GDACS_FL_2105_1
info-gdacs@gdacs.org
2002-12-20T22:59:59-00:00
Actual
Alert
Public
2105
Geo
Flood
Past
Severe
Unknown
Global Disaster Alert and Coordination System

Orange flood alert in Sri Lanka
On 16/12/2002, a flood started in Sri Lanka, lasting until 20/12/2002 (last update). The flood caused 2 killed and 500000 displaced .
http://www.gdacs.org/report.aspx?eventtype=FL&eventid=2105
eventid
2105
currentepisodeid
1
glide
0
version
1
fromdate
Sun, 15 Dec 2002 23:00:00 GMT
todate
Fri, 20 Dec 2002 22:59:59 GMT
eventtype
FL
alertlevel
Orange
alerttype
automatic
link
http://www.gdacs.org/report.aspx?eventtype=FL&amp;eventid=2105
country
Sri Lanka
eventname
severity
Magnitude 4.85
population
2 killed and 500000 displaced
vulnerability
sourceid
DFO
iso3
hazardcomponents
FL,dead=2,displaced=500000,main_cause=Heavy rain,severity=1,sqkm=14147.74
datemodified
Thu, 28 May 2015 11:47:20 GMT
Polygon
7.9099010000000476,81.570383000000049 7.9168250000000739,81.588104000000044 7.9209620000000882,81.587433000000033 7.9237430000000586,81.582611000000043 7.924694000000045,81.576401000000033 7.9226680000000442,81.568565000000035 7.9275040000000558,81.565826000000072 7.9357530000000907,81.569550000000049 7.9385180000000446,81.567719000000068 7.937870000000089,81.55966200000006 7.9348220000000538,81.557891000000041 7.9392140000000495,81.553128000000072 7.9480360000000587,81.547966000000031 7.9540260000000558,81.544312000000048 7.9622960000000376,81.543892000000028 8.0000000000000568,81.503189000000077 8.0097810000000891,81.491798000000074 8.034274000000039,81.476929000000041 8.0798710000000824,81.461998000000051 8.09012800000005,81.460907000000077 8.10410900000005,81.461983000000032 8.107902000000081,81.460167000000069 8.1103580000000761,81.457787000000053 8.11576400000007,81.452545000000043 8.1158030000000849,81.450241000000062 8.1183840000000487,81.445885000000033 8.1259010000000558,81.441887000000065 8.1282960000000912,81.440605000000062 8.1457210000000373,81.435875000000067 8.1506870000000617,81.438683000000083 8.1532230000000823,81.437050000000056 8.1620080000000712,81.436569000000077 8.1730620000000727,81.437805000000083 8.1832400000000689,81.429176000000041 8.18997500000006,81.426353000000063 8.2029450000000566,81.425522000000058 8.2132750000000669,81.420250000000067 8.2366080000000466,81.412254000000075 8.2419090000000779,81.407738000000052 8.2485550000000671,81.410156000000029 8.25757800000008,81.40799700000008 8.257844000000091,81.404648000000066 8.2716290000000754,81.40509000000003 8.31679500000007,81.391380000000083 8.3331360000000814,81.389137000000062 8.3548690000000647,81.389290000000074 8.3566750000000525,81.39372300000008 8.3645340000000488,81.386307000000045 8.37022200000007,81.383675000000039 8.401484000000039,81.376648000000046 8.41716800000006,81.371407000000033 8.4277590000000373,81.367859000000067 8.4709760000000642,81.358513000000073 8.4770990000000666,81.354836000000034 8.4909270000000561,81.352966000000038 8.4996210000000474,81.34555800000004 8.5058470000000739,81.335800000000063 8.5062340000000631,81.325111000000049 8.5113160000000789,81.321205000000077 8.51296700000006,81.32249500000006 8.5129230000000575,81.329254000000049 8.52237800000006,81.322227000000055 8.5217900000000668,81.319916000000035 8.5176760000000513,81.315857000000051 8.5093660000000568,81.312782000000084 8.50903100000005,81.307747000000063 8.5043570000000841,81.299698000000035 8.5027900000000614,81.293381000000068 8.5031680000000733,81.283104000000037 8.5012980000000766,81.282448000000045 8.4939350000000786,81.285263000000043 8.48766500000005,81.285156000000029 8.484273000000087,81.28804000000008 8.4792440000000511,81.28879500000005 8.4703030000000581,81.285927000000072 8.4643330000000674,81.280373000000054 8.4611190000000533,81.285149000000047 8.4568000000000438,81.280884000000071 8.4519440000000827,81.283737000000031 8.4504960000000438,81.282875000000047 8.446495000000084,81.284523000000036 8.44651900000008,81.295815000000061 8.45795000000004,81.29977400000007 8.4582990000000677,81.303978000000029 8.4561950000000934,81.304779000000053 8.4451920000000769,81.300194000000033 8.4350890000000618,81.304436000000067 8.4325890000000641,81.303970000000049 8.4334660000000667,81.301476000000036 8.4410660000000917,81.296982000000071 8.44118700000007,81.289642000000072 8.4431370000000925,81.285484000000054 8.4454190000000722,81.282883000000083 8.4497500000000514,81.277412000000083 8.4485620000000381,81.273407000000077 8.4533810000000926,81.272644000000071 8.45689400000009,81.262421000000074 8.4558910000000651,81.259888000000046 8.4523760000000721,81.257530000000031 8.4534930000000372,81.25314300000008 8.4498150000000578,81.248047000000042 8.4553370000000427,81.242683000000056 8.4558410000000777,81.237450000000081 8.45778000000007,81.233917000000076 8.4576390000000856,81.229713000000061 8.4557960000000776,81.227379000000042 8.4577140000000668,81.225105000000042 8.458005000000071,81.220078000000058 8.4642930000000547,81.206123000000048 8.4628820000000928,81.202957000000083 8.45916800000009,81.199959000000035 8.4615040000000477,81.197685000000035 8.4689460000000736,81.20284300000003 8.4830690000000573,81.19551800000005 8.4956430000000864,81.193619000000069 8.50183700000008,81.189568000000065 8.5072000000000685,81.193092000000036 8.50349900000009,81.198990000000038 8.5065580000000409,81.203651000000036 8.50643000000008,81.211624000000029 8.50768000000005,81.211853000000076 8.5112760000000662,81.209183000000053 8.5146140000000514,81.209656000000052 8.51736800000009,81.207390000000032 8.5238400000000638,81.207916000000068 8.5250700000000847,81.209404000000063 8.5265600000000745,81.207748000000038 8.52642300000008,81.203339000000028 8.5285220000000663,81.202744000000052 8.53224700000004,81.205116000000032 8.5343500000000745,81.204308000000083 8.53609700000004,81.199722000000065 8.54491500000006,81.197342000000049 8.5510930000000371,81.203110000000038 8.5517620000000534,81.200600000000065 8.5489540000000375,81.193214000000069 8.5587980000000812,81.192108000000076 8.56355300000007,81.195335000000057 8.5665240000000722,81.192657000000054 8.57251000000008,81.197365000000048 8.5737120000000573,81.200531000000069 8.57033400000006,81.202576000000079 8.5684920000000488,81.202660000000037 8.5667780000000562,81.202728000000036 8.56716300000005,81.204834000000062 8.5762390000000437,81.212326000000076 8.57783900000004,81.216759000000081 8.5753170000000409,81.217552000000069 8.5650070000000369,81.208786000000032 8.5618590000000836,81.209572000000037 8.5624380000000428,81.21252400000003 8.5680060000000822,81.217224000000044 8.57022900000004,81.221878000000061 8.56953400000009,81.226067000000057 8.5571080000000848,81.231743000000051 8.5413550000000669,81.22351100000003 8.539820000000077,81.227898000000039 8.5373020000000679,81.228485000000035 8.5323300000000586,81.225677000000076 8.5320230000000379,81.23175800000007 8.5394150000000764,81.239845000000059 8.54172200000005,81.245056000000034 8.54203700000005,81.24576600000006 8.5457770000000437,81.247086000000081 8.55790200000007,81.247070000000065 8.5589860000000613,81.244781000000046 8.5692910000000779,81.240959000000032 8.574273000000062,81.243141000000037 8.576733000000047,81.246117000000083 8.5792580000000385,81.245110000000068 8.5745470000000523,81.239159000000029 8.57501300000007,81.236229000000037 8.580972000000088,81.229820000000075 8.6062050000000454,81.22077900000005 8.6135410000000547,81.219643000000076 8.6160210000000461,81.221359000000064 8.61850700000008,81.224106000000063 8.6191020000000549,81.224762000000055 8.6249060000000668,81.227798000000064 8.6360280000000671,81.225250000000074 8.6475030000000856,81.226692000000071 8.6664230000000657,81.207474000000047 8.676140000000089,81.201332000000036 8.6826360000000591,81.200386000000037 8.6866720000000441,81.196465000000046 8.70353300000005,81.188126000000068 8.7229700000000889,81.175629000000072 8.724484000000075,81.17250800000005 8.729938000000061,81.171333000000061 8.7430980000000886,81.15915700000005 8.7643850000000612,81.148575000000051 8.7665130000000886,81.146301000000051 8.76553400000006,81.142082000000073 8.77576600000009,81.129860000000065 8.7869760000000383,81.121841000000074 8.8125470000000519,81.104813000000036 8.8162970000000769,81.105713000000037 8.8216290000000868,81.099075000000084 8.8292250000000649,81.094788000000051 8.8435060000000476,81.090805000000046 8.8515220000000454,81.08631100000008 8.8540350000000672,81.08614300000005 8.85588000000007,81.088478000000066 8.8584050000000616,81.08747100000005 8.85823600000009,81.084946000000059 8.8557740000000535,81.081970000000069 8.8641420000000721,81.081680000000063 8.8639700000000516,81.079369000000042 8.8598210000000677,81.077202000000057 8.8586210000000847,81.073822000000064 8.8561180000000377,81.073364000000083 8.852747000000079,81.074989000000073 8.85151600000006,81.073502000000076 8.8536530000000653,81.070595000000083 8.8594820000000709,81.058922000000052 8.8730920000000424,81.044426000000044 8.8883440000000746,81.031853000000069 8.90374600000007,81.023056000000054 8.9048230000000785,81.020966000000044 8.8949980000000437,81.020821000000069 8.8911470000000463,81.012985000000072 8.89408300000008,81.012398000000076 8.9005150000000413,81.015648000000056 8.90407300000004,81.015495000000044 8.9055610000000911,81.013840000000073 8.9075910000000817,81.017860000000042 8.9148950000000582,81.018814000000077 8.9290390000000457,81.010208000000034 8.9297150000000443,81.007065000000068 8.91774200000009,80.997009000000048 8.9180130000000872,80.993019000000061 8.9302180000000817,81.001610000000085 8.93334400000009,81.002289000000076 8.9388090000000489,81.000481000000036 8.9550800000000663,80.989594000000068 8.9677790000000641,80.979698000000042 8.9714020000000687,80.975342000000069 8.9785720000000424,80.971458000000041 8.978849000000082,80.969551000000081 8.9792730000000915,80.966637000000048 8.9862470000000485,80.961906000000056 8.98956000000004,80.964066000000059 8.9931310000000622,80.963066000000083 9.0309680000000867,80.936737000000051 9.0714130000000637,80.917587000000083 9.0773510000000783,80.912209000000075 9.0950580000000514,80.903015000000039 9.11681400000009,80.888832000000036 9.1178940000000921,80.886536000000035 9.1219050000000834,80.884071000000063 9.12544100000008,80.885391000000084 9.1846360000000686,80.857246000000032 9.23212200000006,80.842804000000058 9.2384360000000925,80.838760000000036 9.267389000000037,80.820190000000082 9.2850370000000453,80.814980000000048 9.2865520000000856,80.811630000000036 9.2861230000000887,80.811012000000062 9.2886940000000777,80.809906000000069 9.2890670000000455,80.811249000000032 9.2909430000000839,80.811699000000033 9.3145190000000753,80.787430000000029 9.3279710000000478,80.766472000000078 9.3295040000000427,80.764076000000045 9.3428760000000466,80.750809000000061 9.3750110000000859,80.712967000000049 9.39540100000005,80.691582000000039 9.4074850000000652,80.680389000000048 9.4127500000000737,80.677940000000035 9.4136380000000486,80.674370000000067 9.4168050000000676,80.672310000000039 9.4218790000000467,80.668594000000041 9.4398150000000669,80.642960000000073 9.4566000000000372,80.624672000000032 9.46812200000005,80.60955000000007 9.47215900000009,80.604256000000078 9.50035900000006,80.562332000000083 9.5173980000000711,80.540459000000055 9.5452850000000922,80.508995000000084 9.5467220000000452,80.507378000000074 9.55582000000004,80.499916000000042 9.5696610000000533,80.482208000000071 9.6087040000000457,80.426071000000036 9.6231230000000778,80.40921000000003 9.6603460000000609,80.365669000000082 9.7084060000000818,80.322464000000082 9.712690000000066,80.319962000000032 9.7330740000000446,80.30803700000007 9.7538280000000555,80.288704000000052 9.7755720000000679,80.273804000000041 9.80043900000004,80.260002000000043 9.8185120000000552,80.253906000000029 9.8191250000000423,80.253357000000051 9.823592000000076,80.249336000000085 9.82351900000009,80.238579000000072 9.83135400000009,80.214653000000055 9.8298010000000886,80.205147000000068 9.8215700000000652,80.177223000000083 9.8209400000000642,80.143700000000081 9.8149630000000911,80.136246000000028 9.8114120000000753,80.135788000000048 9.81333200000006,80.132858000000056 9.8150340000000824,80.130562000000054 9.8144730000000777,80.125069000000053 9.808742000000052,80.114677000000029 9.6772480000000769,80.182102000000043 9.533484000000044,80.21085400000004 9.1453220000000783,80.541514000000063 8.7763280000000918,80.838626000000033 8.4456700000000637,80.991974000000084 8.23241900000005,81.037501000000077 7.8418600000000538,80.848213000000044 7.6909070000000384,81.178869000000077 7.5776540000000523,81.346453000000054 7.34875500000004,81.476841000000036 7.1541870000000927,81.497545000000059 7.11585000000008,81.720381000000032 7.1613750000000778,81.866541000000041 7.2792160000000763,81.859305000000063 7.3096390000000611,81.872344000000055 7.39946000000009,81.844818000000032 7.4979740000000561,81.808600000000069 7.5906920000000468,81.798458000000039 7.6385000000000787,81.770932000000073 7.7428090000000793,81.714432000000045 7.7572960000000535,81.675316000000066 7.8188240000000633,81.617775000000051 7.8384980000000724,81.58886700000005 7.9099010000000476,81.570383000000049
Polygon
8.4935910000000376,80.345035000000053 8.44806600000004,80.268361000000084 8.3570150000000467,80.261173000000042 8.2875290000000632,80.289925000000039 8.1916860000000611,80.349827000000062 8.1509530000000723,80.46483900000004 8.1533490000000484,80.59183100000007 8.2204390000000558,80.692465000000084 8.3450350000000526,80.70923700000003 8.4840050000000815,80.577453000000048 8.5079670000000647,80.366599000000065 8.4935910000000376,80.345035000000053