GDACS_FL_2095_1
info-gdacs@gdacs.org
2002-12-03T22:59:59-00:00
Actual
Alert
Public
2095
Geo
Flood
Past
Severe
Unknown
Global Disaster Alert and Coordination System

Orange flood alert in Indonesia
On 19/11/2002, a flood started in Indonesia, lasting until 03/12/2002 (last update). The flood caused 12 killed and 117000 displaced .
http://www.gdacs.org/report.aspx?eventtype=FL&eventid=2095
eventid
2095
currentepisodeid
1
glide
0
version
1
fromdate
Mon, 18 Nov 2002 23:00:00 GMT
todate
Tue, 03 Dec 2002 22:59:59 GMT
eventtype
FL
alertlevel
Orange
alerttype
automatic
link
http://www.gdacs.org/report.aspx?eventtype=FL&amp;eventid=2095
country
Indonesia
eventname
severity
Magnitude 5.71
population
12 killed and 117000 displaced
vulnerability
sourceid
DFO
iso3
hazardcomponents
FL,dead=12,displaced=117000,main_cause=Heavy rain,severity=2,sqkm=17006.86
datemodified
Thu, 28 May 2015 11:47:21 GMT
Polygon
1.7783760000000939,98.658257000000049 1.916180000000054,98.900055000000066 2.2095710000000395,98.67877500000003 2.4493430000000558,98.384191000000044 2.5920610000000579,98.110771000000057 3.0221310000000585,97.937691000000029 3.3852660000000583,97.468470000000082 3.8054980000000569,97.177895000000035 4.1070420000000922,96.842022000000043 4.4478150000000483,96.329895000000079 4.3474750000000881,96.185234000000037 4.2702100000000769,95.970856000000026 4.140542000000039,96.148483000000056 4.1192460000000892,96.175140000000056 4.0979370000000586,96.198586000000034 4.0754700000000526,96.219978000000083 4.0571110000000772,96.232414000000063 4.0555130000000759,96.235626000000082 4.0536700000000678,96.234947000000034 4.0481730000000766,96.241844000000071 4.0130830000000515,96.271523000000059 4.0002210000000673,96.27729800000003 3.9887580000000753,96.288559000000078 3.9777380000000448,96.294785000000047 3.9646740000000591,96.308807000000058 3.9581950000000461,96.312660000000051 3.9146290000000477,96.338539000000083 3.8953580000000443,96.353951000000052 3.886630000000082,96.35788000000008 3.87539600000008,96.36891200000008 3.846253000000047,96.390312000000051 3.8304320000000871,96.405716000000041 3.8159950000000435,96.422256000000061 3.8014120000000844,96.43698100000006 3.7859600000000455,96.452591000000041 3.7785530000000449,96.46202900000003 3.7513680000000704,96.496674000000041 3.7438150000000405,96.508377000000053 3.7403820000000678,96.515266000000054 3.7365010000000893,96.523056000000054 3.7349410000000489,96.538857000000064 3.7351010000000429,96.540741000000082 3.73565700000006,96.547325000000058 3.7410200000000486,96.569977000000051 3.7406400000000417,96.595619000000056 3.7417640000000461,96.599770000000035 3.741623000000061,96.616219000000058 3.7446310000000835,96.621704000000079 3.7478840000000559,96.632454000000052 3.748162000000093,96.648026000000073 3.7520990000000438,96.656937000000028 3.7512630000000513,96.665520000000072 3.7489750000000868,96.689003000000071 3.7501320000000646,96.691292000000033 3.7531430000000796,96.687828000000081 3.7545930000000567,96.681236000000069 3.7570290000000455,96.689896000000033 3.7623320000000717,96.693764000000044 3.7614160000000538,96.695374000000072 3.7568140000000767,96.694931000000054 3.7510700000000838,96.697006000000044 3.7483180000000402,96.699997000000053 3.7491000000000554,96.731133000000057 3.7516300000000911,96.731125000000077 3.7562180000000467,96.726532000000077 3.75944300000009,96.728119000000049 3.7592240000000743,96.732010000000059 3.7553360000000566,96.739807000000042 3.7488920000000689,96.73868600000003 3.7452220000000693,96.742363000000068 3.7455130000000736,96.762970000000053 3.7434610000000816,96.769386000000054 3.7411840000000893,96.777634000000035 3.7311030000000756,96.791634000000045 3.7343350000000441,96.795517000000075 3.7329740000000697,96.802391000000057 3.721960000000081,96.81226300000003 3.706429000000071,96.851692000000071 3.6871660000000475,96.873047000000042 3.6766030000000569,96.88017300000007 3.6746710000000462,96.880959000000075 3.6669530000000918,96.884094000000061 3.656389000000047,96.890541000000042 3.6343200000000593,96.895645000000059 3.6232700000000477,96.892700000000048 3.6009870000000888,96.903763000000026 3.5874650000000656,96.922112000000027 3.5847220000000561,96.928299000000038 3.5778410000000918,96.935875000000067 3.5755580000000577,96.942291000000068 3.5680240000000936,96.963837000000069 3.5554370000000404,96.988136000000054 3.5494700000000421,96.993645000000072 3.5492530000000784,96.998451000000045 3.5451190000000565,97.000984000000074 3.5363810000000626,97.002151000000026 3.525361000000089,97.010429000000045 3.5184810000000653,97.018684000000064 3.5074430000000802,97.019859000000054 3.4977970000000482,97.025612000000081 3.4958880000000931,97.027260000000069 3.4812710000000493,97.039848000000063 3.466572000000042,97.048592000000042 3.4578300000000581,97.04815700000006 3.4548600000000533,97.056404000000043 3.4461290000000417,97.060097000000042 3.441767000000084,97.063766000000044 3.4332510000000411,97.061737000000051 3.427291000000082,97.06976300000008 3.4151090000000863,97.073456000000078 3.4015660000000594,97.084709000000032 3.3943470000000389,97.08836400000007 3.3774430000000848,97.096909000000039 3.3590760000000728,97.111145000000079 3.3528890000000615,97.120552000000032 3.3487550000000397,97.122849000000031 3.3427750000000742,97.12332200000003 3.3347190000000637,97.121056000000067 3.3282840000000533,97.12336700000003 3.3234630000000607,97.127495000000067 3.3177140000000804,97.128197000000057 3.3145140000000879,97.13644400000004 3.3080880000000548,97.142410000000041 3.3002790000000459,97.147011000000077 3.2925160000000915,97.149261000000081 3.2883260000000405,97.150475000000029 3.2782240000000797,97.158516000000077 3.2704100000000835,97.161049000000048 3.2651330000000485,97.166786000000059 3.2568600000000743,97.169785000000047 3.2490590000000452,97.17826800000006 3.2527480000000537,97.18169400000005 3.2534500000000435,97.186729000000071 3.2589830000000575,97.192200000000071 3.249110000000087,97.199554000000035 3.247047000000066,97.202759000000071 3.2459170000000768,97.210999000000072 3.2406530000000657,97.222458000000074 3.2319160000000693,97.224083000000064 3.2284780000000524,97.229355000000055 3.2292190000000573,97.231674000000055 3.2324170000000549,97.24169900000004 3.2315100000000712,97.247192000000041 3.224168000000077,97.255219000000068 3.2101590000000897,97.26487000000003 3.1874140000000466,97.276825000000031 3.1508680000000595,97.288361000000066 3.1428300000000604,97.293640000000039 3.1386810000000764,97.290222000000028 3.135526000000084,97.291084000000069 3.1336240000000544,97.291603000000066 3.11432300000007,97.300346000000047 3.1124880000000417,97.302643000000046 3.1131900000000883,97.307899000000077 3.110206000000062,97.310883000000047 3.106296000000043,97.310898000000066 3.1042110000000775,97.304039000000046 3.1003000000000611,97.303818000000035 3.0865120000000843,97.309570000000065 3.0837660000000824,97.315987000000064 3.0807820000000561,97.318512000000055 3.0771020000000817,97.318520000000035 3.0724940000000629,97.315331000000072 3.0653700000000867,97.317863000000045 3.0639980000000833,97.321754000000055 3.0600880000000643,97.321762000000035 3.0550300000000448,97.322464000000082 3.0373440000000755,97.333717000000036 2.9978510000000824,97.364929000000075 2.9764890000000719,97.378021000000047 2.9587290000000621,97.395279000000073 2.9512410000000386,97.402557000000058 2.9354120000000421,97.422035000000051 2.9271480000000452,97.43006100000008 2.9232560000000376,97.438309000000061 2.9173170000000823,97.458679000000075 2.9180780000000937,97.493217000000072 2.9139580000000933,97.503288000000055 2.9118250000000785,97.505569000000037 2.9075310000000627,97.510162000000037 2.909383000000048,97.516106000000036 2.9077770000000669,97.518166000000065 2.8946800000000508,97.524605000000065 2.8871250000000828,97.54268600000006 2.8942810000000918,97.555710000000033 2.8945200000000568,97.560280000000034 2.8915400000000773,97.565781000000072 2.8917770000000473,97.569435000000055 2.8947760000000926,97.574234000000047 2.8934060000000841,97.579727000000048 2.8906550000000379,97.584076000000039 2.8853730000000724,97.588211000000058 2.8805580000000646,97.596451000000059 2.8697620000000938,97.60356900000005 2.8682370000000788,97.604347000000075 2.8585030000000415,97.609306000000061 2.8237920000000827,97.619217000000049 2.7421850000000632,97.640434000000027 2.7071380000000431,97.647400000000061 2.6863190000000827,97.651535000000081 2.6042300000000864,97.658340000000067 2.5814140000000521,97.657188000000076 2.5782410000000482,97.657021000000043 2.5423710000000597,97.660072000000071 2.5170720000000415,97.658531000000039 2.4894810000000689,97.660873000000038 2.4703930000000582,97.660225000000082 2.4552760000000831,97.660843000000057 2.4227950000000646,97.662155000000041 2.406242000000077,97.664253000000031 2.3919940000000679,97.66954000000004 2.3513600000000565,97.707336000000055 2.3463460000000396,97.71126600000008 2.3171440000000416,97.734154000000046 2.3074960000000715,97.739426000000037 2.2877310000000648,97.745186000000047 2.2778520000000526,97.750229000000047 2.2663710000000492,97.760078000000078 2.2562770000000683,97.773582000000033 2.2466290000000413,97.779091000000051 2.24479400000007,97.781837000000053 2.2429620000000909,97.786407000000054 2.240897000000075,97.788925000000063 2.2415900000000875,97.791672000000062 2.2468860000000745,97.795547000000056 2.2583870000000843,97.798264000000074 2.2662100000000578,97.801674000000048 2.2703560000000493,97.805786000000069 2.265096000000085,97.823845000000063 2.2547700000000646,97.836891000000037 2.2497170000000892,97.840332000000046 2.24581900000004,97.847427000000039 2.24169100000006,97.854057000000068 2.242159000000072,97.859772000000078 2.24400200000008,97.86182400000007 2.2417120000000637,97.867317000000071 2.2362020000000484,97.873497000000043 2.2350620000000845,97.879440000000045 2.2359900000000721,97.884468000000027 2.2479680000000712,97.898842000000059 2.2599380000000906,97.907501000000082 2.2689190000000394,97.916855000000055 2.2700780000000691,97.922798000000057 2.2696330000000557,97.93354000000005 2.2675750000000789,97.941086000000041 2.2682800000000611,97.951141000000064 2.2582970000000842,97.974388000000033 2.2538410000000795,97.984764000000041 2.2336520000000633,98.017479000000037 2.22379600000005,98.040352000000041 2.1999400000000833,98.08358000000004 2.1989840000000527,98.085152000000051 2.1808960000000752,98.114922000000035 2.1724000000000387,98.124069000000077 2.1521900000000755,98.14329500000008 2.1386510000000385,98.165489000000036 2.1248690000000465,98.177162000000067 2.1062730000000442,98.200264000000061 2.10031100000009,98.215126000000055 2.0959890000000883,98.222260000000063 2.0876890000000685,98.23593900000003 2.0819490000000656,98.242805000000033 2.0716120000000728,98.251503000000071 2.0626580000000558,98.263397000000055 2.0553090000000793,98.270485000000065 2.0470360000000483,98.274155000000064 2.0314010000000735,98.273491000000035 2.0279460000000427,98.267555000000073 2.0254200000000537,98.270073000000082 2.0256600000000731,98.279213000000027 2.0275030000000811,98.282639000000074 2.036008000000038,98.281708000000037 2.0385380000000737,98.283081000000038 2.0393980000000624,98.285843000000057 2.0422290000000771,98.29495200000008 2.0401660000000561,98.300438000000042 2.0335070000000428,98.308907000000033 2.032363000000089,98.314842000000056 2.0332060000000638,98.315155000000061 2.0385730000000422,98.317123000000038 2.0422560000000658,98.321228000000076 2.0406510000000821,98.326027000000067 2.0408870000000547,98.33219900000006 2.0448100000000409,98.347046000000034 2.0425160000000915,98.352303000000063 2.024827000000073,98.366722000000038 2.0177020000000425,98.369469000000038 2.0117230000000745,98.368111000000056 2.0011410000000751,98.361496000000045 2.0006850000000895,98.365150000000028 2.0135700000000725,98.376556000000051 2.01426500000008,98.38250000000005 2.0131220000000667,98.388893000000053 2.0106310000000462,98.39103700000004 2.0080680000000939,98.393242000000043 2.0066930000000411,98.398270000000082 2.005559000000062,98.416321000000039 2.00763900000004,98.428200000000061 2.0062640000000442,98.433228000000042 1.9830750000000421,98.471184000000051 1.9686050000000819,98.487877000000026 1.9567200000000753,98.497574000000043 1.9545900000000529,98.499313000000029 1.9447080000000483,98.504349000000047 1.938267000000053,98.499336000000028 1.9366600000000744,98.502304000000038 1.939653000000078,98.508011000000067 1.9389670000000478,98.512123000000031 1.9180640000000722,98.534996000000035 1.9107150000000388,98.546425000000056 1.9042830000000777,98.552597000000048 1.8957790000000614,98.555580000000077 1.8895760000000905,98.56175200000007 1.8836010000000556,98.564957000000049 1.8801560000000563,98.56929800000006 1.8794710000000805,98.575699000000043 1.8764860000000567,98.580498000000034 1.8741860000000656,98.579819000000043 1.8638490000000729,98.591934000000037 1.8512120000000891,98.600853000000029 1.8482260000000679,98.60519400000004 1.8128400000000511,98.628990000000044 1.8059490000000551,98.639275000000055 1.7933120000000713,98.649338000000057 1.7783760000000939,98.658257000000049
Polygon
1.3600850000000833,97.534707000000083 1.2230710000000613,97.473051000000055 1.092909000000077,97.603215000000034 1.175117000000057,97.664871000000062 1.2915790000000698,97.610063000000082 1.3600850000000833,97.534707000000083