GDACS_WF_1000583_3
info-gdacs@gdacs.org
2021-07-08T22:00:00-00:00
Actual
Alert
Public
1000583
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Russian Federation
On 03/07/2021, a forest fire started in Russian Federation, until 09/07/2021.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1000583
eventid
1000583
currentepisodeid
3
glide
version
0
fromdate
Sat, 03 Jul 2021 00:00:00 GMT
todate
Fri, 09 Jul 2021 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1000583
country
Russian Federation
eventname
severity
Green impact for forestfire in 19815 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
RUS
hazardcomponents
datemodified
Tue, 13 Jul 2021 14:30:30 GMT
Polygon
55.3903070950713,65.931 55.3961753665759,65.9385800429075 55.3920784069596,65.9474077139587 55.3923043211883,65.9565958969659 55.3972341030341,65.9614756788116 55.4072587808904,65.9634753535172 55.4061270950713,65.96978 55.4101116151014,65.9829583848986 55.41343,65.9843329049287 55.4167483848986,65.9829583848986 55.4181229049287,65.97964 55.417168944647,65.9749746827143 55.4197268519786,65.9739157905309 55.4225377139586,65.9758115930404 55.4273886535876,65.9756924449657 55.4288268089319,65.9799569639518 55.4236643211883,65.9842041030341 55.4245545710802,65.9918555194551 55.4216816151014,65.9936816151014 55.4203070950713,65.997 55.4216816151014,66.0003183848986 55.4268403873789,66.0022477005906 55.4262470950713,66.01809 55.427666375361,66.0220047169559 55.4236643211883,66.0262041030341 55.4236179701074,66.0309193298322 55.4196816151014,66.0326816151014 55.4183070950713,66.036 55.4211832255981,66.0403231653581 55.426203064843,66.0409264557399 55.4271777163822,66.0459089829618 55.4253106665461,66.0500240769272 55.4276643211883,66.0567958969659 55.4302653506744,66.0596510375862 55.4287470950713,66.06391 55.4302218577162,66.0677722253562 55.4258416151014,66.0700616151014 55.4244670950713,66.07338 55.4258416151014,66.0766983848986 55.4311058685129,66.0790026281885 55.428000361861,66.0812153321008 55.4232432255981,66.0808168346419 55.4166643211883,66.0882041030341 55.417896070372,66.0940721230319 55.4151543211883,66.0971641030341 55.4145243211883,66.1027058969659 55.4170877139586,66.1052515930404 55.4225724118934,66.104501052017 55.4249609950767,66.1072778229708 55.4203963162433,66.111647376749 55.41724,66.1109170950713 55.413941165474,66.1122771155569 55.4125470950713,66.11561 55.4132643211883,66.1211758969659 55.4188398222971,66.1294234358993 55.4156570950713,66.13799 55.4177602739477,66.1432027222503 55.413566834642,66.146593225598 55.4135543211883,66.1502058969659 55.4180441030341,66.1568256788116 55.4240858969659,66.1568656788116 55.4276534693729,66.1541762491162 55.4302674086673,66.1565319450752 55.4266643211883,66.1602041030341 55.4274494079384,66.166042627543 55.4236643211883,66.1692041030341 55.4256732234556,66.1801872927642 55.4224843211883,66.1838841030341 55.4224843211883,66.1874758969659 55.4256643211883,66.1967958969659 55.4281832255981,66.1993231653581 55.437,66.2016929049287 55.4437529089659,66.2014230591359 55.4474784194258,66.2039450812962 55.4432543211883,66.2089541030341 55.4413770950713,66.21565 55.446950760117,66.223821806417 55.4466643211883,66.2287958969659 55.4491832255981,66.2313231653581 55.4527958969659,66.2313356788116 55.4575843694701,66.2285369952887 55.4596816151014,66.2323183848986 55.463,66.2336929049287 55.4682360470051,66.2308993496122 55.4721998709266,66.2338572503781 55.4742516151014,66.2404883848986 55.47935,66.2424729049287 55.4826683848986,66.2410983848986 55.4855962023463,66.2342521415607 55.4873500396889,66.2334284270646 55.4906841030341,66.2372456788116 55.4952624642915,66.2373290519772 55.5002041030341,66.2423356788116 55.5111429492556,66.2419301323755 55.5150219280085,66.2435727139474 55.5164371155569,66.251478834526 55.5215658969659,66.2525156788116 55.5241056788117,66.2499758969659 55.5241250686911,66.2408374609462 55.5276556788117,66.2357258969659 55.5279731777023,66.2314460840043 55.5313127764172,66.2297052437468 55.5372,66.2322329049287 55.5440358969659,66.2308556788116 55.5469293334539,66.2265440769272 55.5449322225529,66.2224295307159 55.5449656788117,66.2144941030341 55.541445671121,66.211364656829 55.5406392601845,66.2049537445852 55.5473856788117,66.2010958969659 55.5465125668274,66.195668055012 55.5498456788117,66.1915958969659 55.5508429049287,66.18523 55.5496608280555,66.1816702830441 55.5529929049287,66.17449 55.5488877301781,66.1584766918058 55.548798688921,66.1534600111183 55.5511429049287,66.14914 55.5468915205277,66.141811172431 55.5460256788117,66.1269241030341 55.5398879714399,66.1234646693659 55.5411329049287,66.11968 55.5386718375074,66.1150996598065 55.540313165358,66.109003225598 55.5360140769271,66.1061306665461 55.5312991957511,66.1073508072386 55.5303956788117,66.1015241030341 55.525102547163,66.0981230675484 55.5252056788117,66.0933841030341 55.5199867744019,66.0850268346419 55.5148516151014,66.0860316151014 55.5133963877909,66.0926437387976 55.4986016151014,66.0946716151014 55.4975843211883,66.0997858969659 55.5014929137318,66.1034198487027 55.4987443668124,66.1091837351179 55.4897035682234,66.1088657521612 55.4871534001208,66.1063685813132 55.4876493334539,66.1007559230728 55.484343165358,66.091013225598 55.4818158969659,66.0884943211884 55.4771886142768,66.0882523168334 55.4762228844431,66.081651165474 55.4715389037377,66.0802259957674 55.4688053535625,66.0768142814118 55.4735129049287,66.07024 55.4701475909406,66.0646160913225 55.4746583848986,66.0614583848986 55.4760329049287,66.05814 55.4708015081611,66.0504497399772 55.4720487331741,66.0497830843188 55.47634,66.0522029049287 55.480663165358,66.049326774402 55.4800887809038,66.0443064046481 55.4822929049287,66.04008 55.4804549556546,66.0338199131398 55.4838728844431,66.031128834526 55.4853779733002,66.0266791478425 55.4897419964766,66.0222857418899 55.4970773954844,66.0261824136749 55.5006214664113,66.038437845084 55.4990643211883,66.0512758969659 55.5016041030341,66.0538156788116 55.5051722860414,66.0538215930404 55.5080893334539,66.0495040769272 55.5074623751865,66.0390032041655 55.5096050155768,66.0279354098734 55.5135528844431,66.025878834526 55.5145556788117,66.0207841030341 55.5087474880967,66.0165027615101 55.5061983848986,66.0085316151014 55.4974260042188,66.0065062336744 55.5002129049287,66.00104 55.4973158969659,65.9967043211884 55.4867641030341,65.9972943211884 55.4842243211883,65.9998341030341 55.4834599600915,66.004502195247 55.4779345457346,66.0038424547512 55.4789515930404,65.9976477139587 55.475874783674,65.9941836519708 55.4771529049287,65.99072 55.4760079164183,65.9820383890377 55.4772356788117,65.9763341030341 55.474613165358,65.968323225598 55.4685799393132,65.9623968229417 55.4693956788117,65.9523741030341 55.4615253301803,65.9459382352496 55.4616815930404,65.9395077139587 55.4578442313263,65.9362330385334 55.4571256788117,65.9270641030341 55.4519661462778,65.9226389436396 55.4504083848986,65.9183616151014 55.44357,65.9145770950713 55.4350141030341,65.9142843211884 55.4324743211883,65.9168241030341 55.4320808768667,65.9207221125311 55.4260411019586,65.9225036896274 55.4229175157174,65.9179225920415 55.4273756788117,65.9126458969659 55.4265436553656,65.9064783959793 55.4315983848986,65.9045283848986 55.4329693334539,65.9011859230728 55.4309683848986,65.8957416151014 55.4246695728753,65.8938272913922 55.4229383848986,65.8891316151014 55.41962,65.8877570950713 55.4163016151014,65.8891316151014 55.4136226341836,65.8954261238416 55.4051550864033,65.9045251140273 55.4010638595389,65.9080067387181 55.3951171155569,65.909061165474 55.3909770950713,65.92034 55.3944458893818,65.9258079255486 55.3903070950713),65.931 55.4443108657269,(66.0259950307304 55.4460827005094,66.020544247946 55.4505958969659,66.0202956788116 55.4575940050923,66.0202600028632 55.4590808592005,66.0226536325275 55.4563843211883,66.0258341030341 55.4571216444809,66.0310587228495 55.4544443211883,66.0340441030341 55.4543805550963,66.0382476272449 55.4506346992387,66.0430630570307 55.4469415802201,66.0397301196582 55.4476593334539,66.0366059230728 55.4443108657269),66.0259950307304 55.4494995678158,(66.047105003309 55.4504709074772,66.0446939325159 55.4519367703736,66.0449113727363 55.4534031670984,66.0473907968869 55.4511702830441,66.048882762313 55.4494995678158),66.047105003309 55.4520961879092,(66.1234349594503 55.4532864629579,66.1225521913103 55.4581241030341,66.1279056788116 55.4630431119025,66.1278738659073 55.4654540704326,66.1329584928534 55.4668864030781,66.1399494920107 55.4646643211883,66.1432041030341 55.4639592547416,66.1487461580545 55.458690144486,66.1466963363879 55.456389494626,66.1438469150056 55.4565204706413,66.138750399621 55.4593129049287,66.13423 55.4579383848986,66.1309116151014 55.4523624445065,66.1290323588584 55.4520961879092),66.1234349594503 55.452347272804,(66.0729758722674 55.4534265525418,66.0683583119899 55.4550637147127,66.0681576190051 55.4605923259377,66.0702495596017 55.4558705404695,66.0744298121049 55.452347272804),66.0729758722674 55.4624201753566,(66.0693063027905 55.4630718238086,66.0638124472956 55.4647447852218,66.0635488001299 55.4667624090594,66.0658839086775 55.4624201753566),66.0693063027905 55.4644482448649,(66.1219054706153 55.4659722678682,66.1214740360125 55.4666837666748,66.122883632236 55.4650785979493,66.1236270031719 55.4644482448649),66.1219054706153 55.4641662801214,(66.0059844406512 55.4676375307324,66.0025747265419 55.4691319947346,66.0042077299183 55.4672222877061,66.007364311568 55.4644811643683,66.0073866838812 55.4641662801214),66.0059844406512 55.4653630374062,(66.036136136327 55.4677083848986,66.0336383848986 55.4699978272658,66.0328625861437 55.4696984029509,66.037768172543 55.4653630374062),66.036136136327 55.4685247614022,(66.0452360569156 55.4704633166327,66.0395024564546 55.4725016151015,66.0402283848986 55.4738273741516,66.0433787897071 55.4704712668259,66.0477869156812 55.4685247614022),66.0452360569156 55.46823910091,(66.0217921890526 55.4695007923965,66.0200144004269 55.4708572271154,66.0205509252047 55.4718127849925,66.0225147169559 55.4698456867133,66.0248391862402 55.46823910091),66.0217921890526 55.4746301373076,(66.1123588188827 55.4757425976555,66.1113648323749 55.4766442019121,66.1125588541602 55.4746301373076),66.1123588188827 55.5181298114646,(66.1700816433705 55.5188591433214,66.1673916607686 55.5237874829656,66.1631037851282 55.5267228666764,66.1664933594755 55.526643834899,66.1704572833487 55.5248633773307,66.1758953774721 55.5220455397574,66.1764322087123 55.5181298114646,66.1700816433705