.786762000000067,125.16345000000001 38.779827000000068,125.16767000000004 38.778023000000076,125.16587000000004 38.770409000000086,125.16978000000006 38.769592000000046,125.17794000000004 38.771820000000048,125.18209000000002 38.776756000000034,125.18864000000008 38.784264000000064,125.19176000000004 38.783997000000056,125.19438000000002 38.778732000000048,125.19425000000001 38.766876000000082,125.19074 38.761795000000063,125.1935400000001 38.758987000000047,125.19727 38.75203300000004,125.20265000000006 38.750996000000043,125.21052000000009 38.73840000000007,125.21049000000005 38.73797200000007,125.22305000000006 38.746979000000067,125.21831000000009 38.750645000000077,125.21811000000002 38.761944000000085,125.22775000000001 38.773808000000088,125.23067000000003 38.797997000000066,125.22163 38.809181000000081,125.20934 38.811878000000036,125.21262000000002 38.810444000000075,125.21639000000005 38.805614000000048,125.21774000000005 38.802788000000078,125.22263000000009 38.803429000000051,125.22558000000004 38.808064000000059,125.22887000000003 38.810673000000065,125.23073000000011 38.811329000000057,125.2328 38.805595000000039,125.23324000000002 38.791454000000044,125.22966000000008 38.786854000000062,125.23101000000008 38.785381000000086,125.23711000000003 38.774784000000068,125.24123000000009 38.778820000000053,125.24660000000006 38.772781000000066,125.25170000000003 38.77225100000004,125.25637000000006 38.774406000000056,125.26461000000006 38.772762000000057,125.2672 38.768410000000074,125.26738 38.764450000000068,125.27137000000005 38.765762000000052,125.26118000000008 38.764080000000035,125.25178000000005 38.760445000000061,125.24993000000006 38.750935000000084,125.25034000000005 38.739029000000073,125.24295000000006 38.738171000000079,125.23943000000008 38.734791000000087,125.23583000000008 38.726845000000083,125.23154 38.72531500000008,125.22683000000006 38.721912000000088,125.22498000000007 38.718006000000059,125.22577000000001 38.716595000000041,125.22807 38.716461000000038,125.23653000000002 38.708050000000071,125.24684000000002 38.700024000000042,125.26183000000003 38.693260000000066,125.26925000000006 38.687553000000037,125.28224 38.686550000000068,125.28748000000007 38.689697000000081,125.29106000000002 38.688419000000067,125.29807000000005 38.691986000000043,125.30042000000003 38.698269000000039,125.29917 38.702351000000078,125.30162000000007 38.70115700000008,125.30450000000008 38.705311000000052,125.31660000000011 38.707569000000035,125.31841000000009 38.713352000000043,125.31506000000002 38.71637000000004,125.3125 38.722969000000035,125.30128000000002 38.724365000000034,125.29986000000008 38.726158000000055,125.3022400000001 38.722534000000053,125.31384000000003 38.716396000000088,125.32478000000003 38.719566000000043,125.32690000000002 38.724407000000042,125.33000000000004 38.717625000000055,125.33357000000001 38.709770000000049,125.33746000000008 38.711178000000075,125.34917000000007 38.714397000000076,125.36182000000008 38.718067000000076,125.3616300000001 38.726166000000035,125.3565900000001 38.734608000000037,125.3585700000001 38.73867400000006,125.36189000000002 38.746319000000085,125.35684000000003 38.749035000000049,125.35867000000007 38.747562000000073,125.3644700000001 38.749229000000071,125.37417000000005 38.733147000000088,125.36379 38.727428000000089,125.36335000000008 38.722599000000059,125.36439000000007 38.716331000000082,125.36948000000007 38.713951000000066,125.37467000000004 38.713249000000076,125.38897000000009 38.715172000000052,125.39691000000005 38.73125500000009,125.43359000000009 38.735550000000046,125.4369200000001 38.739220000000046,125.43644000000006 38.743885000000034,125.4316 38.747566000000063,125.41767000000004 38.749168000000054,125.41772000000003 38.749771000000067,125.42241000000001 38.751701000000082,125.42516 38.753124000000071,125.42719 38.748913000000073,125.43233000000009 38.752228000000059,125.43914000000007 38.752171000000089,125.44236000000001 38.748417000000074,125.44751000000008 38.743553000000077,125.45059000000003 38.73954800000007,125.45691000000011 38.739723000000083,125.4598400000001 38.731781000000069,125.46867000000009 38.726448000000062,125.45947000000001 38.723907000000054,125.4605600000001 38.721546000000046,125.46458000000007 38.71910100000008,125.47328000000005 38.723873000000083,125.47546 38.723373000000038,125.47778000000005 38.714481000000035,125.48834000000011 38.716431000000057,125.49454000000003 38.723900000000071,125.49943000000007 38.723103000000037,125.50554 38.719009000000085,125.5165300000001 38.717751000000078,125.52798000000007 38.717636000000084,125.5290500000001 38.715103000000056,125.52985000000001 38.710354000000052,125.52650000000006 38.708229000000074,125.5299500000001 38.709156000000064,125.54195000000004 38.703636000000074,125.55552 38.697838000000047,125.55944 38.697102000000086,125.56205 38.685574000000088,125.55331000000001 38.684677000000079,125.55263000000002 38.687996000000055,125.54659000000004 38.688343000000089,125.54018000000008 38.68163700000008,125.53122000000008 38.672131000000036,125.52510000000007 38.669025000000033,125.51946000000009 38.669586000000038,125.51393000000007 38.672173000000043,125.51021000000003 38.681404000000043,125.50639000000001 38.687641000000042,125.49079000000006 38.697979000000089,125.47619000000009 38.699684000000047,125.47039000000007 38.700409000000036,125.45551 38.707039000000066,125.44314000000008 38.709202000000062,125.43736000000001 38.709290000000067,125.43240000000003 38.705853000000047,125.43259 38.701576000000045,125.42809 38.696651000000088,125.4346700000001 38.690010000000086,125.43478000000005 38.685772000000043,125.44138000000009 38.680897000000073,125.43189000000007 38.686813000000086,125.42822000000001 38.683811000000048,125.42307000000005 38.682827000000088,125.39421000000004 38.68628700000005,125.38871000000006 38.685089000000062,125.37965000000008 38.688061000000062,125.36253000000011 38.668850000000077,125.34659000000011 38.671459000000084,125.34140000000002 38.67205000000007,125.33324000000005 38.674854000000039,125.33010000000002 38.66811800000005,125.32204000000002 38.66282300000006,125.32365000000004 38.661240000000078,125.32244000000003 38.659103000000073,125.31304 38.655651000000034,125.31412 38.653980000000047,125.31816000000003 38.651237000000037,125.31779000000006 38.643406000000084,125.30679000000009 38.638844000000063,125.30550000000005 38.626667000000054,125.30782000000011 38.623863000000085,125.31124 38.621567000000084,125.3114700000001 38.622150000000033,125.3039 38.624516000000085,125.29929000000004 38.646339000000069,125.29549000000009 38.650566000000083,125.28917000000001 38.651188000000047,125.27897000000007 38.655655000000081,125.27208000000007 38.656460000000038,125.26480000000004 38.658527000000049,125.26427000000001 38.662560000000042,125.26992000000007 38.66486400000008,125.26910000000009 38.666546000000039,125.26418000000001 38.662991000000034,125.25738000000001 38.662376000000052,125.25298000000009 38.657600000000059,125.25082000000009 38.657738000000052,125.24236000000008 38.653923000000077,125.23729000000003 38.654438000000084,125.23380000000009 38.652885000000083,125.23055000000011 38.647461000000078,125.22604000000001 38.649158000000057,125.21995000000004 38.646168000000046,125.21165000000008 38.645870000000059,125.21082000000001 38.646542000000068,125.19711000000007 38.649414000000036,125.18931000000009 38.660110000000088,125.17876000000001 38.663155000000074,125.17446000000007 38.663460000000043,125.16950000000008 38.660259000000053,125.16914000000008 38.642536000000064,125.17484000000002 38.634888000000046,125.18078000000003 38.630295000000046,125.18154000000004 38.622330000000034,125.17813000000001 38.618519000000049,125.1727800000001 38.618168000000082,125.16577000000007 38.622112000000072,125.16266000000007 38.625694000000067,125.15311000000008 38.635368000000085,125.14956000000006 38.643291000000033,125.14041000000009 38.652039000000059,125.1377 38.657383000000038,125.1325700000001 38.665226000000075,125.12896 38.668518000000063,125.1232 38.666286000000071,125.11935000000005 38.661293000000057,125.11632000000009 38.660709000000054,125.11352000000011 38.660439000000054,125.11221 38.657951000000082,125.11011000000008 38.650646000000052,125.10847000000001 38.647121000000084,125.11423000000002 38.643284000000051,125.11063000000001 38.640083000000061,125.11027000000001 38.634754000000044,125.11423000000002 38.635086000000058,125.12270000000001 38.625946000000056,125.12132000000008 38.617126000000042,125.12898000000007 38.61251800000008,125.13091000000009 38.604782000000057,125.12753000000009 38.59508100000005,125.1328400000001 38.591228000000058,125.13012000000003 38.592880000000036,125.12695000000008 38.59063000000009,125.12427000000002 38.585064000000045,125.12880000000007 38.58404900000005,125.13548000000003 38.581242000000088,125.13921000000005 38.57685500000008,125.1414400000001 38.568165000000079,125.14065000000005 38.564789000000076,125.13678000000004 38.569424000000083,125.13309000000004 38.570877000000053,125.12788 38.57388300000008,125.12591000000009 38.568817000000081,125.11267000000009 38.570034000000078,125.10774000000004 38.572598000000085,125.10488000000009 38.573448000000042,125.09383000000003 38.577206000000047,125.08749 38.575867000000073,125.08513000000005 38.571987000000036,125.08417000000009 38.562107000000083,125.08627000000001 38.549343000000079,125.08218000000011 38.544140000000084,125.07769000000008 38.541157000000055,125.07791000000009 38.537338000000034,125.07287000000008 38.549255000000073,125.05682000000002 38.553314000000057,125.04525000000001 38.552505000000053,125.03794000000005 38.55436300000008,125.03623000000005 38.562702000000058,125.04546000000005 38.562614000000053,125.05158000000006 38.566265000000044,125.05254000000002 38.573517000000038,125.04221000000007 38.583870000000047,125.03894000000003 38.578735000000052,125.0295000000001 38.578197000000046,125.02651000000003 38.577461000000085,125.02247 38.577599000000077,125.01285000000007 38.581200000000081,125.00126 38.582253000000037,125 38.589352000000076,124.99152000000004 38.58334700000006,124.97855000000004 38.584003000000052,124.96428000000003 38.58195500000005,124.96336000000008 38.574112000000071,124.98389000000009 38.569256000000053,124.98729000000003 38.566898000000037,124.99220000000003 38.550587000000064,124.99563 38.536205000000052,124.99210000000005 38.529888000000085,124.98526000000004 38.528492000000085,124.98593000000005 38.527584000000047,124.98637000000008 38.527847000000065,125 38.523621000000048,125.00756000000001 38.509567000000061,125.01337000000001 38.500149000000079,125.01520000000005 38.492615000000058,125.01328000000001 38.474922000000049,125.0009500000001 38.474232000000086,125 38.451996000000065,124.96957000000009 38.447411000000045,124.9700600000001 38.445271000000048,124.97555 38.44133000000005,124.97895000000005 38.437943000000075,124.97539000000006 38.435429000000056,124.97504000000004 38.430897000000073,124.97145 38.431419000000062,124.96680000000003 38.441055000000063,124.96584000000007 38.45074800000009,124.96053000000006 38.460369000000071,124.96044000000006 38.457443000000069,124.95660000000009 38.445850000000064,124.95023000000003 38.445385000000044,124.94954000000007 38.437092000000064,124.93723 38.422073000000069,124.92993000000001 38.415516000000082,124.9236800000001 38.39998200000008,124.9204400000001 38.395924000000036,124.91570000000002 38.401886000000047,124.91552000000001 38.37100200000009,124.8948200000001 38.36135100000007,124.87979000000007 38.351887000000033,124.87150000000008 38.349121000000082,124.86907000000008 38.345520000000079,124.86405000000002 38.343998000000056,124.85792000000004 38.339661000000035,124.85667000000001 38.328167000000064,124.85963000000004 38.315838000000042,124.87392 38.30664100000007,124.87663000000009 38.265995000000089,124.86651000000006 38.253578000000061,124.86974000000009 38.242008000000055,124.87851 38.241253000000086,124.88123000000007 38.241047000000037,124.88197000000002 38.242126000000042,124.88693 38.239540000000034,124.89211 38.236843000000079,124.88799000000006 38.234108000000049,124.88705000000004 38.23177000000004,124.89049 38.227928000000077,124.88663000000008 38.223022000000071,124.89379000000008 38.223186000000055,124.89845000000003 38.217503000000079,124.89513 38.216732000000036,124.90150000000006 38.22031000000004,124.90796 38.214725000000044,124.91452000000004 38.213955000000055,124.92060000000004 38.216255000000046,124.93690000000004 38.225697000000082,124.9501600000001 38.22828700000008,124.9615500000001 38.227451000000087,124.97227000000009 38.228470000000073,124.98158000000001 38.226509000000078,124.99054000000001 38.222164000000078,124.98986000000002 38.220703000000071,124.99622000000011 38.218861000000061,124.99676 38.215714000000048,124.9926200000001 38.215199000000041,124.98013000000003 38.219036000000074,124.96802000000002 38.217091000000039,124.95956000000001 38.219009000000085,124.9532200000001 38.216297000000054,124.95055000000002 38.210533000000055,124.95303000000001 38.207363000000043,124.95036000000005 38.205517000000043,124.93465000000003 38.203701000000081,124.93344000000002 38.200710000000072,124.93425000000002 38.198334000000045,124.94058000000007 38.196018000000038,124.9422800000001 38.194462000000044,124.93876 38.193935000000067,124.9271500000001 38.187218000000087,124.91540000000009 38.18767900000006,124.91483000000005 38.188850000000059,124.91340000000002 38.193184000000088,124.91494 38.199635000000058,124.91218000000003 38.208755000000053,124.91556000000003 38.212460000000078,124.91273000000001 38.212982000000068,124.90781000000004 38.20882000000006,124.89350000000002 38.213440000000048,124.89069000000006 38.210793000000081,124.88280000000009 38.211765000000071,124.87847000000011 38.213383000000078,124.87763000000007 38.217457000000081,124.88148000000001 38.225517000000082,124.87817000000007 38.221962000000076,124.86997000000008 38.224049000000036,124.8679800000001 38.230637000000058,124.87218000000007 38.233849000000077,124.87196000000006 38.237316000000078,124.86941000000002 38.237587000000076,124.86622 38.217903000000035,124.84593000000007 38.191914000000054,124.81916000000001 38.181107000000054,124.80415000000005 38.179718000000037,124.80528000000004 38.187019000000078,124.82574 38.186497000000088,124.83066000000008 38.183971000000042,124.83119000000011 38.181496000000038,124.82766000000004 38.178432000000043,124.81628 38.167194000000052,124.7989500000001 38.170723000000066,124.79176000000007 38.180054000000041,124.78030000000001 38.180492000000072,124.7797700000001 38.18098800000007,124.77688 38.167580000000044,124.76792 38.158291000000077,124.75933000000009 38.141838000000064,124.73669000000007 38.135143000000085,124.72179000000006 38.134827000000087,124.70989000000009 38.137947000000054,124.69777000000011 38.135880000000043,124.67860000000007 38.139912000000038,124.66649000000007 38.138371000000063,124.66124000000002 38.130962000000068,124.65480000000002 38.128841000000079,124.65295000000003 38.125160000000051,124.65434000000005 38.117229000000066,124.66666000000009 38.115257000000042,124.67881 38.108921000000066,124.69173 38.095013000000051,124.76249000000007 38.093964000000085,124.77348000000006 38.095230000000072,124.7822000000001 38.093983000000037,124.79028000000005 38.094837000000041,124.79694000000006 38.09502800000007,124.79842000000008 38.102348000000063,124.81740000000002 38.103859000000057,124.84264000000007 38.106213000000082,124.85545000000002 38.112450000000081,124.86919 38.120316000000059,124.8809500000001 38.12193300000007,124.87982 38.122929000000056,124.87405000000001 38.131321000000071,124.88030000000003 38.135376000000065,124.88560000000007 38.134884000000056,124.88821000000007 38.124825000000044,124.88655000000006 38.118206000000043,124.90178000000003 38.116447000000051,124.90764000000001 38.112930000000063,124.91935000000001 38.102417000000059,124.93420000000003 38.093956000000048,124.94968000000006 38.078266000000042,124.99048000000005 38.072670000000073,124.99731000000008 38.069462000000044,125 38.061539000000039,125.00663000000009 38.061947000000089,125.01012000000003 38.070396000000073,125.01204000000007 38.072838000000047,125.01760000000002 38.074306000000036,125.02719000000002 38.073311000000047,125.03268000000003 38.067711000000088,125.03951000000006 38.066265000000044,125.0444 38.071640000000059,125.05292000000009 38.074455000000057,125.06428000000005 38.074875000000077,125.08225000000004 38.081165000000055,125.09080000000006 38.091179000000068,125.12581 38.091778000000033,125.13162 38.087029000000086,125.1425200000001 38.087811000000045,125.15123000000006 38.093922000000077,125.17108000000007 38.094513000000063,125.17719 38.093285000000037,125.18237000000011 38.087757000000067,125.18427000000008 38.087772000000086,125.19788000000005 38.078228000000081,125.22170000000006 38.083565000000078,125.23198000000002 38.085659000000078,125.24420000000009 38.081367000000057,125.25452000000007 38.080589000000089,125.26001000000008 38.077808000000061,125.26196000000004 38.072113000000058,125.25980000000004 38.069168000000047,125.2718900000001 38.064507000000049,125.2767 38.059921000000088,125.27686000000006 38.067089000000067,125.25880000000006 38.066685000000064,125.25560000000007 38.060097000000042,125.25196000000005 38.056328000000065,125.24404000000004 38.050865000000044,125.24187000000006 38.050499000000059,125.23608000000002 38.044136000000037,125.23273000000006 38.03949700000004,125.2360900000001 38.032654000000036,125.23418000000004 38.029659000000038,125.23526000000004 38.027279000000078,125.24071000000004 38.02177400000005,125.24114000000009 38.018970000000081,125.24426000000005 38.016560000000084,125.23754000000008 38.017330000000072,125.23235 38.022968000000049,125.2238000000001 38.02197300000006,125.21423000000004 38.023621000000048,125.21165000000008 38.028118000000063,125.21698000000004 38.032219000000055,125.2185300000001 38.033909000000051,125.21764000000007 38.041695000000061,125.21355000000005 38.045700000000068,125.20641 38.044865000000073,125.19627000000003 38.048519000000056,125.20213000000001 38.051277000000084,125.20162000000005 38.055851000000075,125.18784000000005 38.056873000000053,125.18091000000004 38.055492000000072,125.16668000000004 38.051441000000068,125.16195000000005 38.049015000000054,125.15581000000009 38.047970000000078,125.14912000000004 38.048813000000052,125.13900000000001 38.045490000000086,125.13168000000007 38.046234000000084,125.12794000000008 38.044014000000061,125.1232500000001 38.047787000000085,125.11610000000007 38.044418000000064,125.11167 38.029781000000071,125.10712000000001 38.025257000000067,125.10572000000002 38.023941000000036,125.10193000000004 38.020260000000064,125.10271 38.013271000000088,125.1103700000001 38.007523000000049,125.11168000000009 38.00402100000008,125.11594000000002 37.99228700000009,125.11913000000004 37.98613000000006,125.11697000000004 37.98495500000007,125.1189700000001 37.988998000000038,125.12427000000002 37.987991000000079,125.1303200000001 37.989922000000035,125.13905 37.987846000000047,125.13987000000009 37.977615000000071,125.13441 37.973347000000047,125.12881000000004 37.971268000000066,125.12993000000006 37.973915000000034,125.13664000000006 37.972607000000039,125.14732000000004 37.977501000000075,125.15669000000003 37.979668000000061,125.16485 37.982216000000051,125.16911000000005 37.984581000000048,125.17307000000005 37.980907000000059,125.17356000000007 37.977112000000034,125.1671 37.975208000000066,125.17168000000004 37.973362000000066,125.1725100000001 37.967297000000087,125.16455000000008 37.960682000000077,125.16266000000007 37.957367000000033,125.15476000000001 37.951939000000039,125.15001000000007 37.954426000000069,125.13734 37.958584000000087,125.13512000000003 37.959541000000058,125.13254000000006 37.957863000000089,125.1070400000001 37.961193000000037,125.09902 37.958145000000059,125.08824000000004 37.958221000000037,125.0830400000001 37.962532000000067,125.08603000000005 37.966225000000065,125.08438000000001 37.967892000000063,125.08008000000007 37.974140000000034,125.07832000000008 37.976406000000054,125.07767000000001 37.978271000000063,125.07569000000001 37.980785000000083,125.06041000000005 37.974125000000072,125.06142 37.971874000000071,125.05876 37.971092000000056,125.04948000000002 37.964645000000075,125.03574000000003 37.954208000000051,125.02856000000008 37.953327000000058,125.02623000000006 37.957958000000076,125.02286000000004 37.958008000000063,125.01939000000004 37.962177000000054,125.0163 37.955441000000064,125.00661000000002 37.954353000000083,125.00253000000009 37.955605000000048,125 37.957890000000077,124.99538000000007 37.94680800000009,124.9850100000001 37.933800000000076,124.98125000000005 37.929703000000075,124.97819000000004 37.927448000000084,124.97649000000001 37.922585000000083,124.98015000000009 37.919991000000039,124.98529000000008 37.929741000000035,124.99274000000003 37.930035000000089,125 37.930080000000089,125.0011300000001 37.934334000000035,125.00816000000009 37.930149000000085,125.01241000000005 37.920162000000062,125.00554 37.905632000000082,125.01215000000002 37.904079000000081,125.02455000000009 37.897327000000075,125.03192000000001 37.896114000000068,125.03651000000002 37.89853700000009,125.04322000000002 37.897057000000075,125.05042000000003 37.901241000000084,125.06207000000006 37.90021900000005,125.06927000000007 37.897625000000062,125.07413000000008 37.897064000000057,125.07445000000007 37.892773000000034,125.07691 37.890526000000079,125.07368000000008 37.878071000000034,125.07917000000009 37.875942000000066,125.08346000000006 37.87420300000008,125.10799000000009 37.863297000000046,125.13171 37.864155000000039,125.13578000000007 37.870983000000081,125.13882000000001 37.876537000000042,125.15023000000008 37.87558400000006,125.1525200000001 37.870163000000048,125.14748000000009 37.866394000000071,125.15403000000003 37.864677000000086,125.16122000000007 37.867229000000066,125.17400000000009 37.867886000000055,125.18233000000009 37.868759000000068,125.19339000000002 37.879341000000068,125.20521000000008 37.880131000000063,125.21332000000007 37.890457000000083,125.22687000000008 37.898323000000062,125.22215000000006 37.904022000000055,125.20986000000005 37.906963000000076,125.21225000000004 37.907818000000077,125.21603000000005 37.899158000000057,125.22738000000004 37.89881100000008,125.2346 37.902927000000034,125.2352800000001 37.908550000000048,125.22761000000003 37.91398200000009,125.23180000000002 37.917210000000068,125.23072000000002 37.920845000000043,125.23254000000009 37.923717000000067,125.23927000000003 37.927555000000041,125.24284 37.929867000000058,125.24173000000008 37.933189000000084,125.23459000000003 37.936440000000061,125.23206000000005 37.940590000000043,125.23043000000007 37.945156000000054,125.2314100000001 37.94320300000004,125.23888 37.936737000000051,125.24191000000008 37.933693000000062,125.24588000000006 37.932121000000052,125.25799000000006 37.930473000000063,125.26083000000006 37.920822000000044,125.2481600000001 37.914482000000078,125.24337000000003 37.906498000000056,125.24115000000006 37.902111000000048,125.24306000000001 37.898533000000043,125.25193000000002 37.895237000000066,125.27122000000008 37.896034000000043,125.27847000000008 37.902256000000079,125.28944000000001 37.897041000000058,125.29596000000004 37.884865000000048,125.3015200000001 37.876865000000066,125.29799000000003 37.875069000000053,125.30381 37.871803000000057,125.30451000000005 37.867805000000089,125.30265000000009 37.866825000000063,125.29597000000001 37.857334000000037,125.28870000000006 37.853748000000053,125.28039000000001 37.84664900000007,125.27845000000002 37.837345000000084,125.26541000000009 37.82366600000006,125.23272000000009 37.806847000000062,125.22393 37.804070000000081,125.22559000000001 37.804928000000075,125.22937000000002 37.815975000000037,125.24062000000004 37.816360000000088,125.24525000000006 37.81145900000007,125.25061000000005 37.811527000000069,125.26043000000004 37.808914000000073,125.26614000000006 37.801941000000056,125.27203000000009 37.796268000000055,125.2825600000001 37.796062000000063,125.28568000000007 37.795963000000086,125.28717000000006 37.799820000000068,125.28958 37.804920000000038,125.28596000000005 37.814045000000078,125.27464000000009 37.818401000000051,125.26060000000007 37.822803000000079,125.25783000000001 37.825760000000059,125.25906000000009 37.824081000000035,125.26363000000003 37.827545000000043,125.27614000000005 37.826786000000084,125.28046000000006 37.824715000000083,125.28098 37.821377000000041,125.27483000000007 37.818787000000043,125.27909 37.828373000000056,125.29523000000006 37.83335100000005,125.31297000000006 37.831043000000079,125.31378000000007 37.819061000000033,125.30394000000001 37.816010000000063,125.3071000000001 37.813046000000043,125.30724000000009 37.810398000000077,125.30112000000008 37.800785000000076,125.30029000000002 37.799847000000057,125.3017000000001 37.803776000000084,125.3133600000001 37.807789000000071,125.32011 37.819828000000086,125.32648000000006 37.823647000000051,125.33120000000008 37.822674000000063,125.33436000000006 37.818497000000036,125.33743000000004 37.817734000000087,125.34203000000002 37.819038000000035,125.34610000000009 37.823853000000042,125.34594000000004 37.826080000000047,125.34975000000009 37.836082000000033,125.35464000000002 37.847736000000054,125.3566800000001 37.853806000000077,125.37707 37.856262000000072,125.38060000000007 37.859470000000044,125.3806800000001 37.859573000000069,125.37919000000011 37.85977900000006,125.37607000000003 37.856693000000064,125.36905000000002 37.860111000000074,125.35672 37.857044000000087,125.34855000000005 37.858227000000056,125.34627 37.862560000000087,125.34753 37.868328000000076,125.34538000000009 37.870831000000067,125.34660000000008 37.869965000000036,125.35698000000002 37.875553000000082,125.36522000000002 37.874306000000047,125.37097000000006 37.870144000000039,125.37317000000007 37.865383000000065,125.37015000000008 37.863056000000086,125.37211000000002 37.862461000000053,125.38019000000008 37.864799000000062,125.39066000000003 37.862938000000042,125.39233000000002 37.855427000000077,125.38924000000009 37.854176000000052,125.39528000000007 37.85589200000004,125.40197 37.854401000000053,125.40858000000003 37.859455000000082,125.41780000000006 37.861950000000036,125.42236000000003 37.860985000000085,125.42522000000008 37.857517000000087,125.42686000000003 37.847065000000043,125.42166000000009 37.846779000000083,125.42484000000002 37.851467000000071,125.43190000000004 37.851418000000081,125.43478000000005 37.847054000000071,125.43524000000002 37.84137700000008,125.43220000000008 37.839748000000043,125.43359000000009 37.844135000000051,125.44469000000004 37.84595500000006,125.4456100000001 37.851284000000078,125.44229000000007 37.854645000000062,125.44672000000003 37.859447000000046,125.4471400000001 37.86599700000005,125.43981000000008 37.866772000000083,125.43492000000003 37.865265000000079,125.42938000000004 37.868977000000086,125.42689000000007 37.875736000000074,125.43343000000004 37.878292000000044,125.43148000000008 37.87906600000008,125.42659000000003 37.876892000000055,125.41988000000003 37.876919000000044,125.40804000000003 37.876923000000033,125.40514000000007 37.87901700000009,125.39017000000001 37.891876000000082,125.37548000000004 37.900433000000078,125.37109000000009 37.902679000000035,125.37375000000009 37.900631000000089,125.38612 37.896698000000072,125.38834000000008 37.900497000000087,125.39393000000007 37.894680000000051,125.39897000000008 37.895031000000074,125.40505000000007 37.891338000000076,125.40640000000008 37.89080400000006,125.41072000000008 37.894081000000085,125.42006000000003 37.897217000000069,125.42419000000007 37.892300000000034,125.43013000000008 37.892914000000076,125.43420000000003 37.899059000000079,125.43668000000002 37.905071000000078,125.43366000000003 37.909439000000077,125.42677000000003 37.911201000000062,125.42400000000009 37.915878000000077,125.4316500000001 37.92455300000006,125.43362000000002 37.925236000000041,125.44666000000007 37.927624000000037,125.45424000000003 37.923439000000087,125.4575900000001 37.917549000000065,125.4536700000001 37.912289000000044,125.45294000000001 37.910812000000078,125.45869000000005 37.908970000000068,125.4592100000001 37.902897000000053,125.4526800000001 37.899483000000089,125.45143000000007 37.892788000000053,125.45414000000005 37.887768000000051,125.45284000000004 37.884926000000064,125.45796000000007 37.886662000000058,125.46350000000007 37.892090000000053,125.46741000000009 37.898777000000052,125.4652900000001 37.901478000000054,125.46796000000006 37.900494000000037,125.47169000000008 37.89493200000004,125.47501 37.890301000000079,125.48180000000002 37.889519000000064,125.48295000000007 37.889366000000052,125.49133000000006 37.892460000000085,125.50600000000009 37.891788000000076,125.50932 37.888523000000077,125.51241000000005 37.884846000000039,125.51288 37.877335000000073,125.51006000000007 37.874512000000038,125.50634000000002 37.875309000000073,125.49556000000007 37.871574000000066,125.48649 37.872654000000068,125.47756000000004 37.867504000000054,125.47077000000002 37.863602000000071,125.45853 37.860561000000075,125.4619100000001 37.859039000000053,125.46996000000001 37.861111000000051,125.48215000000005 37.860088000000076,125.48790000000008 37.857498000000078,125.49187000000006 37.851639000000034,125.48622 37.849346000000082,125.47373000000005 37.846642000000088,125.4710500000001 37.840141000000074,125.4757800000001 37.824902000000066,125.4944200000001 37.819908000000055,125.49662000000001 37.817509000000086,125.49767000000008 37.823269000000039,125.50852000000009 37.827595000000088,125.5100900000001 37.83382400000005,125.50796000000003 37.840107000000046,125.5153600000001 37.835880000000088,125.52073000000007 37.836945000000071,125.52509000000009 37.845325000000059,125.53053 37.845970000000079,125.53286000000003 37.840446000000043,125.53415000000007 37.835545000000081,125.5290500000001 37.828815000000077,125.51850000000002 37.812077000000045,125.50647000000004 37.801834000000042,125.4900100000001 37.797443000000044,125.49191000000008 37.79657700000007,125.48900000000003 37.800522000000058,125.48651000000007 37.806946000000039,125.48611000000005 37.814911000000052,125.48923000000002 37.81930200000005,125.48733000000004 37.823051000000078,125.48281000000009 37.824566000000061,125.4750600000001 37.823753000000067,125.46926000000008 37.827728000000036,125.46503000000007 37.825184000000036,125.45341000000008 37.818188000000077,125.44744000000003 37.818447000000049,125.44572000000005 37.826088000000084,125.44490000000008 37.831306000000041,125.44434000000001 37.830910000000074,125.44086000000004 37.823200000000043,125.43632000000002 37.825146000000075,125.43002000000001 37.81836700000008,125.42435 37.813007000000084,125.41640000000007 37.811272000000088,125.41087000000005 37.802666000000045,125.40485000000001 37.813488000000063,125.40198000000009 37.794388000000083,125.39337 37.792309000000046,125.39418 37.791573000000085,125.39705000000004 37.793083000000081,125.40229000000011 37.790543000000071,125.40337 37.786221000000069,125.40153000000009 37.783871000000033,125.37865000000011 37.790592000000061,125.37524000000008 37.793583000000069,125.37372000000005 37.786430000000053,125.36314000000004 37.776485000000037,125.35479000000009 37.775734000000057,125.35852 37.777458000000081,125.3649200000001 37.776428000000067,125.38480000000004 37.774803000000077,125.38592000000006 37.765587000000039,125.37557000000004 37.763046000000088,125.37666000000002 37.765251000000035,125.38162 37.763950000000079,125.39053000000001 37.765419000000065,125.39836000000003 37.77079400000008,125.40543000000002 37.771839000000057,125.41124000000002 37.778236000000049,125.41257000000007 37.779320000000041,125.41606000000002 37.784569000000033,125.41736000000003 37.782135000000039,125.42537000000004 37.78624700000006,125.43169 37.787491000000045,125.43360000000007 37.787437000000068,125.43649000000005 37.785362000000077,125.43729000000008 37.780575000000056,125.43572000000006 37.776417000000038,125.43763000000001 37.776562000000069,125.44225000000006 37.773808000000088,125.4424600000001 37.769955000000039,125.44005000000004 37.767075000000034,125.4344900000001 37.759804000000088,125.43082000000004 37.757355000000075,125.42671000000007 37.767899000000057,125.4137300000001 37.758907000000079,125.40367000000003 37.758789000000036,125.39732000000004 37.75447500000007,125.39489000000003 37.756516000000033,125.38312000000008 37.752293000000066,125.3755000000001 37.746586000000036,125.37420000000009 37.745926000000054,125.3724400000001 37.763554000000056,125.36051000000009 37.762722000000053,125.35900000000004 37.758217000000059,125.35085000000004 37.754974000000061,125.35278000000005 37.751892000000055,125.35876000000007 37.748749000000089,125.35492000000011 37.744804000000045,125.3444300000001 37.737194000000045,125.33356000000003 37.715195000000051,125.31972000000007 37.711861000000056,125.31357000000003 37.708870000000047,125.31407000000002 37.69082300000008,125.33753000000002 37.685062000000073,125.33940000000007 37.674072000000081,125.33853000000011 37.673336000000063,125.34140000000002 37.675659000000053,125.3469 37.679726000000073,125.35655000000008 37.682686000000047,125.35779000000002 37.686382000000037,125.35616000000005 37.685574000000088,125.3497900000001 37.68698500000005,125.34753 37.697586000000058,125.35760000000005 37.710155000000043,125.35995000000003 37.713020000000085,125.36667 37.724663000000078,125.36929000000009 37.72629900000004,125.38087000000007 37.723763000000076,125.38166000000001 37.722279000000071,125.37470000000008 37.720486000000051,125.37234000000001 37.71887200000009,125.37288000000001 37.719391000000087,125.3827 37.725307000000043,125.41142000000002 37.730812000000071,125.40959000000009 37.73176200000006,125.40928000000008 37.73380300000008,125.4104900000001 37.724918000000059,125.43333000000007 37.724140000000034,125.45119 37.721336000000065,125.46697000000006 37.736656000000039,125.48183000000006 37.744949000000076,125.47946000000002 37.750439000000085,125.48019000000011 37.76324800000009,125.49412000000007 37.767582000000061,125.49539000000004 37.77748100000008,125.4930700000001 37.787235000000067,125.49867000000006 37.794949000000088,125.50310000000002 37.801224000000047,125.51078000000007 37.803856000000053,125.51721000000009 37.802242000000035,125.51774 37.790894000000037,125.51164000000006 37.772228000000041,125.51688000000001 37.769844000000035,125.52201000000002 37.764015000000086,125.52733 37.762489000000073,125.5477800000001 37.772106000000065,125.54834000000005 37.770580000000052,125.54397000000006 37.770920000000046,125.53821000000005 37.772312000000056,125.53709000000003 37.780140000000074,125.54771000000005 37.789703000000088,125.55328000000009 37.795784000000083,125.55682000000002 37.795517000000075,125.55884000000003 37.792278000000067,125.56047000000001 37.778206000000068,125.56526000000008 37.777691000000061,125.56813 37.781002000000058,125.57487000000003 37.780216000000053,125.58004000000005 37.782665000000065,125.58386000000007 37.779175000000066,125.58665000000008 37.775307000000055,125.58509000000004 37.768829000000039,125.5762400000001 37.767406000000051,125.56667000000004 37.765606000000048,125.5648900000001 37.761673000000087,125.56680000000006 37.760647000000063,125.57254 37.763302000000067,125.57752000000005 37.763664000000063,125.58273000000008 37.760128000000066,125.58782000000008 37.761322000000064,125.59737000000007 37.75749600000006,125.60563000000002 37.760307000000068,125.61437000000001 37.768600000000049,125.61231000000009 37.769363000000055,125.61246000000006 37.784355000000062,125.61538000000007 37.79338800000005,125.62258000000008 37.795940000000087,125.62093000000004 37.796047000000044,125.61544000000004 37.791607000000056,125.6078 37.791920000000061,125.6034800000001 37.80046800000008,125.59998000000007 37.805050000000051,125.60011000000009 37.807793000000061,125.61262000000011 37.812290000000075,125.6170800000001 37.813480000000084,125.62665000000004 37.82556500000004,125.64174000000003 37.829941000000076,125.6407200000001 37.824089000000072,125.63506000000007 37.822357000000068,125.62980000000005 37.831078000000048,125.62064000000009 37.833588000000077,125.61800000000005 37.83811600000007,125.62103000000002 37.840416000000062,125.62052000000006 37.843941000000086,125.6160000000001 37.85147500000005,125.61768000000006 37.850769000000071,125.63036 37.852921000000038,125.6376600000001 37.860123000000044,125.63267000000008 37.867851000000087,125.63609000000008 37.873230000000035,125.63046000000008 37.877113000000065,125.63116000000002 37.892033000000083,125.64201000000003 37.904392000000087,125.63111000000004 37.905781000000047,125.6184300000001 37.909962000000064,125.61567000000002 37.911770000000047,125.61687000000006 37.909374000000071,125.6223 37.911362000000054,125.62611000000004 37.912601000000052,125.62570000000005 37.924049000000082,125.62187000000006 37.929260000000056,125.62521000000004 37.92066600000004,125.63103000000001 37.919804000000056,125.63996000000009 37.917900000000088,125.64366000000007 37.907784000000049,125.64539000000002 37.903580000000034,125.64931000000001 37.90137100000004,125.6567500000001 37.898087000000089,125.64885000000004 37.893902000000082,125.65190000000007 37.890499000000034,125.66192000000001 37.889313000000072,125.67547000000002 37.891308000000038,125.69056 37.894337000000064,125.6996200000001 37.904633000000047,125.7132600000001 37.905056000000059,125.71382000000006 37.906315000000063,125.71965 37.912102000000061,125.72822000000008 37.922970000000078,125.7349200000001 37.930286000000081,125.7357300000001 37.936523000000079,125.73332000000005 37.933205000000044,125.72743000000003 37.92385900000005,125.72482000000002 37.921200000000056,125.72041000000002 37.925678000000062,125.71418000000006 37.925510000000088,125.71099000000004 37.917744000000084,125.69832000000008 37.916908000000035,125.69424000000004 37.91787000000005,125.69196 37.925880000000063,125.6925 37.930454000000054,125.68136000000004 37.934097000000065,125.68262000000004 37.935215000000085,125.69568000000004 37.937447000000077,125.69864000000007 37.940685000000087,125.69743000000005 37.944607000000076,125.6959700000001 37.950268000000051,125.69933000000003 37.954746000000057,125.70467000000008 37.955341000000089,125.70932000000005 37.952042000000063,125.71384 37.952682000000038,125.71618000000001 37.955208000000084,125.71597000000008 37.961498000000063,125.71096 37.966778000000033,125.71054000000004 37.965832000000034,125.70039000000008 37.960381000000041,125.6979 37.95951800000006,125.69527000000005 37.963253000000066,125.6919200000001 37.963772000000063,125.68875000000003 37.961613000000057,125.68202000000008 37.953465000000051,125.67686000000003 37.951931000000059,125.67334000000005 37.957237000000077,125.67148000000009 37.963623000000041,125.67312000000004 37.979187000000081,125.6857500000001 37.987228000000073,125.68484000000001 37.988129000000072,125.68027000000006 37.988247000000058,125.67966000000001 37.97926700000005,125.67013000000009 37.976856000000055,125.66455000000008 37.964127000000076,125.64738 37.963058000000046,125.64330000000007 37.966103000000089,125.63992000000007 37.967262000000062,125.62751000000003 37.97277100000008,125.62710000000004 37.977909000000068,125.62204000000008 37.978767000000062,125.61310000000003 37.983936000000085,125.6065900000001 37.98658000000006,125.60001 38.001728000000071,125.58686 38.006710000000055,125.57803000000001 38.018578000000048,125.5698900000001 38.019245000000069,125.56943000000001 38.024681000000044,125.56061 38.028980000000047,125.5636300000001 38.030399000000045,125.57352000000003 38.035397000000046,125.57598000000007 38.036011000000087,125.57977000000005 38.039791000000037,125.58596 38.039680000000089,125.59175000000005 38.035286000000042,125.59393 38.033218000000033,125.60603000000003 38.023911000000055,125.61358000000007 38.025204000000087,125.61767000000009 38.02793900000006,125.61862000000008 38.03484700000007,125.61680000000001 38.03711700000008,125.61803000000009 38.037033000000065,125.62237000000005 38.027145000000075,125.63597000000004 38.01852400000007,125.64324000000011 38.017529000000081,125.64726000000007 38.02266300000008,125.65437000000009 38.020878000000039,125.66358000000002 38.024860000000047,125.67094000000009 38.025009000000068,125.67500000000007 38.021023000000071,125.67951000000005 38.008976000000075,125.68609000000004 38.008461000000068,125.68897000000004 38.01398800000004,125.69413000000009 38.007191000000034,125.69530000000009 37.994221000000039,125.69056 37.991199000000051,125.69249000000002 37.988560000000064,125.69849000000011 37.988171000000079,125.70658000000003 37.992115000000069,125.71568000000002 38.009735000000035,125.7170900000001 38.012215000000083,125.7192 38.016090000000077,125.74306000000001 38.015095000000088,125.74680000000001 38.007351000000085,125.75581 38.004883000000063,125.76442000000009 37.994991000000084,125.77742 38.756658000000073,125.7331660000001 39.267978000000085,126.57855000000006 39.89519800000005,126.66717400000005 40.113362000000052,126.44219800000008 40.031550000000038,126.1354060000001 39.520230000000083,125.44001000000003
Polygon
35.34103900000008,129.31922200000008 35.968258000000048,128.97152600000004 36.070522000000039,128.46702200000004 35.906900000000064,128.07160600000009 35.238774000000035,128.31022200000007 35.102422000000047,128.49429400000008 35.101612000000046,128.48630000000003 35.093109000000084,128.51228000000003 35.094635000000039,128.51936 35.098366000000055,128.5232400000001 35.097504000000072,128.52710000000002 35.09874300000007,128.53024000000005 35.110287000000085,128.53407000000004 35.114017000000047,128.53795000000002 35.111336000000051,128.54141000000004 35.107662000000062,128.54144000000008 35.102402000000041,128.5358 35.099613000000033,128.53645000000006 35.099491000000057,128.53923000000009 35.102459000000067,128.54474000000005 35.101177000000064,128.54773 35.099781000000064,128.54819000000009 35.096542000000056,128.54352000000006 35.093189000000052,128.54665 35.089951000000042,128.54736000000003 35.087387000000035,128.54794000000004 35.089226000000053,128.55309 35.083855000000085,128.58066000000008 35.072380000000067,128.56511 35.067738000000077,128.56619 35.063942000000054,128.5637200000001 35.062508000000037,128.56502 35.061539000000039,128.58142000000009 35.064865000000054,128.58919000000003 35.065289000000064,128.59508000000005 35.063648000000057,128.59581000000003 35.059933000000058,128.5916400000001 35.052086000000088,128.57718 35.049988000000042,128.57787000000008 35.052925000000073,128.5942500000001 35.052387000000067,128.60031000000004 35.051987000000054,128.60480000000007 35.057831000000078,128.61273000000006 35.058445000000063,128.6245 35.064072000000067,128.63213000000007 35.06864900000005,128.62741000000005 35.069462000000044,128.62466000000006 35.064281000000051,128.61232000000007 35.069878000000074,128.6104600000001 35.068707000000074,128.60591 35.074596000000042,128.60770000000002 35.073505000000068,128.61656000000005 35.077644000000078,128.62660000000005 35.081524000000059,128.62212 35.082855000000052,128.61801000000003 35.086990000000071,128.61801000000003 35.093361000000073,128.60922000000005 35.103294000000062,128.60289 35.112534000000039,128.60109 35.127857000000063,128.59810000000004 35.127804000000083,128.59418000000005 35.122177000000079,128.5865500000001 35.126633000000083,128.57426000000009 35.129139000000066,128.5747100000001 35.131966000000034,128.57825000000003 35.129375000000039,128.58478000000002 35.129570000000058,128.59067000000005 35.134167000000048,128.59572000000003 35.137348000000088,128.59648000000004 35.14075500000007,128.59224000000006 35.157978000000071,128.58723000000009 35.157547000000079,128.57629000000009 35.160168000000056,128.57423000000006 35.166149000000075,128.57910000000004 35.168034000000034,128.57811000000004 35.170815000000061,128.56583 35.173035000000084,128.56436000000008 35.177158000000077,128.56503000000009 35.18378800000005,128.56992000000002 35.187721000000067,128.56934 35.191998000000069,128.57130000000006 35.208866000000057,128.58948000000009 35.209862000000044,128.5929000000001 35.207779000000073,128.59836000000007 35.202400000000068,128.60555000000011 35.200314000000049,128.60597000000007 35.197002000000055,128.59792000000004 35.190678000000048,128.59554000000003 35.183834000000047,128.59956 35.170959000000039,128.59480000000008 35.164246000000048,128.60106000000007 35.158352000000036,128.59927000000005 35.155949000000078,128.60162000000003 35.156967000000066,128.60449000000006 35.154526000000089,128.60768000000007 35.147568000000035,128.60918000000004 35.143970000000081,128.61258000000009 35.140400000000056,128.62044000000003 35.139484000000039,128.63045 35.144512000000077,128.64111000000003 35.144440000000088,128.64783 35.142109000000062,128.6485 35.137276000000043,128.64371000000006 35.133232000000078,128.64679 35.126209000000074,128.65974000000006 35.123104000000069,128.66232000000002 35.118729000000087,128.6575600000001 35.117176000000086,128.65906000000007 35.114403000000038,128.66174 35.114632000000086,128.66679000000011 35.111988000000053,128.6694 35.117836000000068,128.6770600000001 35.121490000000051,128.67758000000003 35.134148000000039,128.67201 35.138359000000037,128.67537000000004 35.140213000000074,128.68500000000006 35.143650000000036,128.69025000000011 35.113483000000087,128.70192000000009 35.106792000000041,128.69756000000007 35.101028000000042,128.69800000000009 35.100166000000058,128.69180000000006 35.098015000000089,128.68858 35.095444000000043,128.6895300000001 35.090546000000074,128.69618000000003 35.091358000000071,128.69847000000004 35.095695000000035,128.70128 35.097603000000049,128.70251000000007 35.098812000000066,128.70624000000009 35.098312000000078,128.71207000000004 35.096352000000081,128.71472000000006 35.088654000000076,128.71729000000005 35.085060000000055,128.73044000000004 35.085999000000072,128.73497000000009 35.095764000000088,128.74234 35.095127000000048,128.74620000000004 35.087997000000087,128.7513100000001 35.087139000000036,128.75990000000002 35.088551000000052,128.7641900000001 35.093216000000041,128.76759000000004 35.094948000000045,128.7649100000001 35.09387200000009,128.75841000000003 35.096050000000048,128.7560400000001 35.09781600000008,128.7575700000001 35.09892700000006,128.76825000000008 35.093727000000058,128.77628000000004 35.105106000000035,128.78348000000005 35.110989000000075,128.78053 35.111534000000063,128.78070000000002 35.113480000000038,128.78127000000006 35.112480000000062,128.78790000000004 35.109985000000052,128.79221000000007 35.103729000000044,128.78842000000009 35.096298000000047,128.79015000000004 35.092491000000052,128.79295000000002 35.091019000000074,128.79984000000002 35.089149000000077,128.80055000000004 35.086479000000054,128.79869000000008 35.082939000000067,128.79091000000005 35.077168000000086,128.78661 35.073692000000051,128.7872000000001 35.072327000000087,128.79185000000007 35.081017000000088,128.8025100000001 35.082188000000087,128.81180000000006 35.090569000000073,128.82411000000002 35.094177000000059,128.84503000000007 35.093037000000038,128.85948000000008 35.088234000000057,128.86389000000008 35.08404500000006,128.8650100000001 35.077980000000082,128.86206000000004 35.074821000000043,128.86575000000005 35.073128000000054,128.87234 35.07347100000004,128.87962000000005 35.085930000000076,128.87854000000004 35.088451000000077,128.8834700000001 35.103386000000057,128.88339000000008 35.11756900000006,128.89919000000009 35.119080000000054,128.90601000000004 35.113571000000036,128.90590000000009 35.106556000000069,128.90848000000005 35.093693000000087,128.90367000000003 35.08816900000005,128.90384000000006 35.086300000000051,128.90454 35.085182000000088,128.90866000000005 35.087494000000049,128.91803000000004 35.091805000000079,128.92392000000007 35.099213000000077,128.92752000000007 35.105221000000085,128.92682000000002 35.111282000000074,128.9297600000001 35.120975000000044,128.92401000000007 35.124493000000086,128.92734000000007 35.119755000000055,128.93036000000006 35.120804000000078,128.93239000000005 35.125542000000053,128.93198000000007 35.12308500000006,128.93758000000003 35.120174000000077,128.93996000000004 35.12285600000007,128.94231000000002 35.127018000000078,128.94652000000008 35.141109000000085,128.95450000000005 35.178604000000064,128.95827000000008 35.184437000000059,128.96120000000008 35.187710000000038,128.96954000000005 35.183723000000043,128.9664600000001 35.184006000000068,128.97487 35.179466000000048,128.9737100000001 35.170418000000041,128.97559 35.165207000000066,128.97411 35.164654000000041,128.97127 35.154015000000072,128.97275000000002 35.135590000000036,128.96893 35.114902000000086,128.95964000000004 35.095802000000049,128.95549000000005 35.091438000000039,128.95071000000007 35.088787000000082,128.95332000000008 35.080490000000054,128.95386000000008 35.072487000000081,128.95821 35.066269000000034,128.95341000000008 35.058941000000061,128.95764000000008 35.04538000000008,128.95779000000005 35.038933000000043,128.96768000000009 35.035915000000045,128.96829000000002 35.029179000000056,128.96503000000007 35.02771400000006,128.96689000000003 35.032291000000043,128.97195000000011 35.032940000000053,128.9775800000001 35.034271000000047,128.97852 35.03926800000005,128.97496 35.041962000000069,128.97626000000002 35.041828000000066,128.98380000000009 35.045799000000045,128.98241000000007 35.047375000000045,128.97357 35.049034000000063,128.97258000000011 35.050499000000059,128.97507000000007 35.055187000000046,128.98306000000002 35.055256000000043,128.98642000000007 35.051846000000069,128.9903700000001 35.039577000000065,128.99704000000008 35.03898200000009,128.99979000000008 35.041382000000056,129.00247000000002 35.056911000000071,128.99492000000009 35.070633000000043,128.99617 35.074459000000047,128.99309000000005 35.076939000000039,128.99411000000009 35.079468000000077,128.99875000000009 35.079681000000051,129.00380000000007 35.077877000000058,129.00786000000005 35.064987000000087,129.01309000000003 35.05232600000005,129.01358000000005 35.049026000000083,129.01530000000002 35.048164000000043,129.01886000000002 35.051853000000051,129.02332 35.054878000000087,129.02458000000001 35.059059000000047,129.02635000000009 35.066776000000061,129.02354000000003 35.069481000000053,129.02458000000001 35.071178000000089,129.02750000000003 35.084118000000046,129.03065000000004 35.091228000000058,129.03563000000008 35.09300200000007,129.04163000000005 35.097080000000062,129.0475 35.104675000000043,129.05196 35.105331000000035,129.05731000000003 35.10773800000004,129.05972000000008 35.110058000000038,129.05933000000005 35.114651000000038,129.05464000000006 35.12372600000009,129.06172000000004 35.124882000000071,129.06627000000003 35.11896500000006,129.06976000000009 35.116402000000051,129.0751600000001 35.112389000000064,129.07739000000004 35.109669000000054,129.07663000000002 35.106453000000045,129.07193000000007 35.104080000000067,129.07344 35.104172000000062,129.08469000000002 35.104275000000086,129.09747000000004 35.102291000000037,129.10040000000004 35.093727000000058,129.10175000000004 35.093090000000075,129.10533000000009 35.096909000000039,129.11176 35.096458000000041,129.11620000000005 35.09113300000007,129.12167 35.090252000000078,129.12552000000005 35.091530000000034,129.12756000000002 35.100506000000053,129.1318500000001 35.105785000000083,129.13196000000005 35.115192000000036,129.12761 35.117405000000076,129.1246900000001 35.119003000000077,129.11560000000009 35.127052000000049,129.10611000000006 35.129700000000071,129.11302 35.144585000000063,129.12332000000004 35.149502000000041,129.1306800000001 35.152946000000043,129.14462000000003 35.151421000000084,129.14758000000006 35.146988000000079,129.14894000000004 35.149368000000038,129.17036000000007 35.14697300000006,129.17690000000005 35.146595000000048,129.18442000000005 35.157143000000076,129.19862 35.171173000000067,129.20749 35.178867000000082,129.21896000000004 35.179234000000065,129.2254200000001 35.192314000000067,129.23030000000006 35.205559000000051,129.22737000000006 35.20627200000007,129.22751000000005 35.215576000000056,129.22923000000003 35.21683500000006,129.23157000000003 35.214523000000042,129.23643000000004 35.216858000000059,129.24025000000006 35.225677000000076,129.2476200000001 35.232445000000041,129.25008000000003 35.234280000000069,129.25470000000007 35.236366000000089,129.25429000000008 35.238251000000048,129.24883 35.240616000000045,129.25209000000007 35.245998000000043,129.25473 35.249027000000069,129.25383000000011 35.25197200000008,129.2501400000001 35.253181000000041,129.23987 35.255325000000084,129.23834 35.262943000000064,129.24675000000002 35.26463700000005,129.2541500000001 35.270378000000051,129.25879000000009 35.287724000000082,129.26569000000006 35.295250000000067,129.26549 35.298996000000045,129.2654 35.307854000000077,129.26746000000003 35.313118000000088,129.2723400000001 35.317245000000071,129.28162000000009 35.34103900000008,129.31922200000008
Polygon
37.499393000000055,127.05968600000006 37.36965500000008,127.06833400000005 37.252890000000036,127.2326700000001 37.261539000000084,127.47052200000007 37.296136000000047,127.58729000000005 37.404251000000045,127.6521580000001 37.585884000000078,127.639182 37.706974000000059,127.60891000000004 37.79346600000008,127.47917400000006 37.832388000000037,127.32781 37.802116000000069,127.16347800000005 37.780492000000038,127.04671000000008 37.650754000000063,127.003466 37.499393000000055,127.05968600000006