GDACS_WF_1016657_10
info-gdacs@gdacs.org
2023-08-25T22:00:00-00:00
Actual
Alert
Public
1016657
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Botswana, Namibia
On 21/08/2023, a forest fire started in Botswana, Namibia, until 26/08/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1016657
eventid
1016657
currentepisodeid
10
glide
version
0
fromdate
Mon, 21 Aug 2023 00:00:00 GMT
todate
Sat, 26 Aug 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1016657
country
Botswana, Namibia
eventname
severity
Green impact for forestfire in 15282 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
BWA
hazardcomponents
datemodified
Tue, 05 Sep 2023 15:38:16 GMT
Polygon
-19.4854151997223,21.0712356009026 -19.4854151997223,21.0749843990974 -19.482838582385,21.0777059010116 -19.4839580408842,21.08225 -19.4825751997223,21.0896043990974 -19.4750843990974,21.0960251997223 -19.4697465620763,21.0949634379237 -19.4673719591158,21.09078 -19.4691662740769,21.0870019661693 -19.4690448002777,21.0815756009026 -19.4761131169999,21.0752117376503 -19.4696365620763,21.0731734379237 -19.4673357659364,21.0668191084914 -19.4637894799987,21.0680924819822 -19.4628634379237,21.0736334379237 -19.4515843990974,21.0818651997223 -19.4462465620763,21.0808034379237 -19.4448119591158,21.07734 -19.4456638320997,21.0746829702597 -19.4424515610982,21.076850915882 -19.441627934104,21.0810170982985 -19.4437151997223,21.0833656009026 -19.4437151997223,21.0871143990974 -19.4397447025262,21.0901296628073 -19.4395541713991,21.0929083789065 -19.4437034379237,21.0942065620763 -19.4450621194756,21.0969718912711 -19.4507843990974,21.0974048002777 -19.4561634379237,21.1018665620763 -19.4611758467687,21.1110547305627 -19.4737034379237,21.1155565620763 -19.4767280408842,21.12361 -19.4741740364247,21.1281647824004 -19.4757280408842,21.13207 -19.474822780039,21.1349212167083 -19.4769251997223,21.1372056009026 -19.4769297536286,21.1409315050643 -19.4804934379237,21.1429265620763 -19.4819280408842,21.14639 -19.4804934379237,21.1498534379237 -19.4770190056904,21.1518233080295 -19.4788980408842,21.15575 -19.4774634379237,21.1592134379237 -19.474,21.1606480408842 -19.4689356502588,21.1579666661992 -19.4676734379237,21.1605634379237 -19.4623375470409,21.1631806824091 -19.4622151997223,21.1663143990974 -19.4595643990974,21.1689651997223 -19.4542265620763,21.1679034379237 -19.4485800089822,21.1601710135483 -19.4488175812437,21.1636477786673 -19.4521180408842,21.16833 -19.4491551936734,21.1728145780853 -19.4507180408842,21.17653 -19.4499125806636,21.1793591303765 -19.452866614395,21.1800378476937 -19.4565765620763,21.1725565620763 -19.461126481376,21.1713082105648 -19.4643156009026,21.1679248002777 -19.4680643990974,21.1679248002777 -19.4710880408842,21.17245 -19.4697834379237,21.1776534379237 -19.4655651895144,21.1798976269231 -19.4661651997223,21.1847243990974 -19.4608025712736,21.1881113302488 -19.4687734379237,21.1942265620763 -19.4702080408842,21.19769 -19.4687734379237,21.2011534379237 -19.4653872227761,21.2036900136885 -19.4683580408842,21.20915 -19.4662751997223,21.2220743990974 -19.46215374752,21.2250177305092 -19.4634751997223,21.2307343990974 -19.4574343990974,21.2371751997223 -19.4536856009026,21.2371751997223 -19.4510348002777,21.2345243990974 -19.4519730129841,21.2293714663596 -19.4491448002777,21.2265443990974 -19.4491903989534,21.2225473624172 -19.4468561150176,21.2184591068709 -19.4398087769229,21.2171796875429 -19.43508,21.2205180408842 -19.4244160906397,21.2173195265595 -19.4158043990974,21.2240751997223 -19.4116656869396,21.2238146675416 -19.4104934379237,21.2293334379237 -19.4051556009026,21.2303951997223 -19.4025048002777,21.2277443990974 -19.4039560621944,21.2219800124954 -19.4022935496968,21.2182413342844 -19.3993665620763,21.2169134379237 -19.3978205985252,21.2133011073497 -19.3932665620763,21.2120834379237 -19.3917205985252,21.2084711073497 -19.3871665620763,21.2072534379237 -19.3805648002777,21.1971643990974 -19.3816265620763,21.1918265620763 -19.3875986672112,21.1909832926952 -19.3865002368168,21.1870654423418 -19.3834165620763,21.1856434379237 -19.3819819591158,21.18218 -19.3860112702241,21.1739387238668 -19.38313,21.1748180408842 -19.3796665620763,21.1733834379237 -19.3783811579062,21.1691699270288 -19.3754148002777,21.1663543990974 -19.3760348002777,21.1577056009026 -19.3786856009026,21.1550548002777 -19.38686,21.1540019591158 -19.3918149671363,21.157423341569 -19.39579,21.1554719591158 -19.4003151997223,21.1584956009026 -19.4003151997223,21.1622443990974 -19.3961274924617,21.1653028685755 -19.3974080408842,21.17148 -19.3932065188641,21.1812067155707 -19.396253928175,21.1810735069277 -19.40141,21.1776819591158 -19.4091462396547,21.1792237182616 -19.3992348002777,21.1734343990974 -19.4052749359368,21.1431096132032 -19.4019265620763,21.1407834379237 -19.4004919591158,21.13732 -19.4024248002777,21.1281356009026 -19.4041741653058,21.1260871202869 -19.4036295972812,21.1223558590562 -19.3990956009026,21.1226751997223 -19.3960719591158,21.11815 -19.3988465620763,21.1073465620763 -19.40231,21.1059119591158 -19.4089973412266,21.1076279908423 -19.4121656009026,21.1029548002777 -19.41895009523,21.1037274559946 -19.4221965620763,21.0930365620763 -19.42566,21.0916019591158 -19.4304060635875,21.09242938321 -19.4315497125496,21.0827774667224 -19.4298148002777,21.0806643990974 -19.4305137899394,21.0758694889468 -19.4284419591158,21.07186 -19.4310253413008,21.0555342479703 -19.4284709417705,21.0565237833884 -19.4282551997223,21.0595043990974 -19.4256043990974,21.0621551997223 -19.4116756009026,21.0635251997223 -19.4067635318232,21.0590414145652 -19.40403,21.0598680408842 -19.4005665620763,21.0584334379237 -19.3972152211259,21.0511688305192 -19.39281,21.0519480408842 -19.3893465620763,21.0505134379237 -19.3883578848188,21.0447589510546 -19.3767565620763,21.0423134379237 -19.3722806830857,21.0324717673231 -19.3692548002777,21.0296443990974 -19.3698072150546,21.0242543518412 -19.3640156009026,21.0232651997223 -19.3543148002777,21.0145443990974 -19.3549648002777,21.0058056009026 -19.3580734622177,21.0016619480401 -19.3634756009026,20.9966048002777 -19.36830913688,20.9971242869049 -19.3683748002777,20.9937056009026 -19.3710256009026,20.9910548002777 -19.3747743990974,20.9910548002777 -19.3777980408842,20.99558 -19.3763634379237,20.9990434379237 -19.3735046936287,21.000531814941 -19.3758024839802,21.0027373850666 -19.38045,21.0015619591158 -19.3848335171496,21.0043735579478 -19.38937,21.0030319591158 -19.3938568443385,21.0059981980142 -19.3965,21.0052319591158 -19.3999634379237,21.0066665620763 -19.4013980408842,21.01013 -19.3989910082904,21.0144094885541 -19.4015566412012,21.0174455816556 -19.40416,21.0167519591158 -19.4076234379237,21.0181865620763 -19.410845804664,21.0258527430737 -19.4164648793653,21.0237114913857 -19.4193456009026,21.0199048002777 -19.4230943990974,21.0199048002777 -19.4285451997223,21.0280356009026 -19.4283315742944,21.0339277207444 -19.4357,21.0306519591158 -19.4399284147186,21.0331203167092 -19.4465034379237,21.0341065620763 -19.4499851997223,21.0400556009026 -19.4499851997223,21.0438043990974 -19.4473334379237,21.0499934379237 -19.441432163271,21.0508450166555 -19.4401662502381,21.0588280242181 -19.4445642765186,21.0564667092602 -19.4459365620763,21.0533165620763 -19.449983654935,21.0519980553007 -19.4490519591158,21.04898 -19.4504865620763,21.0455165620763 -19.4558243990974,21.0444548002777 -19.4588480408842,21.04898 -19.4559933894921,21.053558577873 -19.4608334379237,21.0549365620763 -19.4623725332915,21.0585834213398 -19.4677034379237,21.0596465620763 -19.4692542340636,21.0634008915086 -19.4742243990974,21.0625848002777 -19.4854151997223),21.0712356009026 -19.4479171883698,(21.0650078373604 -19.44443,21.0663380408842 -19.4397780412971,21.0634709800437 -19.4398464400703,21.0669577391924 -19.4448234379237,21.0687065620763 -19.4463073933896,21.0715430777313 -19.4479171883698),21.0650078373604 -19.4404065620763,(21.0430665620763 -19.4391067517484,21.0418511286369 -19.4372982856248,21.0450230090311 -19.439177836729,21.0454949833445 -19.4404065620763),21.0430665620763 -19.4398619587029,(21.0630990199563 -19.4395762531999,21.0626488295129 -19.4395031711028,21.0629083455335 -19.4396807332136,21.0631740860118 -19.4398619587029),21.0630990199563 -19.4338217143752,(21.0457769909689 -19.4268392605713,21.0417071675666 -19.4265878585763,21.0471802840718 -19.4286465620763,21.0472865620763 -19.4338217143752),21.0457769909689 -19.4112119957898,(21.0334631161992 -19.410424195336,21.0295572569263 -19.4091814863279,21.0308096663577 -19.4093690386227,21.0331600276738 -19.4112119957898),21.0334631161992 -19.4072850663788,(21.047892456139 -19.4071382688638,21.0471544551941 -19.4069421118077,21.0471544551941 -19.4068850580839,21.0479538667223 -19.4072850663788),21.047892456139 -19.4061377281687,(21.042979630038 -19.4059565026794,21.0429045639825 -19.4058898337079,21.0431154551962 -19.4061071401845,21.0431334062188 -19.4061377281687),21.042979630038 -19.3944389917096,(21.0145305114459 -19.3920131556615,21.0120618019858 -19.3900107416198,21.0127005894517 -19.3914634379237,21.0138765620763 -19.3928603533691,21.0157620330134 -19.3944389917096),21.0145305114459 -19.3923221169735,(21.0331004463783 -19.3921391502708,21.0302394733036 -19.3863365620763,21.0284534379237 -19.3849924941922,21.0240222663457 -19.3831484161712,21.023694812733 -19.3817563041002,21.0325571676734 -19.38526,21.0312619591158 -19.3887234379237,21.0326965620763 -19.3901170301533,21.0350787910648 -19.3923221169735),21.0331004463783 -19.4279690486405,(21.1136320986931 -19.4266731821688,21.112881637905 -19.4265278918783,21.1143063323209 -19.4274990916156,21.1145154343294 -19.4279690486405),21.1136320986931 -19.427124998016,(21.154123122062 -19.422881049284,21.1517303436514 -19.419730001984,21.1555258833762 -19.4241448002777,21.1570356009026 -19.427124998016),21.154123122062 -19.4235806538492,(21.1460098952274 -19.4233020916641,21.1456535064308 -19.4196956009026,21.1456251997223 -19.4168383587476,21.1446070851871 -19.4223177252268,21.1482857043397 -19.4235806538492),21.1460098952274 -19.4195598613185,(21.165288122062 -19.4149598660861,21.1621136856733 -19.4155757078256,21.1658732281634 -19.4165992697677,21.1682038778957 -19.4195598613185),21.165288122062 -19.4567174287264,(21.1903586697512 -19.4528714712421,21.1881926131424 -19.4502,21.1890980408842 -19.4477279288976,21.1885572310801 -19.44876610493,21.1911380801419 -19.4531451997223,21.1941956009026 -19.4532956251385,21.1989980353581 -19.4567174287264),21.1903586697512 -19.4564293279218,(21.2118833532233 -19.4549472113643,21.2084954593339 -19.4472265620763,21.2066434379237 -19.4461059615135,21.2016014033453 -19.4428365620763,21.2001034379237 -19.4402274165848,21.1948055945325 -19.433827519339,21.1991750632576 -19.4402534379237,21.2011065620763 -19.4447327886357,21.2089145406661 -19.4496439093603,21.2108104734405 -19.4541943990974,21.2102748002777 -19.4564293279218),21.2118833532233 -19.4677066019295,(21.1468315428484 -19.4674447420126,21.1465012322611 -19.4673233389558,21.1471115666431 -19.4675045644451,21.1471866326986 -19.4677066019295),21.1468315428484 -19.4675752579874,(21.1444287677389 -19.4675556009026,21.1438651997223 -19.4672698621223,21.1438795871602 -19.4673791009313,21.1444287677389 -19.4675752579874),21.1444287677389 -19.467045435555,(21.1478033673014 -19.4592133401728,21.1540412656659 -19.4664416241859,21.1528134904507 -19.4668348002777,21.1515456009026 -19.467045435555),21.1478033673014 -19.4648801378777,(21.1410904128398 -19.4645721599611,21.139542103297 -19.4616757719648,21.1388854233766 -19.4562915515882,21.139937533889 -19.4577134379237,21.1412765620763 -19.4588654864551,21.1427518481045 -19.4608456009026,21.1411048002777 -19.4648801378777),21.1410904128398 -19.4577976287791,(21.1198111249813 -19.4558341532313,21.1158052694373 -19.4471691627319,21.1130140890316 -19.4421191839581,21.1120187348185 -19.4393043990974,21.1147851997223 -19.4362030920732,21.1150497718399 -19.4351134379237,21.1204134379237 -19.4303609083844,21.1216545656706 -19.4304199889044,21.1229555544847 -19.4377762670042,21.1248234105466 -19.4423,21.1219819591158 -19.4464392580416,21.1244279983592 -19.4494456009026,21.1208648002777 -19.4531943990974,21.1208648002777 -19.4554577252268,21.1229357043397 -19.4577976287791),21.1198111249813 -19.4516680830505,(21.1553732705426 -19.45089,21.1555280408842 -19.4482257751423,21.1548588380456 -19.4494597370929,21.1579532463789 -19.4516680830505),21.1553732705426 -19.4512701347135,(21.130278122062 -19.4471807419584,21.1278420016408 -19.4442042747652,21.1315055064167 -19.448088950716,21.1340796563486 -19.4512701347135),21.130278122062 -19.4469255208732,(21.153689865939 -19.4456,21.1502580408842 -19.4420153294429,21.1491141244939 -19.4439001340584,21.1528794295178 -19.4469255208732),21.153689865939 -19.4364510322165,(21.149022259809 -19.4363765620763,21.1482534379237 -19.4355883714493,21.147253822534 -19.4338416423535,21.1484374918284 -19.4364510322165),21.149022259809 -19.4325830908831,(21.1758662479483 -19.4305148002777,21.1734843990974 -19.429509356395,21.1649102282766 -19.4245399807537,21.1613758284751 -19.4231234379237,21.1638734379237 -19.4212301386815,21.165191877938 -19.4256551997223,21.1681956009026 -19.4256551997223,21.1719443990974 -19.4230043990974,21.1745951997223 -19.4193361268861,21.1747131764521 -19.4181151997223,21.1830943990974 -19.4153199259497,21.1859149143984 -19.4172952049961,21.1884056109168 -19.4221956009026,21.1848548002777 -19.4282618531021,21.1840113729844 -19.4325830908831),21.1758662479483 -19.4315985286521,(21.1994661622317 -19.4279356227731,21.197128831103 -19.4231,21.2008380408842 -19.4188474216593,21.1982224058282 -19.4065018782499,21.1969742960957 -19.40061,21.1997380408842 -19.3971465620763,21.1983034379237 -19.3957122304421,21.1949914961602 -19.3932601360372,21.1938652319732 -19.3896313327888,21.1934967073048 -19.3955218139146,21.2038213050901 -19.3989056009026,21.2008848002777 -19.4026543990974,21.2008848002777 -19.4053051997223,21.2035356009026 -19.404350370254,21.2087134023821 -19.4064492259424,21.2101086012761 -19.4104335540707,21.2105484473191 -19.41898,21.2041719591158 -19.4224434379237,21.2056065620763 -19.4244048586285,21.209166674528 -19.4260865620763,21.2036465620763 -19.4315985286521,21.1994661622317