GDACS_FL_3755_1
info-gdacs@gdacs.org
2010-12-17T22:59:59-00:00
Actual
Alert
Public
3755
Geo
Flood
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green flood alert in Serbia
On 01/12/2010, a flood started in Serbia, lasting until 17/12/2010 (last update). The flood caused 3 killed and 30000 displaced .
http://www.gdacs.org/report.aspx?eventtype=FL&eventid=3755
eventid
3755
currentepisodeid
1
glide
FL-2010-000252-SRB
version
1
fromdate
Tue, 30 Nov 2010 23:00:00 GMT
todate
Fri, 17 Dec 2010 22:59:59 GMT
eventtype
FL
alertlevel
Green
alerttype
automatic
link
http://www.gdacs.org/report.aspx?eventtype=FL&amp;eventid=3755
country
Serbia
eventname
severity
Magnitude 6.54
population
3 killed and 30000 displaced
vulnerability
sourceid
DFO
iso3
hazardcomponents
FL,dead=3,displaced=30000,main_cause=Heavy Rain,severity=2,sqkm=101737.38
datemodified
Thu, 28 May 2015 11:45:19 GMT
Polygon
43.192772000000048,23.00499700000006 43.210548000000074,22.940552000000082 43.229717000000051,22.905969000000084 43.286732000000086,22.846943000000067 43.331871000000035,22.829512000000079 43.386662000000058,22.764305000000036 43.400688000000059,22.721386000000052 43.415833000000077,22.669167000000073 43.430832000000066,22.628052000000082 43.475620000000049,22.541664000000083 43.717499000000089,22.410416000000055 43.826942000000088,22.367222000000083 44.00819000000007,22.418610000000058 44.060833000000059,22.544859000000088 44.119579000000044,22.614859000000081 44.169998000000078,22.619164000000069 44.213188000000059,22.651804000000084 44.224716000000058,22.676388000000088 44.224701000000039,22.681435000000079 44.274021000000062,22.687775000000045 44.288467000000082,22.665276000000063 44.294167000000073,22.641110000000083 44.298035000000084,22.616676000000041 44.305550000000039,22.575623000000064 44.329720000000066,22.54333100000008 44.345276000000069,22.529999000000089 44.461063000000081,22.45992700000005 44.48333000000008,22.461527000000046 44.547634000000073,22.586248000000069 44.551662000000078,22.615416000000039 44.54583000000008,22.639027000000056 44.528885000000059,22.672497000000078 44.523567000000071,22.701181000000076 44.533051000000057,22.738888000000088 44.552601000000038,22.762510000000077 44.60513700000007,22.712776000000076 44.619442000000049,22.665833000000077 44.618607000000054,22.644444000000078 44.622425000000078,22.607290000000091 44.638611000000083,22.574444000000085 44.658607000000075,22.543053000000043 44.679718000000037,22.513887000000068 44.69916500000005,22.493471000000056 44.713745000000074,22.466108000000077 44.712078000000076,22.428818000000035 44.659023000000047,22.311594000000071 44.635826000000066,22.297775000000058 44.604164000000083,22.273331000000042 44.585274000000084,22.25861000000009 44.483261000000084,22.17548400000004 44.480274000000065,22.137497000000053 44.498676000000046,22.091665000000091 44.559509000000048,22.035416000000055 44.589424000000065,22.031261000000086 44.593887000000052,22.02916300000004 44.633049000000085,21.997013000000038 44.649437000000034,21.909164000000089 44.661942000000067,21.783608000000072 44.655830000000037,21.734165000000075 44.660133000000087,21.64423400000004 44.682842000000051,21.617706000000055 44.710793000000081,21.615601000000083 44.755829000000062,21.596943000000067 44.771660000000054,21.565552000000082 44.777355000000057,21.533747000000062 44.777771000000087,21.474720000000048 44.776665000000037,21.453610000000083 44.783104000000037,21.398665000000051 44.828098000000068,21.362572000000057 44.866524000000084,21.369581000000039 44.876244000000042,21.407776000000069 44.875416000000087,21.453610000000083 44.875275000000045,21.478886000000045 44.879715000000033,21.502220000000079 44.892426000000057,21.553957000000082 44.913956000000042,21.556803000000059 44.940201000000059,21.535831000000087 44.962357000000054,21.473194000000092 44.962357000000054,21.450136000000043 44.961662000000047,21.429722000000083 44.972218000000055,21.407219000000055 45.013607000000036,21.373436000000083 45.053604000000064,21.443054000000075 45.142773000000034,21.514095000000054 45.183609000000047,21.482777000000056 45.187447000000077,21.473370000000045 45.215416000000062,21.410832000000084 45.217773000000079,21.351387000000045 45.231247000000053,21.271942000000081 45.316383000000087,21.048885000000041 45.345833000000084,20.986664000000076 45.478882000000056,20.808330000000069 45.50777400000004,20.794167000000073 45.613537000000065,20.767567000000042 45.633331000000055,20.776526000000047 45.653049000000067,20.797497000000078 45.758675000000039,20.801596000000075 45.768154000000038,20.773018000000036 45.746941000000049,20.752775000000042 45.743748000000039,20.717636000000084 45.798748000000046,20.662359000000038 45.827911000000086,20.655972000000077 45.898746000000074,20.585276000000079 45.91124700000006,20.553749000000039 45.914234000000079,20.513746000000083 45.981522000000041,20.373192000000074 46.017391000000089,20.354025000000036 46.069859000000065,20.314026000000069 46.114853000000039,20.261025000000075 46.118050000000039,20.25777400000004 46.150551000000064,20.202776000000085 46.167217000000051,20.115276000000051 46.17083000000008,19.961109000000079 46.152145000000075,19.849583000000052 46.162216000000058,19.744721000000084 46.176392000000078,19.703720000000089 46.181110000000047,19.666525000000036 46.172775000000058,19.565275000000042 46.139229000000057,19.506317000000081 46.118122000000085,19.516317000000072 46.07638600000007,19.463886000000059 45.988884000000041,19.284027000000037 45.988606000000061,19.154095000000041 46.020897000000048,19.127497000000062 46.022217000000069,19.093054000000052 45.959442000000081,19.002636000000052 45.911110000000065,18.858887000000038 45.911110000000065,18.835831000000042 45.912964000000045,18.81702000000007 45.875507000000084,18.832353000000069 45.825760000000059,18.889858000000061 45.815693000000067,18.916664000000083 45.782497000000035,18.956663000000049 45.664070000000038,18.96688800000004 45.628052000000082,18.936386000000084 45.620174000000077,18.91041800000005 45.573139000000083,18.902237000000071 45.544849000000056,18.929182000000083 45.537933000000066,18.948725000000081 45.539989000000048,18.96966800000007 45.561134000000038,19.007090000000062 45.518860000000075,19.097931000000074 45.498009000000081,19.096016000000077 45.487015000000042,19.056398000000058 45.497074000000055,19.025572000000068 45.489693000000045,19.001083000000051 45.382221000000072,18.981260000000077 45.298050000000046,19.112499000000071 45.287498000000085,19.138611000000083 45.270332000000053,19.190205000000049 45.247429000000068,19.26052100000004 45.243408000000045,19.285004000000072 45.238365000000044,19.320339000000047 45.234581000000048,19.350563000000079 45.235748000000058,19.388962000000049 45.235275000000058,19.409212000000082 45.217915000000062,19.424997000000076 45.179993000000081,19.418539000000067 45.173332000000073,19.352497000000085 45.186661000000072,19.248678000000041 45.209995000000049,19.212830000000054 45.216942000000074,19.187496000000067 45.214302000000089,19.167358000000036 45.096664000000033,19.104164000000083 45.031944000000067,19.115555000000086 44.93075900000008,19.040760000000091 44.905479000000071,19.00982300000004 44.880272000000048,19.028610000000072 44.861382000000049,19.039719000000048 44.901382000000069,19.121109000000047 44.922428000000082,19.17534500000005 44.909439000000077,19.304859000000079 44.889160000000061,19.371388000000081 44.864815000000078,19.382198000000074 44.767735000000073,19.345222000000092 44.74721500000004,19.336109000000079 44.704720000000066,19.31361000000004 44.560158000000058,19.193981000000065 44.521423000000084,19.130825000000073 44.376663000000065,19.105553000000043 44.355827000000033,19.10444300000006 44.31523100000004,19.128990000000044 44.286778000000083,19.160911000000056 44.265179000000046,19.237432000000069 44.209412000000043,19.357952000000068 44.120277000000044,19.485832000000073 44.060272000000055,19.596943000000067 44.052620000000047,19.618565000000046 44.01975200000004,19.619785000000036 43.960442000000057,19.525793000000078 43.958885000000066,19.485275000000058 43.960655000000088,19.428531000000078 43.970875000000035,19.366123000000073 43.997734000000037,19.308924000000047 44.010612000000037,19.239452000000085 43.962379000000055,19.251221000000044 43.859444000000053,19.366943000000049 43.800278000000048,19.437496000000067 43.772774000000084,19.475277000000062 43.758469000000048,19.490137000000061 43.737080000000049,19.499582000000089 43.709579000000076,19.507637000000045 43.685829000000069,19.51055400000007 43.588051000000064,19.493889000000081 43.57138800000007,19.480553000000043 43.584442000000081,19.408608000000072 43.544167000000073,19.287499000000082 43.513214000000062,19.228809000000069 43.519024000000059,19.217777000000069 43.555969000000061,19.009165000000053 43.506035000000054,18.949858000000063 43.455898000000047,18.95715000000007 43.452774000000034,18.982777000000056 43.447357000000068,19.00499700000006 43.432358000000079,19.025274000000081 43.305275000000051,19.092915000000062 43.255276000000038,19.075554000000068 43.235947000000067,19.059574000000055 43.239441000000056,19.016666000000043 43.293888000000038,18.955055000000073 43.320911000000081,18.958124000000055 43.357769000000076,18.915571000000057 43.355537000000083,18.880829000000062 43.348022000000071,18.83934000000005 43.257149000000084,18.702776000000085 43.147217000000069,18.645832000000041 43.127075000000048,18.648262000000045 43.083881000000076,18.658123000000046 43.043396000000087,18.647045000000048 43.029160000000047,18.579720000000066 43.022774000000084,18.552219000000036 43.014717000000076,18.529997000000037 42.995411000000047,18.503054000000077 42.966175000000078,18.481733000000077 42.828606000000036,18.455414000000076 42.766388000000063,18.490833000000066 42.727566000000081,18.523817000000065 42.713951000000066,18.557844000000046 42.663055000000043,18.57638600000007 42.641174000000035,18.572081000000082 42.615135000000066,18.54333100000008 42.569443000000035,18.463886000000059 42.565826000000072,18.455555000000061 42.516804000000036,18.453331000000048 42.493607000000054,18.457777000000078 42.471523000000047,18.472916000000055 42.451111000000083,18.498055000000079 42.449440000000038,18.503197000000057 42.453884000000073,18.508053000000075 42.460552000000064,18.678610000000049 42.419857000000036,18.707636000000036 42.399021000000062,18.703470000000038 42.418953000000045,18.625622000000078 42.429718000000037,18.585831000000042 42.427219000000036,18.553539000000058 42.387215000000083,18.577221000000065 42.36506600000007,18.62006800000006 42.374302000000057,18.647081000000071 42.284721000000047,18.810833000000059 42.286938000000077,18.84735900000004 42.279438000000084,18.879372000000046 42.189995000000067,18.964443000000074 42.157494000000042,19.00499700000006 42.137009000000035,19.050068000000067 42.111664000000076,19.078609000000085 42.043327000000033,19.138611000000083 42.019581000000073,19.145969000000036 41.982773000000066,19.137983000000077 41.94888700000007,19.152777000000071 41.931522000000086,19.176109000000054 41.911732000000086,19.232359000000088 41.903328000000045,19.278889000000049 41.894722000000058,19.299442000000056 41.848999000000049,19.367771000000062 41.912498000000085,19.343330000000037 41.955551000000071,19.346943000000067 42.072807000000068,19.376391000000069 42.104092000000037,19.399095000000045 42.123467000000062,19.378193000000067 42.152496000000042,19.332222000000058 42.182911000000047,19.288540000000069 42.448608000000036,19.519722000000058 42.542843000000062,19.608540000000062 42.571037000000047,19.61117900000005 42.60333200000008,19.633331000000055 42.623188000000084,19.651526000000047 42.660343000000069,19.717844000000071 42.640968000000044,19.754581000000087 42.587875000000054,19.764789000000064 42.544998000000078,19.746805000000052 42.500965000000065,19.769442000000083 42.484093000000087,19.793957000000091 42.471939000000077,19.822498000000053 42.515553000000068,19.927359000000081 42.56291200000004,20.056108000000052 42.560913000000085,20.071423000000038 42.533470000000079,20.10208300000005 42.511314000000084,20.161665000000085 42.428329000000076,20.222498000000087 42.360554000000036,20.239582000000041 42.327076000000034,20.249512000000038 42.311844000000065,20.355675000000076 42.304161000000079,20.386944000000085 42.273911000000055,20.457537000000059 42.230270000000075,20.50888800000007 42.213051000000064,20.525137000000086 42.043610000000058,20.595276000000069 41.956524000000059,20.621735000000058 41.93471500000004,20.603331000000082 41.918816000000049,20.583399000000043 41.882187000000044,20.589642000000083 41.861523000000034,20.618956000000082 41.856388000000038,20.707777000000078 41.868118000000038,20.736942000000056 41.937389000000053,20.77756700000009 41.985622000000035,20.759857000000068 42.046799000000078,20.770832000000041 42.08311800000007,20.795414000000051 42.119995000000074,20.914997000000085 42.200691000000063,21.110832000000073 42.199997000000053,21.136455000000069 42.147633000000042,21.218191000000047 42.149578000000076,21.305553000000089 42.19430200000005,21.346249000000057 42.265968000000044,21.472635000000082 42.254166000000055,21.619720000000086 42.239716000000044,21.681389000000081 42.232494000000088,21.707775000000083 42.235134000000073,21.729858000000036 42.268261000000052,21.788956000000042 42.298748000000046,21.803192000000081 42.330341000000033,21.850693000000035 42.316940000000045,22.023609000000079 42.300968000000069,22.075207000000091 42.316387000000077,22.196178000000089 42.336140000000057,22.216873000000078 42.358952000000045,22.325344000000086 42.32388300000008,22.365276000000051 42.335274000000084,22.410832000000084 42.363052000000039,22.459442000000081 42.400692000000049,22.520832000000041 42.425415000000044,22.537222000000042 42.48333000000008,22.558470000000057 42.512913000000083,22.546942000000058 42.531105000000082,22.522499000000039 42.566940000000045,22.468193000000042 42.599442000000067,22.447220000000073 42.820412000000033,22.44291300000009 42.876873000000046,22.521248000000071 42.894444000000078,22.594858000000045 42.894722000000058,22.614998000000071 42.882912000000033,22.658610000000067 42.89214700000008,22.741594000000077 43.101662000000033,22.966389000000049 43.137356000000068,22.992083000000036 43.192772000000048,23.00499700000006