GDACS_WF_1017236_12
info-gdacs@gdacs.org
2023-09-22T22:00:00-00:00
Actual
Alert
Public
1017236
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Canada
On 10/09/2023, a forest fire started in Canada, until 23/09/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017236
eventid
1017236
currentepisodeid
12
glide
version
0
fromdate
Sun, 10 Sep 2023 00:00:00 GMT
todate
Sat, 23 Sep 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017236
country
Canada
eventname
severity
Green impact for forestfire in 9874 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
CAN
hazardcomponents
datemodified
Sun, 24 Sep 2023 08:33:11 GMT
Polygon
60.92561,-117.04495 60.9270744660941,-117.041414466094 60.9312013540873,-117.040067627641 60.9330773783202,-117.033298532361 60.9284506023374,-117.030213417162 60.9263106023374,-117.021096582838 60.9290165828382,-117.018390602337 60.9354382244472,-117.019315311314 60.9367231779335,-117.017598282156 60.9365006023374,-117.011416582838 60.9405128448917,-117.007706128941 60.93794,-117.00343 60.9394044660941,-116.999894466094 60.9448534171618,-116.998810602337 60.9476871167704,-117.002158670153 60.9492365800947,-117.001850462735 60.94829,-116.99909 60.9512314801544,-116.994567556851 60.9510179899869,-116.991905730699 60.9476044660941,-116.990465533906 60.94614,-116.98693 60.9472806023374,-116.981276582838 60.9517358399933,-116.977635950386 60.9516406023374,-116.973666582838 60.9532813219012,-116.971672386939 60.9510506023374,-116.968943417162 60.9510506023374,-116.965116582838 60.9553596904272,-116.962091724412 60.9556206023374,-116.959576582838 60.9583265828382,-116.956870602337 60.9654753644458,-116.958644555867 60.96482,-116.95553 60.9662844660941,-116.951994466094 60.97166519806,-116.950897032714 60.9745968470136,-116.947540658553 60.97359,-116.94469 60.9753744660941,-116.939044466094 60.9810168929809,-116.938089878747 60.9823948263236,-116.93551404396 60.9802506023374,-116.933183417162 60.9790624590216,-116.92403591647 60.97646,-116.91974 60.9783706023374,-116.913576582838 60.9823944660941,-116.908064466094 60.98593,-116.9066 60.9894655339059,-116.908064466094 60.9904606824352,-116.913646188882 60.9932893976626,-116.916376582838 60.9934429160202,-116.919431628259 60.9966753368798,-116.924242202566 60.9986855374344,-116.926082434832 61.0032634171618,-116.925580602337 61.0059693976626,-116.928286582838 61.0059693976626,-116.932113417162 61.0032106603565,-116.936924932115 61.0036393976626,-116.941393417162 61.0020107846391,-116.943379523729 61.0038026321145,-116.945088018829 61.0065665828382,-116.942090602337 61.0103934171618,-116.942090602337 61.0139826627611,-116.948261944597 61.0188546481255,-116.947287195234 61.0190906023374,-116.944646582838 61.021817654634,-116.941936410897 61.021627320021,-116.941428030508 61.01804,-116.94297 61.0120265828382,-116.940769397663 61.0093206023374,-116.938063417162 61.0093206023374,-116.934236582838 61.0167731926628,-116.929379505088 61.0182244660941,-116.925414466094 61.0216059327018,-116.923980645891 61.0230344660941,-116.920264466094 61.0287175451365,-116.918860685096 61.0277306023374,-116.912116582838 61.0298444660941,-116.909044466094 61.0333085235109,-116.907594217558 61.0339188287888,-116.90495522147 61.0326657770353,-116.902806698176 61.0314055339059,-116.905315533906 61.0211129337999,-116.912392819477 61.02174,-116.91513 61.0194755339059,-116.924095533906 61.01594,-116.92556 61.0128665828382,-116.924929397663 61.00978,-116.92031 61.0119705955128,-116.916289281928 61.0116629215521,-116.910766874794 61.0054906023374,-116.905803417162 61.0054580472577,-116.893900248276 61.0002144660941,-116.892775533906 60.99875,-116.88924 61.0002144660941,-116.885704466094 61.00375,-116.88424 61.0072855339059,-116.885704466094 61.0084019527423,-116.890989751724 61.0123378008613,-116.89124066681 61.0144376014842,-116.888927510669 61.0138406023374,-116.883566582838 61.0170043543632,-116.88076954592 61.0168806023374,-116.876726582838 61.0217765783084,-116.873695014846 61.0229006023374,-116.869236582838 61.0255465249753,-116.866570731718 61.0256306023374,-116.863166582838 61.028528044289,-116.860422518287 61.02705,-116.85509 61.0293706023374,-116.840326582838 61.0371765828382,-116.833580602337 61.0410034171618,-116.833580602337 61.0488093976626,-116.839046582838 61.0474893976626,-116.848123417162 61.04479472719,-116.850821840543 61.04764,-116.85528 61.0458398773359,-116.859039812456 61.04648830403,-116.864109748417 61.0501,-116.869 61.0497993976626,-116.875253417162 61.0464866114007,-116.878080098833 61.04911,-116.88239 61.04998,-116.88782 61.0486254562404,-116.892744010436 61.04999,-116.89613 61.0476176122974,-116.903817508742 61.0486793976626,-116.909233417162 61.0441315288009,-116.912305772037 61.0435960313571,-116.914897708462 61.04534,-116.91862 61.0429835464051,-116.922751540899 61.04486,-116.93306 61.0438860967074,-116.93586135479 61.0456318632229,-116.937996189254 61.04483,-116.93224 61.0462944660941,-116.928704466094 61.0528734171618,-116.927600602337 61.0555793976626,-116.930306582838 61.05738,-116.93945 61.0559155339059,-116.942985533906 61.0494555339059,-116.948385533906 61.0443253518745,-116.949532804766 61.0438901735576,-116.952471577105 61.0455177372144,-116.955608508596 61.04876,-116.95434 61.0522955339059,-116.955804466094 61.0584,-116.96389 61.0569355339059,-116.967425533906 61.0521297766545,-116.971165103026 61.0550193976626,-116.977306582838 61.0558165385359,-116.994141229484 61.05766,-116.99793 61.0554405923178,-117.007569932115 61.056380500933,-117.014844043118 61.06044,-117.0242 61.0600293976626,-117.034533417162 61.0574181306193,-117.037176112154 61.05822,-117.03972 61.0557844675811,-117.045557265543 61.0560293976626,-117.051523417162 61.0540131658408,-117.05376852233 61.05616,-117.05776 61.0550279314334,-117.060798065851 61.0582493976626,-117.063606582838 61.0582493976626,-117.067433417162 61.05363,-117.07052 61.0500944660941,-117.069055533906 61.0488816323578,-117.06425495871 61.0457865828382,-117.064109397663 61.0430806023374,-117.061403417162 61.0390606023374,-117.051363417162 61.0389306023374,-117.045836582838 61.043289825589,-117.039920761211 61.0412606023374,-117.031126582838 61.0462669287615,-117.028116964916 61.0489246240133,-117.021098825062 61.0470706023374,-117.018313417162 61.0463440792113,-117.00984785205 61.0437456912811,-117.009542029438 61.0409655339059,-117.027755533906 61.0369137737397,-117.029117316212 61.0340534171618,-117.032599397663 61.02717,-117.03369 61.0227777058653,-117.03094330161 61.0218951661947,-117.031783323213 61.0233576891102,-117.036967905711 61.0280934171618,-117.036360602337 61.0324393976626,-117.042126582838 61.0322293976626,-117.048213417162 61.0304678184138,-117.051779728461 61.03112,-117.05783 61.0280334171618,-117.062449397663 61.0205459268596,-117.061139407329 61.0194555339059,-117.066555533906 61.01592,-117.06802 61.0123844660941,-117.066555533906 61.01092,-117.06302 61.0123844660941,-117.059484466094 61.0161240731404,-117.058060592671 61.0168557615946,-117.053181305315 61.0144275435335,-117.049339837668 61.0131332241848,-117.049082381542 61.01508,-117.05454 61.0136155339059,-117.058075533906 61.01008,-117.05954 61.0065444660941,-117.058075533906 61.00327,-117.04977 61.0043917183385,-117.04674742436 61.00267,-117.04304 61.0043228036775,-117.039378622944 61.0001611457822,-117.036902872789 60.9954265828382,-117.037509397663 60.9927206023374,-117.034803417162 60.9925,-117.02795 60.9946087756236,-117.02398395223 60.9919484839949,-117.023019261842 60.9905455339059,-117.026245533906 60.98701,-117.02771 60.9823906023374,-117.024623417162 60.9834744660941,-117.019174466094 60.98701,-117.01771 60.9898515160051,-117.018710738158 60.9913388829094,-117.015428060581 60.9797465828382,-117.016469397663 60.9766606525796,-117.011853280739 60.9752655339059,-117.016735533906 60.9722305748614,-117.018100429469 60.9771,-117.02476 60.9756355339059,-117.028295533906 60.9726409658692,-117.029652395198 60.97412,-117.0351 60.9722302537821,-117.038919697 60.9723393976626,-117.049223417162 60.9655957328032,-117.053343352849 60.9653093976626,-117.057653417162 60.962119067044,-117.060455740891 60.9620893976626,-117.064133417162 60.9593834171618,-117.066839397663 60.9555565828382,-117.066839397663 60.9510534209939,-117.061280896589 60.9524,-117.06464 60.9506431814784,-117.068370877553 60.9548,-117.07407 60.9530085830339,-117.077823995494 60.9540793976626,-117.083253417162 60.9508774824928,-117.087283500141 60.9569207635713,-117.097251651573 60.9610793976626,-117.100246582838 60.96214,-117.10644 60.9617193976626,-117.111483417162 60.9578334171618,-117.114879397663 60.9540065828382,-117.114879397663 60.9513006023374,-117.112173417162 60.9518241302659,-117.103990606466 60.9443434171618,-117.109629397663 60.9405165828382,-117.109629397663 60.9378106023374,-117.106923417162 60.9384511634346,-117.102137915409 60.9365406023374,-117.099963417162 60.9367917311917,-117.094931023317 60.9328244660941,-117.091925533906 60.93136,-117.08839 60.9339800862656,-117.084082305382 60.9319,-117.07655 60.9337671312504,-117.071425946936 60.9313806023374,-117.068933417162 60.9312,-117.06282 60.92561),-117.04495 60.9901629030102,(-116.936817745406 60.99214,-116.94135 60.9910196284176,-116.94723661229 60.9922606023374,-116.947743417162 60.9924906023374,-116.939996582838 60.9948693396435,-116.936865067885 60.9911689903424,-116.935562736949 60.9901629030102),-116.936817745406 60.9925215639193,(-117.003689113716 60.9926644348648,-117.004407374462 60.9932944660941,-117.003464466094 60.9938687634094,-117.003080732896 60.9925215639193),-117.003689113716 60.9946633465023,(-116.957321377845 60.9947018706893,-116.958532569717 60.9959064607931,-116.95753499999999 60.9949108363536,-116.957272149052 60.9946633465023),-116.957321377845 60.9971449617479,(-117.014695632998 60.99979,-117.01902 60.9976812243764,-117.02298604777 61.0073273420134,-117.030461448836 61.0087244660941,-117.027264466094 61.0159764693899,-117.023942265711 61.0099565828382,-117.023899397663 61.0072506023374,-117.021193417162 61.008374826159,-117.015717498361 61.00647,-117.00778 61.0083939056411,-117.003937478403 61.0077554295699,-117.001602703709 61.0041965828382,-117.001549397663 61.0010912730256,-116.998726060623 60.9988066331984,-117.002422841943 61.0014493976626,-117.005086582838 61.0011893976626,-117.011723417162 60.9971449617479),-117.014695632998 61.0018055768124,(-116.990892021841 61.0029168506749,-116.993165692031 61.0050906457698,-116.991954886874 61.0054106023374,-116.989736582838 61.0054006101808,-116.987906774631 61.0018055768124),-116.990892021841 61.003391363021,(-116.959280135168 61.004077773904,-116.960435917715 61.0067565828382,-116.957770602337 61.0097524860063,-116.957306614888 61.0060095738006,-116.954686490376 61.003391363021),-116.959280135168 61.0039742893747,(-116.966276090915 61.0056301360774,-116.968272721896 61.0065614029027,-116.966878982599 61.0051344660941,-116.965925533906 61.0039742893747),-116.966276090915 61.0043724025839,(-116.981225243732 61.0044436632547,-116.981583495316 61.0045871587115,-116.981368739189 61.0043724025839),-116.981225243732 61.0179906230055,(-117.040680776503 61.0196524564665,-117.044010162332 61.0228958652876,-117.044683513477 61.0214123108898,-117.039812094289 61.0205034171618,-117.040419397663 61.0179906230055),-117.040680776503 61.0189110660937,(-116.990581201863 61.0211426025751,-116.998458829736 61.0240392826148,-116.998216782468 61.0240406023374,-116.994396582838 61.02627395532,-116.991831093231 61.0252,-116.98888 61.0252753262898,-116.98509251836 61.0189110660937),-116.990581201863 61.0238504452154,(-116.979677294135 61.0253946737102,-116.98232748164 61.0293810173312,-116.97786759099 61.02724,-116.97388 61.0283534171618,-116.970079397663 61.0251018826643,-116.970193831913 61.02644,-116.97539 61.0238504452154),-116.979677294135 61.0198335306101,(-117.023037734289 61.0208534171618,-117.023240602337 61.0213631432588,-117.023581190427 61.0212601075032,-117.022782608705 61.0198335306101),-117.023037734289 61.0300141208885,(-116.953167162972 61.0335758199628,-116.955184011707 61.0344016658522,-116.953316977482 61.03232,-116.95381 61.0300141208885),-116.953167162972 61.0342305599099,(-116.960496100715 61.0345688212194,-116.960722119696 61.0343241800372,-116.960355988293 61.0342305599099),-116.960496100715 61.0218498350367,(-116.892586163329 61.02412,-116.89689 61.0232762589311,-116.899828185032 61.02787,-116.89678 61.0324893976626,-116.899866582838 61.0340979753711,-116.89642207572 61.03301,-116.89345 61.0345409881193,-116.885924916777 61.03025,-116.88852 61.0266802615593,-116.887359947973 61.0252655339059,-116.891145533906 61.0218498350367),-116.892586163329 61.0321493976626,(-116.877496582838 61.0338941381764,-116.880147003871 61.0377319416905,-116.871031473859 61.0353331618763,-116.869858207465 61.0324557968978,-116.870827229209 61.0321493976626,-116.877496582838