GDACS_TC_1000818_19
info-gdacs@gdacs.org
2021-08-30T19:00:00-00:00
Actual
Alert
Public
IDA-21
Met
Tropical Cyclone
Past
Extreme
Unknown
Global Disaster Alert and Coordination System

Red alert for tropical cyclone IDA-21. Population affected by Category 1 (120 km/h) wind speeds or higher is 2.652 million.
From 26/08/2021 to 30/08/2021, a Tropical Depression (maximum wind speed of 241 km/h) IDA-21 was active in Atlantic. The cyclone affects these countries: United States, Cuba (vulnerability Low). Estimated population affected by category 1 (120 km/h) wind speeds or higher is 2.652 million.
http://www.gdacs.org/report.aspx?eventtype=TC&eventid=1000818
eventid
1000818
currentepisodeid
19
glide
version
19
fromdate
Thu, 26 Aug 2021 15:00:00 GMT
todate
Mon, 30 Aug 2021 21:00:00 GMT
eventtype
TC
alertlevel
Red
alerttype
realtime_max
link
http://www.gdacs.org/report.aspx?eventtype=TC&amp;eventid=1000818
country
United States, Cuba
eventname
IDA-21
severity
Tropical Depression (maximum wind speed of 241 km/h)
population
Population affected by Category 1 (120 km/h) wind speeds or higher is 2.652 million
vulnerability
Low
sourceid
NOAA
iso3
CUB
hazardcomponents
etrap,SS,calcepisode=scheduled
datemodified
Tue, 31 Aug 2021 21:03:32 GMT
Polygon
17.599000000000004,-80.5 17.599609782153909,-80.4631403665387 17.601438385689907,-80.4263256408629 17.604483582736407,-80.389600676045 17.608741663189708,-80.3530102157977 17.614207439234811,-80.3165988399604 17.620874251665509,-80.2804109101859 17.628733977997708,-80.2444905158922 17.637777042365705,-80.2088814205466 17.647992427188605,-80.1736270083467 17.659367686593306,-80.1387702313632 17.671888961578603,-80.1043535572097 17.685540996899807,-80.070418917302 17.700307159654503,-80.0370076557717 17.716169459548205,-80.0041604790943 17.733108570811808,-79.971917406495 17.751103855747402,-79.9403177211909 17.770133389872406,-79.9093999225311 17.790173988630709,-79.8792016790908 17.811201235639707,-79.8497597827778 17.833189512437908,-79.8211101040077 17.856112029697105,-79.7932875480008 17.879940859861009,-79.7663260122561 17.904646971170507,-79.7402583452515 17.930200263034806,-79.7151163064241 17.956569602703812,-79.6909305274752 17.983722863199006,-79.667730475051 18.011626962455207,-79.6455444148417 18.040247903625811,-79.624399377144 18.069550816502609,-79.6043211239294 18.099500000000006,-79.5853341174565 18.130058965651308,-79.5674614904681 18.161190482064107,-79.5507250180069 18.192856620281106,-79.5351450908867 18.225018799990707,-79.5207406908488 18.257637836531011,-79.5075293674357 18.290673988630708,-79.49552721661 18.324087006827206,-79.4847488611437 18.357836182504702,-79.4752074328026 18.391880397491406,-79.4669145563475 18.426178174155403,-79.4598803353709 18.46068772593901,-79.4541133399875 18.495367008269103,-79.4496205963928 18.530173769782103,-79.4464075783028 18.565065603800807,-79.4444782002852 18.600000000000005,-79.4438348129899 18.634934396199203,-79.4444782002852 18.6698262302179,-79.4464075783028 18.7046329917309,-79.4496205963928 18.739312274061,-79.4541133399875 18.7738218258446,-79.4598803353709 18.808119602508604,-79.4669145563475 18.8421638174953,-79.4752074328026 18.875912993172797,-79.4847488611437 18.909326011369302,-79.49552721661 18.942362163469,-79.5075293674357 18.974981200009296,-79.5207406908488 19.007143379718897,-79.5351450908867 19.038809517935896,-79.5507250180069 20.511579128302895,-80.2837917539952 20.5478733137711,-80.3034713925873 20.583500000000004,-80.3244869823803 20.6184157813601,-80.3468129191152 21.406912298487097,-80.8906319106349 21.44596333323,-80.9177420718508 21.484105526558203,-80.9462926322393 22.752534943476622,-81.932857646142 23.624843797817697,-82.3198973219783 23.678436720650396,-82.34461076698 23.731203072844202,-82.3713410487689 23.783078566726907,-82.4000556006142 23.834000000000003,-82.4307194382576 23.883905332741005,-82.4632952025364 23.932733762989205,-82.4977432048996 23.980425800823795,-82.5340214757628 24.0269233408432,-82.572085815641 24.072169732957096,-82.6118898489996 24.1161098514066,-82.6533850807552 24.158690161925595,-82.6965209553598 24.1998587869649,-82.7412449183947 24.239565568896296,-82.7875024806002 25.126011231365112,-83.843049341194529 25.807566053051296,-84.405977777169127 27.1175,-85.2288751271039 27.172401849867896,-85.2656408577031 27.226118977868804,-85.3045196377598 28.319504192748397,-86.1339075037338 28.376746075089503,-86.1789721087042 28.432554273602005,-86.2262553556522 28.486860794592495,-86.275699637225 28.539599473930409,-86.3272447131817 28.590706057658902,-86.3808277837873 28.640118280278003,-86.4363835663239 28.687775940605707,-86.49384437462821 28.733620975124204,-86.5531402015567 29.436439881690511,-87.510203674576232 29.633934724559065,-87.7044739541417 29.818283819682595,-87.8145626724937 29.884499999999996,-87.8564478126374 29.949394884121809,-87.900944540932613 30.012889407628105,-87.94799864497 30.074906212222395,-87.9975527965718 30.156217797427217,-88.065658036970063 30.233041024498529,-87.997469127086418 30.314128925757021,-87.9305901480272 30.397148966634617,-87.8670852682778 30.482000000000014,-87.807031858752 30.568578647939226,-87.7505030852787 30.656779427706219,-87.697567819460815 30.746494880237016,-87.64829055476558 30.837615701072526,-87.602731327949712 30.930030873528413,-87.560945645913 31.023627803952614,-87.522984418072483 31.118292458903028,-87.488893894336911 31.213909504079318,-87.458715608758 31.310362444840827,-87.432486328928292 31.407533768136627,-87.4102380111848 31.505305085677328,-87.3919977616758 31.603557278172921,-87.3777878033355 31.702170640461723,-87.3676254488092 31.80102502735172,-87.361523079360609 31.899999999999991,-87.3594881297869 31.998974972648302,-87.361523079360609 32.0978293595383,-87.3676254488092 32.7695082311982,-87.4225903674284 32.854004165740406,-87.431365268434988 32.938190635332994,-87.4436351589826 33.0219650717306,-87.4593850900998 33.10522540868719,-87.4785958729215 33.18787020630721,-87.501244102068 33.269798774635305,-87.5273021841609 33.3509112963311,-87.556738371440986 33.4311089482814,-87.589516800448479 33.5102940220007,-87.6255975357167 33.5883700426742,-87.6649366184275 33.6652418866975,-87.70748611996828 33.740815897569696,-87.753194200325908 33.815,-87.802005171244915 33.8877038120867,-87.8538595640762 33.958838755433895,-87.9086942022296 34.0283181630707,-87.9664422781452 34.0960573850413,-88.0270334346878 34.1619738915383,-88.0903938508667 34.225987373452,-88.156446331774518 34.2880198402154,-88.2251104026379 34.347995714822908,-88.29630240686339 34.4058419259101,-88.3699356079603 34.461487996779105,-88.4459202952152 34.5148661312643,-88.5241638929913 34.565911296331095,-88.604571073517192 34.6145613013088,-88.6870438730292 34.6607568736601,-88.7714818111251 34.704441731196191,-88.857782013184 34.745562650647209,-88.945839335703084 34.78406953250699,-89.0355464943992 34.8199154620715,-89.1267941949178 34.853056766597305,-89.2194712659914 34.8834530685098,-89.3134647948846 34.911067334597206,-89.4086602649612 34.9358659211301,-89.5049416952046 34.957818614850694,-89.602191781523 34.9768986697831,-89.700292039666593 34.993082839819692,-89.7991229495818 35.006351407042004,-89.8985641010289 35.016688205744906,-89.9984943402823 35.024080642131395,-90.0987919177387 35.028519709656393,-90.1993346362496 35.03,-90.3 35.028519709656393,-90.400665363750278 35.024080642131395,-90.501208082261286 35.016688205744906,-90.601505659717688 35.006351407042004,-90.701435898971084 34.993082839819692,-90.80087705041818 34.9768986697831,-90.899707960333373 34.957818614850694,-90.997808218476891 34.9358659211301,-91.095058304795373 34.911067334597206,-91.191339735038767 34.8834530685098,-91.286535205115385 34.853056766597305,-91.380528734008593 34.8199154620715,-91.473205805082188 34.78406953250699,-91.564453505600781 34.745562650647209,-91.654160664296882 34.704441731196191,-91.742217986815987 34.6607568736601,-91.828518188874881 34.6145613013088,-91.912956126970769 34.251150555766095,-92.567990531782968 34.19437219604729,-92.663503612419191 34.134798497228708,-92.756624466358289 34.072502040685393,-92.847239640183773 34.0075587250539,-92.935238733264683 33.94004767376039,-93.020514532261174 33.870051138621704,-93.102963141747978 33.797654399633707,-93.18248411079469 33.722945661071009,-93.258980555349666 33.6460159440236,-93.332359276278765 33.566958975501493,-93.402530872913587 33.485871074243,-93.46940985197277 33.402851033365408,-93.532914731722173 33.317999999999991,-93.592968141247951 33.2314213520608,-93.649496914721269 33.1432205722938,-93.702432180539191 33.05350511976301,-93.751709445234368 32.962384298927496,-93.797268672050265 32.869969126471609,-93.839054354086983 32.776372196047291,-93.877015581927466 32.681707541097,-93.911106105663066 32.586090495920708,-93.941284391241979 32.4896375551592,-93.967513671071686 32.392466231863395,-93.989761988815175 32.2946949143227,-94.008002238324167 32.196442721827104,-94.022212196664583 32.0978293595383,-94.03237455119077 31.998974972648302,-94.038476920639368 31.899999999999991,-94.040511870213066 31.80102502735172,-94.038476920639368 31.702170640461723,-94.03237455119077 31.603557278172921,-94.022212196664583 31.505305085677328,-94.008002238324167 31.407533768136627,-93.989761988815175 31.310362444840827,-93.967513671071686 31.213909504079318,-93.941284391241979 31.118292458903028,-93.911106105663066 31.023627803952614,-93.877015581927466 30.930030873528413,-93.839054354086983 30.837615701072526,-93.797268672050265 30.746494880237016,-93.751709445234368 30.656779427706219,-93.702432180539191 30.568578647939226,-93.649496914721269 30.482000000000014,-93.592968141247951 30.397148966634617,-93.532914731722173 30.314128925757021,-93.46940985197277 30.233041024498529,-93.402530872913587 30.153984055976423,-93.332359276278765 30.077054338929017,-93.258980555349666 30.002345600366318,-93.18248411079469 29.929948861378321,-93.102963141747978 29.894288790559347,-93.063541351073965 29.651301791550996,-93.086013976937281 29.575697008347703,-93.090566459111287 29.500000000000011,-93.092084569697292 29.424302991652318,-93.090566459111287 29.348698208449012,-93.086013976937281 29.273277763172512,-93.07843266967339 29.198133544017615,-93.067831773974788 29.123357102640416,-93.05422420539999 29.04903954261632,-93.03762654267517 28.975271408444318,-93.01805900749568 28.902142575232915,-92.995545439888986 28.829742139200714,-92.97011326916919 28.758158309126618,-92.941793480518982 28.687478298880912,-92.91062057723839 28.61778822116861,-92.876632538708179 28.549172982614511,-92.839870774117969 28.481716180317413,-92.800380072015088 28.415500000000009,-92.758208545737091 28.350605115878214,-92.713407574792583 28.287110592371917,-92.666031742263684 28.225093787777613,-92.616138768304666 28.164630260018608,-92.563789439818891 27.464630260018613,-91.950453378362269 27.405793674589916,-91.896083226299083 27.348655714807609,-91.83940298889398 27.29328599447442,-91.780481722285188 27.239751973065506,-91.719391212959991 27.188118873539516,-91.656205890293677 27.138449602874918,-91.591002735868983 27.09080467542702,-91.523861189685874 27.045242139200713,-91.454863053375988 27.00181750512812,-91.38409239053999 26.960583679436709,-91.311635424329182 26.921590899191621,-91.237580432395788 26.884886671089017,-91.162017639340192 26.850515713577121,-91.085039106786084 26.818519902373215,-91.006738621217892 26.78893821944461,-90.927211579715987 26.782996637764942,-90.909548414738211 26.660400526069616,-90.785010472465771 26.609293942341122,-90.73103483369259 26.559881719722021,-90.675072030216285 26.512224059394313,-90.61719024409237 26.46637902487582,-90.557459995361285 25.666379024875809,-89.446859798443285 25.005824401875284,-88.589206048128517 23.882500000000007,-87.850601500394887 23.827598150132111,-87.814261802310881 23.773881022131217,-87.775833540282491 23.721414062043312,-87.735363533227584 23.67026119277741,-87.692901087615979 23.620484736225215,-87.648497937396584 23.572145337331506,-87.6022081809684 23.525301890207711,-87.55408821526909 23.480011466378606,-87.504196667064591 23.436329245249016,-87.452594321521289 23.394308446876707,-87.399344048148279 23.354000267131717,-87.344510724201285 23.315453815322012,-87.288161155638988 22.699921693962551,-86.348560104635311 21.760434431103711,-85.21249751939979 21.722237868877514,-85.164762715737879 21.685598062984006,-85.115608828124692 21.650559653382611,-85.065095743000882 21.617165328978214,-85.013285002779583 21.120557121418393,-84.209780476097791 19.915894473441806,-83.253707367760683 19.878707591915607,-83.223751192659591 19.842521328678206,-83.19242589983088 19.807379771117315,-83.159769654318481 19.77332573380771,-83.125822242727281 19.740400706348211,-83.090625024749187 19.708644802813211,-83.054220882772483 19.678096712879309,-83.016654169636581 19.648793654688607,-82.977970654594685 19.620771329503807,-82.9382174675513 19.162724922566287,-82.282845427391266 17.983722863199006,-81.332269524949 17.956569602703812,-81.3090694725248 17.930200263034806,-81.2848836935759 17.904646971170507,-81.2597416547485 17.879940859861009,-81.2336739877439 17.856112029697105,-81.206712451999181 17.833189512437908,-81.1788898959923 17.811201235639707,-81.1502402172222 17.790173988630709,-81.120798320909188 17.770133389872406,-81.090600077468892 17.751103855747402,-81.0596822788091 17.733108570811808,-81.02808259350499 17.716169459548205,-80.99583952090569 17.700307159654503,-80.962992344228283 17.685540996899807,-80.929581082697979 17.671888961578603,-80.89564644279028 17.659367686593306,-80.8612297686368 17.647992427188605,-80.8263729916533 17.637777042365705,-80.791118579453382 17.628733977997708,-80.7555094841078 17.620874251665509,-80.7195890898141 17.614207439234811,-80.6834011600396 17.608741663189708,-80.6469897842023 17.604483582736407,-80.610399323954979 17.601438385689907,-80.5736743591371 17.599609782153909,-80.53685963346129 17.599000000000004,-80.5