GDACS_WF_1017395_3
info-gdacs@gdacs.org
2023-09-22T22:00:00-00:00
Actual
Alert
Public
1017395
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 19/09/2023, a forest fire started in Australia, until 23/09/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017395
eventid
1017395
currentepisodeid
3
glide
version
0
fromdate
Tue, 19 Sep 2023 00:00:00 GMT
todate
Sat, 23 Sep 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017395
country
Australia
eventname
severity
Green impact for forestfire in 20180 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Sat, 23 Sep 2023 08:17:37 GMT
Polygon
-18.18143,130.37976 -18.1799655339059,130.383295533906 -18.1763634100424,130.384746754434 -18.1757593976626,130.395303417162 -18.1719312700559,130.399241270056 -18.1708093976626,130.404383417162 -18.1681034171618,130.407089397663 -18.1642765828382,130.407089397663 -18.1615706023374,130.404383417162 -18.1622471744923,130.397653111207 -18.1595506023374,130.394953417162 -18.1595458752095,130.391150347715 -18.1550905131381,130.391388478796 -18.1548593976626,130.394053417162 -18.1515434171618,130.397809397663 -18.1458084768407,130.396297520741 -18.1407222739181,130.397079791389 -18.1399287243407,130.399987829568 -18.1419360329952,130.401843108607 -18.1431544660941,130.399544466094 -18.14669,130.39808 -18.15084756581,130.400475402626 -18.1536865828382,130.397100602337 -18.1575134171618,130.397100602337 -18.1602193976626,130.399806582838 -18.1618925550268,130.414167377088 -18.1654693976626,130.417046582838 -18.1643855339059,130.422495533906 -18.1598179375002,130.423754710005 -18.1628155339059,130.425634466094 -18.16428,130.42917 -18.162686607786,130.441364435474 -18.1664455339059,130.442784466094 -18.16791,130.44632 -18.1664593976626,130.453113417162 -18.1621013993185,130.45762175084 -18.16364,130.46915 -18.1617993976626,130.474093417162 -18.15718,130.47718 -18.1497406449051,130.474050161406 -18.14451,130.47743 -18.1408433060657,130.475769239052 -18.1396455339059,130.480645533906 -18.13611,130.48211 -18.1280944660941,130.479635533906 -18.12663,130.4761 -18.1279677404628,130.472754124404 -18.1201966009987,130.471495563176 -18.116325051876,130.477523122145 -18.11923,130.47648 -18.1227655339059,130.477944466094 -18.1252093976626,130.482276582838 -18.12741,130.49409 -18.1189804940993,130.505874434205 -18.1220693976626,130.508656582838 -18.1220693976626,130.512483417162 -18.1193634171618,130.515189397663 -18.1155365828382,130.515189397663 -18.1128306023374,130.512483417162 -18.1135195059007,130.507625565795 -18.1084716175198,130.505117311636 -18.1089993976626,130.512093417162 -18.10438,130.51518 -18.1008444660941,130.513715533906 -18.0986466901677,130.505997461273 -18.0904744660941,130.500305533906 -18.088252959993,130.492448708419 -18.0837406023374,130.489383417162 -18.0837406023374,130.485556582838 -18.0864671587506,130.482429543604 -18.0807865828382,130.482819397663 -18.0780806023374,130.480113417162 -18.0791644660941,130.474664466094 -18.0869432585395,130.467136509947 -18.0819244660941,130.465355533906 -18.08046,130.46182 -18.0819244660941,130.458284466094 -18.0865190930619,130.457030666708 -18.0837,130.45259 -18.0855197653623,130.448817062713 -18.0819206023374,130.445933417162 -18.0827120288362,130.440922129379 -18.0809817501572,130.441080239365 -18.0810193976626,130.444963417162 -18.0783134171618,130.447669397663 -18.0667565828382,130.449219397663 -18.0590217694692,130.440982449856 -18.0518765828382,130.438919397663 -18.0491706023374,130.436213417162 -18.0488406023374,130.427026582838 -18.0532470131432,130.42398236572 -18.0501937746731,130.417960476647 -18.0485908019786,130.416695830844 -18.0409765828382,130.417429397663 -18.03789,130.41281 -18.0393544660941,130.409274466094 -18.043531592301,130.407937620644 -18.0461093850728,130.404362592467 -18.04435,130.40063 -18.0474365828382,130.396010602337 -18.0545934171618,130.395430602337 -18.057441654341,130.398311393705 -18.0610484455595,130.397556447725 -18.0640865828382,130.393180602337 -18.0679134171618,130.393180602337 -18.071,130.3978 -18.0680149681818,130.403121311347 -18.0745655339059,130.404594466094 -18.07715,130.41533 -18.0756855339059,130.418865533906 -18.0710100216257,130.420351258255 -18.068049057214,130.424668856596 -18.069162060839,130.428252100017 -18.07442,130.42489 -18.0786881821362,130.427450951658 -18.0801356658813,130.421916686157 -18.0773,130.4173 -18.0786123071622,130.410709133215 -18.0764006023374,130.408333417162 -18.0752706023374,130.397236582838 -18.0779765828382,130.394530602337 -18.08322,130.39359 -18.0875464865066,130.396238210314 -18.0943099498016,130.395617402693 -18.0940349844444,130.394184941506 -18.0868265828382,130.394789397663 -18.0813044660941,130.390655533906 -18.0796239884165,130.385249619946 -18.0757606023374,130.382313417162 -18.0765798709413,130.377260460724 -18.0744841077583,130.374367212574 -18.0703734171618,130.380989397663 -18.0626665828382,130.381769397663 -18.0549167355268,130.373507415914 -18.05109,130.37428 -18.0475544660941,130.372815533906 -18.0453088632166,130.364847839138 -18.0418344660941,130.363395533906 -18.0404909909063,130.360468262361 -18.0361147278452,130.357668980458 -18.03192,130.36012 -18.0283844660941,130.358655533906 -18.0273006023374,130.353206582838 -18.0310985425056,130.349267211707 -18.0299172607317,130.346569509507 -18.0253506023374,130.343493417162 -18.02404,130.33647 -18.0271265828382,130.331850602337 -18.032370413274,130.33279740887 -18.0349165828382,130.330330602337 -18.0383624067097,130.329864073124 -18.0392406023374,130.324716582838 -18.0482654528414,130.312443291288 -18.0410144660941,130.307945533906 -18.0399306023374,130.302496582838 -18.04455,130.29941 -18.0495406095228,130.302696935722 -18.0493506023374,130.297156582838 -18.0520565828382,130.294450602337 -18.0558834171618,130.294450602337 -18.0643402916335,130.301029511827 -18.0712365828382,130.294620602337 -18.0750634171618,130.294620602337 -18.07815,130.29924 -18.0766855339059,130.302775533906 -18.0737244131353,130.304125742123 -18.0732098669626,130.307485316538 -18.0791017989569,130.307779043967 -18.0802151916308,130.301163108713 -18.0788506023374,130.295526582838 -18.0824827377987,130.292250221468 -18.0767106023374,130.286493417162 -18.0767106023374,130.282666582838 -18.078825895626,130.280355286914 -18.0795944660941,130.274434466094 -18.08313,130.27297 -18.0867210998638,130.273571310603 -18.0852885425132,130.268572514936 -18.0746944660941,130.261115533906 -18.0730164714453,130.255742102975 -18.0691406023374,130.252803417162 -18.069964490339,130.247743547307 -18.06762,130.24362 -18.0707065828382,130.239000602337 -18.0745334171618,130.239000602337 -18.0784455339059,130.242524466094 -18.0798667446512,130.246277459323 -18.0856093976626,130.251456582838 -18.0862055996225,130.255218308986 -18.0900793976626,130.258156582838 -18.0906714574868,130.261917485064 -18.1012555339059,130.269354466094 -18.1029439405157,130.274749968093 -18.1060615467481,130.27656734485 -18.1055206023374,130.269246582838 -18.11014,130.26616 -18.1225593976626,130.275386582838 -18.1225983739929,130.279017469917 -18.1259455339059,130.280444466094 -18.12741,130.28398 -18.1259455339059,130.287515533906 -18.12241,130.28898 -18.1188744660941,130.287515533906 -18.1177516260071,130.282262530083 -18.11461,130.28286 -18.1107356209794,130.280888416355 -18.11409,130.28629 -18.1126255339059,130.289825533906 -18.10909,130.29129 -18.1047465828382,130.290919397663 -18.0942227412707,130.281953350121 -18.0856341043741,130.282194713086 -18.1030965538,130.29744474633 -18.1051865828382,130.295660602337 -18.1090134171618,130.295660602337 -18.1121,130.30028 -18.1106355339059,130.303815533906 -18.1077563986412,130.305149434192 -18.1107,130.31052 -18.1079655339059,130.316555533906 -18.1025165828382,130.317639397663 -18.0994384142656,130.31297769863 -18.0914634171618,130.318709397663 -18.0857708644726,130.318434151441 -18.0864735285547,130.322367897025 -18.0884639730412,130.323148880247 -18.09239,130.3211 -18.0959255339059,130.322564466094 -18.09739,130.3261 -18.0959255339059,130.329635533906 -18.09239,130.3311 -18.0896560269588,130.330171119753 -18.0848834171618,130.336059397663 -18.0810565828382,130.336059397663 -18.07793384846,130.33336201946 -18.0782045471586,130.338516708712 -18.0815555339059,130.339944466094 -18.08302,130.34348 -18.0796178995774,130.348162158012 -18.0843393976626,130.352476582838 -18.0856701948248,130.362819065686 -18.0899493976626,130.366436582838 -18.0899493976626,130.370263417162 -18.0873503278309,130.373664366571 -18.0879180338114,130.377305899386 -18.0911355339059,130.379364466094 -18.092947256483,130.384774497164 -18.0925706023374,130.377256582838 -18.0956433822673,130.373935205654 -18.0966306023374,130.365836582838 -18.1004616580769,130.362906810958 -18.1014006023374,130.354746582838 -18.1041065828382,130.352040602337 -18.1092183450234,130.352764937026 -18.1091906023374,130.348896582838 -18.11381,130.34581 -18.1173455339059,130.347274466094 -18.1186545433585,130.351591533313 -18.1219089289346,130.354276220761 -18.1282234171618,130.353550602337 -18.1309293976626,130.356256582838 -18.1298455339059,130.361705533906 -18.1234496305984,130.362896976621 -18.12506,130.36653 -18.1239650285846,130.372139640707 -18.1307155339059,130.374254466094 -18.1329881846324,130.380030757919 -18.1355581584583,130.378168397002 -18.13425,130.37328 -18.1357144660941,130.369744466094 -18.14132,130.36709 -18.147076680446,130.368584421021 -18.1455006023374,130.366633417162 -18.1455006023374,130.362806582838 -18.15012,130.35972 -18.1536555339059,130.361184466094 -18.1549979273015,130.364106299102 -18.15941,130.36133 -18.1651893406533,130.364079077138 -18.1706134171618,130.363330602337 -18.1737,130.36795 -18.1710654894915,130.374338690546 -18.1783434171618,130.375140602337 -18.18143),130.37976 -18.1546376500125,(130.367474473898 -18.1545320726985,130.366943700898 -18.1543194748554,130.367261876055 -18.1546376500125),130.367474473898 -18.1236921897922,(130.383570030861 -18.1233888485329,130.381754968631 -18.1163265828382,130.380599397663 -18.1134155443242,130.376862520914 -18.1108151372297,130.37944707796 -18.1120893976626,130.381696582838 -18.1145886156679,130.386979759754 -18.1172365828382,130.384360602337 -18.1236921897922),130.383570030861 -18.1179762672518,(130.394545061736 -18.1142713843321,130.389590240246 -18.1105161707455,130.393662805096 -18.1145702099973,130.395770174549 -18.1179762672518),130.394545061736 -18.115144948124,(130.478766877855 -18.1124963008357,130.479759018594 -18.113289201258,130.481580516554 -18.1144691733527,130.480277594359 -18.115144948124),130.478766877855 -18.1133217078992,(130.456998133072 -18.11282,130.45403 -18.1076683268716,130.452623933558 -18.1119220664095,130.45720027293 -18.1133217078992),130.456998133072 -18.111722685649,(130.443395142039 -18.1113974850878,130.438718815788 -18.106400555329,130.434618144114 -18.1063356190033,130.436648312841 -18.1091255339059,130.437964466094 -18.1102565242939,130.443176495587 -18.111722685649),130.443395142039 -18.1153679911173,(130.368078375907 -18.1152432083984,130.367451050816 -18.1148850745124,130.367987036054 -18.1150098572313,130.368614361145 -18.1153679911173),130.368078375907 -18.1143201427687,(130.372165638855 -18.113983552103,130.372669382385 -18.1141144556758,130.373327479086 -18.1143201427687),130.372165638855 -18.1070754371435,(130.414413096811 -18.1070449189881,130.414433488391 -18.1070703738556,130.414438551679 -18.1070754371435),130.414413096811 -18.1048577969676,(130.424766974468 -18.1037565828382,130.423779397663 -18.1007936783516,130.419781773061 -18.0982302837158,130.424577322302 -18.0997770932586,130.427632106085 -18.1048577969676),130.424766974468 -18.1025558975447,(130.460386757228 -18.1023170331714,130.45891409507 -18.1017328601078,130.458797895823 -18.1011061194834,130.459735879453 -18.1025558975447),130.460386757228 -18.1009428847117,(130.443274071248 -18.1007494653768,130.442301686586 -18.1001455339059,130.443205533906 -18.0993993976626,130.443873417162 -18.0983701576129,130.445413783751 -18.1009428847117),130.443274071248 -18.1027150810119,(130.415236511609 -18.0993731173019,130.411933326793 -18.0971322856769,130.412200944084 -18.0981534171618,130.413150602337 -18.1011163216484,130.417148226939 -18.1027150810119),130.415236511609 -18.0972831181621,(130.469271944763 -18.097083865162,130.468526266354 -18.09668,130.46846 -18.0966081972102,130.468820977001 -18.0972831181621),130.469271944763 -18.0661621378702,(130.372007480252 -18.0652165828382,130.371819397663 -18.064506229664,130.371443663578 -18.0646494776766,130.372163819969 -18.0661621378702),130.372007480252 -18.0648696721691,(130.332605633429 -18.0640461424795,130.332010486645 -18.0643055996225,130.333638308986 -18.0646506095228,130.333706935722 -18.0648696721691),130.332605633429 -18.0918901664204,(130.4599473914 -18.0916721120478,130.456502000356 -18.0906134171618,130.457209397663 -18.0876409069381,130.457379333292 -18.0901112005811,130.460066466907 -18.0918901664204),130.4599473914 -18.0867238955201,(130.43844780268 -18.0866097958839,130.438277040507 -18.0860479711638,130.439117870621 -18.0861519173227,130.439097194444 -18.0867238955201),130.43844780268 -18.0862491306898,(130.403623397469 -18.0857135134934,130.402821789686 -18.08541384846,130.40302201946 -18.0852380338114,130.403905899386 -18.0862491306898),130.403623397469 -18.0743082498428,(130.438549760635 -18.072390172806,130.437680753142 -18.0726199462596,130.4388359023 -18.0735909478259,130.43902904652 -18.0743082498428),130.438549760635 -18.0604882751247,(130.431007015198 -18.0589149396235,130.427454028946 -18.0578084689592,130.431258890621 -18.0601801866212,130.431212873354 -18.0604882751247),130.431007015198 -18.1167905166601,(130.493951863357 -18.1160659472407,130.491028187437 -18.1128865828382,130.490899397663 -18.110099071337,130.487783533143 -18.1069560365393,130.492370330636 -18.1096855339059,130.493674466094 -18.1110247314086,130.496580232264 -18.1139745853029,130.496998472883 -18.1167905166601),130.493951863357 -18.1507676384881,(130.405804217064 -18.1488033370926,130.407565815436 -18.1499334171618,130.407790602337 -18.1507107991704,130.408310032389 -18.1507676384881),130.405804217064 -18.1507263081419,(130.416499604847 -18.1501010326676,130.416917400562 -18.1504065411456,130.416978169977 -18.1507263081419),130.416499604847 -18.1498551233046,(130.426671513851 -18.1451947282095,130.424363064559 -18.1423534171618,130.427749397663 -18.1369044660941,130.426665533906 -18.13544,130.42313 -18.1383381957222,130.418636478584 -18.1355744660941,130.417325533906 -18.13411,130.41379 -18.1370081957223,130.409296478584 -18.12886,130.41082 -18.1256798407682,130.409592987672 -18.1243593976626,130.418763417162 -18.1216534171618,130.421469397663 -18.1175640323523,130.422523008735 -18.1159397727122,130.425659791645 -18.1175564255797,130.427456202866 -18.1228134171618,130.426500602337 -18.1255193976626,130.429206582838 -18.1259477543492,130.433109141529 -18.1290634171618,130.433250602337 -18.1317693976626,130.435956582838 -18.13334,130.44902 -18.1318755339059,130.452555533906 -18.1281540846642,130.45398301914 -18.1268155339059,130.456885533906 -18.1242054678984,130.458165912989 -18.1297496301237,130.458985298016 -18.1309744660941,130.456654466094 -18.13451,130.45519 -18.1410160329952,130.459303108607 -18.1436797285371,130.456038772603 -18.1398206023374,130.453103417162 -18.1398206023374,130.449276582838 -18.1425265828382,130.446570602337 -18.1473348679928,130.447226386817 -18.148527771255,130.44290292428 -18.1471088797477,130.437780984175 -18.1444965828382,130.437539397663 -18.1417906023374,130.434833417162 -18.1417906023374,130.431006582838 -18.1448565828382,130.427230602337 -18.1498551233046),130.426671513851 -18.1474175154855,(130.455867711206 -18.1470859816005,130.455319913754 -18.1465302714629,130.455691227397 -18.1474175154855),130.455867711206 -18.1421566590816,(130.463959087483 -18.1416139670048,130.463146891393 -18.1410299873773,130.464496007185 -18.1416965828382,130.464050602337 -18.1421566590816),130.463959087483 -18.1394400126227,(130.466083992815 -18.1391344829135,130.46628814124 -18.1392837641827,130.466317835131 -18.1394400126227),130.466083992815 -18.1334608815995,(130.469918186237 -18.1310493976626,130.469973417162 -18.1300922595372,130.471405875596 -18.133246703743,130.470994931033 -18.1334608815995),130.469918186237 -18.1472789673324,(130.417262599438 -18.1438654998196,130.415019185413 -18.1412118042778,130.418283521416 -18.1423534171618,130.418510602337 -18.1446052717905,130.420536935441 -18.1472789673324),130.417262599438 -18.1459066629074,(130.407924184564 -18.1425339670048,130.405686891393 -18.1398818042777,130.408943521416 -18.1432645001804,130.411180814587 -18.1444844660941,130.408874466094 -18.1459066629074,130.407924184564