GDACS_WF_1017206_12
info-gdacs@gdacs.org
2023-09-20T22:00:00-00:00
Actual
Alert
Public
1017206
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 06/09/2023, a forest fire started in Australia, until 21/09/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017206
eventid
1017206
currentepisodeid
12
glide
version
0
fromdate
Wed, 06 Sep 2023 00:00:00 GMT
todate
Thu, 21 Sep 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017206
country
Australia
eventname
severity
Green impact for forestfire in 35610 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Thu, 21 Sep 2023 08:35:50 GMT
Polygon
-24.0240293976626,149.455613417162 -24.0161943496649,149.466901593847 -24.0164093976626,149.472633417162 -24.0082234171618,149.484139397663 -23.9975165828382,149.484799397663 -23.9948106023374,149.482093417162 -23.9947206937319,149.478718583921 -23.9848165828382,149.479109397663 -23.9792744660941,149.474845533906 -23.9775445136214,149.46921171354 -23.9756068403331,149.468465072164 -23.9735434171618,149.470209397663 -23.9563865828382,149.472679397663 -23.9536806023374,149.469973417162 -23.9529644769183,149.465947782373 -23.9460496169644,149.46735807435 -23.9462593976626,149.473063417162 -23.9411561054314,149.479950420681 -23.9413793976626,149.485663417162 -23.9375555339059,149.491675533906 -23.9209552054841,149.495567247349 -23.9179134171618,149.500649397663 -23.9036465828382,149.498969397663 -23.8980206023374,149.491563417162 -23.89746,149.48668 -23.8988510668386,149.483201804107 -23.8966859590545,149.48098592492 -23.8867444660941,149.478005533906 -23.8828806023374,149.471533417162 -23.8837806023374,149.459416582838 -23.8864914278048,149.456709638614 -23.88579,149.45177 -23.8872544660941,149.448234466094 -23.8939077780396,149.446176658258 -23.8990465828382,149.442330602337 -23.9056817576927,149.441756764971 -23.9068544660941,149.436754466094 -23.91039,149.43529 -23.9135729027366,149.43651884548 -23.9176212035544,149.432382619828 -23.9109465828382,149.432799397663 -23.9024357778208,149.427393413488 -23.89427,149.43334 -23.8896506023374,149.430253417162 -23.890364783855,149.425357734663 -23.88249,149.42964 -23.8789544660941,149.428175533906 -23.8775794549326,149.42322108729 -23.8700565828382,149.423869397663 -23.8671312637261,149.420060727499 -23.8593365828382,149.421469397663 -23.8534906023374,149.413413417162 -23.8544649307296,149.406356155426 -23.8521689817288,149.405237319463 -23.8472165828382,149.405989397663 -23.8444567140778,149.403012502586 -23.8430855339059,149.408385533906 -23.8375576567052,149.409982067339 -23.84012,149.41812 -23.8371949734701,149.422631449189 -23.8372693976626,149.433903417162 -23.8345634171618,149.436609397663 -23.8248165828382,149.438179397663 -23.8219848877573,149.434841407288 -23.8157665828382,149.434409397663 -23.8054706023374,149.425313417162 -23.80431,149.41899 -23.8057744660941,149.415454466094 -23.812982069873,149.41325030296 -23.8150388843835,149.411202972376 -23.8082786907466,149.408208511792 -23.8066155339059,149.411985533906 -23.8011665828382,149.413069397663 -23.7953006023374,149.403643417162 -23.7953006023374,149.399816582838 -23.7998961496926,149.396734744121 -23.8040344660941,149.387914466094 -23.8088692541915,149.386708437727 -23.8102544660941,149.382774466094 -23.8150220189066,149.381260696519 -23.8178390899744,149.376695971782 -23.8190944660941,149.369374466094 -23.8233565828382,149.366760602337 -23.8295001497271,149.365815127048 -23.8260406023374,149.362613417162 -23.8260956933772,149.35691862254 -23.8114265828382,149.353219397663 -23.8087206023374,149.350513417162 -23.8072006023374,149.339856582838 -23.8121798239951,149.336841573443 -23.8093840006724,149.335960128705 -23.8066165828382,149.335749397663 -23.80353,149.33113 -23.8069812769763,149.326438060163 -23.807512124055,149.314936146244 -23.8049134363414,149.311965477503 -23.8003365828382,149.312329397663 -23.7975513652736,149.309225065542 -23.79489,149.30996 -23.7913544660941,149.308495533906 -23.78932,149.30106 -23.7924065828382,149.296440602337 -23.80449,149.29426 -23.8073714587632,149.295162528201 -23.8076506169851,149.292151866398 -23.80471,149.28763 -23.8061744660941,149.284094466094 -23.8086097489581,149.282848853539 -23.8097044660941,149.277454466094 -23.8286530688542,149.272965218263 -23.8316165828382,149.270070602337 -23.834303840537,149.269742861817 -23.8321173081931,149.26913933802 -23.82815,149.27125 -23.8235306023374,149.268163417162 -23.82059,149.25586 -23.823322447936,149.251477227714 -23.8212842742538,149.249163131898 -23.8156265828382,149.250559397663 -23.8117156428663,149.244250182723 -23.8116293976626,149.247943417162 -23.8089234171618,149.250649397663 -23.8050965828382,149.250649397663 -23.8023906023374,149.247943417162 -23.8018006023374,149.238636582838 -23.8045065828382,149.235930602337 -23.8111309965655,149.234325967894 -23.8088937711126,149.230924153167 -23.80575,149.2319 -23.8024626086405,149.230601337455 -23.7984434171618,149.233429397663 -23.7843865828382,149.235409397663 -23.7816806023374,149.232703417162 -23.7809400389803,149.22837867121 -23.7769306023374,149.225413417162 -23.7760304613506,149.220336693685 -23.77323,149.22131 -23.7693920349415,149.2193929137 -23.7650765828382,149.219719397663 -23.7617667392556,149.214689895214 -23.7565544452601,149.21234257321 -23.75307,149.21331 -23.7436444660941,149.211065533906 -23.7370006023374,149.182596582838 -23.7415037825502,149.179533117088 -23.7444444660941,149.172494466094 -23.74798,149.17103 -23.7517200680387,149.172800573056 -23.7544505666234,149.170393842542 -23.7493906023374,149.165943417162 -23.7493906023374,149.162116582838 -23.7520965828382,149.159410602337 -23.7573012352672,149.159556756897 -23.7542344660941,149.158185533906 -23.752994595396,149.153520882696 -23.7507304968748,149.151616392495 -23.7458265828382,149.150879397663 -23.7435747733478,149.148853132113 -23.7349,149.15245 -23.7313644660941,149.150985533906 -23.7300658413596,149.148283740816 -23.7256944660941,149.146985533906 -23.72423,149.14345 -23.7282862204715,149.136635840965 -23.7280161911346,149.132328286497 -23.7205744660941,149.130215533906 -23.7194906023374,149.124766582838 -23.72411,149.12168 -23.7315698302881,149.123352567139 -23.7409634171618,149.123040602337 -23.74405,149.12766 -23.741632101037,149.131832597382 -23.7419710771343,149.136880089038 -23.7446002607446,149.136578689149 -23.7476865828382,149.131960602337 -23.7515134171618,149.131960602337 -23.7587493976626,149.138776582838 -23.7575626505173,149.144828041924 -23.7625426145124,149.153506855958 -23.7656265828382,149.148900602337 -23.7710755339059,149.149984466094 -23.77307,149.15979 -23.7712879514211,149.166547133775 -23.77247,149.16966 -23.7690783291202,149.175333047691 -23.7717031797667,149.176455712372 -23.7750265439459,149.174772241523 -23.77393,149.16736 -23.7753944660941,149.163824466094 -23.7831932977141,149.159683702963 -23.7778444660941,149.156195533906 -23.77638,149.15266 -23.7773606023374,149.144186582838 -23.7800665828382,149.141480602337 -23.7832262342916,149.140984425597 -23.7807744660941,149.139735533906 -23.77931,149.1362 -23.7818172402888,149.131967706653 -23.780639999999998,149.12599 -23.7819054702056,149.122752284487 -23.7783806023374,149.119883417162 -23.7783806023374,149.116056582838 -23.7855565828382,149.109470602337 -23.7893834171618,149.109470602337 -23.7966493976626,149.114436582838 -23.7976845093533,149.121522396655 -23.8018393976626,149.124516582838 -23.8016370926676,149.128646187983 -23.8029165804211,149.131892808616 -23.8070693976626,149.134886582838 -23.8071031244687,149.138543861057 -23.8118434171618,149.137990602337 -23.8145493976626,149.140696582838 -23.8116408644726,149.156995305481 -23.8140665828382,149.156100602337 -23.8192334171618,149.156560602337 -23.8219393976626,149.159266582838 -23.8225693976626,149.170903417162 -23.8196454505243,149.173652753922 -23.8176055242791,149.179726702354 -23.8190873835514,149.184094247355 -23.8234734171618,149.183720602337 -23.8261793976626,149.186426582838 -23.8261793976626,149.190253417162 -23.8234241134944,149.193506975125 -23.8271455339059,149.194934466094 -23.8286099583781,149.198469790753 -23.8355393704292,149.201832526409 -23.8513355339059,149.204284466094 -23.8528,149.20782 -23.8499202867054,149.212301171853 -23.8510891275662,149.214790966266 -23.8541134171618,149.214950602337 -23.8570776537722,149.218657794624 -23.8588244660941,149.214574466094 -23.86236,149.21311 -23.8713555339059,149.216554466094 -23.8752393976626,149.220516582838 -23.8752393976626,149.224343417162 -23.8725334171618,149.227049397663 -23.8685200809048,149.226924781055 -23.866133229761,149.229017930012 -23.8756334171618,149.228290602337 -23.8816713968729,149.23226156574 -23.8888334171618,149.232700602337 -23.8915393976626,149.235406582838 -23.8899593976626,149.246003417162 -23.8855799902653,149.251227763901 -23.8847093976626,149.258933417162 -23.8802693699472,149.262787831169 -23.8856793976626,149.269966582838 -23.8861668584025,149.276981261775 -23.8907693976626,149.282216582838 -23.8907693976626,149.286043417162 -23.88615,149.28913 -23.8814901818311,149.287825373957 -23.8783834171618,149.291549397663 -23.8625198507785,149.293714030926 -23.8607773679629,149.302030887202 -23.8658993976626,149.306966582838 -23.8657380929688,149.311034826696 -23.8717734171618,149.310310602337 -23.8784651531346,149.31621551755 -23.88745,149.31301 -23.8945155339059,149.315094466094 -23.89598,149.31863 -23.8946664912298,149.321939610305 -23.8979834171618,149.322380602337 -23.9006893976626,149.325086582838 -23.90238,149.33041 -23.9006434465129,149.33412733689 -23.9040193976626,149.336966582838 -23.9060765913373,149.343590402941 -23.9099265828382,149.340410602337 -23.915139685282,149.341336877082 -23.9202446096327,149.339220264333 -23.9235044660941,149.332494466094 -23.92704,149.33103 -23.9305755339059,149.332494466094 -23.93436,149.34171 -23.9328955339059,149.345245533906 -23.9278534171618,149.348249397663 -23.9231417023542,149.347658139426 -23.9181434171618,149.350739397663 -23.9134724595905,149.350175372541 -23.911254527943,149.351464600269 -23.9155493976626,149.355496582838 -23.9155493976626,149.359323417162 -23.9128434171618,149.362029397663 -23.90734,149.36296 -23.9027206023374,149.359873417162 -23.9019294146758,149.354522525275 -23.89636,149.35653 -23.8840865828382,149.354059397663 -23.8813806023374,149.351353417162 -23.8818290575213,149.346855422226 -23.8698991690738,149.343960432916 -23.8705993976626,149.350863417162 -23.8678934171618,149.353569397663 -23.86488,149.35447 -23.8570667825388,149.351654781385 -23.8526844675762,149.351918487476 -23.8502610824227,149.353679427018 -23.8490155339059,149.358315533906 -23.8443234171618,149.361809397663 -23.8412177178084,149.361952840327 -23.8400474511341,149.364863479188 -23.8446793976626,149.369256582838 -23.8455196181865,149.375749027774 -23.8485072169465,149.375324598063 -23.84667,149.37154 -23.8490406023374,149.364676582838 -23.85366,149.36159 -23.8598655339059,149.365054466094 -23.8622790122526,149.372671206729 -23.86785,149.37128 -23.8713855339059,149.372744466094 -23.87403,149.38193 -23.8725655339059,149.385465533906 -23.8701514555662,149.386706928618 -23.8725849094396,149.398360033706 -23.8758122485377,149.398833774729 -23.8770944660941,149.396214466094 -23.88063,149.39475 -23.8841655339059,149.396214466094 -23.88563,149.39975 -23.884237793844,149.403177389266 -23.8865893976626,149.405646582838 -23.8866632065096,149.40910235503 -23.8897321151416,149.410378546021 -23.8891406023374,149.405576582838 -23.8916944660941,149.402344466094 -23.8971588132297,149.401270889661 -23.9040465828382,149.396300602337 -23.9078734171618,149.396300602337 -23.910310822965,149.398604632398 -23.9142634171618,149.398520602337 -23.9168846509373,149.400686481462 -23.9205320484038,149.399929428584 -23.9135365828382,149.397919397663 -23.9108306023374,149.395213417162 -23.9108306023374,149.391386582838 -23.9135365828382,149.388680602337 -23.9277434171618,149.390780602337 -23.9325993976626,149.396796582838 -23.9315627868834,149.402174814827 -23.9336128188062,149.405329249987 -23.9360265828382,149.403060602337 -23.9398534171618,149.403060602337 -23.9425593976626,149.405766582838 -23.94255721443,149.4095966846 -23.9454435678428,149.413836296388 -23.9485955339059,149.415224466094 -23.9505212859914,149.418551544007 -23.95485,149.4159 -23.9583855339059,149.417364466094 -23.9594693976626,149.422813417162 -23.9561007241065,149.425651215507 -23.9637745378679,149.432317737821 -23.9685555339059,149.433534466094 -23.9699439321676,149.437452418818 -23.974279678782,149.436814399816 -23.9744406023374,149.433796582838 -23.9775334533045,149.431013649017 -23.9777606023374,149.426916582838 -23.9804665828382,149.424210602337 -23.9847658513703,149.424526272783 -23.98966,149.42153 -23.9959534171618,149.423560602337 -23.9999350744176,149.429226215393 -24.0027355339059,149.430544466094 -24.0044382740152,149.436101754066 -24.0109934171618,149.437150602337 -24.016291545779,149.445025646281 -24.0212334171618,149.444280602337 -24.0239393976626,149.446986582838 -24.0240293976626),149.455613417162 -23.9312198815991,(149.410494307158 -23.9308469949194,149.410743462072 -23.9310586634559,149.411304805497 -23.9312198815991),149.410494307158 -23.9295024690651,(149.416674853222 -23.9293549884482,149.41677339662 -23.9293169606462,149.416964575291 -23.9294644412632,149.416866031893 -23.9295024690651),149.416674853222 -23.9166680059644,(149.408668760995 -23.9156053490627,149.407553518538 -23.914434594427,149.408176793695 -23.9157766081032,149.410002832171 -23.9166680059644),149.408668760995 -23.9095754055729,(149.407193206305 -23.907999177035,149.405455367602 -23.90632182247,149.405848029036 -23.9072518059077,149.407601423853 -23.9095754055729),149.407193206305 -23.8651055545891,(149.410463666099 -23.8650294549326,149.41008108729 -23.8628111675692,149.409997667919 -23.8630971504605,149.411435401003 -23.8651055545891),149.410463666099 -23.8783108650869,(149.329513371118 -23.8780679487513,149.328292148231 -23.8772460767423,149.328455628738 -23.8773453224307,149.329705429493 -23.8783108650869),149.329513371118 -23.870872061475,(149.269270926491 -23.8699365836106,149.269021549668 -23.8698463979397,149.269474943653 -23.870872061475),149.269270926491 -23.852038547096,(149.278518983841 -23.8510844885595,149.270150873009 -23.8488769308426,149.268085274876 -23.8477555339059,149.273345533906 -23.84422,149.27481 -23.8414605683966,149.273864108885 -23.8427845597692,149.280208549189 -23.8482609901638,149.28317447532 -23.8497044660941,149.279744466094 -23.852038547096),149.278518983841 -23.8488253783088,(149.285499886061 -23.8487690098362,149.28541552468 -23.8487492158609,149.285515035713 -23.8488253783088),149.285499886061 -23.8462182744539,(149.344635168589 -23.8441898884864,149.344144934935 -23.8405440468395,149.352561161161 -23.8411444817827,149.352441727225 -23.8439689175773,149.350080572982 -23.8441306023374,149.347066582838 -23.8462182744539),149.344635168589 -23.8368952930233,(149.339082280629 -23.8349065828382,149.334389397663 -23.833989642617,149.333776717794 -23.8326716466866,149.33960008451 -23.8368952930233),149.339082280629 -23.7952580856275,(149.158842836354 -23.7952224815007,149.158136157679 -23.7911010165514,149.158717365972 -23.7923050501084,149.161280740896 -23.7952580856275),149.158842836354 -23.7899342495181,(149.138622348147 -23.7893544769183,149.137727782373 -23.7872648503096,149.14012353428 -23.789432457452,149.140007629588 -23.7899342495181),149.138622348147 -23.7869239457528,(149.206547334781 -23.7827734902216,149.209671805236 -23.78344,149.21228 -23.7849018632229,149.21673727541 -23.7867664268507,149.215224160856 -23.78487,149.2114 -23.7869239457528),149.206547334781 -23.7611593396435,(149.184413913844 -23.7595193976626,149.182623417162 -23.758689189823,149.183865910999 -23.7608118176884,149.185706487545 -23.7611593396435),149.184413913844 -23.8316523432948,(149.409627932661 -23.8313344660941,149.409415533906 -23.8304883321598,149.408149204984 -23.8304288160341,149.410756666139 -23.8316523432948),149.409627932661 -23.8203244660941,(149.343554466094 -23.817357470149,149.344101540287 -23.8174386697802,149.3458302416 -23.8191794577693,149.34548397734 -23.8203244660941),149.343554466094 -23.9111754308353,(149.446648049634 -23.910241501931,149.445260461898 -23.9084765828382,149.444909397663 -23.9096288639121,149.447156394987 -23.9111754308353,149.446648049634