GDACS_TC_1000789_7
info-gdacs@gdacs.org
2021-06-16T01:00:00-00:00
Actual
Alert
Public
BILL-21
Met
Tropical Cyclone
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green alert for tropical cyclone BILL-21. Population affected by Category 1 (120 km/h) wind speeds or higher is 0.
From 14/06/2021 to 16/06/2021, a Tropical Storm (maximum wind speed of 93 km/h) BILL-21 was active in Atlantic. The cyclone affects these countries: Canada, Saint Pierre and Miquelon (vulnerability Low). Estimated population affected by category 1 (120 km/h) wind speeds or higher is 0.
http://www.gdacs.org/report.aspx?eventtype=TC&eventid=1000789
eventid
1000789
currentepisodeid
7
glide
version
7
fromdate
Mon, 14 Jun 2021 15:00:00 GMT
todate
Wed, 16 Jun 2021 03:00:00 GMT
eventtype
TC
alertlevel
Green
alerttype
realtime_max
link
http://www.gdacs.org/report.aspx?eventtype=TC&amp;eventid=1000789
country
Canada, Saint Pierre and Miquelon
eventname
BILL-21
severity
Tropical Storm (maximum wind speed of 93 km/h)
population
Population affected by Category 1 (120 km/h) wind speeds or higher is 0
vulnerability
Low
sourceid
NOAA
iso3
CAN
hazardcomponents
etrap,SS,calcepisode=completed
datemodified
Thu, 17 Jun 2021 06:05:41 GMT
Polygon
35.699,-69.8 35.699609782153907,-69.7564287136308 35.701438385689904,-69.7129105121624 35.704483582736408,-69.6694984158198 35.708741663189706,-69.6262453155553 35.714207439234805,-69.5832039086089 35.720874251665506,-69.5404266343051 35.728733977997706,-69.4979656101631 35.737777042365707,-69.4558725684003 35.747992427188606,-69.4141987929041 35.759367686593308,-69.3729950567507 35.7718889615786,-69.3323115603455 35.785540996899805,-69.2921978702622 35.800307159654508,-69.252702858853 35.816169459548206,-69.2138746447057 35.83310857081181,-69.1757605340181 35.851103855747404,-69.1384069629631 35.870133389872407,-69.1018594411131 37.343875514867712,-66.340850281492408 39.30100874223691,-61.2309540741764 39.322147911126208,-61.1763938039831 39.344722111351608,-61.122836971072793 40.468703839727304,-58.65467490828199 40.494063878211612,-58.6024535463407 40.520771329503809,-58.551447541093 40.548793654688609,-58.501719035499406 40.578096712879315,-58.4533286160838 42.384539616958413,-55.6153838896417 42.420270959691706,-55.56255989220589 42.457317785941008,-55.5114871941209 42.495634959855416,-55.462228019601895 42.535175797860511,-55.41484238336551 42.575892125536207,-55.3693880175101 42.617734336309006,-55.325920301178904 45.754036666770006,-52.29336272200441 45.79308770151291,-52.256521188033808 45.833000000000006,-52.221681979837093 45.873724935243608,-52.1888875436228 45.915212890183405,-52.158177834359996 45.957413318136908,-52.129590267098905 46.00027480438321,-52.1031596713866 46.043745128803614,-52.0789182488327 46.087771329503816,-52.0568955338765 46.132299767340108,-52.0371183578037 46.177276191270018,-52.019610816057011 46.222645804449108,-52.0043942388793 46.268353330992312,-51.9914871653257 46.314343083319308,-51.980905320677408 46.360559030001006,-51.972661597281906 46.406944864025306,-51.966766038846494 46.453444071398913,-51.963225828200805 46.5,-51.9620452785463 46.5465559286011,-51.963225828200805 46.593055135974708,-51.966766038846494 46.6394409699991,-51.972661597281906 46.6856569166807,-51.980905320677408 46.7316466690077,-51.9914871653257 46.7773541955509,-52.0043942388793 46.82272380873,-52.019610816057011 46.867700232659907,-52.0371183578037 46.912228670496191,-52.0568955338765 46.9562548711964,-52.0789182488327 46.9997251956168,-52.1031596713866 47.042586681863106,-52.129590267098905 47.08478710981661,-52.158177834359996 47.1262750647564,-52.1888875436228 47.167,-52.221681979837093 47.2069122984871,-52.256521188033808 47.24596333323,-52.29336272200441 47.284105526558207,-52.332161696014794 47.3212924080844,-52.3728708394915 47.3574786713218,-52.4154405546142 47.3926202288827,-52.4598189767422 47.4266742661923,-52.505952037604089 47.4595992936518,-52.5537835311716 47.4913551971868,-52.603255182137609 47.5219032871207,-52.654306716916 47.551206345311392,-52.7068759370755 47.579228670496192,-52.7608987951189 47.6059361217884,-52.8163094725154 47.63129616027269,-52.87304045989 47.6552778886484,-52.93102263927311 47.6778520888738,-52.99018536831079 47.6989912577631,-53.050456566331 47.7186696404952,-53.111762802163007 47.736863261992106,-53.174029383601905 47.7535499561284,-53.2371804484097 47.7687093927377,-53.30113905674159 47.7823231023817,-53.3658272848854 47.794374498852193,-53.431166320199594 47.8048488993789,-53.4970765571343 47.813733542518307,-53.563477694218491 47.8210176037013,-53.6302888318951 47.8266922084213,-53.6974285710841 47.830750443046604,-53.764815112355606 47.833187363243496,-53.832366355589 47.834,-53.9 47.833187363243496,-53.967633644410995 47.830750443046604,-54.035184887644377 47.8266922084213,-54.102571428915894 47.8210176037013,-54.169711168104882 47.813733542518307,-54.236522305781492 47.8048488993789,-54.302923442865684 47.794374498852193,-54.368833679800389 47.7823231023817,-54.434172715114592 47.7687093927377,-54.498860943258393 47.7535499561284,-54.562819551590295 47.736863261992106,-54.625970616398078 47.7186696404952,-54.688237197836976 47.6989912577631,-54.749543433668983 47.6778520888738,-54.809814631689193 47.6552778886484,-54.868977360726888 47.63129616027269,-54.926959540109983 47.6059361217884,-54.983690527484583 47.579228670496192,-55.039101204881085 47.551206345311392,-55.093124062924481 47.5219032871207,-55.145693283083986 47.4913551971868,-55.196744817862388 47.4595992936518,-55.246216468828386 47.4266742661923,-55.294047962395894 47.3926202288827,-55.340181023257784 47.3574786713218,-55.384559445385783 47.3212924080844,-55.427129160508485 44.459476377297982,-58.591504224611931 42.632273562343954,-60.759963421679231 41.666083276216419,-62.854247693925871 39.6989912577631,-67.947228488096286 39.6778520888738,-68.000240911460992 39.6552778886484,-68.052278364542786 39.63129616027269,-68.103277447720785 39.6059361217884,-68.153176026467889 39.579228670496192,-68.201913307052379 39.551206345311392,-68.2494299106051 39.5219032871207,-68.29566794546399 39.4913551971868,-68.340571077706088 39.4595992936518,-68.384084599781488 39.4266742661923,-68.426155497166292 39.3926202288827,-68.466732512952589 37.3697997369652,-70.7278006580064 37.3434303972962,-70.756390348181981 37.316277136801,-70.783814824038885 37.2883730375448,-70.810040673077779 37.2597520963742,-70.835035943141293 37.2304491834974,-70.8587701813433 37.2005,-70.8812144711703 37.1699410343487,-70.902341467712489 37.1388095179359,-70.92212543097898 37.1071433797189,-70.940542257257988 37.0749812000093,-70.957569508483587 37.042362163469,-70.973186439572984 37.0093260113693,-70.987374023701292 36.9759129931728,-71.000114975482688 36.9421638174953,-71.0113937720301 36.9081196025086,-71.021196671867088 36.8738218258446,-71.029511731670283 36.839312274061,-71.0363288208203 36.8046329917309,-71.041639633743983 36.7698262302179,-71.045437700033787 36.7349343961992,-71.047718392331191 36.7,-71.048478931963785 36.665065603800805,-71.047718392331191 36.630173769782104,-71.045437700033787 36.595367008269108,-71.041639633743983 36.560687725939005,-71.0363288208203 36.526178174155405,-71.029511731670283 36.491880397491407,-71.021196671867088 36.457836182504707,-71.0113937720301 36.424087006827207,-71.000114975482688 36.390673988630709,-70.987374023701292 36.357637836531005,-70.973186439572984 36.325018799990708,-70.957569508483587 36.292856620281107,-70.940542257257988 36.261190482064109,-70.92212543097898 36.23005896565131,-70.902341467712489 36.199500000000008,-70.8812144711703 36.169550816502607,-70.8587701813433 36.140247903625806,-70.835035943141293 36.111626962455205,-70.810040673077779 36.083722863199007,-70.783814824038885 36.05656960270381,-70.756390348181981 36.030200263034807,-70.7278006580064 36.004646971170509,-70.698080585645783 35.97994085986101,-70.6672663404303 35.95611202969711,-70.635395464771179 35.933189512437906,-70.602506788420982 35.911201235639709,-70.568640381165793 35.890173988630707,-70.533837504006186 35.870133389872407,-70.498140558886888 35.851103855747404,-70.461593037036891 35.83310857081181,-70.424239465981884 35.816169459548206,-70.386125355294283 35.800307159654508,-70.347297141146981 35.785540996899805,-70.30780212973778 35.7718889615786,-70.267688439654492 35.759367686593308,-70.227004943249284 35.747992427188606,-70.1858012070959 35.737777042365707,-70.1441274315997 35.728733977997706,-70.102034389836888 35.720874251665506,-70.0595733656949 35.714207439234805,-70.016796091391086 35.708741663189706,-69.973754684444685 35.704483582736408,-69.9305015841802 35.701438385689904,-69.887089487837585 35.699609782153907,-69.8435712863692 35.699,-69.8