GDACS_WF_1017276_15
info-gdacs@gdacs.org
2023-09-26T22:00:00-00:00
Actual
Alert
Public
1017276
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 13/09/2023, a forest fire started in Australia, until 27/09/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017276
eventid
1017276
currentepisodeid
15
glide
version
0
fromdate
Wed, 13 Sep 2023 00:00:00 GMT
todate
Wed, 27 Sep 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017276
country
Australia
eventname
severity
Green impact for forestfire in 57063 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Thu, 28 Sep 2023 08:34:03 GMT
Polygon
-17.3836993976626,130.008476582838 -17.3823893976626,130.019523417162 -17.37777,130.02261 -17.372527307734195,130.021584802263 -17.368549999999995,130.02352 -17.365077087479598,130.022097376178 -17.363715533905896,130.025115533906 -17.360680126176195,130.026480518718 -17.3587393976626,130.035133417162 -17.3560334171618,130.037839397663 -17.3519165370416,130.037732877366 -17.3490334171618,130.041329397663 -17.3443056109627,130.040727387502 -17.339711248564196,130.041573838656 -17.3369934171618,130.044339397663 -17.3324445081669,130.043856922792 -17.333999437359296,130.045352349951 -17.3420034171618,130.043990602337 -17.345339397662595,130.046926582838 -17.343900171920296,130.052612979193 -17.3465193976626,130.056706582838 -17.346042400388797,130.0661295728 -17.34873,130.07532 -17.346175533905896,130.082085533906 -17.342156563221895,130.083453838446 -17.344489999999997,130.08757 -17.343025533905898,130.091105533906 -17.33949,130.09257 -17.333336582838196,130.091639397663 -17.3296506023374,130.088443417162 -17.3301406023374,130.080546582838 -17.3353529227271,130.072419341255 -17.33282,130.06673 -17.334114499716595,130.057259996734 -17.326629999999998,130.05798 -17.3220275244287,130.054918742861 -17.318099212618797,130.056901886885 -17.316711899390697,130.059118279925 -17.320155533905897,130.060564466094 -17.321619999999996,130.0641 -17.320155533905897,130.067635533906 -17.31662,130.0691 -17.312000602337395,130.066013417162 -17.313298100609295,130.060421720075 -17.3098544660941,130.058975533906 -17.3084205236653,130.055593452828 -17.3034965828382,130.054939397663 -17.3009716078209,130.052504311011 -17.293631500925898,130.050018775941 -17.291363417161797,130.052069397663 -17.2839069877331,130.05214535209 -17.2853352004976,130.061599323231 -17.2903755339059,130.062764466094 -17.292648229169696,130.068890981823 -17.2974455339059,130.070104466094 -17.29891,130.07364 -17.2974455339059,130.077175533906 -17.2940449334077,130.078613160076 -17.2950093976626,130.083883417162 -17.292303417161797,130.086589397663 -17.2884765828382,130.086589397663 -17.2843643691181,130.082061576033 -17.2838693976626,130.089893417162 -17.279527049114996,130.092924891505 -17.278864149228795,130.096333514737 -17.280906582838195,130.094620602337 -17.2847334171618,130.094620602337 -17.287819999999996,130.09924 -17.2847334171618,130.103859397663 -17.280906582838195,130.103859397663 -17.278291056217498,130.10128879096 -17.2769202049859,130.106375409971 -17.27982,130.11087 -17.2783555339059,130.114405533906 -17.274819999999995,130.11587 -17.270295654662,130.112925673018 -17.268975533905895,130.115735533906 -17.2648685492563,130.11708633138 -17.264085533905895,130.122985533906 -17.26055,130.12445 -17.2581258401888,130.123728130335 -17.254170604595895,130.126444401802 -17.257589999999997,130.13113 -17.2545034171618,130.135749397663 -17.24801,130.13797 -17.2397268408911,130.136060529626 -17.2384355339059,130.138725533906 -17.234899999999996,130.14019 -17.2302937944846,130.137384528771 -17.2258475138111,130.139932017219 -17.2272193976626,130.145573417162 -17.224513417161795,130.148279397663 -17.2209026697932,130.149132875167 -17.224435533905897,130.150924466094 -17.2259,130.15446 -17.222813417161795,130.159079397663 -17.2034744660941,130.155525533906 -17.20201,130.15199 -17.2035544660941,130.144784466094 -17.20709,130.14332 -17.211606681263895,130.146252856884 -17.212217084804898,130.142693272777 -17.204538355976897,130.132102008333 -17.20212,130.13282 -17.1985634769706,130.131324121463 -17.1956266514953,130.132861481783 -17.1945793976626,130.142053417162 -17.191873417161798,130.144759397663 -17.1819859443858,130.143888517471 -17.18346,130.15303 -17.181415533905895,130.158105533906 -17.17883093007,130.159380848249 -17.1784680771695,130.162174986111 -17.18278,130.17139 -17.178309397662595,130.185953417162 -17.1762513245899,130.18822647976 -17.1792293976626,130.190986582838 -17.1792293976626,130.194813417162 -17.1765234171618,130.197519397663 -17.171320534131695,130.196599951312 -17.1684255339059,130.201835533906 -17.162367626254895,130.203822049235 -17.1596732119424,130.206556171213 -17.1627755339059,130.207934466094 -17.16424,130.21147 -17.161153417161795,130.216089397663 -17.1573265828382,130.216089397663 -17.1547601481982,130.213592262301 -17.1517834171618,130.217659397663 -17.1479565828382,130.217659397663 -17.1449105749086,130.212836016159 -17.1394965828382,130.213039397663 -17.1367349822044,130.21005379587 -17.1311344660941,130.207655533906 -17.1300506023374,130.202206582838 -17.1347044660941,130.194354466094 -17.1381139735022,130.192915068229 -17.13673,130.1895 -17.1386245231295,130.18567711117 -17.1320865828382,130.185989397663 -17.1293806023374,130.183283417162 -17.1275706023374,130.175336582838 -17.1318375394457,130.172320108763 -17.1282688445883,130.170089089386 -17.1229672801352,130.171051502491 -17.124101920764,130.175124717986 -17.1271893976626,130.177906582838 -17.1261055339059,130.183355533906 -17.12257,130.18482 -17.1190344660941,130.183355533906 -17.1176694878946,130.180320159422 -17.11397,130.18203 -17.1038374164747,130.180254277792 -17.1042893976626,130.186243417162 -17.09967,130.18933 -17.0950506023374,130.186243417162 -17.0942784825312,130.179068333404 -17.0897765828382,130.179519397663 -17.0870706023374,130.176813417162 -17.0869936515734,130.173373440453 -17.0804844660941,130.170165533906 -17.07902,130.16663 -17.0796318009018,130.163103564592 -17.07538,130.16564 -17.0723333504163,130.164502195966 -17.0728493976626,130.170753417162 -17.0701434171618,130.173459397663 -17.0675115078846,130.173697083032 -17.0681993976626,130.178553417162 -17.0655405320669,130.181581176328 -17.0681134171618,130.181830602337 -17.0708193976626,130.184536582838 -17.0697355339059,130.189985533906 -17.0642865828382,130.191069397663 -17.06122703044,130.186314108801 -17.0555365828382,130.187759397663 -17.0524512761715,130.183133584253 -17.0458934171618,130.186489397663 -17.0424285819364,130.18656140376 -17.0426380221606,130.189556775991 -17.0483955339059,130.190434466094 -17.0494793976626,130.195883417162 -17.04486,130.19897 -17.0403601377928,130.196062314613 -17.0366555339059,130.205175533906 -17.03312,130.20664 -17.0295844660941,130.205175533906 -17.0284515222368,130.199973325166 -17.0220406023374,130.195333417162 -17.0226006023374,130.183406582838 -17.0278444682544,130.17936066528 -17.0286665053617,130.174800260074 -17.0275903964054,130.173208007136 -17.0237165828382,130.173239397663 -17.0205646144473,130.170307996129 -17.0182955339059,130.174155533906 -17.0142448009104,130.175517520529 -17.01546,130.17868 -17.0139955339059,130.182215533906 -17.01046,130.18368 -17.0069244660941,130.182215533906 -17.00546,130.17868 -17.0069244660941,130.175144466094 -17.0109751990896,130.173782479471 -17.0097948066979,130.170445014913 -17.0070634171618,130.172859397663 -17.0032365828382,130.172859397663 -16.9993184331712,130.167939627697 -16.9943202002643,130.166971453757 -16.9929455339059,130.171125533906 -16.9845060310046,130.172834874596 -16.9832255339059,130.175445533906 -16.97969,130.17691 -16.9761544660941,130.175445533906 -16.9683321135454,130.165444453039 -16.96383,130.16665 -16.9597595322435,130.164384948823 -16.9579255339059,130.169595533906 -16.9534571005387,130.17087443476 -16.95422,130.17336 -16.9527555339059,130.176895533906 -16.9458634171618,130.180769397663 -16.9376465828382,130.179179397663 -16.9349012734453,130.176275697469 -16.9305934171618,130.181299397663 -16.9234365828382,130.181879397663 -16.9207306023374,130.179173417162 -16.9218144660941,130.173724466094 -16.9268820235532,130.172037639752 -16.9303829261655,130.165205820374 -16.9284306023374,130.163003417162 -16.9278506023374,130.155556582838 -16.9330246187252,130.148865686521 -16.9322106023374,130.139936582838 -16.9375658453347,130.132384872224 -16.9332406023374,130.128733417162 -16.9340521649608,130.123691993539 -16.9317838456539,130.119941247172 -16.9280165828382,130.119929397663 -16.9253106023374,130.117223417162 -16.9253106023374,130.113396582838 -16.9296844539868,130.110358842139 -16.9295806023374,130.106376582838 -16.9322865828382,130.103670602337 -16.9377355339059,130.104754466094 -16.9385913039615,130.110544783509 -16.9465344539868,130.108738842139 -16.9464306023374,130.104756582838 -16.9508644660941,130.098114466094 -16.9581560340944,130.09615474345 -16.9586206023374,130.090786582838 -16.9613265828382,130.088080602337 -16.9667755339059,130.089164466094 -16.9680256874801,130.093777421795 -16.9694860317669,130.09385858268 -16.9710554408336,130.090453587998 -16.9704406023374,130.085706582838 -16.9728744660941,130.081774466094 -16.9762983378988,130.080332210973 -16.9751102311403,130.077078291189 -16.9701806023374,130.074053417162 -16.9701806023374,130.070226582838 -16.9728865828382,130.067520602337 -16.9767134171618,130.067520602337 -16.980638064207,130.072289016749 -16.9817844660941,130.067154466094 -16.9872334171618,130.066070602337 -16.992773568183,130.074744384333 -16.9935569995405,130.073662449998 -16.99084,130.06929 -16.9923044660941,130.065754466094 -16.99584,130.06429 -17.0000632274953,130.066783672283 -17.0053769603331,130.063095538747 -17.0068144660941,130.059424466094 -17.01035,130.05796 -17.0138855339059,130.059424466094 -17.01535,130.06296 -17.0095636442872,130.072227539374 -17.0121165828382,130.069750602337 -17.0151236442872,130.069587539374 -17.0164044660941,130.064964466094 -17.0210424711215,130.063719295141 -17.0223244660941,130.059084466094 -17.0277734171618,130.058000602337 -17.0306311823617,130.06146965605 -17.0342655339059,130.062914466094 -17.03573,130.06645 -17.0340500130338,130.070129540349 -17.0342993976626,130.078073417162 -17.03212730473,130.080422665394 -17.0413234171618,130.079260602337 -17.0486655339059,130.082464466094 -17.0499867018224,130.086720408588 -17.053900421157,130.090395829216 -17.05836,130.08783 -17.062467773904,130.090150883773 -17.0642411847175,130.079044157825 -17.0578444660941,130.076185533906 -17.0555600471314,130.067571014417 -17.0496944660941,130.066765533906 -17.0484197803606,130.062275909698 -17.04437,130.06451 -17.0408344660941,130.063045533906 -17.03937,130.05951 -17.0425915938222,130.054863746983 -17.0412771909933,130.05135824384 -17.0369343430951,130.05238609292 -17.0356755339059,130.056955533906 -17.03214,130.05842 -17.0250065828382,130.057379397663 -17.0227466591068,130.055340988293 -17.0204934171618,130.057369397663 -17.0133265828382,130.057959397663 -17.01024,130.05334 -17.0123580226523,130.045002955346 -17.0100644660941,130.043785533906 -17.0086,130.04025 -17.0116865828382,130.035630602337 -17.0171355339059,130.036714466094 -17.0186,130.04025 -17.0174819773477,130.043267044654 -17.0195461511781,130.044331197455 -17.0209944660941,130.040714466094 -17.02453,130.03925 -17.0280655339059,130.040714466094 -17.0293550851246,130.043370643539 -17.0318790320375,130.042131148412 -17.0331244660941,130.037494466094 -17.03666,130.03603 -17.0437654345135,130.041504461041 -17.0434106023374,130.037146582838 -17.0461165828382,130.034440602337 -17.0589156461762,130.032035362873 -17.0562606023374,130.029363417162 -17.0561900890378,130.025891077134 -17.0520065828382,130.026129397663 -17.0493006023374,130.023423417162 -17.0493006023374,130.019596582838 -17.0520065828382,130.016890602337 -17.0574555339059,130.017974466094 -17.0586099109622,130.023068922866 -17.0627934171618,130.022830602337 -17.0654993976626,130.025536582838 -17.0657180898009,130.028263977538 -17.0702537147905,130.030594605226 -17.07355,130.02929 -17.0806076581302,130.029807522053 -17.0788251978176,130.023114299984 -17.0746165828382,130.023369397663 -17.0719106023374,130.020663417162 -17.0710406023374,130.012226582838 -17.07566,130.00914 -17.0803740305756,130.012702334619 -17.0838765828382,130.008440602337 -17.0893255339059,130.009524466094 -17.09294,130.02052 -17.0906142371253,130.029170081474 -17.09136,130.03163 -17.0898955339059,130.035165533906 -17.0851582290057,130.036390952887 -17.0878168255842,130.04136896621 -17.09193,130.03904 -17.0965493976626,130.042126582838 -17.0954655339059,130.047575533906 -17.089613027095,130.048389750336 -17.0895757192655,130.050557808789 -17.0904357786301,130.053067957556 -17.0943634171618,130.053000602337 -17.0970693976626,130.055706582838 -17.0970693976626,130.059533417162 -17.0950877533196,130.061755411715 -17.096234665105,130.062757524901 -17.0992120497168,130.059136045916 -17.09823,130.05252 -17.1011670288849,130.048000531094 -17.09759,130.04256 -17.0999406023374,130.029536582838 -17.1019661916178,130.027285225216 -17.0980044660941,130.025905533906 -17.09654,130.02237 -17.0996265828382,130.017750602337 -17.1050434054963,130.018812998577 -17.1075665828382,130.016380602337 -17.1113934171618,130.016380602337 -17.1202683565276,130.026132126713 -17.11652,130.01466 -17.1179844660941,130.011124466094 -17.1234334171618,130.010040602337 -17.125957079659,130.012473724663 -17.1309634171618,130.012620602337 -17.13402621889,130.017359555714 -17.1364990476558,130.01741232051 -17.1366206023374,130.014196582838 -17.1389335704558,130.011753204816 -17.1367906023374,130.009423417162 -17.1367906023374,130.005596582838 -17.1394965828382,130.002890602337 -17.14435,130.00145 -17.1478855339059,130.002914466094 -17.14935,130.00645 -17.1478855339059,130.009985533906 -17.1437164295442,130.011866795184 -17.1485111358034,130.012606666952 -17.1509565828382,130.010290602337 -17.1547834171618,130.010290602337 -17.157869999999996,130.01491 -17.1553227892611,130.019169000748 -17.156041400864897,130.020357473801 -17.159308408931896,130.022382173583 -17.161336582838196,130.020690602337 -17.1651634171618,130.020690602337 -17.1695689138441,130.024999815914 -17.1751263044962,130.025477709531 -17.1752806023374,130.022426582838 -17.177578534306296,130.01999325165 -17.1769706023374,130.015256582838 -17.179347032707895,130.012770800695 -17.1786806023374,130.007946582838 -17.183299999999996,130.00486 -17.1879193976626,130.007946582838 -17.1879193976626,130.011773417162 -17.1858259037596,130.014682643653 -17.18879,130.0136 -17.1922584725932,130.015019657157 -17.1941530961046,130.014545133991 -17.1959844660941,130.005684466094 -17.207243417161795,130.003860602337 -17.2099493976626,130.006566582838 -17.210075774098097,130.01766714412 -17.2113944660941,130.014864466094 -17.2145488416804,130.013475817104 -17.2183245425783,130.005667484797 -17.212820602337395,129.994713417162 -17.2133603678192,129.989984323319 -17.2089706023374,129.986943417162 -17.2100544660941,129.981494466094 -17.2169491554808,129.978486864022 -17.2204965828382,129.974000602337 -17.225319336462,129.974432968219 -17.2236706023374,129.972433417162 -17.2236706023374,129.968606582838 -17.226376582838196,129.965900602337 -17.2302034171618,129.965900602337 -17.2329093976626,129.968606582838 -17.232976179293896,129.972097683229 -17.2358834171618,129.972280602337 -17.2385893976626,129.974986582838 -17.2375055339059,129.980435533906 -17.232413706912,129.981590434058 -17.2331462278552,129.988933064776 -17.235708506959597,129.989825227928 -17.2377962508345,129.987654868135 -17.2372006023374,129.982936582838 -17.241154466094095,129.979264466094 -17.24469,129.9778 -17.249732942534,129.979080965588 -17.2549113905124,129.976893167205 -17.2550065847,129.974463103522 -17.2510844660941,129.973075533906 -17.24962,129.96954 -17.2510844660941,129.966004466094 -17.254619999999996,129.96454 -17.2581555339059,129.966004466094 -17.259613415299995,129.969506896478 -17.264619397662596,129.972516582838 -17.264418816855596,129.980203778536 -17.266318009090995,129.980413994287 -17.266900602337397,129.975336582838 -17.2696065828382,129.972630602337 -17.273433417161797,129.972630602337 -17.2761393976626,129.975336582838 -17.2756659479668,129.985770370946 -17.2796055339059,129.987154466094 -17.281069999999996,129.99069 -17.2796055339059,129.994225533906 -17.27607,129.99569 -17.269211177392496,129.990459822142 -17.2681097035317,129.992714802756 -17.2708093976626,129.995416582838 -17.273243777799397,130.002944835249 -17.2773517023542,130.004471905933 -17.2816503031105,130.003772461472 -17.282894466094096,130.001344466094 -17.28643,129.99988 -17.291049397662597,130.002966582838 -17.2895355339059,130.012725533906 -17.285999999999998,130.01419 -17.282558704954297,130.012788502299 -17.2802322967837,130.014373365531 -17.2817514693284,130.022184926258 -17.286183417161798,130.021780602337 -17.2888893976626,130.024486582838 -17.2925983660771,130.037857411396 -17.296975533905897,130.039154466094 -17.299863321211,130.042724762925 -17.301144466094097,130.038164466094 -17.3065934171618,130.037080602337 -17.309373020364,130.040156709152 -17.3134634171618,130.039980602337 -17.3163314550024,130.043501300103 -17.3183102336321,130.042192751224 -17.3145206023374,130.038063417162 -17.313251786848095,130.028375013747 -17.3095365828382,130.027629397663 -17.306915302115595,130.025050179338 -17.304073417161796,130.028439397663 -17.3002465828382,130.028439397663 -17.29716,130.02382 -17.2988406023374,130.009166582838 -17.302352775343596,130.006300240678 -17.302500602337396,130.003216582838 -17.304911662511,130.0007076618 -17.30384,129.99776 -17.3059306023374,129.988536582838 -17.3083070327079,129.986050800695 -17.30726,129.98314 -17.308724466094098,129.979604466094 -17.3141734171618,129.978520602337 -17.316879397662596,129.981226582838 -17.316879397662596,129.985053417162 -17.3145029672921,129.987539199305 -17.3209093976626,129.992016582838 -17.319518797133597,129.999313365531 -17.320439970435,130.003666983506 -17.324915533905898,130.004944466094 -17.32638,130.00848 -17.324915533905898,130.012015533906 -17.3216738324636,130.013421553089 -17.321468574794295,130.016251539312 -17.3221946557698,130.01871686726 -17.326999397662597,130.021766582838 -17.3277199067948,130.030055936473 -17.3312248679928,130.033066386817 -17.331280602337397,130.029306582838 -17.3368785656649,130.024473230696 -17.336250602337397,130.019706582838 -17.338270558784,130.017458988956 -17.3379206023374,130.012486582838 -17.3399392874326,130.010239838445 -17.334844466094097,130.009085533906 -17.3338084562107,130.001402785637 -17.3298344660941,130.000025533906 -17.3284720294374,129.99700293662 -17.325424466094095,129.995635533906 -17.32396,129.9921 -17.325424466094095,129.988564466094 -17.3293457477103,129.98717672999 -17.3343865828382,129.980380602337 -17.338213417161796,129.980380602337 -17.3445488649397,129.986184724845 -17.349465533905896,129.987374466094 -17.3503913961313,129.99446967951 -17.351607732930095,129.994711623942 -17.353224466094098,129.989794466094 -17.3589999531976,129.988928786741 -17.3590506023374,129.985356582838 -17.361756582838197,129.982650602337 -17.3702906023374,129.983696582838 -17.37491,129.98061 -17.379529397662598,129.983696582838 -17.379529397662598,129.987523417162 -17.3768234171618,129.990229397663 -17.3737098247019,129.99037127029 -17.372408554552297,129.994817812135 -17.376879397662595,129.998616582838 -17.3770466339919,130.005850749594 -17.3809934171618,130.005770602337 -17.3836993976626),130.008476582838 -17.3665336845076,(130.00426907006 -17.3542422670699,130.001598376058 -17.3537093976626,130.004893417162 -17.3497791883309,130.00847654109 -17.3546604709102,130.008289223384 -17.358559999999997,130.00628 -17.3620955339059,130.007744466094 -17.363324655086696,130.010096841223 -17.3658090459586,130.00794629729 -17.3665336845076),130.00426907006 -17.364174083814298,(130.016242187057 -17.3627853449133,130.013783158777 -17.357618408964697,130.016092705898 -17.3578468328492,130.017241070313 -17.36018,130.01658 -17.363652912520397,130.018002623822 -17.364174083814298),130.016242187057 -17.283691182579,(130.043918844304 -17.2825551018271,130.042221227346 -17.280620973222597,130.042724056569 -17.2823093266539,130.045360053383 -17.283691182579),130.043918844304 -17.2825530122669,(130.05092464791 -17.2817106733461,130.049169946617 -17.281264498513,130.049837694444 -17.2819034171618,130.050490602337 -17.2825530122669),130.05092464791 -17.280385630881895,(130.079078423967 -17.2800303592224,130.077292352723 -17.2761044660941,130.075905533906 -17.2729206023374,130.072183417162 -17.2729206023374,130.068356582838 -17.2755742832456,130.065685547808 -17.274039039914697,130.061994279885 -17.2708689703448,130.06291017586 -17.2695755339059,130.068935533906 -17.2636434171618,130.072689397663 -17.257646582838195,130.071729397663 -17.254608111369,130.066868127815 -17.2508532300912,130.068531979049 -17.253775533905895,130.069874466094 -17.255239999999997,130.07341 -17.254419338730795,130.075982011895 -17.2564434171618,130.076340602337 -17.25953,130.08096 -17.2559630786196,130.085674942939 -17.2578593976626,130.088346582838 -17.257874637584298,130.092096800901 -17.261543417161796,130.092910602337 -17.2643065927598,130.095904122009 -17.2662544660941,130.091484466094 -17.2687371105255,130.090229432738 -17.26586,130.08575 -17.2673244660941,130.082214466094 -17.2713214415257,130.080841786426 -17.274326582838196,130.077690602337 -17.280385630881895),130.079078423967 -17.2779758507712,(130.098456485263 -17.277960796433895,130.098479015671 -17.2779689437825,130.09849120904 -17.2779758507712),130.098456485263 -17.2542432224463,(130.112264230846 -17.253908405277098,130.112544023549 -17.25418,130.11249 -17.2542432224463),130.112264230846 -17.2521093954041,(130.126225598198 -17.2507439540342,130.125469417155 -17.249731369488,130.127142173706 -17.250676582838196,130.126510602337 -17.2521093954041),130.126225598198 -17.250911594722897,(130.113775976451 -17.248983389706,130.113500479725 -17.2477793976626,130.118843417162 -17.2490260459658,130.119850582845 -17.250911594722897),130.113775976451 -17.248938630511997,(130.127767826294 -17.248492437670098,130.128065962819 -17.2487104466943,130.12810932751 -17.248938630511997),130.127767826294 -17.2571896964956,(130.04812043224 -17.256711736844796,130.048439794668 -17.257156241319297,130.048351377231 -17.2571896964956),130.04812043224 -17.256028263155198,(130.048800205332 -17.2537389558906,130.04924721149 -17.254256261024295,130.050504641422 -17.2548844660941,130.049564466094 -17.256028263155198),130.048800205332 -17.2529394101183,(130.023393943503 -17.2511627503746,130.007942618799 -17.2484738952623,130.017820806201 -17.2512793976626,130.020546582838 -17.2529394101183),130.023393943503 -17.2526758604672,(130.058090132468 -17.252008092076096,130.055952048588 -17.2498846934042,130.056653479724 -17.2502881672274,130.058184809247 -17.2526758604672),130.058090132468 -17.2516427485754,(130.006349151441 -17.2516397725651,130.006344697526 -17.2516372496254,130.006357381201 -17.2516427485754),130.006349151441 -17.248040088069295,(130.096539796346 -17.24593,130.09128 -17.2457823255675,130.083958192971 -17.239514466094096,130.082835533906 -17.238049999999998,130.0793 -17.2386045077035,130.074534604295 -17.233223645652195,130.072655867377 -17.2300693976626,130.089283417162 -17.2281268770858,130.09147927005 -17.2292593976626,130.097583417162 -17.226553417161796,130.100289397663 -17.223087266071097,130.100361142018 -17.2268093976626,130.106116582838 -17.2279507498445,130.11690748164 -17.2307165828382,130.113900602337 -17.237863721606598,130.114313630888 -17.2350006023374,130.111533417162 -17.234480602337396,130.102086582838 -17.2391,130.099 -17.243256787309996,130.101394237519 -17.244654466094097,130.098194466094 -17.248040088069295),130.096539796346 -17.2412518681016,(130.127900479769 -17.2400820175451,130.122841655268 -17.237346666794796,130.124009217708 -17.2359259932509,130.12935259578 -17.2383831591089,130.131619470373 -17.2412518681016),130.127900479769 -17.2278388170306,(130.120150340895 -17.2278015111873,130.119962791755 -17.2277993976626,130.119973417162 -17.2267460947666,130.121549796346 -17.2272014172554,130.122231234606 -17.2275206023374,130.120626582838 -17.2278388170306),130.120150340895 -17.2268271795921,(130.128272655725 -17.2267928745697,130.128100192731 -17.226492962186597,130.128464070138 -17.226635598692198,130.128559376804 -17.2268271795921),130.128272655725 -17.2452784413682,(130.044255597632 -17.244032336740595,130.042799892781 -17.2348865828382,130.043299397663 -17.2321806023374,130.040593417162 -17.2319145344874,130.038104196248 -17.2271565828382,130.037179397663 -17.224191251886495,130.033169574397 -17.221439999999998,130.03411 -17.2179044660941,130.032645533906 -17.216722616950797,130.02752424988 -17.2106042259019,130.02075285588 -17.212319397662597,130.033543417162 -17.2096134171618,130.036249397663 -17.206281490642198,130.036347840945 -17.201542007387797,130.041863068188 -17.2026066504403,130.045278753138 -17.2055861408976,130.04299338633 -17.206834466094097,130.040544466094 -17.21037,130.03908 -17.2150053428813,130.042246744866 -17.2201434171618,130.041370602337 -17.222849397662596,130.044076582838 -17.222849397662596,130.047903417162 -17.2201434171618,130.050609397663 -17.217191327943198,130.050783395282 -17.2158455339059,130.054915533906 -17.206216959011897,130.056362798156 -17.206153224089498,130.057417618937 -17.210135533905895,130.059254466094 -17.211575113397796,130.062664886602 -17.220205533905897,130.064764466094 -17.221528744165,130.069010141038 -17.2236844660941,130.058594466094 -17.2291334171618,130.057510602337 -17.2321388024362,130.061721792281 -17.234043335668495,130.061937042933 -17.236090602337395,130.052816582838 -17.241336582838198,130.047630602337 -17.244881757480297,130.047574576743 -17.2452784413682),130.044255597632 -17.214282625753896,(130.096851343591 -17.2142506023374,130.096803417162 -17.214003617690395,130.09587140255 -17.213391651244198,130.096280305456 -17.214282625753896),130.096851343591 -17.2094383487558,(130.096409694544 -17.206680602337396,130.093693417162 -17.20443,130.07913 -17.205258403796996,130.0721755641 -17.203379406832898,130.070943199783 -17.2027593976626,130.075083417162 -17.1996219339106,130.078782822453 -17.200339397662596,130.083683417162 -17.195939784411095,130.086726282162 -17.1990193976626,130.089506582838 -17.198549397662596,130.094943417162 -17.1958434171618,130.097649397663 -17.191060303504397,130.09701043224 -17.18692,130.09938 -17.182873771804996,130.09715122589 -17.1836006346708,130.104174622135 -17.186606582838195,130.099960602337 -17.195829999999997,130.09896 -17.1993655339059,130.100424466094 -17.20083,130.10396 -17.199331631612395,130.110474632569 -17.201086801640496,130.114678266398 -17.205277758098198,130.114166716606 -17.204560602337395,130.109266582838 -17.208325242267495,130.106350021884 -17.206910602337395,130.098996582838 -17.2094383487558),130.096409694544 -17.1895481108,(130.115272416115 -17.1890156319924,130.109481412667 -17.1842493653292,130.107015377865 -17.182865533905897,130.110145533906 -17.1799965934692,130.111477406315 -17.182723417161796,130.111700602337 -17.185291735161595,130.114200556346 -17.1895481108),130.115272416115 -17.1862545143472,(130.128103515341 -17.1844268509128,130.127892939799 -17.18426,130.13071 -17.183804005149796,130.134548768273 -17.1856335820014,130.13475515719 -17.1862545143472),130.128103515341 -17.2392635616189,(130.00662471287 -17.238524982818397,130.007118215447 -17.238769999999995,130.00835 -17.239198302333797,130.009047206549 -17.2392635616189),130.00662471287 -17.234092936144297,(130.027116280633 -17.2291065828382,130.026209397663 -17.226044096468595,130.021711141128 -17.2227688253016,130.020252193691 -17.2235934171618,130.022690602337 -17.226299397662597,130.025396582838 -17.2264622872702,130.028404515804 -17.233254710576897,130.028370773847 -17.234092936144297),130.027116280633 -17.2299941677354,(130.003866420519 -17.2292417725047,130.001279319881 -17.2281074260964,130.003348957911 -17.228688777863898,130.004162589959 -17.2299941677354),130.003866420519 -17.2021773649068,(130.028400306626 -17.2011097793988,130.017699673811 -17.199026903895398,130.017724866009 -17.198999397662597,130.021413417162 -17.1962934171618,130.024119397663 -17.191210799490396,130.023280310056 -17.191919722534,130.026665495839 -17.19599,130.02482 -17.2021773649068),130.028400306626 -17.2003516944064,(130.049022733006 -17.1949081613985,130.048955818794 -17.19558,130.05331 -17.1952115965581,130.055162089172 -17.196548962461495,130.05542810779 -17.2002865183652,130.051929604908 -17.2003516944064),130.049022733006 -17.2003453604354,(130.061542099508 -17.1997410375385,130.06142189221 -17.199620830240395,130.062026215107 -17.2003453604354),130.061542099508 -17.1980891697596,(130.063953784893 -17.1978087611978,130.064141147904 -17.1980619173487,130.064090792015 -17.1980891697596),130.063953784893 -17.193060602337397,(130.046823417162 -17.1928104078622,130.045565604596 -17.1922999776835,130.046686157462 -17.193060602337397),130.046823417162 -17.1907580830039,(130.077226650693 -17.1881025733025,130.069472962211 -17.1824344660941,130.068535533906 -17.180599999999995,130.06442 -17.1827991566223,130.060393561578 -17.1797706023374,130.057623417162 -17.1798106023374,130.051736582838 -17.182516582838197,130.049030602337 -17.1864000223165,130.048823842538 -17.183470602337398,130.046073417162 -17.183516546324796,130.039957089403 -17.1701104161878,130.038363648976 -17.169519397662597,130.043433417162 -17.1668134171618,130.046139397663 -17.1623179026257,130.045692599829 -17.1500465828382,130.048859397663 -17.1471660543364,130.045275905103 -17.1426044660941,130.044015533906 -17.14114,130.04048 -17.1426044660941,130.036944466094 -17.14614,130.03548 -17.1491042756556,130.036562763534 -17.1496843839229,130.034203133048 -17.1463844660941,130.032785533906 -17.1449623128551,130.029462721087 -17.14028,130.03257 -17.1358634126698,130.029786944274 -17.1368063348228,130.038897593717 -17.13876,130.04276 -17.1355922048474,130.047965069828 -17.1404434171618,130.047280602337 -17.14353,130.0519 -17.1420655339059,130.055435533906 -17.138619511852,130.056882194986 -17.1416993976626,130.059776582838 -17.1406155339059,130.065225533906 -17.1351665828382,130.066309397663 -17.1300204486405,130.06215938994 -17.1322193976626,130.064526582838 -17.13281,130.07356 -17.1304487334114,130.078491562074 -17.1326593976626,130.080866582838 -17.1327911837924,130.084030883547 -17.1371355339059,130.085334466094 -17.1386,130.08887 -17.1354155339059,130.094875533906 -17.13188,130.09634 -17.1260031479322,130.095434681788 -17.1203865828382,130.096769397663 -17.1156194088617,130.091370080121 -17.1151907012628,130.093552431907 -17.1182393976626,130.096326582838 -17.1179223603696,130.1017407728 -17.1216734171618,130.106310602337 -17.1235283393728,130.106766025782 -17.1256144660941,130.098684466094 -17.12915,130.09722 -17.1327767122363,130.098820924109 -17.1416234171618,130.098010602337 -17.1445698500386,130.101925418564 -17.1486134171618,130.101780602337 -17.1516830870096,130.106314972655 -17.1555955339059,130.107704466094 -17.1570350527386,130.111114581647 -17.160945533905895,130.112504466094 -17.162351648374198,130.115746646567 -17.1674765828382,130.108420602337 -17.1745334065308,130.107632593685 -17.1737,130.1013 -17.1747902241467,130.098324558749 -17.172249999999995,130.09317 -17.1738806023374,130.078976582838 -17.1765865828382,130.076270602337 -17.18201,130.07471 -17.1875863629305,130.077677975371 -17.1907580830039),130.077226650693 -17.1723224687265,(130.155407714346 -17.1716721830362,130.154434493034 -17.171418995309697,130.155458781729 -17.171739151440597,130.155672703216 -17.1723224687265),130.155407714346 -17.171853063398,(130.173514393065 -17.168166566584695,130.171208887852 -17.1620794207348,130.172294841894 -17.1576073480063,130.172352818913 -17.153043872337996,130.174492992997 -17.1600934171618,130.175160602337 -17.164215753287195,130.178387248743 -17.1681865828382,130.173830602337 -17.171853063398),130.173514393065 -17.1573067880576,(130.206863828787 -17.156782151682396,130.206759472124 -17.156412473898,130.207461390404 -17.1573067880576),130.206863828787 -17.154377526102,(130.210778609596 -17.1542941249005,130.210834336497 -17.1543498518018,130.210917737699 -17.154377526102),130.210778609596 -17.1692282177855,(130.131047765135 -17.166695246146595,130.130200734108 -17.1638634171618,130.133539397663 -17.1617407269068,130.133878372994 -17.1599334171618,130.135239397663 -17.1569147140416,130.135400144953 -17.1573434171618,130.135910602337 -17.1596877116206,130.13640131641 -17.16419,130.13349 -17.166590023149897,130.134195742064 -17.1692282177855),130.131047765135 -17.1494004005114,(130.167158964461 -17.1483370970231,130.167329531325 -17.1491584299616,130.169264567438 -17.14907,130.16882 -17.1494004005114),130.167158964461 -17.1485366733129,(130.151404132253 -17.1427059214495,130.147712591772 -17.1402250767771,130.148765664498 -17.1425193976626,130.151196582838 -17.1418085712965,130.158244837635 -17.14295,130.15749 -17.1444144660941,130.153954466094 -17.1485366733129),130.151404132253 -17.1384214287035,(130.161565162365 -17.12829190806,130.157931096137 -17.12472,130.15945 -17.1213816698316,130.158117301231 -17.1212341844206,130.159244158001 -17.1251,130.16004 -17.1304611554117,130.162820910614 -17.1382056969227,130.162649719266 -17.1384214287035),130.161565162365 -17.1384210430056,(130.12465237955 -17.13734008907,130.120646528904 -17.128933750583,130.113521533553 -17.1292393976626,130.119893417162 -17.1286959681133,130.121750385275 -17.1308565828382,130.119860602337 -17.1346834171618,130.119860602337 -17.1384210430056),130.12465237955 -17.1285442715459,(130.126982584768 -17.1281440318867,130.122599614725 -17.1267257935262,130.12544880243 -17.1276111106613,130.127168202008 -17.1285442715459),130.126982584768 -17.1156220270275,(130.136594598975 -17.1116650964217,130.130229175576 -17.10773309482,130.134597340897 -17.1113055339059,130.136054466094 -17.1122458790174,130.141718207993 -17.1132845344874,130.141365803752 -17.1156220270275),130.136594598975 -17.184833946125,(130.021506181297 -17.1845540962404,130.021087356347 -17.1839114656937,130.02151674835 -17.1841913155784,130.0219355733 -17.184833946125),130.021506181297 -17.1788942910769,(130.029139952057 -17.1767636955038,130.028142290469 -17.176960671929297,130.029427442168 -17.178795324063696,130.029637492831 -17.1788942910769),130.029139952057 -17.1273244132397,(130.036872460249 -17.1260188604116,130.029005455703 -17.1219416434724,130.028157873287 -17.1216228289526,130.03350285513 -17.1250069710882,130.037973679052 -17.1273244132397),130.036872460249 -17.1143016090307,(130.076471832212 -17.1139965026266,130.07646747835 -17.1137451595242,130.076843639886 -17.1143016090307),130.076471832212 -17.1075083199778,(130.17171143742 -17.107434465481,130.171600906354 -17.1072289114601,130.171641793591 -17.1072370141692,130.171682528661 -17.1075083199778),130.17171143742 -17.1059259239016,(130.090290875044 -17.1030127459679,130.087741116196 -17.1035988268015,130.091942459545 -17.10449,130.09462 -17.1047549909446,130.096539987719 -17.1059259239016),130.090290875044 -17.1024025835253,(130.177185722208 -17.1023929858308,130.177137471339 -17.1023447349619,130.177147069034 -17.1024025835253),130.177185722208 -17.1011930397564,(130.069381710768 -17.1000830564292,130.06927749982 -17.1002650515841,130.069746373996 -17.1010879450219,130.069910057677 -17.1011930397564),130.069381710768 -17.0976892271501,(130.11809115143 -17.097571330707,130.118067700369 -17.0976657760895,130.118209047873 -17.0976892271501),130.11809115143 -17.0948925445372,(130.096566255984 -17.0907834068976,130.093217243243 -17.0899041798152,130.093042354103 -17.0861722141474,130.092395389977 -17.0870643182976,130.096706662479 -17.0948925445372),130.096566255984 -17.0928753743162,(130.141808454506 -17.0836590799195,130.131395629567 -17.0787944660941,130.130195533906 -17.0764,130.1248 -17.0782803923595,130.119627987213 -17.0736006023374,130.116553417162 -17.0743206023374,130.106266582838 -17.0774718618881,130.099256195216 -17.0749776013129,130.098939987467 -17.0697234171618,130.104529397663 -17.0658965828382,130.104529397663 -17.0634308689576,130.10218300157 -17.0620155339059,130.105965533906 -17.05848,130.10743 -17.0507216187595,130.10255458392 -17.0499793976626,130.106523417162 -17.044658608279,130.110811636371 -17.0431941554052,130.114639863923 -17.0445093976626,130.120243417162 -17.0405210455258,130.123535413996 -17.0440363107029,130.125744363418 -17.0472963112479,130.123441689611 -17.0484106023374,130.111106582838 -17.0511165828382,130.108400602337 -17.0549434171618,130.108400602337 -17.0575187100082,130.110910994941 -17.06262,130.10772 -17.0697334171618,130.108750602337 -17.07282,130.11337 -17.0714951387264,130.116696600527 -17.0728559592235,130.125539336388 -17.0822455339059,130.133064466094 -17.0833725814296,130.138296317704 -17.0878093976626,130.141346582838 -17.087889588108,130.144770272568 -17.0928753743162),130.141808454506 -17.08436,(130.15947 -17.0827190413741,130.158543950385 -17.0801081990982,130.162006435408 -17.0824465828382,130.159850602337 -17.08436),130.15947 -17.0741846905541,(130.148720816464 -17.0707564397301,130.145967325691 -17.0711393380844,130.148214694649 -17.0730114705629,130.149752196888 -17.0741846905541),130.148720816464 -17.0680635602699,(130.143332674309 -17.0679885425132,130.143142514936 -17.0668165828382,130.142909397663 -17.0658552898659,130.143026577985 -17.0680635602699),130.143332674309 -17.0624547101341,(130.144723422015 -17.0595326817093,130.143959111324 -17.06068,130.14702 -17.0584725013356,130.151052012397 -17.05984,130.15078 -17.0611549501374,130.151041559845 -17.0624547101341),130.144723422015 -17.0617062056221,(130.122441420568 -17.0598619526682,130.120444894997 -17.0565872403543,130.120179564846 -17.0564493976626,130.123313417162 -17.0529453843975,130.126668320557 -17.0568088398437,130.129525951658 -17.0585944660941,130.125064466094 -17.0617062056221),130.122441420568 -17.0570474986644,(130.151747987603 -17.0545442340768,130.151794082111 -17.054128298703,130.152072001243 -17.05444,130.15201 -17.0562240191391,130.15236486347 -17.0570474986644),130.151747987603 -17.0523138507658,(130.139435373795 -17.0521587417414,130.138655588071 -17.05093,130.1389 -17.0505888393699,130.138832138931 -17.0523138507658),130.139435373795 -17.0467500788914,(130.14993432023 -17.0464393627729,130.149872514951 -17.0465122670699,130.149981623942 -17.0467500788914),130.14993432023 -17.0427006372271,(130.147337485049 -17.0418312302772,130.147275450746 -17.0411,130.14713 -17.0399120978169,130.147366288435 -17.0427006372271),130.147337485049 -17.0418048029365,(130.15715929253 -17.0406209687105,130.157034714752 -17.0411586406443,130.159648747707 -17.0417855751156,130.159524042687 -17.0418048029365),130.15715929253 -17.087126972905,(130.045030249664 -17.08693,130.04404 -17.0870431744158,130.04347103379 -17.0860344692768,130.044623562083 -17.087126972905),130.045030249664 -17.0841317709942,(130.036039047113 -17.0835228595597,130.035632185501 -17.083468185272,130.035907051707 -17.0841317709942),130.036039047113 -17.0820258399933,(130.020181120098 -17.0815265357859,130.01876741578 -17.0811748021824,130.020535700016 -17.0815565828382,130.020280602337 -17.0820258399933),130.020181120098 -17.075089190745,(130.059279268022 -17.0749490333093,130.059069507596 -17.074879430319,130.059419425458 -17.075089190745),130.059279268022 -17.0512241645674,(130.054901134853 -17.0486484061778,130.057086253017 -17.0492287827245,130.058800052814 -17.0510294080212,130.056879757871 -17.0512241645674),130.054901134853 -17.0280477279727,(130.047984319041 -17.0280149148754,130.047819356461 -17.0278321939751,130.047941446663 -17.0280477279727),130.047984319041 -17.0236178060249,(130.049068553337 -17.0212238488219,130.047938802545 -17.021132994276,130.048557954102 -17.0227533408932,130.050169011707 -17.0236178060249),130.049068553337 -17.0358617878668,(130.185547577869 -17.0350906023374,130.184393417162 -17.0340558528918,130.184119705894 -17.035314782688,130.185905939837 -17.0358617878668),130.185547577869 -17.0355246762555,(130.093412647381 -17.034742678115,130.089902435283 -17.031381621808,130.089328584557 -17.0302655339059,130.094615533906 -17.0243822181766,130.095916776926 -17.0215834171618,130.099089397663 -17.0174025642383,130.098852849997 -17.0161455339059,130.101345533906 -17.01261,130.10281 -17.008756790606,130.10087009894 -17.0046765828382,130.101039397663 -17.0013486177611,130.096513783857 -16.9985134171618,130.099869397663 -16.9946865828382,130.099869397663 -16.9868890590575,130.090788003512 -16.9839036420252,130.090858160119 -16.9867534171618,130.096770602337 -16.98984,130.10139 -16.9883755339059,130.104925533906 -16.9807449551027,130.109905362411 -16.98022739303,130.112005942113 -16.9842955339059,130.113364466094 -16.98576,130.1169 -16.9817055339059,130.125105533906 -16.9762565828382,130.126189397663 -16.9734406353921,130.122930575995 -16.9675444660941,130.122145533906 -16.96608,130.11861 -16.9667583189869,130.115074556321 -16.9624755339059,130.120895533906 -16.9569438009084,130.122064598341 -16.9569786799869,130.130712104052 -16.9598843309901,130.139004780701 -16.9617944660941,130.130834466094 -16.9674965828382,130.126210602337 -16.9713234171618,130.126210602337 -16.9740293976626,130.128916582838 -16.9751528151467,130.137866667487 -16.9780293976626,130.140606582838 -16.9766925247552,130.146224589216 -16.9786997610991,130.14897256801 -16.9830234171618,130.148640602337 -16.9855649915135,130.151100531648 -16.9884643963408,130.146689483561 -16.9854844660941,130.145335533906 -16.9842018424608,130.140885816216 -16.98143,130.14184 -16.9778944660941,130.140375533906 -16.97643,130.13684 -16.9778944660941,130.133304466094 -16.9809735484302,130.131930793862 -16.9840065828382,130.127580602337 -16.9878334171618,130.127580602337 -16.99092,130.1322 -16.9894555339059,130.135735533906 -16.9862481575392,130.137754183784 -16.9909334171618,130.137180602337 -16.9937456036592,130.140420516439 -16.9962849520204,130.140632177505 -16.99298,130.13506 -16.9944644660941,130.129874466094 -16.998,130.12841 -17.0010859339749,130.129518307349 -17.0022344660941,130.124394466094 -17.0055052191077,130.122982668194 -17.0085465828382,130.118590602337 -17.0123734171618,130.118590602337 -17.0203722634067,130.123269036297 -17.01944,130.12053 -17.0209044660941,130.116994466094 -17.0251806910275,130.115677332606 -17.0289165828382,130.110420602337 -17.0320935025711,130.109946205515 -17.0278106023374,130.105533417162 -17.0278106023374,130.101706582838 -17.0305165828382,130.099000602337 -17.0331640312786,130.098766007899 -17.0333306023374,130.095776582838 -17.0355246762555),130.093412647381 -17.0325441220092,(130.141369374611 -17.0319257668916,130.141246376131 -17.02905,130.14227 -17.0275554009519,130.141972705765 -17.0292089515578,130.14599499748 -17.0325441220092),130.141369374611 -17.0250545990482,(130.140117294235 -17.0245712711554,130.139393942925 -17.023527423112,130.139258422789 -17.0234097746227,130.139849881685 -17.0250545990482),130.140117294235 -17.0074100653897,(130.146954321153 -17.0073508618236,130.146865716754 -17.0070468247739,130.147320740355 -17.0071286845639,130.147375437318 -17.0074100653897),130.146954321153 -17.0043701835405,(130.158008577778 -17.004110343809,130.156497724765 -16.9984044660941,130.155585533906 -16.9972453674928,130.150514813944 -16.9951738641731,130.150793138427 -16.9950193976626,130.153843417162 -16.9923134171618,130.156549397663 -16.9884865828382,130.156549397663 -16.9859450084865,130.154089468352 -16.9830234171618,130.157879397663 -16.9792178069842,130.158570593857 -16.9843934171618,130.158770602337 -16.99461,130.15677 -16.9996537120831,130.158487063425 -17.0043701835405),130.158008577778 -16.9689789101917,(130.154245636619 -16.9675328937058,130.154564000851 -16.9673601616183,130.15564888022 -16.9687249093689,130.155522584986 -16.9689789101917),130.154245636619 -16.9589980334908,(130.144830590882 -16.9568671576407,130.145998055437 -16.9549555339059,130.152105533906 -16.9519955339059,130.153634466094 -16.9534234315291,130.157353842118 -16.9576059300937,130.154931179569 -16.9589980334908),130.144830590882 -17.03140269527,(130.080817334606 -17.0274334894312,130.080556831764 -17.0241432532798,130.086315690001 -17.029198378192,130.086831415443 -17.0292306023374,130.083166582838 -17.03140269527),130.080817334606 -17.0210267467202,(130.086734309999 -17.0172906023374,130.083823417162 -17.0184963557128,130.076512460626 -17.0159434171618,130.078989397663 -17.0129363557128,130.079152460626 -17.0122904351865,130.082815336991 -17.0163555339059,130.084174466094 -17.01782,130.08771 -17.0185477818234,130.089693223074 -17.0210267467202),130.086734309999 -17.0044988903683,(130.074126351235 -17.0026140618979,130.073798733071 -17.0028169226132,130.074658514243 -17.0040095421893,130.07485871254 -17.0044988903683),130.074126351235 -16.991946836166,(130.07874010902 -16.991856431817,130.078285615667 -16.9915989820128,130.078670916527 -16.991946836166),130.07874010902 -16.9828163579748,(130.090411839881 -16.9805748108204,130.087903754449 -16.9784445591664,130.091256412002 -16.9795865828382,130.090530602337 -16.9828163579748),130.090411839881 -16.9816234596895,(130.082675768631 -16.9805126979896,130.08262328713 -16.9810293976626,130.083396582838 -16.9810551891796,130.083526245551 -16.9816234596895),130.082675768631 -16.9758271419831,(130.117237545543 -16.9758068711228,130.117135637047 -16.9758093646079,130.117249424005 -16.9758271419831),130.117237545543 -16.9432504517643,(130.145112928285 -16.9423653812748,130.145704313479 -16.9426038537916,130.147198985312 -16.9429206023374,130.145606582838 -16.9432504517643),130.145112928285 -16.9423507175243,(130.120142707049 -16.942049070466,130.119544622344 -16.94166384846,130.11980201946 -16.941624803109,130.119998313695 -16.9423507175243),130.120142707049 -16.9421129061758,(130.152540351626 -16.9419889246785,130.151917054548 -16.9416523199398,130.152420819139 -16.9421129061758),130.152540351626 -16.9348506023374,(130.113456582838 -16.9344455460132,130.113241157861 -16.934705967371,130.114183711917 -16.9348506023374),130.113456582838 -17.2902550665923,(130.076996839924 -17.2900512565022,130.076691816568 -17.2899162469593,130.076718671636 -17.289982367711296,130.077051083104 -17.2902550665923,130.076996839924