GDACS_WF_1001625_1
info-gdacs@gdacs.org
2021-08-05T22:00:00-00:00
Actual
Alert
Public
1001625
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Russian Federation
On 05/08/2021, a forest fire started in Russian Federation, until 06/08/2021.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1001625
eventid
1001625
currentepisodeid
1
glide
version
0
fromdate
Thu, 05 Aug 2021 00:00:00 GMT
todate
Fri, 06 Aug 2021 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1001625
country
Russian Federation
eventname
severity
Green impact for forestfire in 14341 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
RUS
hazardcomponents
datemodified
Sun, 08 Aug 2021 05:13:23 GMT
Polygon
62.9370112852139,115.86867 62.9387555448146,115.873805159301 62.9427651913784,115.876840875108 62.9432675513911,115.879862666764 62.946223848723,115.882860669584 62.9458357374479,115.887881793932 62.95014310562,115.891313347496 62.9478693089227,115.896065923073 62.9482229635649,115.901477690898 62.9533025272565,115.90655725459 62.9577707724712,115.907013545828 62.9562198232192,115.914316389075 62.9600467170617,115.917927975587 62.9581233156659,115.92196163136 62.9541571376179,115.923660494534 62.9514225971022,115.930277713959 62.9534398942251,115.934379284862 62.9531457579335,115.938940628458 62.9565972328749,115.942292385574 62.9569071722494,115.94802750767 62.9547012852139,115.95227 62.9572129452972,115.956720332985 62.9562735513116,115.96244600815 62.9492043956768,115.963710345759 62.9476492876688,115.967687057337 62.9441329635649,115.970702309102 62.9434185113309,115.977885896966 62.9470941614688,115.985743663954 62.9459429635649,115.991587690898 62.9504376654329,115.99468938033 62.9520384941062,115.998191728613 62.9553373286322,115.999551749099 62.963833031674,115.999067697373 62.9668753216251,116.00183019215 62.9714635315727,116.001518104336 62.9788698696568,116.003842642172 62.9805035703857,116.018462118986 62.9780012852139,116.02307 62.979375805244,116.026388384899 62.9820528911444,116.028009329725 62.9820803228468,116.031371263615 62.9771157374479,116.035118206068 62.9782236702165,116.040778858685 62.9764785113309,116.046175896966 62.9792275513911,116.052812666764 62.9851240471627,116.053935968336 62.9861270545857,116.056985543581 62.9849126425102,116.0625916109 62.980683031361,116.064425718135 62.9793085113309,116.067744103034 62.980683031361,116.071062487933 62.9853538231552,116.073755260885 62.9791963846816,116.076321859362 62.9752856542805,116.08215594918 62.9771239575485,116.090416544087 62.9732912852139,116.0957 62.9767495446168,116.102410984293 62.9747970493362,116.118634079973 62.9773604421065,116.121179776047 62.9828945701198,116.120604136089 62.9844771155569,116.125954644384 62.98781,116.127348714787 62.9911428844431,116.125954644384 62.9927254298802,116.120604136089 62.9982595578935,116.121179776047 63.0008104372101,116.118654957409 62.9995775215507,116.112666039198 63.0028914886691,116.107695896966 62.999838002301,116.102538916034 63.0034667761432,116.097406805882 63.0012809618265,116.09100325633 63.0065901767808,116.087348183007 63.0062375610944,116.082430958446 63.0092274028978,116.077712286041 63.0078528828677,116.074393901142 63.004144397787,116.072641936302 63.0029026311743,116.068937509973 63.0063298699675,116.064218877477 63.0099296747259,116.062666769798 63.0118129872413,116.05866657821 63.0181601700425,116.063327835023 63.0212659200268,116.067842950664 63.0316059957179,116.068044795082 63.0304975513911,116.077582666764 63.0364834009896,116.081719931319 63.0379968836095,116.084866948154 63.0424915631783,116.086638116864 63.0417929635649,116.092567690898 63.0493689583117,116.098591314562 63.0467529635649,116.101925896966 63.0467529635649,116.105517690898 63.0542042720433,116.11136887302 63.0532529635649,116.117497690898 63.0580166448713,116.121020010787 63.0552785113309,116.129204103034 63.0586976092092,116.134170387846 63.0580130518466,116.139413116391 63.0611824231181,116.142776092765 63.0599870493362,116.159364079973 63.0694122261747,116.166300279013 63.0650729635649,116.170265896966 63.0650670493362,116.173834079973 63.0706468018526,116.179023389774 63.0701929635649,116.184407690898 63.0743425034847,116.187500327792 63.0755763881555,116.190917577145 63.0709293767188,116.193247538174 63.0699120828057,116.198361820039 63.0724518646515,116.200901601885 63.078418631408,116.201785616995 63.0739020828057,116.211379973893 63.0777089796277,116.218215973092 63.0766357374479,116.233591793932 63.0811782660485,116.236762601135 63.081470257478,116.240810178831 63.0865289437336,116.245877229069 63.0979186360121,116.244848436824 63.0964688726143,116.250005434551 63.0993623091023,116.254317036436 63.1029749804701,116.254304522982 63.1069918422832,116.249378466985 63.1135743910721,116.25759895473 63.1272143735234,116.261140694141 63.130010026107,116.263757917195 63.1419101788304,116.260989742523 63.1444499606762,116.258449960677 63.1441875660071,116.253185861811 63.1475872545893,116.252607472744 63.1501270364351,116.250067690898 63.1504806910773,116.244655923073 63.1486309166202,116.240186670098 63.1528170364351,116.235277690898 63.1526942566431,116.228309562853 63.1556442625521,116.225171793932 63.1558209959146,116.221298866671 63.1600570364351,116.218047690898 63.1588568717431,116.212368650965 63.1617306910773,116.206785870859 63.1606439927455,116.20306671738 63.1657888648925,116.198110469048 63.1653207140657,116.189906238394 63.1673451433113,116.179795923073 63.1659706232812,116.176477538174 63.1629331564121,116.174762903074 63.1632531409702,116.171595494832 63.1648107248325,116.169052841414 63.1700941030341,116.169668864892 63.1728421574859,116.167405884277 63.1787765679059,116.168645656751 63.1813163497517,116.166105874905 63.1817266579535,116.162696679489 63.1847042420665,116.161140628458 63.1860642625521,116.157841793932 63.1851163223044,116.151040693267 63.1874810729087,116.14670696137 63.1840199925929,116.141292268366 63.1883845229814,116.13775498047 63.1883970364351,116.134142309102 63.1858336436648,116.131596613028 63.180232929763,116.132105617217 63.1797256788117,116.128348293176 63.1771858969659,116.12580851133 63.169407052939,116.127095092856 63.166459742522,116.120759821169 63.1613833519096,116.11941829616 63.1580617939318,116.114305737447 63.1508782060682,116.114305737447 63.1478500212598,116.117793443774 63.1434916371624,116.119260944161 63.1407425971022,116.125897713959 63.1439080830519,116.133578239528 63.1384829635649,116.140422309102 63.1387637790242,116.145034262268 63.1365011351075,116.147739530952 63.1371897870794,116.156096173734 63.1347312852139,116.16058 63.1362509529615,116.164315669258 63.1346357374479,116.168408206068 63.1360036638022,116.172127442952 63.1322785113309,116.178204103034 63.1340527639073,116.184461350649 63.1306141901426,116.192 63.1319887101727,116.195318384899 63.1368125189169,116.197804447034 63.1310339468209,116.207366341719 63.1318472106258,116.213128881414 63.1261225817336,116.214731218591 63.1247285113309,116.218064103034 63.1264727709316,116.223199262335 63.1302962626355,116.227096747884 63.1291875115981,116.228475663235 63.1251690756275,116.228504665013 63.1214053096049,116.2316530598 63.1181717939318,116.229028642376 63.1148344225137,116.228604047493 63.1113926667631,116.22008755139 63.104422094515,116.216926503867 63.105443831423,116.210603637032 63.1017029728311,116.204753204109 63.1032942793428,116.198618197146 63.100717272612,116.195910093936 63.0995114476979,116.190666433982 63.0951375763857,116.186537594566 63.0965642625521,116.182611793932 63.0958708846628,116.176236379235 63.0986287147861,116.17164 63.0954852243435,116.164253869363 63.0969242625521,116.160428206068 63.0946486538426,116.156066585101 63.0959079171943,116.152509973893 63.0951970364351,116.145302309102 63.090759218473,116.142198884687 63.0899971803182,116.139352354425 63.093194194756,116.137118384899 63.0945687147861,116.1338 63.0910822738458,116.128600781775 63.0928974028978,116.124402286041 63.0908486964132,116.118520917181 63.0925370364351,116.112422309102 63.0899972545893,116.109882527256 63.0849884198521,116.109625237475 63.0805272832991,116.100407280069 63.0821506910773,116.094144129141 63.0767174727435,116.08729274541 63.0710274688528,116.087490598306 63.0729006910773,116.080432282995 63.0664152325249,116.072701174253 63.0662358938651,116.069537216109 63.0701251546958,116.067675154697 63.0738914886691,116.059515896966 63.0735342625521,116.054128206068 63.0711201346461,116.049653252029 63.0723070364351,116.043882309102 63.0697672545893,116.041342527256 63.065015817029,116.040452448424 63.0662911757879,116.036448549887 63.0698756567507,116.033381995824 63.071246605306,116.02649589392 63.0676375181921,116.021254567489 63.0707706910773,116.016165870859 63.0694211826235,116.01255 63.0704170364351,116.007162309102 63.0666731566852,116.004083168232 63.0652951546958,115.999274845303 63.0563905748772,115.996677051643 63.0515045720828,115.990823908991 63.0428457181355,115.99185303136 63.0397092282545,115.996522686898 63.0353071682833,115.99929454503 63.0312387053834,115.998433867978 63.0298382884677,115.994601924236 63.0320214886691,115.984724103034 63.0259769137312,115.981046269354 63.0295042625521,115.97434 63.0295042625521,115.970748206068 63.0240674727435,115.96387274541 63.013834681668,115.96466084375 63.0143447411356,115.95732164982 63.0060132154225,115.951379747037 63.0030147723144,115.942790149723 63.0045479171943,115.934920026107 63.0013598517874,115.930163345147 63.0009870364351,115.923762309102 62.9933676908977,115.916142963564 62.9857317792773,115.916394617352 62.984383727255,115.915095213003 62.9867179171943,115.910180026107 62.9849772290683,115.905068943733 62.9812289345119,115.90193317502 62.9810414886691,115.898114103034 62.9782126751938,115.892716664128 62.9785070364351,115.884432309102 62.970561558214,115.878152051329 62.9697101416024,115.87346105788 62.9726442625521,115.870251793932 62.9726442625521,115.863068206068 62.9682196284738,115.859853654743 62.9655351546958,115.851384845303 62.95558,115.847261285213 62.9522616151014,115.848635805243 62.950346078174,115.852703955691 62.9439948453042,115.853504845303 62.9370112852139),115.86867 62.9654509111451,(115.931682622373 62.9747625912146,115.924237562982 62.9767935821284,115.924831014065 62.9789437080214,115.928771361306 62.9721916151014,115.932101615101 62.9703679870047,115.93680618392 62.9656730082915,115.935728106542 62.9654509111451),115.931682622373 62.9686741897016,(115.964076167247 62.9743283848986,115.961208384899 62.9759718765975,115.958355837719 62.9774205905912,115.958965505414 62.978225693811,115.960835460283 62.9753070950713,115.96546 62.9815069713622,115.973318645556 62.9801269544247,115.977415330019 62.9768479180594,115.976655772509 62.976393165358,115.973293225598 62.9712327908212,115.968843247304 62.9686741897016),115.964076167247 62.9712025155473,(115.944106336226 62.9714528946505,115.942531668934 62.972918757547,115.942749109155 62.9730137292267,115.944514770573 62.9712025155473),115.944106336226 62.9714787911871,(115.952659715198 62.9736677237531,115.948682792589 62.9752815865492,115.949204979674 62.9791435028324,115.952648751987 62.9764335414384,115.956832480831 62.9714787911871),115.952659715198 62.9877981340072,(115.993318853904 62.989310644576,115.992777668969 62.9922962833606,115.994030120077 62.9905595681467,115.996918485943 62.9880711430297,115.996302185859 62.9877981340072),115.993318853904 62.988862530866,(116.110734815283 62.9889339962142,116.108961321153 62.9904725726077,116.109112857701 62.9904207247537,116.110638610705 62.988862530866),116.110734815283 62.9919003240019,(115.983422009218 62.994076615052,115.979458366406 62.9956904778481,115.979980553492 62.9992106918055,115.983677293435 62.9968457588406,115.987601333197 62.9919003240019),115.983422009218 63.0055944378107,(116.033990008669 63.0089370364351,116.030067690898 63.0091179023521,116.024802781256 63.011614696186,116.026214896506 63.0154900128811,116.027888700372 63.016036856703,116.030977445342 63.0197638983933,116.03445983669 63.0155893089227,116.039552282995 63.0167142840462,116.045238441299 63.0143025817336,116.049701218591 63.015939413287,116.053769777801 63.0135950888489,116.056007389995 63.0116254894644,116.053121129948 63.0115970364351,116.049022309102 63.009190252954,116.04621769784 63.0101406910773,116.040674129141 63.0059999637345,116.037516050376 63.0055944378107),116.033990008669 63.0137008925025,(115.98805394429 63.0149142226738,115.987340409523 63.0173982407632,115.987668204119 63.016870533119,115.992500204436 63.0141351232119,115.990527085538 63.0137008925025),115.98805394429 63.0263078608125,(116.015796973281 63.0273567063693,116.014412925038 63.0318438925434,116.014581591342 63.0342909107017,116.015866032121 63.0312526439484,116.019854994262 63.0263078608125),116.015796973281 63.0361395908246,(116.015368431546 63.0379477923079,116.011882571867 63.0394863687014,116.012034108415 63.0401135765527,116.015034670132 63.0361395908246),116.015368431546 63.0468023316282,(116.021757200676 63.0486075379775,116.019008346625 63.0500734008739,116.019225786846 63.0531247240305,116.025811305683 63.0508705143977,116.027223206627 63.0468023316282),116.021757200676 63.04825889857,(116.044886180688 63.0509259183671,116.044743723244 63.0547317796765,116.048556431806 63.052247605791,116.056249261832 63.049195163485,116.054469572146 63.0506922383826,116.049655923073 63.04825889857),116.044886180688 63.0757483010561,(116.121171744561 63.0802594065239,116.118903783736 63.0788433948321,116.124051238501 63.0768281651481,116.124904038276 63.0757483010561),116.121171744561 63.0815591877689,(116.171549876125 63.0840972672143,116.170237125694 63.0843703183956,116.172188691102 63.0821084183871,116.173345985078 63.0815591877689),116.171549876125 63.0846357469582,(116.197091603502 63.0867646710825,116.195992395379 63.0864554059002,116.19882039617 63.0846357469582),116.197091603502 63.0855864118033,(116.206973854148 63.0874074238032,116.204307310343 63.0888596058205,116.205384321929 63.0903820556157,116.209481864275 63.0894865206269,116.210634043567 63.0855864118033),116.206973854148 63.0873964628092,(116.200154318368 63.0889511002013,116.199366032222 63.0899435115868,116.202504423445 63.0886114789184,116.203759039378 63.0873964628092),116.200154318368 63.1312707035687,(116.242471114108 63.1336479293999,116.239100330044 63.1358610990442,116.23870777933 63.138216783849,116.24237832254 63.1374306069114,116.244130898128 63.1312707035687),116.242471114108 63.1498794795766,(116.160228850159 63.1506877113309,116.157622970967 63.15302,116.157712904929 63.1542674301031,116.158385647126 63.1537774591792,116.160290638902 63.1498794795766),116.160228850159 63.1619364335828,(116.152124879821 63.1637486884755,116.15176439991 63.1651748084999,116.154175720289 63.1626477016503,116.156430788129 63.1619364335828,116.152124879821