GDACS_WF_1017631_5
info-gdacs@gdacs.org
2023-10-08T22:00:00-00:00
Actual
Alert
Public
1017631
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 03/10/2023, a forest fire started in Australia, until 09/10/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017631
eventid
1017631
currentepisodeid
5
glide
version
0
fromdate
Tue, 03 Oct 2023 00:00:00 GMT
todate
Mon, 09 Oct 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017631
country
Australia
eventname
severity
Green impact for forestfire in 16925 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Tue, 10 Oct 2023 08:26:22 GMT
Polygon
-19.16018,124.67979 -19.1587155339059,124.683325533906 -19.15518,124.68479 -19.1475673886388,124.682760850261 -19.1482393976626,124.687593417162 -19.1455334171618,124.690299397663 -19.1376065828382,124.689749397663 -19.1357497092788,124.688314195503 -19.1353043022782,124.691209441854 -19.1386193976626,124.694036582838 -19.1386193976626,124.697863417162 -19.1359134171618,124.700569397663 -19.1299811353204,124.700373861181 -19.1279551856689,124.702763809151 -19.1288347142392,124.709661512922 -19.1310555339059,124.710864466094 -19.13252,124.7144 -19.1311993976626,124.723873417162 -19.1266611919423,124.726943849919 -19.1250855339059,124.732435533906 -19.1189134171618,124.736709397663 -19.1110065828382,124.736139397663 -19.10792,124.73152 -19.1093844660941,124.727984466094 -19.1132025389568,124.725899872466 -19.1142506023374,124.715146582838 -19.1162217173428,124.712931623763 -19.11482,124.70949 -19.1156706023374,124.703756582838 -19.1183765828382,124.701050602337 -19.120880323356,124.700787422616 -19.1210748433817,124.696161457592 -19.1175706023374,124.692373417162 -19.1177356977218,124.687060558146 -19.1144206023374,124.684233417162 -19.1153211383182,124.6790588355 -19.1123444660941,124.677705533906 -19.1076306023374,124.671723417162 -19.1088959274546,124.65957608741 -19.1039865828382,124.660299397663 -19.1011343628242,124.656858221482 -19.0969465828382,124.657099397663 -19.0942406023374,124.654393417162 -19.0929813642724,124.649798165841 -19.08904,124.65187 -19.0828365828382,124.650599397663 -19.0732753783282,124.644959953974 -19.06947,124.6463 -19.0633602691216,124.643536323178 -19.0577612548136,124.64397833934 -19.0564655339059,124.646665533906 -19.05293,124.64813 -19.0493944660941,124.646665533906 -19.0480650756108,124.643809070952 -19.0456034171618,124.646149397663 -19.0417765828382,124.646149397663 -19.0390706023374,124.643443417162 -19.0390706023374,124.639616582838 -19.0417765828382,124.636910602337 -19.0466075928007,124.637581571048 -19.0457638202611,124.635765220438 -19.0415565828382,124.636019397663 -19.0390693307394,124.633640767349 -19.0340465828382,124.634429397663 -19.0311926866977,124.630979795025 -19.0286334171618,124.632849397663 -19.0248065828382,124.632849397663 -19.0218612068701,124.628939894874 -19.0193934171618,124.631289397663 -19.0155665828382,124.631289397663 -19.0128606023374,124.628583417162 -19.0128606023374,124.624756582838 -19.0173949785528,124.621686911817 -19.0163332376603,124.619542291506 -19.0121365828382,124.619789397663 -19.0094306023374,124.617083417162 -19.00486,124.59639 -19.0063244660941,124.592854466094 -19.0100647526037,124.591430727825 -19.0112744660941,124.586614466094 -19.0160198993195,124.585390663938 -19.0187465828382,124.582580602337 -19.0225734171618,124.582580602337 -19.0254186220738,124.585986511219 -19.0296434171618,124.585720602337 -19.0327042965418,124.59046922001 -19.0384355339059,124.591364466094 -19.0417391566728,124.601759472225 -19.0465999123946,124.600446886288 -19.0495565828382,124.596480602337 -19.0550055339059,124.597564466094 -19.0560893976626,124.603013417162 -19.0525100876054,124.605893113712 -19.0500945727662,124.611068104732 -19.0547900209145,124.611479421657 -19.0558806023374,124.606396582838 -19.0585865828382,124.603690602337 -19.0660310173094,124.603793316207 -19.0577906023374,124.590723417162 -19.0578669693162,124.585316950883 -19.0540144660941,124.583915533906 -19.052628502131,124.580774656863 -19.0476806023374,124.577753417162 -19.0477676886145,124.572350840435 -19.04487,124.57303 -19.0413344660941,124.571565533906 -19.0372251082109,124.56318732108 -19.0333744660941,124.561785533906 -19.0290077828327,124.554320767312 -19.0251744660941,124.552915533906 -19.0237720425812,124.549691909119 -19.019150910681,124.547097894302 -19.01376,124.55057 -19.0095147083254,124.548043306339 -19.0052380762481,124.547657053017 -19.0015655339059,124.552565533906 -18.99803,124.55403 -18.9934106023374,124.550943417162 -18.9944944660941,124.545494466094 -18.9985965828382,124.541670602337 -19.0017489667372,124.541536445807 -19.0023406023374,124.537026582838 -19.0044746905541,124.534702728545 -19.00276,124.531 -19.0042244660941,124.527464466094 -19.00776,124.526 -19.0105886577028,124.526992146516 -19.0072997256325,124.51813591144 -19.0018165828382,124.519009397663 -18.998789333647,124.514091709613 -18.9954265828382,124.513999397663 -18.9918606023374,124.509843417162 -18.9918606023374,124.506016582838 -18.995652362563,124.503094627322 -18.9942406023374,124.497426582838 -18.9976685351791,124.494576997088 -18.99631,124.4912 -18.9981933972567,124.48738454524 -18.9950506023374,124.483363417162 -18.99383,124.47762 -18.9952944660941,124.474084466094 -18.9974970715473,124.472885135954 -18.9951354744974,124.471123434725 -18.9904765828382,124.471679397663 -18.9877706023374,124.468973417162 -18.9887056597397,124.463747170542 -18.98558,124.45912 -18.9870444660941,124.455584466094 -18.99058,124.45412 -19.0006534171618,124.456100602337 -19.005854700794,124.461106229739 -19.0079744660941,124.453804466094 -19.0119432692682,124.452426182616 -19.00989,124.44657 -19.0129765828382,124.441950602337 -19.0168034171618,124.441950602337 -19.0270455339059,124.447264466094 -19.0281293976626,124.452713417162 -19.0254234171618,124.455419397663 -19.0214320127855,124.455309435469 -19.0175693976626,124.464203417162 -19.0143860929704,124.467004343347 -19.0141493976626,124.485763417162 -19.0114434171618,124.488469397663 -19.0068260060056,124.487941151111 -19.0052591231625,124.494116553841 -19.01139,124.49005 -19.0178855339059,124.491654466094 -19.01935,124.49519 -19.0185573747621,124.497720053009 -19.0207855339059,124.498924466094 -19.02225,124.50246 -19.0203017205646,124.506318807645 -19.0211147963295,124.510685477131 -19.0268534171618,124.509430602337 -19.0297865514223,124.513278561905 -19.0322265828382,124.510970602337 -19.0360534171618,124.510970602337 -19.038987312627,124.51482238874 -19.0433051828483,124.512128914686 -19.0402306023374,124.508973417162 -19.0402306023374,124.505146582838 -19.04485,124.50206 -19.0483855339059,124.503524466094 -19.0523482940254,124.508746775773 -19.0566034171618,124.508460602337 -19.0594960436976,124.512104915821 -19.0637334171618,124.511830602337 -19.0666143359329,124.515416056913 -19.0708534171618,124.515140602337 -19.0755693976626,124.519826582838 -19.0756839264816,124.523077641907 -19.0790434171618,124.523170602337 -19.0817493976626,124.525876582838 -19.0806655339059,124.531325533906 -19.0769046499621,124.53274517509 -19.0770525084359,124.534971490165 -19.0816793976626,124.538056582838 -19.0816793976626,124.541883417162 -19.0789734171618,124.544589397663 -19.0744070710382,124.544095271675 -19.0739131586074,124.546097313317 -19.0741979083643,124.548663796102 -19.07989,124.5457 -19.0845093976626,124.548786582838 -19.0845093976626,124.552613417162 -19.0799162868431,124.555694771222 -19.079961812033,124.558063454667 -19.0819591281664,124.558393836214 -19.0876965828382,124.550380602337 -19.0915234171618,124.550380602337 -19.0943926202041,124.553907157967 -19.1106134171618,124.550560602337 -19.1133193976626,124.553266582838 -19.1131319146938,124.557374005253 -19.11551,124.56152 -19.1140455339059,124.565055533906 -19.1094411704319,124.56630739658 -19.1090838442003,124.569196865546 -19.1139834171618,124.570230602337 -19.1183543656204,124.575312174553 -19.1247334171618,124.573800602337 -19.1274393976626,124.576506582838 -19.127552736128,124.579763626218 -19.1316834171618,124.579560602337 -19.1343893976626,124.582266582838 -19.1343893976626,124.586093417162 -19.1311085520344,124.588913745446 -19.1321193976626,124.594253417162 -19.1294134171618,124.596959397663 -19.1238061066135,124.596344237056 -19.11926,124.59874 -19.1138469716938,124.595485124431 -19.1148093976626,124.601513417162 -19.10666,124.6065 -19.1031244660941,124.605035533906 -19.0987179336224,124.600268201222 -19.0933151628695,124.600557587046 -19.0938588118286,124.605648784789 -19.0988493976626,124.610066582838 -19.0989611878998,124.613331409687 -19.1005913222889,124.613879928334 -19.1019344660941,124.609734466094 -19.10547,124.60827 -19.1173855339059,124.611374466094 -19.1184693976626,124.616823417162 -19.1157634171618,124.619529397663 -19.1030786777111,124.617570071666 -19.1017355339059,124.621715533906 -19.0982,124.62318 -19.0946644660941,124.621715533906 -19.0934688121002,124.616828590313 -19.0875816247589,124.613679234534 -19.0819223729649,124.613780289331 -19.0810771953259,124.616764948188 -19.0860955339059,124.617934466094 -19.087270629976,124.622924761349 -19.0928455339059,124.623924466094 -19.09431,124.62746 -19.0920149700221,124.631550498951 -19.0934355411723,124.634121842666 -19.1036334171618,124.632480602337 -19.1064926602419,124.635957085856 -19.1122955339059,124.636804466094 -19.1145727082436,124.643777053782 -19.1187534171618,124.643540602337 -19.1216097313097,124.647002361119 -19.12857,124.64589 -19.1321055339059,124.647354466094 -19.1355293976626,124.652746582838 -19.1366416023637,124.660860419616 -19.1413355339059,124.662094466094 -19.1428,124.66563 -19.1397134171618,124.670249397663 -19.1340204704835,124.668800368669 -19.1330938903172,124.675497370786 -19.1364193976626,124.678326582838 -19.136614289083,124.681173631827 -19.13952,124.68013 -19.1471326113612,124.682129149739 -19.14608,124.67921 -19.1483925308593,124.675107807334 -19.1449944660941,124.673635533906 -19.14353,124.6701 -19.1466165828382,124.665480602337 -19.15451,124.66369 -19.1591293976626,124.666776582838 -19.157208097956,124.675247229594 -19.16018),124.67979 -19.125037263872,(124.582836373782 -19.1249128211888,124.582919523724 -19.1249959711313,124.583043966407 -19.125037263872),124.582836373782 -19.1096362584863,(124.587341104742 -19.108610326202,124.586865925482 -19.1092820446595,124.587871223196 -19.1096362584863),124.587341104742 -19.1056819780164,(124.560655408126 -19.1053616342745,124.560869454971 -19.1056288295681,124.56092260342 -19.1056819780164),124.560655408126 -19.0977877185911,(124.586183725087 -19.0964194595861,124.585614904003 -19.0962128511572,124.586653594717 -19.0965465828382,124.586430602337 -19.0977877185911),124.586183725087 -19.0921774887804,(124.574976276548 -19.0911955314998,124.57432015367 -19.09147,124.5757 -19.0913490363821,124.576308125174 -19.0921774887804),124.574976276548 -19.0918748371305,(124.599272412954 -19.090886536402,124.596755047871 -19.0881052995669,124.596077723744 -19.088866949208,124.59752673418 -19.0918748371305),124.599272412954 -19.0883159242095,(124.564409396803 -19.087271877225,124.563423985515 -19.0851108718336,124.563126163786 -19.0848872218604,124.567806584988 -19.0883159242095),124.564409396803 -19.0858457184146,(124.584521409372 -19.0825544660941,124.583105533906 -19.0811704155482,124.579974276261 -19.0789265828382,124.579659397663 -19.0765684224357,124.577473966725 -19.0727243954832,124.578671472514 -19.0734878488502,124.580020436802 -19.0793855339059,124.580804466094 -19.0806928106091,124.587840575752 -19.0858062824454,124.588000332624 -19.0858457184146),124.584521409372 -19.0778723518409,(124.619899701255 -19.0766908912186,124.620260910358 -19.0769955339059,124.620464466094 -19.0775846401051,124.621346125827 -19.0778723518409),124.619899701255 -19.0757537718568,(124.569541701161 -19.0714254888132,124.563049234497 -19.0698900279506,124.562865343348 -19.0711,124.56602 -19.0696355339059,124.569555533906 -19.0629992242009,124.570997624552 -19.0693556045168,124.576748527486 -19.06827,124.57378 -19.0697344660941,124.570244466094 -19.07327,124.56878 -19.0757537718568),124.569541701161 -19.0722074915641,(124.539228509835 -19.068887656654,124.53791466507 -19.06943,124.53898 -19.0720829289618,124.539854728325 -19.0722074915641),124.539228509835 -19.0673299720494,(124.561264656652 -19.0615948126464,124.551313490235 -19.0585444660941,124.549945533906 -19.0560628141914,124.545275788265 -19.0469444660941,124.539265533906 -19.0461548585142,124.533376197348 -19.0416336031271,124.532185093367 -19.0385675548781,124.534128318214 -19.0401993976626,124.536116582838 -19.0401222740233,124.541780065312 -19.0429914455571,124.545955353542 -19.0468555339059,124.547354466094 -19.0482548917891,124.55056267892 -19.0521055339059,124.551964466094 -19.0531172381205,124.55912420133 -19.0673299720494),124.561264656652 -19.0521108875833,(124.523921023661 -19.0520463906733,124.523596775798 -19.0516872373342,124.523836754387 -19.0521108875833),124.523921023661 -19.0338611554444,(124.525577921192 -19.0328861524667,124.520340594219 -19.0292934485777,124.516361438095 -19.0286701981669,124.517294198251 -19.02993,124.52119 -19.0281248003103,124.524953204816 -19.0308941284205,124.528560222996 -19.0338611554444),124.525577921192 -19.0129319515795,(124.530573535672 -19.0125663269267,124.53002633971 -19.012684944101,124.530622668515 -19.0129319515795),124.530573535672 -19.0121836730733,(124.52879366029 -19.0120330963158,124.528036659811 -19.0113913422972,124.527607853484 -19.0121836730733),124.52879366029 -19.0496047403953,(124.639453965298 -19.0476224071993,124.638588428952 -19.0483093976626,124.639616582838 -19.0485549243892,124.640850929048 -19.0496047403953,124.639453965298