GDACS_WF_1017304_5
info-gdacs@gdacs.org
2023-09-18T22:00:00-00:00
Actual
Alert
Public
1017304
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Namibia
On 08/09/2023, a forest fire started in Namibia, until 19/09/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017304
eventid
1017304
currentepisodeid
5
glide
version
0
fromdate
Fri, 08 Sep 2023 00:00:00 GMT
todate
Tue, 19 Sep 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017304
country
Namibia
eventname
severity
Green impact for forestfire in 8649 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
NAM
hazardcomponents
datemodified
Tue, 19 Sep 2023 08:24:45 GMT
Polygon
-19.0542780408842,20.08725 -19.0528434379237,20.0907134379237 -19.0469664344404,20.0915352091874 -19.0429486195057,20.0968488080031 -19.0424548252824,20.1000590382869 -19.0450680408842,20.10431 -19.0437234379237,20.1145434379237 -19.0383856009026,20.1156051997223 -19.0324268924259,20.1112975211796 -19.02764,20.1149280408842 -19.0241765620763,20.1134934379237 -19.0226650887819,20.1105185808026 -19.0210651997223,20.1278143990974 -19.01654,20.1308380408842 -19.0120148002777,20.1278143990974 -19.0125591963279,20.1185959610202 -19.0073148002777,20.1155743990974 -19.0083765620763,20.1102365620763 -19.0135774750898,20.1091475643992 -19.014908053594,20.1047230121615 -19.0143927935732,20.1006169337266 -19.0101748002777,20.0976543990974 -19.0101529424178,20.0940154877847 -19.0073056009026,20.0936951997223 -19.0046548002777,20.0910443990974 -19.0046548002777,20.0872956009026 -19.0064101892046,20.0850606708776 -19.0004719362321,20.0894150644771 -18.9996551997223,20.0950243990974 -18.9970043990974,20.0976751997223 -18.9858656009026,20.0965951997223 -18.9832148002777,20.0939443990974 -18.9816919591158,20.08809 -18.9831265620763,20.0846265620763 -18.98659,20.0831919591158 -18.9913119867013,20.0862187677389 -18.9927065620763,20.0829565620763 -18.9996080637679,20.0796649355229 -19.0004744901345,20.0739562687189 -18.9921198861154,20.0713103087174 -18.9875556009026,20.0718551997223 -18.9844363318828,20.0671020104192 -18.9731265620763,20.0647334379237 -18.9720648002777,20.0593956009026 -18.976336687006,20.0562482911051 -18.9737496522713,20.052853719748 -18.9688065620763,20.0517134379237 -18.9673719591158,20.04825 -18.9688065620763,20.0447865620763 -18.9727665620763,20.0415965620763 -18.9781959760348,20.0404510569473 -18.9774041565202,20.034866218953 -18.9711465620763,20.0330234379237 -18.9661119591158,20.02527 -18.9691356009026,20.0207448002777 -18.9728843990974,20.0207448002777 -18.9759011196934,20.0249187787906 -18.9846143990974,20.0261448002777 -18.9879568083458,20.0300553214452 -18.989194445866,20.0267338806495 -18.9846448002777,20.0235643990974 -18.9846448002777,20.0198156009026 -18.9872956009026,20.0171648002777 -18.9924504164083,20.0181042710094 -18.9967375518552,20.0154249514724 -18.9973386808655,20.0084860918704 -18.9949065620763,20.0071534379237 -18.9934719591158,20.00369 -18.9966004397622,19.9989698914339 -18.9920748002777,19.9947743990974 -18.9920748002777,19.9910256009026 -18.9955764831928,19.9881426082156 -18.9973765620763,19.9818765620763 -19.0040492285767,19.9773844319199 -19.0061070178164,19.9716623043189 -19.0044359795755,19.9712008559985 -19.0015443990974,19.9749151997223 -18.9963783050262,19.9740884618715 -18.9898934379237,19.9809934379237 -18.9845556009026,19.9820551997223 -18.9788713293779,19.9753736604749 -18.97306,19.9785680408842 -18.9695965620763,19.9771334379237 -18.9685348002777,19.9717956009026 -18.9731956222776,19.9677523915641 -18.9684265620763,19.9664034379237 -18.9673648002777,19.9610656009026 -18.97189,19.9580419591158 -18.9753534379237,19.9594765620763 -18.9767191024982,19.9618846831841 -18.9812556818535,19.9607697950239 -18.9829465620763,19.9568565620763 -18.99094,19.9515719591158 -19.0009328962989,19.9583171196435 -19.0027376631082,19.9571002402198 -18.9987748002777,19.9540143990974 -18.9987748002777,19.9502656009026 -19.0014256009026,19.9476148002777 -19.0067119594863,19.9486421652841 -19.0084546099772,19.9473391434796 -19.0051065620763,19.9457534379237 -19.0036719591158,19.94229 -19.0056348002777,19.9334656009026 -19.0114556009026,19.9266848002777 -19.0152043990974,19.9266848002777 -19.0178551997223,19.9293356009026 -19.0167138087552,19.9348469134105 -19.0179756583665,19.9391920784257 -19.0231243990974,19.9383448002777 -19.0257751997223,19.9409956009026 -19.0247134379237,19.9463334379237 -19.0185203038382,19.9481124316094 -19.0233234379237,19.9496565620763 -19.0247004909678,19.952508078528 -19.0281834379237,19.9539465620763 -19.0296180408842,19.95741 -19.0275651997223,19.9677743990974 -19.0249143990974,19.9704251997223 -19.0195765620763,19.9693634379237 -19.018308646201,19.9643532672882 -19.0127986968581,19.9678813499099 -19.0116607816135,19.9703028546237 -19.0159251997223,19.9734156009026 -19.0159251997223,19.9771643990974 -19.0089216881425,19.9851039616871 -19.0110672180715,19.9863223607447 -19.0139956009026,19.9829848002777 -19.02819,19.9823419591158 -19.0344434379237,19.9847865620763 -19.0358780408842,19.98825 -19.0350119939871,19.9925596001954 -19.0369580408842,19.9964 -19.0345751997223,20.0108443990974 -19.03005,20.0138680408842 -19.0230147380293,20.0114067602582 -19.01914,20.0132080408842 -19.013957046758,20.0116338014903 -19.0154080408842,20.02144 -19.0139734379237,20.0249034379237 -19.01051,20.0263380408842 -19.0009957132508,20.0230378803565 -19.0007029621585,20.0244022803626 -19.0041352609996,20.027386880009 -19.0184543990974,20.0304948002777 -19.0211051997223,20.0331456009026 -19.0200434379237,20.0384834379237 -19.01658,20.0399180408842 -19.0099800750737,20.0384409146353 -19.0095652774523,20.0418535840676 -19.0162343990974,20.0424048002777 -19.019416135748,20.0471213515623 -19.024040560575,20.0454930808754 -19.0254265620763,20.0427865620763 -19.02889,20.0413519591158 -19.0346934379237,20.0441365620763 -19.0361280408842,20.0476 -19.0347597128509,20.0509642504859 -19.0376034379237,20.0524165620763 -19.0390380408842,20.05588 -19.0382767099159,20.0624599719686 -19.0428343990974,20.0621248002777 -19.0458580408842,20.06665 -19.0428343990974,20.0711751997223 -19.0373856905712,20.0699475069904 -19.0366512953676,20.0710466070842 -19.0440651997223,20.0755156009026 -19.0464880408842,20.08089 -19.0452363042611,20.0842597543541 -19.0512543990974,20.0827248002777 -19.0542780408842),20.08725 -19.0305466492201,(20.0523621139628 -19.0279719595366,20.051200680119 -19.0265934379237,20.0536734379237 -19.02313,20.0551080408842 -19.0196665620763,20.0536734379237 -19.018073864252,20.0500186484377 -19.0113395099173,20.0545817847816 -19.0158451997223,20.0577756009026 -19.0148300897719,20.0630436184989 -19.0184580408842,20.06783 -19.0128443990974,20.0776951997223 -19.0088898107954,20.0787493291224 -19.0136829230956,20.0793517658871 -19.0165356009026,20.0763948002777 -19.0195533143596,20.0762493784817 -19.0201448002777,20.0675756009026 -19.0227956009026,20.0649248002777 -19.0266218718701,20.0648382514545 -19.0299997580599,20.0584416431792 -19.0305466492201),20.0523621139628 -19.0296797723842,(20.0880194658745 -19.0276480571481,20.0840609302736 -19.0252756009026,20.0836851997223 -19.0232678954127,20.0819968589824 -19.0220123849753,20.0841754889657 -19.0265651997223,20.0873456009026 -19.0265651997223,20.0910943990974 -19.024392959314,20.0946705185723 -19.027147285538,20.0940129488726 -19.0275448002777,20.0903256009026 -19.0296797723842),20.0880194658745 -19.0277478391276,(20.1037466116555 -19.0238254502877,20.102956577942 -19.022581946406,20.1056658737919 -19.0234049112181,20.1077214191974 -19.0277478391276),20.1037466116555 -19.0178156009026,(20.0918348002777 -19.0171312569259,20.0885650633962 -19.0139526735828,20.0885397360146 -19.0138446451424,20.0910520997755 -19.0178156009026),20.0918348002777 -19.0094044420916,(20.0549469897291 -19.0092121014362,20.054908730794 -19.0090069833268,20.0551864921481 -19.0091456873113,20.0553251961326 -19.0094044420916),20.0549469897291 -19.0252735155984,(19.9923308080593 -19.0241826608233,19.9920417275713 -19.0230951997223,19.9975743990974 -19.0185329450115,20.0006683526311 -19.018996348745,20.0033775920756 -19.0227864364811,20.0047741496046 -19.0247548002777,19.9946656009026 -19.0252735155984),19.9923308080593 -19.0140146199667,(19.9920389828494 -19.0124427819285,19.9909976392553 -19.0080043990974,19.9957351997223 -19.0046036933509,19.9958044396153 -19.0015156082289,19.9998088830768 -19.0028913191345,20.0055839081296 -19.0064199380018,20.0086802420268 -19.0095905408022,20.0078486109495 -19.0092148002777,19.9982656009026 -19.0137770549885,19.9951716473689 -19.0140146199667),19.9920389828494 -19.009299620793,(19.9564592949881 -19.0071480405137,19.9552078347159 -19.0052723368918,19.9565997597802 -19.007287395147,19.9574302831883 -19.009299620793),19.9564592949881 -18.996822718646,(19.9649939569176 -18.9914380988628,19.9639937300001 -18.9914806659544,19.9669010109248 -18.9955216949738,19.9679515381285 -18.996822718646,19.9649939569176