GDACS_WF_1016901_1
info-gdacs@gdacs.org
2023-08-21T22:00:00-00:00
Actual
Alert
Public
1016901
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Brazil
On 12/08/2023, a forest fire started in Brazil, until 22/08/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1016901
eventid
1016901
currentepisodeid
1
glide
version
0
fromdate
Sat, 12 Aug 2023 00:00:00 GMT
todate
Tue, 22 Aug 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1016901
country
Brazil
eventname
severity
Green impact for forestfire in 13785 ha
population
1 people affected in the area
vulnerability
sourceid
GWIS
iso3
BRA
hazardcomponents
datemodified
Tue, 29 Aug 2023 23:47:24 GMT
Polygon
-7.3649651997222989,-44.9677343990974 -7.3649651997222989,-44.9639856009026 -7.3604270696739995,-44.9608184099338 -7.363485199722299,-44.9570843990974 -7.362423437923729,-44.9517465620763 -7.3524027492479087,-44.9493308140585 -7.3493843990974188,-44.9453448002777 -7.3450799999999994,-44.9443719591158 -7.34183374639491,-44.9455411751767 -7.33987327733167,-44.9439397304803 -7.3440551997223,-44.9404543990974 -7.34299343792373,-44.9351165620763 -7.33953,-44.9336819591158 -7.3336439534141791,-44.9368034447042 -7.3302932996244889,-44.932395890683 -7.3284377086636594,-44.9230641063556 -7.3316426451005894,-44.9195428677293 -7.336,-44.9220080408842 -7.3405251997223,-44.9189843990974 -7.3398551997222992,-44.9126556009026 -7.3372043990974189,-44.9100048002777 -7.3318665620762689,-44.9110665620763 -7.330339560985359,-44.9149405172978 -7.32269560090258,-44.9137048002777 -7.3200448002776994,-44.9163556009026 -7.3200693986513494,-44.9203900896078 -7.31860669182755,-44.9205400629047 -7.3172934379237295,-44.9164665620763 -7.3138299999999994,-44.9150319591158 -7.30026560090258,-44.9169848002777 -7.2971568786895791,-44.9217910119588 -7.2924408755060588,-44.9245968481045 -7.28839,-44.9225319591158 -7.28473091154152,-44.9240793785494 -7.28141439909742,-44.9202748002777 -7.27766560090258,-44.9202748002777 -7.2746382460889,-44.9252939164427 -7.26790656207627,-44.9261365620763 -7.26588377361712,-44.9321372912867 -7.25369560090258,-44.9335048002777 -7.25078850600262,-44.9365690451652 -7.24729,-44.9350819591158 -7.24399098394642,-44.9362864299176 -7.2401,-44.9342119591158 -7.2355748002777,-44.9372356009026 -7.23473195911582,-44.94252 -7.23796656207627,-44.9513334379237 -7.24330439909742,-44.9523951997223 -7.24705770740956,-44.946672081996 -7.24921560090258,-44.9484051997223 -7.25341693793216,-44.948308134927 -7.2500448002777,-44.9523456009026 -7.2506948002777,-44.9599743990974 -7.26090886353762,-44.967198239999 -7.25410805121032,-44.9701841976602 -7.25009921958044,-44.9700322001175 -7.24753343792373,-44.9632465620763 -7.24255439909742,-44.9603648002777 -7.23880560090258,-44.9603648002777 -7.2361548002777,-44.9630156009026 -7.2361548002777,-44.9667643990974 -7.23843725099843,-44.9709126187787 -7.23330656207627,-44.9721565620763 -7.23187195911582,-44.97562 -7.2331748002777,-44.9844143990974 -7.23577055875555,-44.9871026657678 -7.23524578587755,-44.9949125191694 -7.2304648002777,-45.0006156009026 -7.2291348002777,-45.0050956009026 -7.22954075387743,-45.0096319468388 -7.22690195911582,-45.0139 -7.22854050341092,-45.0189278761808 -7.22711874669113,-45.0224361499495 -7.22559628867987,-45.025233586098 -7.21993656207627,-45.0262465620763 -7.21850195911582,-45.02971 -7.21993656207627,-45.0331734379237 -7.22239515151264,-45.0345101232085 -7.2207648002777,-45.0487643990974 -7.22624804144725,-45.0535257198436 -7.22113656207627,-45.0548065620763 -7.2175248002777,-45.0599256009026 -7.2175248002777,-45.0636743990974 -7.22017560090258,-45.0663251997223 -7.22844116363328,-45.067254781942 -7.22934656207627,-45.0739234379237 -7.23468439909742,-45.0749851997223 -7.23770804088418,-45.07046 -7.23478532563898,-45.0660022372368 -7.23540121717272,-45.0647733271465 -7.24184439909742,-45.0651251997223 -7.24524343792373,-45.0625234379237 -7.24667804088418,-45.05906 -7.24598581602635,-45.0564587329801 -7.2505751997223,-45.0522743990974 -7.25026875292254,-45.0478180944135 -7.25402343792373,-45.0452834379237 -7.25545804088418,-45.04182 -7.25469865691901,-45.039118222273 -7.2591789944968,-45.0348540866141 -7.26856094926499,-45.0340483928496 -7.2687848002777,-45.0371843990974 -7.27261560090258,-45.0413751997223 -7.27795343792373,-45.0403134379237 -7.27926945166371,-45.0362538117286 -7.28197439909742,-45.0359051997223 -7.2846251997223,-45.0332543990974 -7.2846251997223,-45.0295056009026 -7.28100051073237,-45.0264870267394 -7.2888251997223,-45.0183943990974 -7.28973420164106,-45.0128114883379 -7.2937934379237293,-45.0113934379237 -7.29509293578306,-45.0086092192104 -7.2997199999999989,-45.0114780408842 -7.303183437923729,-45.0100434379237 -7.30461804088418,-45.00658 -7.3033138430020887,-45.003311727068 -7.30888343792373,-45.0021734379237 -7.31005660867046,-44.9972455593964 -7.31175647316275,-44.9959521355881 -7.31443444054594,-44.9992452288868 -7.3154365620762691,-45.0047834379237 -7.3188999999999993,-45.0062180408842 -7.3234251997222994,-45.0031943990974 -7.3223755339488088,-44.9978746650571 -7.3243861953312788,-44.9960358385785 -7.3260865620762692,-44.9994434379237 -7.3295499999999993,-45.0008780408842 -7.3330134379237295,-44.9994434379237 -7.3343831417475593,-44.9963062699925 -7.33899831795236,-44.9932958803253 -7.34165560090258,-44.9955451997223 -7.3454043990974194,-44.9955451997223 -7.3480551997223,-44.9928943990974 -7.3484695871601691,-44.9875998621223 -7.3520943990974192,-44.9875751997223 -7.3547451997222995,-44.9849243990974 -7.3570780408841792,-44.97773 -7.35564343792373,-44.9742665620763 -7.35218,-44.9728319591158 -7.3493013975759487,-44.9737094935662 -7.346139316478129,-44.9696846132224 -7.350719999999999,-44.9720580408842 -7.3568370059345787,-44.9692256914445 -7.3623143990974187,-44.9703851997223 -7.3649651997222989),-44.9677343990974 -7.33947376773884,(-44.9586193341503 -7.3340918128911188,-44.965079281789 -7.3240982624072988,-44.9629908633821 -7.3237451997222989,-44.9591156009026 -7.3212777785293488,-44.9564210365743 -7.3231317800845188,-44.9527176840589 -7.3250319185161494,-44.9524033777271 -7.3281256009025793,-44.9572851997223 -7.33187439909742,-44.9572851997223 -7.3341829065538295,-44.9553266722705 -7.33947376773884),-44.9586193341503 -7.3231712799331588,(-44.9730397153976 -7.3198467905449087,-44.9735572880865 -7.3192605669726,-44.9700586674705 -7.3202317375926995,-44.9700291366179 -7.3231712799331588),-44.9730397153976 -7.29854617754846,(-45.0019154469185 -7.29528633997817,-45.0045686020593 -7.2948351997223,-45.0031756009026 -7.2943318277107494,-44.9993402890253 -7.2967948581453292,-44.9981897604172 -7.29854617754846),-45.0019154469185 -7.29726542532646,(-44.9568554659144 -7.2969362408566489,-44.9585583521459 -7.2912629050295088,-44.9574559422203 -7.28692,-44.9547819591158 -7.2823542187105,-44.9576174590673 -7.2785428464141,-44.9546774892537 -7.28043804088418,-44.95074 -7.27900343792373,-44.9472765620763 -7.27366560090258,-44.9462148002777 -7.27080387491932,-44.9490509602186 -7.26641767920277,-44.9452229118749 -7.26976933803245,-44.9420415297833 -7.27817343792373,-44.9392334379237 -7.27968122037276,-44.9336027807679 -7.28196560090258,-44.9355251997223 -7.28571439909742,-44.9355251997223 -7.2915537492986688,-44.9312178601385 -7.29520500998082,-44.9353172816393 -7.29073560090258,-44.9351948002777 -7.2880848002777,-44.9378456009026 -7.2891648002777,-44.9471943990974 -7.29311360737424,-44.9501033892625 -7.2932748002776995,-44.9535543990974 -7.29726542532646),-44.9568554659144 -7.28554126559481,(-44.9935088486712 -7.28451081121367,-44.9958100296005 -7.2758423065723,-44.9966105758223 -7.27606134895973,-44.9951306246224 -7.27981343792373,-44.9937534379237 -7.28124804088418,-44.99029 -7.28275344309247,-44.9901179874117 -7.28554126559481),-44.9935088486712 -7.2791685732085,(-45.0107698420331 -7.27902986922395,-45.0109085460177 -7.27897935687139,-45.0107939308753 -7.27916058236067,-45.0107578828842 -7.2791685732085),-45.0107698420331 -7.27897605955081,(-45.0075728242431 -7.2787506431286,-45.0087060691247 -7.27856941763933,-45.0087421171158 -7.27791848312687,-45.0077679247733 -7.27897605955081),-45.0075728242431 -7.27771948926763,(-45.0271929732606 -7.27763442685217,-45.0272498101495 -7.27748079130083,-45.0271861722204 -7.27758310331617,-45.0269917893101 -7.27771948926763),-45.0271929732606 -7.26562812229044,(-44.999739582149 -7.26147852992422,-45.0032294512262 -7.26160954392743,-45.0018471508028 -7.26211018134284,-44.9978708234771 -7.26531245498384,-44.9978312275118 -7.26562812229044),-44.999739582149 -7.26533508964119,(-44.9853257865436 -7.26458418947466,-44.9884019523559 -7.26357821634288,-44.9882781481413 -7.26224343792373,-44.9853165620763 -7.26077996280079,-44.9838574461407 -7.26357173834243,-44.9827779121296 -7.26533508964119),-44.9853257865436 -7.24279251223785,(-44.98048956421 -7.2423932695144,-44.9815105448058 -7.24195070551364,-44.9802020719015 -7.24213646019226,-44.9799769602155 -7.24279251223785),-44.98048956421 -7.24265508321844,(-44.9833503536381 -7.24250144766709,-44.9834530096316 -7.24244788884298,-44.9832948652865 -7.24264404589906,-44.9832948652865 -7.24265508321844,-44.9833503536381