GDACS_WF_1017407_10
info-gdacs@gdacs.org
2023-09-29T22:00:00-00:00
Actual
Alert
Public
1017407
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 15/09/2023, a forest fire started in Australia, until 30/09/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017407
eventid
1017407
currentepisodeid
10
glide
version
0
fromdate
Fri, 15 Sep 2023 00:00:00 GMT
todate
Sat, 30 Sep 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017407
country
Australia
eventname
severity
Green impact for forestfire in 10890 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Sat, 30 Sep 2023 08:32:57 GMT
Polygon
-19.5354393976626,130.203893417162 -19.5327334171618,130.206599397663 -19.5294247386537,130.206702465262 -19.5212264937137,130.215069850334 -19.5219993976626,130.220053417162 -19.51532343249,130.22436084591 -19.5162693976626,130.229603417162 -19.5085584425663,130.234681896857 -19.5057201041219,130.239201248492 -19.5096293976626,130.242146582838 -19.5085455339059,130.247595533906 -19.50501,130.24906 -19.4944565828382,130.246849397663 -19.4916105276694,130.243439214251 -19.4872948696265,130.245333447187 -19.4895655339059,130.246584466094 -19.49103,130.25012 -19.488287453051,130.256698386252 -19.49021,130.26054 -19.4889815171521,130.268504057138 -19.49115,130.27251 -19.4896855339059,130.276045533906 -19.4842365828382,130.277129397663 -19.4814938730071,130.274238766349 -19.4758265828382,130.275649397663 -19.4703444660941,130.270915533906 -19.46888,130.26738 -19.4721813819899,130.261070517833 -19.4691906023374,130.257043417162 -19.4691906023374,130.253216582838 -19.4711059855999,130.251038862523 -19.468855866856,130.248940074145 -19.4644858303841,130.252153144802 -19.4650493976626,130.256823417162 -19.4614846444016,130.26058789726 -19.4623968029664,130.266086960975 -19.4658534171618,130.266160602337 -19.4685593976626,130.268866582838 -19.467378742187,130.275006294884 -19.4763034171618,130.275840602337 -19.4790093976626,130.278546582838 -19.4798893976626,130.286063417162 -19.4771834171618,130.288769397663 -19.4739573104531,130.289186478735 -19.4738893976626,130.292913417162 -19.4715371083917,130.295383068738 -19.4749195387841,130.29826849116 -19.4756606023374,130.292776582838 -19.4819465828382,130.285770602337 -19.4857734171618,130.285770602337 -19.4884793976626,130.288476582838 -19.4884793976626,130.292303417162 -19.4844446367309,130.297284014993 -19.4838893976626,130.305123417162 -19.4806447185838,130.307936551472 -19.4786018761663,130.312890136697 -19.4778863731649,130.317510669503 -19.4819493976626,130.320486582838 -19.4819493976626,130.324313417162 -19.4792434171618,130.327019397663 -19.4754165828382,130.327019397663 -19.4727106023374,130.324313417162 -19.4733836268351,130.319479330497 -19.4717195926915,130.319004273405 -19.4680457551464,130.319612341166 -19.4642634171618,130.325409397663 -19.4604365828382,130.325409397663 -19.4521944660941,130.320905533906 -19.4508761655786,130.316635176014 -19.4491755532631,130.316446551164 -19.4477555339059,130.320205533906 -19.4423065828382,130.321289397663 -19.4396006023374,130.318583417162 -19.43873,130.31061 -19.4396606023374,130.304896582838 -19.4460369075818,130.298338711763 -19.444585500799,130.295237496601 -19.43705,130.29885 -19.4325658463304,130.295965824101 -19.4203665828382,130.299069397663 -19.4176606023374,130.296363417162 -19.4172262977856,130.291762207896 -19.4147406023374,130.289203417162 -19.4147406023374,130.285376582838 -19.41936,130.28229 -19.4228955339059,130.283754466094 -19.4243337022144,130.287157792104 -19.4265855668377,130.288165914836 -19.4261006023374,130.280846582838 -19.4287288419948,130.278192547108 -19.4269976031581,130.27312548826 -19.4241565828382,130.272929397663 -19.4214506023374,130.270223417162 -19.4229877134732,130.264471615878 -19.4219735359357,130.261940236903 -19.4172744660941,130.259425533906 -19.4151406023374,130.253853417162 -19.4162244660941,130.248404466094 -19.4205813471525,130.245977486114 -19.4176568924252,130.243975896228 -19.4145834171618,130.248529397663 -19.4107565828382,130.248529397663 -19.4080506023374,130.245823417162 -19.4080506023374,130.241996582838 -19.4107565828382,130.239290602337 -19.4137460383289,130.239124037331 -19.4120175655256,130.236534869338 -19.40778,130.23905 -19.4031606023374,130.235963417162 -19.4031606023374,130.232136582838 -19.4060074373588,130.229402584631 -19.4061906023374,130.226496582838 -19.4088965828382,130.223790602337 -19.4127234171618,130.223790602337 -19.4168334348005,130.229457110126 -19.4179606023374,130.218396582838 -19.4238329992883,130.213074085408 -19.4229706023374,130.207956582838 -19.4272696302627,130.204244429288 -19.4285306023374,130.193856582838 -19.4323857041453,130.190922027898 -19.4340644660941,130.185464466094 -19.441287694549,130.180918251933 -19.4418606023374,130.173536582838 -19.4461596302627,130.169824429288 -19.4479544660941,130.161474466094 -19.4573465828382,130.154160602337 -19.4727855339059,130.156944466094 -19.47425,130.16048 -19.4735359677184,130.163365627427 -19.4781555339059,130.164614466094 -19.4794353624519,130.169078235637 -19.4849855339059,130.170094466094 -19.48645,130.17363 -19.4843688780451,130.177577570179 -19.4901493976626,130.181696582838 -19.4890655339059,130.187145533906 -19.483559450561,130.188191223095 -19.4833993976626,130.191213417162 -19.4806934171618,130.193919397663 -19.4768665828382,130.193919397663 -19.47378,130.1893 -19.4758584516314,130.185354214074 -19.4752452853884,130.183287938417 -19.4707944660941,130.182005533906 -19.4695098623863,130.179374229278 -19.46702,130.18014 -19.4634844660941,130.178675533906 -19.46202,130.17514 -19.4643829992883,130.171004085408 -19.4616703920338,130.17165212867 -19.4609181767139,130.180809166278 -19.4655555339059,130.182054466094 -19.46702,130.18559 -19.4646639141288,130.189721295194 -19.4693355339059,130.191824466094 -19.4717493976626,130.194966582838 -19.4707476807698,130.200292592436 -19.4768834171618,130.200370602337 -19.4795893976626,130.203076582838 -19.4795893976626,130.206903417162 -19.4750771544161,130.209968685661 -19.47632,130.21707 -19.4737213242949,130.221363388539 -19.4775755339059,130.222764466094 -19.4790277200096,130.226361735681 -19.483668974471,130.227684182238 -19.4896636475297,130.224066741521 -19.4899486471348,130.222944814487 -19.48731,130.22381 -19.4837744660941,130.222345533906 -19.48231,130.21881 -19.4837744660941,130.215274466094 -19.4886033215414,130.213653259994 -19.4889251162387,130.210011188967 -19.4851944660941,130.208585533906 -19.48373,130.20505 -19.4844606023374,130.199666582838 -19.4890744660941,130.193154466094 -19.49261,130.19169 -19.4962476605061,130.193307309352 -19.50048,130.1908 -19.5051673615997,130.194228260624 -19.5099934171618,130.193560602337 -19.5126993976626,130.196266582838 -19.5115625888204,130.201750910681 -19.5129942969334,130.203021325024 -19.5160155092378,130.200361250943 -19.5173444660941,130.196144466094 -19.5233065828382,130.193810602337 -19.5271334171618,130.193810602337 -19.5299653906518,130.197149992369 -19.5343555339059,130.198444466094 -19.5354393976626),130.203893417162 -19.5138365151982,(130.208359143685 -19.5136157030666,130.208028674976 -19.5132774762566,130.208534867169 -19.5135056119343,130.208580246177 -19.5138365151982),130.208359143685 -19.5084542954806,(130.210865539633 -19.5049116206734,130.208578413803 -19.5021272373342,130.211956754387 -19.5058006023374,130.213536582838 -19.5084542954806),130.210865539633 -19.5000400709212,(130.238279278932 -19.4989223727293,130.236511497338 -19.4982070104011,130.235820224232 -19.4977631608032,130.237507116913 -19.5000400709212),130.238279278932 -19.4995127626658,(130.212253245613 -19.4982759036417,130.212007219057 -19.49836,130.21243 -19.4982238506307,130.213114469101 -19.4995127626658),130.212253245613 -19.4991635365134,(130.221173408932 -19.4969342969334,130.218838742861 -19.4965355339059,130.219435533906 -19.4954245349409,130.220177879681 -19.4991635365134),130.221173408932 -19.4920554650591,(130.220712120319 -19.4919363573745,130.220688428327 -19.4919293976626,130.220723417162 -19.4918413528652,130.220855185513 -19.4920554650591),130.220712120319 -19.4803476290158,(130.252470005978 -19.4778187433883,130.252302674132 -19.4784828302688,130.25348520669 -19.4792774763876,130.254241456779 -19.4803476290158),130.252470005978 -19.4768010963886,(130.242505096706 -19.4753608032872,130.241340866745 -19.4741825354034,130.241511786486 -19.4754334171618,130.241760602337 -19.4768010963886),130.242505096706 -19.4747861615204,(130.231713436609 -19.4747651903357,130.231608007344 -19.4747424912889,130.231722123158 -19.4747861615204),130.231713436609 -19.4716386757051,(130.222006611461 -19.4647365828382,130.221579397663 -19.4622139502793,130.219147816748 -19.4579815345373,130.219769947564 -19.4574093976626,130.224843417162 -19.4547034171618,130.227549397663 -19.4508765828382,130.227549397663 -19.4481706023374,130.224843417162 -19.4495376575035,130.214753433945 -19.4468406023374,130.212053417162 -19.4474006023374,130.204556582838 -19.4518180751514,130.20151016535 -19.45112,130.19833 -19.4525844660941,130.194794466094 -19.4559945293356,130.193354957667 -19.4582660858712,130.188798704806 -19.4570218232861,130.185580833722 -19.4531672671402,130.184858584843 -19.4497921054721,130.186539961867 -19.4477955339059,130.193645533906 -19.4372422247869,130.201178384063 -19.4360993976626,130.208683417162 -19.4302270007117,130.214005914592 -19.4310893976626,130.219123417162 -19.4267996085326,130.222821743878 -19.4260893976626,130.229543417162 -19.4216565651995,130.232592889874 -19.4219480935297,130.234781498238 -19.4246734171618,130.235000602337 -19.4273793976626,130.237706582838 -19.4268448844255,130.242333372753 -19.4299893976626,130.245126582838 -19.4299349151928,130.24903495594 -19.4333165828382,130.250000602337 -19.4379152655344,130.250516334932 -19.4401065828382,130.248580602337 -19.4472739545877,130.247591633726 -19.4556165828382,130.242130602337 -19.458836349402,130.242009849052 -19.4589206023374,130.238606582838 -19.4635565685425,130.235523295688 -19.4652906023374,130.228966582838 -19.4716386757051),130.222006611461 -19.4691645434107,(130.243557958744 -19.4682165828382,130.243369397663 -19.4674552787492,130.243487205585 -19.468454133144,130.244749925855 -19.4691645434107),130.243557958744 -19.4570106023374,(130.304933417162 -19.4566799117724,130.303270923424 -19.4532720470587,130.303819451313 -19.4509234134877,130.306794222179 -19.4564213843784,130.308507572361 -19.4570106023374),130.304933417162 -19.4490950483073,(130.265896473134 -19.4477881911011,130.264402390654 -19.4485593976626,130.265556582838 -19.4487107764074,130.268623909577 -19.4490950483073),130.265896473134 -19.4410579742148,(130.272493076042 -19.4381809713443,130.266873516303 -19.4381635156641,130.267454239327 -19.43898,130.27002 -19.4410579742148),130.272493076042 -19.4253450848072,(130.25203504406 -19.4249711752957,130.251960668834 -19.4252412238809,130.252364825103 -19.4253450848072),130.25203504406 -19.4658167119469,(130.207865694008 -19.4650059935717,130.204486587541 -19.4619956134313,130.210392752224 -19.4639260497207,130.212882183252 -19.4658167119469),130.207865694008 -19.41676,(130.24024 -19.4156839616711,130.240025962669 -19.4167131075748,130.241134103772 -19.41676),130.24024 -19.4673528916083,(130.295616931262 -19.4664424624985,130.295279533949 -19.4662255109733,130.296370222919 -19.4673528916083),130.295616931262 -19.4638765739814,(130.283046834752 -19.463822075958,130.283083249167 -19.4638675321772,130.283092290971 -19.4638765739814,130.283046834752