GDACS_WF_1001100_2
info-gdacs@gdacs.org
2021-07-25T22:00:00-00:00
Actual
Alert
Public
1001100
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Canada
On 10/07/2021, a forest fire started in Canada, until 26/07/2021.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1001100
eventid
1001100
currentepisodeid
2
glide
version
0
fromdate
Sat, 10 Jul 2021 00:00:00 GMT
todate
Mon, 26 Jul 2021 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1001100
country
Canada
eventname
severity
Green impact for forestfire in 9148 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
CAN
hazardcomponents
datemodified
Tue, 27 Jul 2021 15:33:07 GMT
Polygon
51.7881443211883,-90.6291358969659 51.7881443211883,-90.6253041030341 51.7901640566045,-90.6218179286969 51.7888370950713,-90.61816 51.790136834642,-90.610793225598 51.793371065303,-90.6078338485898 51.7948716151014,-90.6036416151014 51.7995800357686,-90.6016227189044 51.7980006665461,-90.5922959230728 51.8027269581973,-90.5819416292553 51.7989016151014,-90.5797683848986 51.7975306665461,-90.5764259230728 51.7989016151014,-90.5731316151014 51.8036697706775,-90.5712235758742 51.8044210473222,-90.5665708316702 51.8022884069596,-90.5638422860413 51.8024284069596,-90.5574177139585 51.8047153223552,-90.5542598431597 51.8059143211883,-90.5468141030341 51.8107149383222,-90.5427702773536 51.8047370950713,-90.52135 51.8050684069596,-90.5115377139587 51.8074683246082,-90.5086617269921 51.8068822334867,-90.5034159511217 51.8046213189525,-90.4962603198721 51.8016284069596,-90.4932322860413 51.7982043211883,-90.4678241030341 51.8007905680556,-90.4651098257625 51.8020616151014,-90.4601016151014 51.8079841030341,-90.4560043211884 51.8115967744019,-90.4560168346419 51.8141156788117,-90.4585441030341 51.8137326210902,-90.4632385269542 51.8162156788117,-90.4660941030341 51.8163761162578,-90.4700489553989 51.8212856788117,-90.4734341030341 51.8224327961123,-90.4799512366236 51.8283356788117,-90.4832041030341 51.8283356788117,-90.4867958969659 51.8241214931945,-90.4921359531275 51.8248285583691,-90.4997914818101 51.8285060148677,-90.4988212665064 51.8316041030341,-90.4946443211884 51.8365074465945,-90.4931921982501 51.8343070950713,-90.488 51.8364268010583,-90.4837078135243 51.8347570950713,-90.47717 51.8379388160127,-90.4706960236557 51.8315643211883,-90.4617458969659 51.8334335898972,-90.4530013534378 51.8285184069596,-90.4495122860413 51.8273870950713,-90.43995 51.8294215506024,-90.4348375779744 51.8241616151014,-90.4329283848986 51.8215670950713,-90.42489 51.824275979084,-90.4204254268877 51.8243043211883,-90.4163041030341 51.8275391347625,-90.4128812885283 51.8235771155569,-90.410468834526 51.8208706665461,-90.4037440769272 51.8241083246082,-90.397061726992 51.8232243211883,-90.3876541030341 51.82756,-90.3847570950713 51.8339758969659,-90.3853543211884 51.8365156788117,-90.3878941030341 51.8365156788117,-90.3914858969659 51.8304140209161,-90.3993845731123 51.8313950732692,-90.4055124413567 51.8355935686007,-90.4050041705452 51.8355343211883,-90.4000441030341 51.8380741030341,-90.3975043211884 51.8458358969659,-90.3982243211884 51.8483756788117,-90.4007641030341 51.8485174732093,-90.4052127142723 51.8524056788117,-90.4083041030341 51.8526982946166,-90.4119322609948 51.8550383218876,-90.4120962111448 51.85651046489,-90.410031787888 51.8541070950713,-90.40549 51.8560331491542,-90.4013619439677 51.8548170950713,-90.39787 51.8581228209289,-90.3930247048216 51.8580343211883,-90.3885741030341 51.8605741030341,-90.3860343211884 51.8651884527129,-90.3856763990865 51.8643870950713,-90.38198 51.8657616151014,-90.3786616151014 51.8708758969659,-90.3776443211884 51.8737729049287,-90.38198 51.8712693307294,-90.3863272291851 51.8724729049287,-90.39005 51.8703066188384,-90.3943385739278 51.8725729049287,-90.39889 51.8704583848986,-90.4031183848986 51.8672156760986,-90.4048518391155 51.8663237325964,-90.4118663536525 51.8726683848986,-90.4137716151014 51.8736236619687,-90.4199323221966 51.8780483848986,-90.4218116151014 51.8794193334539,-90.4251059230728 51.877334116882,-90.4294615910681 51.8791656788117,-90.4320641030341 51.8791656788117,-90.4356558969659 51.8766258969659,-90.4381956788116 51.8724830482283,-90.4390346435441 51.8758429049287,-90.44717 51.8710243544786,-90.4561082501749 51.8752756788117,-90.4620841030341 51.8776229049287,-90.47473 51.8755383848986,-90.4791683848986 51.8686824268998,-90.4837776914495 51.8657998543271,-90.4917432299071 51.866843165358,-90.497346774402 51.8643158969659,-90.4998656788116 51.8606434999746,-90.500633517532 51.8613315930404,-90.5068822860413 51.8543550525283,-90.5195328616917 51.8543136278506,-90.5268992187831 51.8620502873883,-90.5284869614204 51.8662777255216,-90.5251287485113 51.8633106665461,-90.5200240769272 51.8646816151014,-90.5166816151014 51.868,-90.5153070950713 51.871298834526,-90.5166671155569 51.8726929049287,-90.52 51.8714382811894,-90.523987428264 51.8759058969659,-90.5250943211884 51.8784456788117,-90.5276341030341 51.8769955113539,-90.5338926255182 51.8849656788117,-90.5451941030341 51.8849656788117,-90.5487858969659 51.8794422860415,-90.5521415930403 51.873812599358,-90.5513954082355 51.8722083848985,-90.5539883848986 51.8671142864713,-90.5557929226564 51.8653783848986,-90.5591683848986 51.8620840769271,-90.560539333454 51.857736834642,-90.557666774402 51.8567487943015,-90.551888774834 51.8538188380051,-90.5514978666636 51.8506822860414,-90.5551315930404 51.8413359953129,-90.5553463545598 51.8381556788117,-90.5674958969659 51.83382,-90.5703929049287 51.8255216151014,-90.5684183848986 51.8241470950713,-90.5651 51.8251186886412,-90.5560350852855 51.8198224073494,-90.555098225867 51.8187360922893,-90.5596277549173 51.8214129049287,-90.56417 51.8193481279474,-90.5686934765744 51.8236929049287,-90.579 51.8214998602207,-90.5854861682427 51.8224672218287,-90.5933751937096 51.8261001697119,-90.5948384547028 51.8306944130496,-90.5934662372033 51.8316743211883,-90.5794841030341 51.8342141030341,-90.5769443211884 51.8378058969659,-90.5769443211884 51.8403456788117,-90.5794841030341 51.840323058591,-90.5850855635369 51.845728834526,-90.5866571155569 51.8471229049287,-90.58999 51.8463056788117,-90.5957858969659 51.844060292793,-90.5987469670157 51.8406048088551,-90.5989515284633 51.8401921814387,-90.602732258251 51.8417084959873,-90.6030338719675 51.844329707207,-90.5993530329843 51.8526358969659,-90.6002943211884 51.8551756788117,-90.6028341030341 51.8561656788117,-90.6106058969659 51.8526922860414,-90.6163215930404 51.8383728903373,-90.6148365452972 51.834288451018,-90.6158743495845 51.8330556788117,-90.6214758969659 51.8304922860414,-90.6240215930404 51.8246460953632,-90.6225278941362 51.8196741030341,-90.6231756788116 51.8163021320011,-90.6201519662778 51.8132858969659,-90.6225656788116 51.8087216377202,-90.6224518458019 51.8041688596961,-90.6261359998303 51.8033683848986,-90.6325283848986 51.79739,-90.6354629049287 51.7881443211883),-90.6291358969659 51.8160926723946,(-90.6146075051838 51.8161715758586,-90.6163316977647 51.8177101522521,-90.6161801612165 51.8179369042842,-90.6143216865183 51.8160926723946),-90.6146075051838 51.8397651120166,(-90.6041140481636 51.8405525784611,-90.6052988296255 51.8417284540629,-90.6045131346667 51.8409409876189,-90.6033283532054 51.8397651120166),-90.6041140481636 51.8204247478427,(-90.5132882146264 51.8220162503838,-90.5153483996097 51.82879,-90.5144370950713 51.833724105255,-90.5120560513594 51.8285016151014,-90.5102383848986 51.823617288586,-90.5011502088901 51.8222656788117,-90.5102458969659 51.8204247478427),-90.5132882146264 51.8384679722404,(-90.4079957929719 51.839921131233,-90.408383930618 51.8403693106859,-90.4069934021085 51.8388280451159,-90.4065583014746 51.8384679722404),-90.4079957929719 51.8447031361872,(-90.4507059780469 51.8466555108465,-90.4503920089198 51.8483109401384,-90.4464547251102 51.8474702263767,-90.4434492968114 51.844780160533,-90.4470141700191 51.8447031361872),-90.4507059780469 51.8506651108711,(-90.5418048712557 51.8526872604398,-90.542528257525 51.8525666051488,-90.5395428248461 51.8506651108711,-90.5418048712557