GDACS_WF_1016576_7
info-gdacs@gdacs.org
2023-08-23T22:00:00-00:00
Actual
Alert
Public
1016576
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in United States
On 16/08/2023, a forest fire started in United States, until 24/08/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1016576
eventid
1016576
currentepisodeid
7
glide
version
0
fromdate
Wed, 16 Aug 2023 00:00:00 GMT
todate
Thu, 24 Aug 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1016576
country
United States
eventname
severity
Green impact for forestfire in 25005 ha
population
n.a. people affected in the area
vulnerability
sourceid
GWIS
iso3
USA
hazardcomponents
datemodified
Tue, 05 Sep 2023 13:00:18 GMT
Polygon
41.81151,-123.959102904929 41.818198834526,-123.956822884443 41.8197591624684,-123.951610180246 41.8262267744019,-123.950313165358 41.8293227846492,-123.944811216261 41.834933165358,-123.941736774402 41.8380429049287,-123.9342 41.8370233358381,-123.926462385962 41.8427715930404,-123.923032286041 41.8427092214498,-123.91065560471 41.8487254234393,-123.911000350836 41.8475706665461,-123.915354076927 41.8504432255981,-123.919653165358 41.8555928844431,-123.918628834526 41.8565956788117,-123.913534103034 41.8514443022632,-123.909465466429 41.8600756788117,-123.900845896966 41.8586128357173,-123.894677284564 41.8604629049287,-123.8906 41.8594712521137,-123.885856489667 41.8623293334539,-123.881294076927 41.8616459865611,-123.875314965443 41.8699056788117,-123.863585896966 41.8714657022592,-123.85626427668 41.8765358969659,-123.855605678812 41.8858061094124,-123.848970137976 41.8897232632572,-123.848643900853 41.8914471155569,-123.854568834526 41.89478,-123.855962904929 41.9013683848986,-123.853638384899 41.9032148524477,-123.849048637761 41.9102220354388,-123.848008554962 41.9145204820586,-123.850642795495 41.9171102736303,-123.858551461043 41.914977102854,-123.862997983281 41.9091916151014,-123.864181615101 41.906904421742,-123.871782500342 41.9033316151014,-123.873581615101 41.9010694267693,-123.879037217405 41.8963548207874,-123.879532838996 41.88566,-123.875967095071 41.8823416151014,-123.877341615101 41.879668932452,-123.887184476139 41.8743016151014,-123.888691615101 41.8698284157205,-123.896156908214 41.8663716151014,-123.897791615101 41.8647637985373,-123.901655037648 41.8602743211883,-123.904914103034 41.8589943211883,-123.914815896966 41.8644915846854,-123.92296526086 41.8656743211883,-123.929635896966 41.8683642819158,-123.932500261641 41.8711743211883,-123.942565896966 41.875481880644,-123.946807282625 41.8753443211883,-123.953405896966 41.8778841030341,-123.955945678812 41.8829983848986,-123.954928384899 41.8843729049287,-123.95161 41.8836577086875,-123.947773591456 41.885534647438,-123.946281105311 41.88915,-123.947412904929 41.892707711659,-123.946152906279 41.90044,-123.948172904929 41.9082158969659,-123.946955678812 41.9111396370959,-123.944251982904 41.91417,-123.944992904929 41.9174883848986,-123.943618384899 41.9188629049287,-123.9403 41.9185093334539,-123.931205923073 41.9144346355668,-123.923959789999 41.9232083848986,-123.921818384899 41.9266856788117,-123.917435896966 41.9267572023011,-123.910706526384 41.9333130796666,-123.910943486539 41.9322406665461,-123.915534076927 41.9355725456487,-123.92071802935 41.9347770950713,-123.92383 41.9361516151014,-123.927148384899 41.9504858969659,-123.929745678812 41.9535754353165,-123.92561171632 41.9591358969659,-123.924085678812 41.9628160384255,-123.920518678549 41.9742383848986,-123.918908384899 41.9756129049287,-123.91559 41.9736046986561,-123.908434244584 41.9793456788117,-123.904895896966 41.9833039954501,-123.890526664446 41.9894,-123.893382904929 42.0038222860414,-123.89056159304 42.0070755411526,-123.885285918331 42.0116983848986,-123.883778384899 42.0130233601303,-123.879041289536 42.0167329049287,-123.87417 42.011586343053,-123.866637538877 42.0134029049287,-123.86096 42.0120262927024,-123.852920104031 42.0157129049287,-123.84786 42.0128583848986,-123.841961615101 42.0038617151889,-123.837971169941 42.0062656788117,-123.834435896966 42.006253165358,-123.830823225598 42.0019540769271,-123.827950666546 41.9986116151014,-123.829321615101 41.9972406665461,-123.832664076927 42.0002982848111,-123.838171623533 41.9940789598692,-123.84666509401 41.988740722533,-123.847933036462 41.9902339283894,-123.84106653208 41.9943129049287,-123.83527 41.990663165358,-123.821963225598 41.9871958969659,-123.819054321188 41.9811100555708,-123.819779156029 41.9738558969659,-123.815264321188 41.9682807877704,-123.814653183391 41.9719816773518,-123.80907432702 41.9771645868668,-123.811929013284 41.9805283848986,-123.810558384899 41.9815456788117,-123.805444103034 41.9774658963315,-123.801227557771 41.983200105115,-123.796338494431 41.9938583848986,-123.792518384899 41.9974504901016,-123.784160244266 42.0023256788117,-123.780905896966 42.0013083848986,-123.775791615101 41.9951499622646,-123.774783872428 41.9904483848986,-123.768071615101 41.98375,-123.766187095071 41.974231165474,-123.768517115557 41.9713534619206,-123.774777792743 41.9664258969659,-123.769294321188 41.9584341030341,-123.769674321188 41.9505135635942,-123.779082728397 41.947508834526,-123.766737115557 41.94054,-123.764057095071 41.9369323378227,-123.765183756138 41.9304358969659,-123.759844321188 41.9198477139586,-123.75692840696 41.9172843211883,-123.759474103034 41.9162610469983,-123.76410400522 41.9116041030341,-123.764314321188 41.9084431408693,-123.768096827273 41.902691165474,-123.769257115557 41.8998111376551,-123.775828029622 41.8956165554938,-123.778750971494 41.89017,-123.775817095071 41.8828316151014,-123.776911615101 41.8819131346444,-123.78297588393 41.8750328022515,-123.795300030449 41.8700941030341,-123.795544321188 41.8675543211883,-123.798084103034 41.8675543211883,-123.801675896966 41.872575444531,-123.804880259711 41.8731585534716,-123.80764007997 41.8616297457132,-123.810587604031 41.8586488861351,-123.802656544133 41.8593727736786,-123.800481872626 41.8631328844431,-123.798628834526 41.8645675226997,-123.792989476018 41.8723858969659,-123.792065678812 41.8752793334539,-123.787754076927 41.8739083848986,-123.784411615101 41.8695404020165,-123.782871885992 41.8676368244062,-123.779574920547 41.8691829049287,-123.7751 41.8678083848986,-123.771781615101 41.8572540769271,-123.765970666546 41.8518810108224,-123.768929680294 41.8500183848986,-123.765441615101 41.8467,-123.764067095071 41.8433671155569,-123.765461165474 41.8418142363839,-123.77096081615 41.8300216151014,-123.775511615101 41.8286470950713,-123.77883 41.8311684069596,-123.791052286041 41.8342868760402,-123.795937739192 41.8314270950713,-123.80315 41.8345951180465,-123.808376420469 41.8313070950713,-123.81401 41.8352869082784,-123.82080448019 41.8320977868259,-123.830794551444 41.8278516151014,-123.832981615101 41.8251852947494,-123.837706722135 41.8163841030341,-123.839074321188 41.8100616151014,-123.844241615101 41.8083170950713,-123.84927 41.8098523110672,-123.855319010496 41.8091525678522,-123.861425963654 41.8053453531852,-123.864376891194 41.7995741030341,-123.863274321188 41.7964228688467,-123.867718449597 41.7909543211883,-123.870764103034 41.7909543211883,-123.874355896966 41.7943035205337,-123.877570105145 41.7942943211883,-123.881825896966 41.8006654279932,-123.892212167328 41.798495396224,-123.896691541458 41.7939943211883,-123.899854103034 41.7923097238329,-123.90754869152 41.7888116151014,-123.909191615101 41.7871490161624,-123.912450827454 41.7857619763171,-123.912174928075 41.7883393334539,-123.895915923073 41.7854667744019,-123.891616834642 41.7818541030341,-123.891604321188 41.7725330228284,-123.899573139084 41.7682441030341,-123.899734321188 41.765716834642,-123.902253225598 41.7669985822935,-123.911714356292 41.7626170950713,-123.92145 41.7658741030341,-123.926625678812 41.7726258969659,-123.926875678812 41.7779383848986,-123.923278384899 41.7794003264116,-123.918115303732 41.7830158969659,-123.917665678812 41.7873909473548,-123.913447631705 41.7948289130672,-123.920716997239 41.7983943211883,-123.943095896966 41.8022241787231,-123.94626627792 41.8031243211883,-123.952205896966 41.8081916151014,-123.957728384899 41.81151),-123.959102904929 41.8492141030341,(-123.775284321188 41.8471396358816,-123.773905632852 41.84995223062,-123.772546019861 41.8507233545141,-123.774443935466 41.8492141030341),-123.775284321188 41.8919591577579,(-123.83796090285 41.8902962185333,-123.83796090285 41.8853983848986,-123.827231615101 41.8786349797955,-123.82386740838 41.8758886033464,-123.811237922359 41.8799458969659,-123.810605678812 41.8832335525729,-123.80702173452 41.8877667744019,-123.807183165358 41.8911615286072,-123.801335344494 41.8948311276096,-123.800174564475 41.8995,-123.802742904929 41.902798834526,-123.801382884443 41.9041929049287,-123.79805 41.903005718313,-123.79257692417 41.9044255732281,-123.791261652781 41.90884,-123.793322904929 41.9121583848986,-123.791948384899 41.9133504603065,-123.784702729447 41.9182359230728,-123.786829333454 41.9214655109497,-123.786170987002 41.9239069444876,-123.790557409857 41.9226770950713,-123.79407 41.924674608704,-123.798245803777 41.9238343211883,-123.803505896966 41.9279602477907,-123.806815537005 41.9289376793945,-123.815957919632 41.9212346430147,-123.815351715795 41.9182558969659,-123.812684321188 41.9146641030341,-123.812684321188 41.910689635144,-123.817674487759 41.9023971155569,-123.822831165474 41.9001643120535,-123.826504098174 41.8986202121674,-123.835120861206 41.8919591577579),-123.83796090285 41.9732126386513,(-123.804820863037 41.9717467757548,-123.805038303257 41.9715736409979,-123.803457367888 41.9731545763673,-123.803284233131 41.9732126386513),-123.804820863037 41.9302950477277,(-123.817629834978 41.9289158609848,-123.81835868511 41.9283160599224,-123.816728628019 41.9302950477277),-123.817629834978 41.9737448602925,(-123.891582925921 41.9723813915797,-123.892311715132 41.970268989602,-123.890033129909 41.9716893334539,-123.879275923073 41.9703183848986,-123.875981615101 41.9671131762187,-123.873904770029 41.9685430059582,-123.865128407959 41.9716665358789,-123.861182743694 41.9754093792098,-123.862606989775 41.9762343211883,-123.868315896966 41.9809631534335,-123.872015945201 41.9790685200687,-123.878006676902 41.9757743211883,-123.881044103034 41.9770141364058,-123.886948331687 41.9737448602925),-123.891582925921 41.9250772225859,(-123.906141323265 41.9237137538731,-123.906870112476 41.9219324864215,-123.904800663575 41.9244347933081,-123.904005513729 41.9250772225859),-123.906141323265 41.91339689589,(-123.914239004737 41.9122754056662,-123.91222540243 41.9151535915014,-123.911771627538 41.9154887495074,-123.913546622176 41.91339689589),-123.914239004737 41.8852158969659,(-123.919134321188 41.8833827983991,-123.917549973963 41.8862541129168,-123.916697529427 41.8867394956065,-123.918668467186 41.8852158969659),-123.919134321188 41.9069158969659,(-123.924254321188 41.9053913026317,-123.923320432282 41.9060917265768,-123.919212455476 41.9095208778644,-123.918147901011 41.9120723036299,-123.923362608756 41.9087404862654,-123.92496561185 41.9069158969659),-123.924254321188 41.8930376489795,(-123.933344722246 41.8862287284666,-123.930269436312 41.8920629602852,-123.926691180237 41.8960722064928,-123.927126588593 41.8963996104277,-123.931325011442 41.8930376489795,-123.933344722246