GDACS_FL_2045_1
info-gdacs@gdacs.org
2002-09-03T21:59:59-00:00
Actual
Alert
Public
2045
Geo
Flood
Past
Severe
Unknown
Global Disaster Alert and Coordination System

Orange flood alert in South Korea
On 31/08/2002, a flood started in South Korea, lasting until 03/09/2002 (last update). The flood caused 138 killed and 70000 displaced .
http://www.gdacs.org/report.aspx?eventtype=FL&eventid=2045
eventid
2045
currentepisodeid
1
glide
0
version
1
fromdate
Fri, 30 Aug 2002 22:00:00 GMT
todate
Tue, 03 Sep 2002 21:59:59 GMT
eventtype
FL
alertlevel
Orange
alerttype
automatic
link
http://www.gdacs.org/report.aspx?eventtype=FL&amp;eventid=2045
country
South Korea
eventname
severity
Magnitude 4.68
population
138 killed and 70000 displaced
vulnerability
sourceid
DFO
iso3
hazardcomponents
FL,dead=138,displaced=70000,main_cause=Heavy rain,severity=1,sqkm=11999.65
datemodified
Thu, 28 May 2015 11:47:25 GMT
Polygon
35.349178000000052,129.34035000000006 36.04652800000008,129.0019400000001 35.83501700000005,127.9022920000001 35.071136000000081,128.05075000000011 35.08057800000006,128.05579 35.079445000000078,128.0610200000001 35.07139600000005,128.06139000000007 35.066700000000083,128.05830000000003 35.057919000000084,128.04829000000007 35.053154000000063,128.04691000000003 35.048973000000046,128.0480500000001 35.041882000000044,128.04176000000007 35.030701000000079,128.0399900000001 35.024601000000075,128.04326000000003 35.018856000000085,128.03761000000009 35.015400000000056,128.03796 35.01440800000006,128.0454400000001 35.011307000000045,128.0483200000001 35.006702000000075,128.04861000000005 35.000000000000057,128.04112000000009 34.997475000000065,128.03830000000005 34.992710000000045,128.03691000000003 34.986675000000048,128.0385 34.97369400000008,128.04892000000007 34.972435000000075,128.04993000000002 34.968739000000085,128.05055000000004 34.957836000000043,128.03624000000002 34.953102000000058,128.03401000000008 34.932484000000045,128.04422 34.924427000000037,128.0560200000001 34.925064000000077,128.06302000000005 34.918552000000034,128.07628 34.922527000000059,128.08014000000003 34.921215000000075,128.08981000000006 34.914753000000076,128.09055 34.913723000000061,128.0932600000001 34.921535000000063,128.09875 34.919121000000075,128.10167 34.920105000000035,128.10562000000004 34.91746100000006,128.10854000000006 34.920403000000078,128.11314000000004 34.921345000000088,128.11462000000006 34.915550000000053,128.12152000000003 34.912914000000058,128.11858000000007 34.911449000000061,128.10957000000008 34.909901000000048,128.10808000000009 34.906158000000062,128.10980000000006 34.901989000000071,128.11624000000006 34.904247000000055,128.12279 34.895897000000048,128.12479000000008 34.886322000000064,128.13425000000007 34.889870000000087,128.14282000000003 34.89514900000006,128.14285000000007 34.896469000000081,128.14433000000008 34.895836000000088,128.14847000000009 34.899639000000036,128.15092000000004 34.903370000000052,128.16063000000008 34.896313000000077,128.16466000000003 34.896107000000086,128.16965000000005 34.892315000000053,128.17249000000004 34.892151000000069,128.17638 34.893501000000072,128.17702000000008 34.899139000000048,128.17401000000007 34.901588000000061,128.17584000000011 34.900547000000074,128.17883000000006 34.899086000000068,128.17957 34.893513000000041,128.18231000000003 34.896568000000059,128.1861100000001 34.901066000000071,128.18834000000004 34.900013000000058,128.19162000000006 34.891319000000067,128.19081000000006 34.889393000000041,128.19292000000007 34.889698000000067,128.20213 34.892811000000052,128.20456000000001 34.906616000000042,128.19843000000003 34.914986000000056,128.20145000000002 34.920105000000035,128.2053800000001 34.930653000000063,128.20018000000005 34.93354000000005,128.20258 34.935184000000049,128.20714000000009 34.931816000000083,128.2108300000001 34.935341000000051,128.21440000000007 34.935143000000039,128.21912000000009 34.939182000000073,128.22131000000002 34.935627000000068,128.22946000000002 34.936066000000039,128.23534000000006 34.931538000000046,128.23924 34.932861000000059,128.23984000000007 34.934471000000087,128.24054 34.940762000000063,128.23842000000002 34.940849000000071,128.24178000000006 34.937901000000068,128.24632000000008 34.931896000000052,128.24707 34.931370000000072,128.24872000000005 34.93670300000008,128.25294000000008 34.93326200000007,128.25830000000008 34.933399000000065,128.26584000000003 34.926762000000053,128.2707200000001 34.92390400000005,128.26776000000007 34.925030000000049,128.26282000000003 34.922836000000075,128.26045000000011 34.91746500000005,128.26791000000003 34.908524000000057,128.26764000000003 34.906994000000054,128.27116 34.90729900000008,128.27481 34.904457000000036,128.27687000000003 34.898895000000039,128.2726100000001 34.897259000000076,128.27335000000005 34.90206500000005,128.28452000000004 34.907211000000075,128.28233 34.90898100000004,128.28383000000008 34.909321000000034,128.28664000000003 34.905830000000037,128.29311000000007 34.908447000000081,128.29718000000003 34.912724000000082,128.30385 34.91607300000004,128.30600000000004 34.921108000000061,128.30103000000008 34.927753000000052,128.30144000000007 34.930889000000036,128.30330000000004 34.932022000000075,128.30894 34.935169000000087,128.31055000000003 34.934753000000057,128.31497000000002 34.939960000000042,128.32199000000003 34.942009000000041,128.31709 34.946014000000048,128.32014000000004 34.952507000000082,128.31859000000009 34.954292000000066,128.31982000000005 34.949429000000066,128.3315 34.945789000000048,128.33072000000004 34.943161000000089,128.33305000000007 34.942909000000043,128.33890000000008 34.939152000000036,128.34090000000003 34.93396800000005,128.33862000000011 34.932812000000069,128.34412000000009 34.926098000000081,128.34537 34.918922000000066,128.336 34.917381000000034,128.33980000000008 34.918713000000082,128.34373000000005 34.919216000000063,128.34521000000007 34.916023000000052,128.35532 34.911938000000077,128.35423000000003 34.907959000000062,128.35593000000006 34.902184000000034,128.35139000000004 34.901012000000037,128.34657000000004 34.90456800000004,128.33871000000011 34.904518000000053,128.31308 34.900959000000057,128.30507 34.89632800000004,128.30060000000003 34.893917000000044,128.30324000000007 34.893497000000082,128.30766000000006 34.877991000000065,128.31589000000008 34.877090000000067,128.32085000000006 34.881840000000068,128.32782000000009 34.87237900000008,128.32890000000009 34.874722000000077,128.33852000000002 34.875900000000058,128.33795000000009 34.877769000000058,128.33704 34.877773000000047,128.34233000000006 34.869854000000089,128.34489000000008 34.869011000000057,128.34846000000005 34.879234000000054,128.35106000000007 34.877365000000054,128.35707000000002 34.87030400000009,128.35579000000007 34.867710000000045,128.3573 34.867519000000073,128.36703 34.865353000000084,128.3746900000001 34.866627000000051,128.37700000000007 34.86872500000004,128.37630000000001 34.87192200000004,128.37149 34.87879200000009,128.37192000000005 34.880852000000061,128.37735000000009 34.889965000000075,128.36845000000005 34.892750000000035,128.36778000000004 34.895435000000077,128.36935000000005 34.896004000000062,128.37218000000007 34.882614000000046,128.38441 34.87355800000006,128.38133000000005 34.871643000000063,128.38316000000009 34.87146400000006,128.38733000000002 34.86960600000009,128.38777000000005 34.867413000000056,128.38541000000009 34.864712000000054,128.38942000000009 34.863953000000038,128.39633000000003 34.861671000000058,128.40120000000002 34.86251400000009,128.40820000000008 34.86047700000006,128.41281000000004 34.861076000000082,128.42009000000007 34.854984000000059,128.43335000000002 34.852623000000051,128.4295800000001 34.853146000000038,128.42293000000006 34.856365000000039,128.41757000000007 34.855488000000037,128.41138 34.857285000000047,128.40704000000005 34.855587000000071,128.39857000000006 34.85787600000009,128.39343000000008 34.85675800000007,128.38751000000002 34.849945000000048,128.3804 34.849499000000037,128.37480000000005 34.845100000000059,128.37035000000003 34.843052000000057,128.3752300000001 34.838482000000056,128.37466000000006 34.837360000000047,128.3793300000001 34.837933000000078,128.38055000000008 34.840302000000065,128.38564000000008 34.838108000000034,128.38857000000007 34.833878000000084,128.38551000000007 34.832024000000047,128.38596000000007 34.828793000000076,128.39688 34.833431000000076,128.40108000000009 34.833744000000081,128.40443000000005 34.829983000000084,128.40642000000003 34.829414000000043,128.40889000000004 34.837364000000036,128.42665 34.835903000000087,128.43381 34.839855000000057,128.43796000000009 34.839272000000051,128.44598000000008 34.840691000000049,128.45026000000007 34.845837000000074,128.45337000000006 34.853455000000054,128.45247000000006 34.85973000000007,128.44563000000005 34.86367000000007,128.44476000000009 34.864658000000077,128.44846000000007 34.862328000000048,128.45442000000003 34.87605700000006,128.45744000000002 34.876656000000082,128.45758 34.877270000000067,128.45929 34.869553000000053,128.4624 34.86664600000006,128.46585000000005 34.876598000000058,128.46927000000005 34.885757000000069,128.47514 34.887180000000058,128.47412000000008 34.888149000000055,128.46779000000004 34.894260000000088,128.46455000000003 34.894291000000067,128.45871 34.900028000000077,128.4588 34.909061000000065,128.45186 34.906307000000083,128.44136000000003 34.900940000000048,128.44855000000007 34.894817000000046,128.44676000000004 34.890381000000048,128.44313 34.886429000000078,128.44427000000007 34.883465000000058,128.43851000000006 34.881973000000073,128.43062000000009 34.876320000000078,128.43388000000004 34.873116000000039,128.42943000000002 34.869175000000041,128.4239500000001 34.870155000000068,128.41733000000011 34.880257000000086,128.41742000000011 34.898865000000058,128.4225 34.904545000000041,128.41869000000008 34.911182000000053,128.42970000000003 34.926102000000071,128.43510000000003 34.934292000000084,128.42644000000007 34.939869000000044,128.43013000000008 34.943378000000052,128.4286800000001 34.948322000000076,128.42064000000005 34.957527000000084,128.43600000000004 34.964046000000053,128.43982000000005 34.969841000000088,128.44321000000002 34.974751000000083,128.44128 34.977982000000054,128.43564000000003 34.97758900000008,128.42892000000006 34.980026000000066,128.42043 34.978378000000077,128.41084 34.979584000000045,128.40953000000002 34.988770000000045,128.40956000000006 34.991467000000057,128.41084 34.99094800000006,128.41750000000002 34.987667000000044,128.42427000000009 34.987026000000071,128.45462000000009 34.982498000000078,128.46355000000005 34.98542800000007,128.46484000000009 34.990082000000086,128.46347000000003 34.992538000000081,128.46503000000007 34.990147000000036,128.47240000000011 34.990650000000073,128.47662000000003 34.995888000000036,128.48282000000006 34.996433000000081,128.48291000000006 35.000000000000057,128.48349000000007 35.001358000000039,128.48372000000006 35.000000000000057,128.49313000000006 35.004852000000085,128.49818000000005 35.013096000000075,128.49872000000005 35.016197000000034,128.49612000000002 35.016914000000043,128.49031000000002 35.015903000000037,128.48718000000008 35.023468000000037,128.48236000000009 35.027782000000059,128.48347 35.030857000000083,128.48145 35.032898000000046,128.47684000000004 35.030613000000073,128.47139000000004 35.038952000000052,128.45937000000004 35.041130000000067,128.46202000000005 35.041340000000048,128.47292000000004 35.044796000000076,128.47787000000005 35.052113000000077,128.47864000000004 35.056992000000037,128.48257 35.059982000000048,128.47719000000006 35.064735000000042,128.47359000000006 35.064919000000089,128.46941000000004 35.063667000000066,128.46654 35.062698000000069,128.46588000000008 35.057198000000085,128.46220000000005 35.056900000000041,128.45856000000003 35.05966200000006,128.45316000000003 35.057919000000084,128.4457900000001 35.052086000000088,128.44263 35.046913000000075,128.44536000000005 35.044250000000034,128.44324000000006 35.033745000000067,128.39456000000007 35.028057000000047,128.38806 35.019676000000061,128.38530000000003 35.011372000000051,128.38617000000011 35.01144400000004,128.37389000000007 35.009937000000036,128.3662700000001 35.004929000000061,128.35979000000009 35.000000000000057,128.3569 34.991047000000037,128.3516800000001 34.99279400000006,128.34845000000007 35.000000000000057,128.35025000000007 35.006199000000038,128.35181 35.01714700000008,128.3695100000001 35.019810000000064,128.3716300000001 35.025066000000038,128.36694 35.027283000000068,128.36876000000007 35.025837000000081,128.37564000000009 35.028889000000049,128.37946 35.030987000000039,128.37875000000008 35.039711000000068,128.36284 35.042603000000042,128.36497000000008 35.044064000000049,128.36842000000001 35.043053000000043,128.38120000000004 35.045750000000055,128.3931 35.048065000000065,128.39798000000008 35.050533000000087,128.40039000000002 35.052029000000061,128.40187000000003 35.051834000000042,128.40631000000008 35.056908000000078,128.41110000000003 35.056087000000048,128.41412000000003 35.049473000000035,128.41315000000009 35.048496000000057,128.41447000000005 35.051128000000062,128.42776000000003 35.062290000000075,128.43518000000006 35.065311000000065,128.43956000000003 35.066456000000073,128.44495000000006 35.065723000000048,128.45634000000007 35.07273500000008,128.46405000000004 35.073277000000076,128.46744 35.069378000000086,128.47249000000011 35.073063000000047,128.47748 35.074715000000083,128.47647000000006 35.079052000000047,128.46138000000008 35.082756000000074,128.4554700000001 35.088753000000054,128.44972000000007 35.093960000000038,128.45145000000002 35.096611000000053,128.45386000000008 35.097389000000078,128.45699000000002 35.09549300000009,128.4615 35.092258000000072,128.46922000000006 35.09410100000008,128.47437000000002 35.093128000000036,128.48073 35.095043000000089,128.48421000000008 35.101612000000046,128.48630000000003 35.093109000000084,128.51228000000003 35.094635000000039,128.51936 35.098366000000055,128.5232400000001 35.097504000000072,128.52710000000002 35.09874300000007,128.53024000000005 35.110287000000085,128.53407000000004 35.114017000000047,128.53795000000002 35.111336000000051,128.54141000000004 35.107662000000062,128.54144000000008 35.102402000000041,128.5358 35.099613000000033,128.53645000000006 35.099491000000057,128.53923000000009 35.102459000000067,128.54474000000005 35.101177000000064,128.54773 35.099781000000064,128.54819000000009 35.096542000000056,128.54352000000006 35.093189000000052,128.54665 35.089951000000042,128.54736000000003 35.087387000000035,128.54794000000004 35.089226000000053,128.55309 35.083855000000085,128.58066000000008 35.072380000000067,128.56511 35.067738000000077,128.56619 35.063942000000054,128.5637200000001 35.062508000000037,128.56502 35.061539000000039,128.58142000000009 35.064865000000054,128.58919000000003 35.065289000000064,128.59508000000005 35.063648000000057,128.59581000000003 35.059933000000058,128.5916400000001 35.052086000000088,128.57718 35.049988000000042,128.57787000000008 35.052925000000073,128.5942500000001 35.052387000000067,128.60031000000004 35.051987000000054,128.60480000000007 35.057831000000078,128.61273000000006 35.058445000000063,128.6245 35.064072000000067,128.63213000000007 35.06864900000005,128.62741000000005 35.069462000000044,128.62466000000006 35.064281000000051,128.61232000000007 35.069878000000074,128.6104600000001 35.068707000000074,128.60591 35.074596000000042,128.60770000000002 35.073505000000068,128.61656000000005 35.077644000000078,128.62660000000005 35.081524000000059,128.62212 35.082855000000052,128.61801000000003 35.086990000000071,128.61801000000003 35.093361000000073,128.60922000000005 35.103294000000062,128.60289 35.112534000000039,128.60109 35.127857000000063,128.59810000000004 35.127804000000083,128.59418000000005 35.122177000000079,128.5865500000001 35.126633000000083,128.57426000000009 35.129139000000066,128.5747100000001 35.131966000000034,128.57825000000003 35.129375000000039,128.58478000000002 35.129570000000058,128.59067000000005 35.134167000000048,128.59572000000003 35.137348000000088,128.59648000000004 35.14075500000007,128.59224000000006 35.157978000000071,128.58723000000009 35.157547000000079,128.57629000000009 35.160168000000056,128.57423000000006 35.166149000000075,128.57910000000004 35.168034000000034,128.57811000000004 35.170815000000061,128.56583 35.173035000000084,128.56436000000008 35.177158000000077,128.56503000000009 35.18378800000005,128.56992000000002 35.187721000000067,128.56934 35.191998000000069,128.57130000000006 35.208866000000057,128.58948000000009 35.209862000000044,128.5929000000001 35.207779000000073,128.59836000000007 35.202400000000068,128.60555000000011 35.200314000000049,128.60597000000007 35.197002000000055,128.59792000000004 35.190678000000048,128.59554000000003 35.183834000000047,128.59956 35.170959000000039,128.59480000000008 35.164246000000048,128.60106000000007 35.158352000000036,128.59927000000005 35.155949000000078,128.60162000000003 35.156967000000066,128.60449000000006 35.154526000000089,128.60768000000007 35.147568000000035,128.60918000000004 35.143970000000081,128.61258000000009 35.140400000000056,128.62044000000003 35.139484000000039,128.63045 35.144512000000077,128.64111000000003 35.144440000000088,128.64783 35.142109000000062,128.6485 35.137276000000043,128.64371000000006 35.133232000000078,128.64679 35.126209000000074,128.65974000000006 35.123104000000069,128.66232000000002 35.118729000000087,128.6575600000001 35.117176000000086,128.65906000000007 35.114403000000038,128.66174 35.114632000000086,128.66679000000011 35.111988000000053,128.6694 35.117836000000068,128.6770600000001 35.121490000000051,128.67758000000003 35.134148000000039,128.67201 35.138359000000037,128.67537000000004 35.140213000000074,128.68500000000006 35.143650000000036,128.69025000000011 35.113483000000087,128.70192000000009 35.106792000000041,128.69756000000007 35.101028000000042,128.69800000000009 35.100166000000058,128.69180000000006 35.098015000000089,128.68858 35.095444000000043,128.6895300000001 35.090546000000074,128.69618000000003 35.091358000000071,128.69847000000004 35.095695000000035,128.70128 35.097603000000049,128.70251000000007 35.098812000000066,128.70624000000009 35.098312000000078,128.71207000000004 35.096352000000081,128.71472000000006 35.088654000000076,128.71729000000005 35.085060000000055,128.73044000000004 35.085999000000072,128.73497000000009 35.095764000000088,128.74234 35.095127000000048,128.74620000000004 35.087997000000087,128.7513100000001 35.087139000000036,128.75990000000002 35.088551000000052,128.7641900000001 35.093216000000041,128.76759000000004 35.094948000000045,128.7649100000001 35.09387200000009,128.75841000000003 35.096050000000048,128.7560400000001 35.09781600000008,128.7575700000001 35.09892700000006,128.76825000000008 35.093727000000058,128.77628000000004 35.105106000000035,128.78348000000005 35.110989000000075,128.78053 35.111534000000063,128.78070000000002 35.113480000000038,128.78127000000006 35.112480000000062,128.78790000000004 35.109985000000052,128.79221000000007 35.103729000000044,128.78842000000009 35.096298000000047,128.79015000000004 35.092491000000052,128.79295000000002 35.091019000000074,128.79984000000002 35.089149000000077,128.80055000000004 35.086479000000054,128.79869000000008 35.082939000000067,128.79091000000005 35.077168000000086,128.78661 35.073692000000051,128.7872000000001 35.072327000000087,128.79185000000007 35.081017000000088,128.8025100000001 35.082188000000087,128.81180000000006 35.090569000000073,128.82411000000002 35.094177000000059,128.84503000000007 35.093037000000038,128.85948000000008 35.088234000000057,128.86389000000008 35.08404500000006,128.8650100000001 35.077980000000082,128.86206000000004 35.074821000000043,128.86575000000005 35.073128000000054,128.87234 35.07347100000004,128.87962000000005 35.085930000000076,128.87854000000004 35.088451000000077,128.8834700000001 35.103386000000057,128.88339000000008 35.11756900000006,128.89919000000009 35.119080000000054,128.90601000000004 35.113571000000036,128.90590000000009 35.106556000000069,128.90848000000005 35.093693000000087,128.90367000000003 35.08816900000005,128.90384000000006 35.086300000000051,128.90454 35.085182000000088,128.90866000000005 35.087494000000049,128.91803000000004 35.091805000000079,128.92392000000007 35.099213000000077,128.92752000000007 35.105221000000085,128.92682000000002 35.111282000000074,128.9297600000001 35.120975000000044,128.92401000000007 35.124493000000086,128.92734000000007 35.119755000000055,128.93036000000006 35.120804000000078,128.93239000000005 35.125542000000053,128.93198000000007 35.12308500000006,128.93758000000003 35.120174000000077,128.93996000000004 35.12285600000007,128.94231000000002 35.127018000000078,128.94652000000008 35.141109000000085,128.95450000000005 35.178604000000064,128.95827000000008 35.184437000000059,128.96120000000008 35.187710000000038,128.96954000000005 35.183723000000043,128.9664600000001 35.184006000000068,128.97487 35.179466000000048,128.9737100000001 35.170418000000041,128.97559 35.165207000000066,128.97411 35.164654000000041,128.97127 35.154015000000072,128.97275000000002 35.135590000000036,128.96893 35.114902000000086,128.95964000000004 35.095802000000049,128.95549000000005 35.091438000000039,128.95071000000007 35.088787000000082,128.95332000000008 35.080490000000054,128.95386000000008 35.072487000000081,128.95821 35.066269000000034,128.95341000000008 35.058941000000061,128.95764000000008 35.04538000000008,128.95779000000005 35.038933000000043,128.96768000000009 35.035915000000045,128.96829000000002 35.029179000000056,128.96503000000007 35.02771400000006,128.96689000000003 35.032291000000043,128.97195000000011 35.032940000000053,128.9775800000001 35.034271000000047,128.97852 35.03926800000005,128.97496 35.041962000000069,128.97626000000002 35.041828000000066,128.98380000000009 35.045799000000045,128.98241000000007 35.047375000000045,128.97357 35.049034000000063,128.97258000000011 35.050499000000059,128.97507000000007 35.055187000000046,128.98306000000002 35.055256000000043,128.98642000000007 35.051846000000069,128.9903700000001 35.039577000000065,128.99704000000008 35.03898200000009,128.99979000000008 35.041382000000056,129.00247000000002 35.056911000000071,128.99492000000009 35.070633000000043,128.99617 35.074459000000047,128.99309000000005 35.076939000000039,128.99411000000009 35.079468000000077,128.99875000000009 35.079681000000051,129.00380000000007 35.077877000000058,129.00786000000005 35.064987000000087,129.01309000000003 35.05232600000005,129.01358000000005 35.049026000000083,129.01530000000002 35.048164000000043,129.01886000000002 35.051853000000051,129.02332 35.054878000000087,129.02458000000001 35.059059000000047,129.02635000000009 35.066776000000061,129.02354000000003 35.069481000000053,129.02458000000001 35.071178000000089,129.02750000000003 35.084118000000046,129.03065000000004 35.091228000000058,129.03563000000008 35.09300200000007,129.04163000000005 35.097080000000062,129.0475 35.104675000000043,129.05196 35.105331000000035,129.05731000000003 35.10773800000004,129.05972000000008 35.110058000000038,129.05933000000005 35.114651000000038,129.05464000000006 35.12372600000009,129.06172000000004 35.124882000000071,129.06627000000003 35.11896500000006,129.06976000000009 35.116402000000051,129.0751600000001 35.112389000000064,129.07739000000004 35.109669000000054,129.07663000000002 35.106453000000045,129.07193000000007 35.104080000000067,129.07344 35.104172000000062,129.08469000000002 35.104275000000086,129.09747000000004 35.102291000000037,129.10040000000004 35.093727000000058,129.10175000000004 35.093090000000075,129.10533000000009 35.096909000000039,129.11176 35.096458000000041,129.11620000000005 35.09113300000007,129.12167 35.090252000000078,129.12552000000005 35.091530000000034,129.12756000000002 35.100506000000053,129.1318500000001 35.105785000000083,129.13196000000005 35.115192000000036,129.12761 35.117405000000076,129.1246900000001 35.119003000000077,129.11560000000009 35.127052000000049,129.10611000000006 35.129700000000071,129.11302 35.144585000000063,129.12332000000004 35.149502000000041,129.1306800000001 35.152946000000043,129.14462000000003 35.151421000000084,129.14758000000006 35.146988000000079,129.14894000000004 35.149368000000038,129.17036000000007 35.14697300000006,129.17690000000005 35.146595000000048,129.18442000000005 35.157143000000076,129.19862 35.171173000000067,129.20749 35.178867000000082,129.21896000000004 35.179234000000065,129.2254200000001 35.192314000000067,129.23030000000006 35.205559000000051,129.22737000000006 35.20627200000007,129.22751000000005 35.215576000000056,129.22923000000003 35.21683500000006,129.23157000000003 35.214523000000042,129.23643000000004 35.216858000000059,129.24025000000006 35.225677000000076,129.2476200000001 35.232445000000041,129.25008000000003 35.234280000000069,129.25470000000007 35.236366000000089,129.25429000000008 35.238251000000048,129.24883 35.240616000000045,129.25209000000007 35.245998000000043,129.25473 35.249027000000069,129.25383000000011 35.25197200000008,129.2501400000001 35.253181000000041,129.23987 35.255325000000084,129.23834 35.262943000000064,129.24675000000002 35.26463700000005,129.2541500000001 35.270378000000051,129.25879000000009 35.287724000000082,129.26569000000006 35.295250000000067,129.26549 35.298996000000045,129.2654 35.307854000000077,129.26746000000003 35.313118000000088,129.2723400000001 35.317245000000071,129.28162000000009 35.315807000000063,129.30084 35.326469000000088,129.31706000000008 35.337589000000037,129.32434 35.349178000000052,129.34035000000006
Polygon
37.833697000000086,128.86600200000009 37.735290000000077,128.703122 37.555443000000082,128.82867400000009 37.531689000000085,129.01531 37.601109000000065,129.07152000000008 37.625405000000057,129.05005100000005 37.66142700000006,129.0535000000001 37.833697000000086,128.86600200000009