GDACS_WF_1017305_6
info-gdacs@gdacs.org
2023-09-18T22:00:00-00:00
Actual
Alert
Public
1017305
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Bolivia
On 07/09/2023, a forest fire started in Bolivia, until 19/09/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017305
eventid
1017305
currentepisodeid
6
glide
version
0
fromdate
Thu, 07 Sep 2023 00:00:00 GMT
todate
Tue, 19 Sep 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017305
country
Bolivia
eventname
severity
Green impact for forestfire in 13610 ha
population
35 people affected in the area
vulnerability
sourceid
GWIS
iso3
BOL
hazardcomponents
datemodified
Wed, 20 Sep 2023 08:31:33 GMT
Polygon
-14.1478793976626,-66.0350834171618 -14.1478793976626,-66.0312565828382 -14.1444338280741,-66.0284034889211 -14.14516,-66.02409 -14.1436330489713,-66.0205127149955 -14.1469693976626,-66.0176534171618 -14.1475193976626,-66.0100365828382 -14.1429,-66.00695 -14.1347470731506,-66.009165634096 -14.12609,-66.00692 -14.1225544660941,-66.0083844660941 -14.1205595925183,-66.0116598613893 -14.1158430144557,-66.0100843345075 -14.1127834171618,-66.0056006023375 -14.1080943583038,-66.0061767223524 -14.1036288539355,-66.0031091633304 -14.1073893976626,-66.0001934171618 -14.1063055339059,-65.9947444660941 -14.1008565828382,-65.9936606023374 -14.0978579531387,-65.9987221702877 -14.0976628707281,-65.9978645899076 -14.09799,-65.99622 -14.0976093976626,-65.9943065828382 -14.0956263442418,-65.9918794908644 -14.10475,-65.99187 -14.1124555339059,-65.9886955339059 -14.114095879988,-65.9835433762525 -14.1236193976626,-65.9775834171618 -14.12464,-65.97201 -14.1231755339059,-65.9684744660941 -14.11964,-65.96701 -14.1148215106522,-65.969921579873 -14.1125455339059,-65.9651244660941 -14.1081137472145,-65.9638382757633 -14.1064455339059,-65.9604444660941 -14.10291,-65.95898 -14.0982906023374,-65.9620665828382 -14.0971988206624,-65.9691493850728 -14.0946234014744,-65.967871632468 -14.09675,-65.96345 -14.0936634171618,-65.9588306023374 -14.0898365828382,-65.9588306023374 -14.0846687376644,-65.9641041590303 -14.0792263099299,-65.9629627001276 -14.0764634171618,-65.9599706023374 -14.0710144660941,-65.9610544660941 -14.0699306023374,-65.9665034171618 -14.0729511291729,-65.9692719648186 -14.0740744530413,-65.9749759216796 -14.0715406023374,-65.9796165828382 -14.0709706023374,-65.9870334171618 -14.0743588740348,-65.9898751138197 -14.0758044660941,-65.9935055339059 -14.0801965828382,-65.9971093976626 -14.0831043109224,-65.9972922192605 -14.0834260891804,-65.9989099078043 -14.0806944660941,-66.0002144660941 -14.0793548880419,-66.0043778545851 -14.0771941937504,-66.002941137482 -14.0761355339059,-65.9974544660941 -14.0726,-65.99599 -14.0641306023374,-66.0024365828382 -14.0648906023374,-66.0084934171618 -14.06997198531,-66.0114881054083 -14.0695499159415,-66.0148390556161 -14.0672906023374,-66.0172465828382 -14.0672906023374,-66.0210734171618 -14.0699965828382,-66.0237793976626 -14.0729009850852,-66.0239628808106 -14.0740506023374,-66.0300134171618 -14.0759493483918,-66.0321800208497 -14.0715665828382,-66.0324706023375 -14.0694570285499,-66.0342839679317 -14.0649965828382,-66.0338606023375 -14.059375,-66.0384040186313 -14.0572486383766,-66.0369135352424 -14.05793,-66.03455 -14.0560888256636,-66.0307413716863 -14.05766,-66.02605 -14.0561955339059,-66.0225144660941 -14.05004,-66.01896 -14.0445862196926,-66.022769120501 -14.0434955339059,-66.0173544660941 -14.0381993538239,-66.0158047958839 -14.0496393976626,-66.0026834171618 -14.0473055339059,-65.9914244660941 -14.03592,-65.98555 -14.0286644660941,-65.9904944660941 -14.026563941967,-65.9949585873293 -14.02401,-65.99415 -14.0204744660941,-65.9956144660941 -14.01901,-65.99915 -14.0205183864837,-66.003701276821 -14.0179444660941,-66.0049744660941 -14.01648,-66.00851 -14.0180474081649,-66.0160262653925 -14.0138244660941,-66.0180144660941 -14.01236,-66.02155 -14.0130606023374,-66.0270434171618 -14.0156537614887,-66.0306212104505 -14.0143106023374,-66.0362434171618 -14.0176217824831,-66.039678851693 -14.0121444660941,-66.0425844660941 -14.00677,-66.04981 -14.0112190745053,-66.0582642637689 -14.0111506023374,-66.0641034171618 -14.0157550557906,-66.0671870274119 -14.0144206023374,-66.0728034171618 -14.0171265828382,-66.0755093976626 -14.0200034870004,-66.0756983505198 -14.0236844660941,-66.0832255339059 -14.0261132740238,-66.084469858516 -14.02506,-66.08739 -14.0265244660941,-66.0909255339059 -14.03006,-66.09239 -14.033079600149,-66.0917545512916 -14.0352444660941,-66.0953455339059 -14.03878,-66.09681 -14.0423155339059,-66.0953455339059 -14.0437774091059,-66.0917969746958 -14.0470634171618,-66.0916893976625 -14.0503040850219,-66.0891650888895 -14.0516044660941,-66.0935255339059 -14.06002,-66.09661 -14.0635555339059,-66.0951455339059 -14.0670803666484,-66.0896300661991 -14.0684644660941,-66.0938755339059 -14.072,-66.09534 -14.0750071171202,-66.0946920682628 -14.0757306023374,-66.0996334171618 -14.08035,-66.10272 -14.0849693976626,-66.0996334171618 -14.0844045860025,-66.0916629397794 -14.08594,-66.08808 -14.0843374530509,-66.0844522034165 -14.0857072800656,-66.0831046855968 -14.08884,-66.0843 -14.0937611739536,-66.0835072021612 -14.09777,-66.08568 -14.1039155339059,-66.0812555339059 -14.10538,-66.07772 -14.104764015801,-66.0745419983643 -14.10763,-66.07007 -14.1067026544085,-66.0646029556056 -14.11486,-66.06581 -14.1189364942499,-66.0635359295378 -14.1202903694016,-66.0664461601563 -14.1185206023374,-66.0685265828382 -14.1185206023374,-66.0723534171618 -14.1228461675364,-66.075381553089 -14.1242844660941,-66.0787855339059 -14.12782,-66.08025 -14.1313555339059,-66.0787855339059 -14.1341893976626,-66.0718634171618 -14.1341893976626,-66.0680365828382 -14.12980651899,-66.0649970465523 -14.1298651672242,-66.060650726733 -14.1383234171618,-66.0605693976625 -14.1442793976626,-66.0522434171618 -14.1442793976626,-66.0484165828382 -14.13966,-66.04533 -14.1256265944311,-66.0488990506821 -14.1273596735258,-66.0433596100659 -14.1331917744553,-66.0356872804197 -14.14326,-66.03817 -14.1478793976626),-66.0350834171618 -14.1181682993871,(-66.0280484339462 -14.1166262569397,-66.0302400887855 -14.1148213142359,-66.0295934783223 -14.1157631923679,-66.0270053178573 -14.1181682993871),-66.0280484339462 -14.1177100823904,(-66.0448187656109 -14.1126616894272,-66.0465973997443 -14.1107324028296,-66.0458155752175 -14.1107568636758,-66.0424436858436 -14.1123255339059,-66.0413955339059 -14.1134975653437,-66.0393301682963 -14.1163344509204,-66.0388548897631 -14.1177100823904),-66.0448187656109 -14.1084143422925,(-66.0194362231965 -14.1075770185067,-66.0185215048311 -14.10767,-66.01854 -14.1078019597613,-66.0185137515715 -14.1084143422925),-66.0194362231965 -14.0991511460645,(-66.0016908366695 -14.0990233950581,-66.0017162479247 -14.0989620468613,-66.0014078297123 -14.0991511460645),-66.0016908366695 -14.0976428536674,(-66.0434431930911 -14.0955664987,-66.0440345664392 -14.0953589388114,-66.0438958793556 -14.0971493976626,-66.0410234171618 -14.0976428536674),-66.0434431930911 -14.0852060861231,(-66.041384971326 -14.0812342019902,-66.0431191485636 -14.0806693976626,-66.0390734171618 -14.0806693976626,-66.0352465828382 -14.0787706516082,-66.0330799791503 -14.0845058203262,-66.0323866586679 -14.08327,-66.03558 -14.0852060861231),-66.041384971326 -14.0808611978821,(-66.0724934408748 -14.0787154283698,-66.0764129159392 -14.0779960230156,-66.0745381954984 -14.0780385754264,-66.0716957299167 -14.0797265451022,-66.0708423111379 -14.0808611978821),-66.0724934408748 -14.069456630505,(-66.0685415683885 -14.0652160921176,-66.0714138080524 -14.06124,-66.06929 -14.0521365828382,-66.0707106023374 -14.0460766478572,-66.080193967825 -14.0435276394284,-66.0804834689249 -14.0506539347436,-66.0678689611072 -14.0527527545678,-66.066564843892 -14.0579034171618,-66.0674493976626 -14.0606093976626,-66.0647434171618 -14.0608462665313,-66.0621074030565 -14.0626795991237,-66.0606553663217 -14.0671982163159,-66.064257873606 -14.069456630505),-66.0685415683885 -14.069115771643,(-66.0784255774868 -14.0682478210229,-66.0812498657271 -14.0658254265239,-66.082856623938 -14.0666190655585,-66.0773692875568 -14.069115771643),-66.0784255774868 -14.0360345353343,(-66.0253010108973 -14.0352420219799,-66.0264456122338 -14.0350793868024,-66.0262022114898 -14.0354393976626,-66.0256634171618 -14.0360345353343),-66.0253010108973 -14.0337906461761,(-66.0159852041161 -14.0327800115821,-66.0166604885626 -14.032778213278,-66.0164504707522 -14.033319916226,-66.0156706724192 -14.0337906461761,-66.0159852041161