GDACS_WF_1017827_1
info-gdacs@gdacs.org
2023-10-10T22:00:00-00:00
Actual
Alert
Public
1017827
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 06/10/2023, a forest fire started in Australia, until 11/10/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017827
eventid
1017827
currentepisodeid
1
glide
version
0
fromdate
Fri, 06 Oct 2023 00:00:00 GMT
todate
Wed, 11 Oct 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017827
country
Australia
eventname
severity
Green impact for forestfire in 7720 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Thu, 12 Oct 2023 08:22:16 GMT
Polygon
-17.8339093976626,123.985296582838 -17.8315955339059,123.995805533906 -17.82806,123.99727 -17.8242020446595,123.995322996129 -17.8229319877873,124.000491791434 -17.8230764567757,124.002761913915 -17.8288034171618,124.002900602337 -17.8315093976626,124.005606582838 -17.8293555339059,124.016105533906 -17.8239065828382,124.017189397663 -17.8187133800632,124.011338806844 -17.8149234171618,124.015579397663 -17.8094744660941,124.014495533906 -17.80801,124.01096 -17.8094606023374,124.003996582838 -17.8134186586386,124.001041548976 -17.8144917352136,123.99550116088 -17.8107429099814,123.992746463487 -17.80662,123.99509 -17.7988744660941,123.992575533906 -17.79741,123.98904 -17.8007639777643,123.980067112698 -17.79804,123.97569 -17.7990489551853,123.970301151714 -17.7954892636397,123.96650149257 -17.7912165828382,123.966799397663 -17.7884205316446,123.963640601211 -17.7847948099661,123.962679943711 -17.7820980661582,123.965248364156 -17.7798455339059,123.973735533906 -17.7757515216266,123.975088911745 -17.7748204653779,123.976984137765 -17.77796,123.97596 -17.7814955339059,123.977424466094 -17.7825793976626,123.982873417162 -17.77796,123.98596 -17.7740745805415,123.983971893172 -17.7704643341187,124.000083313843 -17.7706692229647,124.00111335963 -17.7737365828382,123.996590602337 -17.7775634171618,123.996590602337 -17.7802693976626,123.999296582838 -17.7802693976626,124.003123417162 -17.77565,124.00621 -17.7721144660941,124.004745533906 -17.7707507770353,124.00171664037 -17.7678458669335,124.014031019824 -17.767993391146,124.016347325876 -17.7713693976626,124.019186582838 -17.7702855339059,124.024635533906 -17.76675,124.0261 -17.7587344660941,124.023725533906 -17.75727,124.02019 -17.7672306023374,123.967356582838 -17.7699365828382,123.964650602337 -17.7724142186249,123.964382230062 -17.7750765862278,123.957085505856 -17.7636265828382,123.958279397663 -17.7596644660941,123.955605533906 -17.758324984176,123.951441662116 -17.7547,123.95304 -17.7511644660941,123.951575533906 -17.7497,123.94804 -17.7508754925765,123.944936945526 -17.7490419502899,123.941642812113 -17.7438144660941,123.939245533906 -17.74235,123.93571 -17.7454365828382,123.931090602337 -17.753641087427,123.933252271455 -17.7411007833673,123.922149952942 -17.7374644660941,123.920705533906 -17.7365430364393,123.915013483025 -17.7317651044094,123.911563863447 -17.7272265828382,123.912039397663 -17.7228144660941,123.909065533906 -17.7219022752346,123.903359656191 -17.7154675288785,123.902520704859 -17.71624,123.90797 -17.7147755339059,123.911505533906 -17.709013378884,123.912380121471 -17.7061834171618,123.915709397663 -17.7007344660941,123.914625533906 -17.6989676403484,123.910235861534 -17.69489,123.91166 -17.6913544660941,123.910195533906 -17.68761,123.9004 -17.6886506023374,123.892676582838 -17.6913565828382,123.889970602337 -17.6959199731512,123.890462753315 -17.6973611197487,123.88379355781 -17.6955757284067,123.879603467375 -17.69666,123.88257 -17.6951955339059,123.886105533906 -17.6897465828382,123.887189397663 -17.6870406023374,123.884483417162 -17.6870969788718,123.880572209392 -17.68453,123.8763 -17.6859944660941,123.872764466094 -17.6894778835731,123.871310366602 -17.6886606023374,123.865566582838 -17.693393478263,123.857630220358 -17.6909006023374,123.854823417162 -17.6917297540913,123.849755669545 -17.6859106023374,123.842793417162 -17.6875544660941,123.833704466094 -17.6930034171618,123.832620602337 -17.6960407828303,123.836992568579 -17.7006334171618,123.838280602337 -17.7033393976626,123.840986582838 -17.70472,123.84771 -17.7032327374208,123.857397878426 -17.7056444660941,123.854194466094 -17.70918,123.85273 -17.7127155339059,123.854194466094 -17.7140192669532,123.858538059594 -17.7158395054423,123.859630347285 -17.7189465828382,123.854640602337 -17.7243955339059,123.855724466094 -17.7254793976626,123.861173417162 -17.7223799171425,123.863957669683 -17.7209855339059,123.867845533906 -17.71745,123.86931 -17.7127601207779,123.868132400152 -17.7114055339059,123.871115533906 -17.70847335881,123.872806612483 -17.7125357893628,123.878321450035 -17.7181955339059,123.879264466094 -17.720348175732,123.885853173727 -17.7239756718134,123.885641485869 -17.7254344660941,123.882134466094 -17.72897,123.88067 -17.7335893976626,123.883756582838 -17.7351493976626,123.889593417162 -17.7324434171618,123.892299397663 -17.7272516618488,123.891387386615 -17.7281299795002,123.893311968488 -17.7337755339059,123.894264466094 -17.7358917832685,123.900700763249 -17.7361806023374,123.897236582838 -17.7388865828382,123.894530602337 -17.7443355339059,123.895614466094 -17.7458,123.89915 -17.742716954484,123.903767034099 -17.7436623658693,123.908113692181 -17.7476734171618,123.907990602337 -17.7506289489276,123.911951161768 -17.75463,123.90979 -17.7581655339059,123.911254466094 -17.75963,123.91479 -17.7583309434591,123.918077981015 -17.7616755339059,123.919504466094 -17.7628124538284,123.924686685804 -17.7656353897983,123.928150808263 -17.7672055567842,123.928421517369 -17.7702665828382,123.923930602337 -17.7757155339059,123.925014466094 -17.77718,123.92855 -17.7763179736837,123.931183919063 -17.7788393976626,123.933766582838 -17.7802492689445,123.939660036653 -17.7857834171618,123.941710602337 -17.7884997331295,123.944468542739 -17.8006509568822,123.947388558887 -17.8035900764063,123.944576945598 -17.8048144660941,123.939834466094 -17.80835,123.93837 -17.8118855339059,123.939834466094 -17.81335,123.94337 -17.8113902321169,123.953196387638 -17.8163655339059,123.954374466094 -17.8176776089882,123.958676121352 -17.8234693976626,123.963316582838 -17.8223496168062,123.969644792816 -17.8254434171618,123.969790602337 -17.8281493976626,123.972496582838 -17.8272693976626,123.980893417162 -17.8232634393386,123.983857979329 -17.8247692742538,123.98514890988 -17.82929,123.98221 -17.8339093976626),123.985296582838 -17.8123596754002,(123.982939735101 -17.8089170563281,123.978090122271 -17.8064746806175,123.980052852685 -17.8120317725047,123.983430476464 -17.8123596754002),123.982939735101 -17.8099172406025,(123.97409432942 -17.809796284718,123.973486243124 -17.8095319877873,123.973881791434 -17.8096529436719,123.974489877729 -17.8099172406025),123.97409432942 -17.806560543896,(123.955852586746 -17.8053866196452,123.955619078694 -17.8049634171618,123.956040602337 -17.8061558587321,123.956837366322 -17.806560543896),123.955852586746 -17.7957634471908,(123.955770740071 -17.7937240802137,123.955284135094 -17.7929382951559,123.957218132464 -17.7942769255952,123.957408137685 -17.7957634471908),123.955770740071 -17.7705229778661,(123.946042842097 -17.7683465828382,123.944839397663 -17.7678472789277,123.944505773456 -17.7676805605769,123.947286803522 -17.7705229778661),123.946042842097 -17.7656406023374,(123.938306582838 -17.7642633524138,123.937836276533 -17.7634691870186,123.938969865479 -17.7652827210723,123.940334226544 -17.7656406023374),123.938306582838 -17.7055057208446,(123.902048232028 -17.7042744660941,123.901225533906 -17.7040500807542,123.90222451513 -17.7054449518055,123.902906261382 -17.7055057208446),123.902048232028 -17.7031346871978,(123.896057687228 -17.701167925416,123.896716978229 -17.7028556036391,123.897919264976 -17.70281,123.89769 -17.7031346871978),123.896057687228 -17.698712074584,(123.896423021771 -17.6980000268488,123.895947246685 -17.6978893976626,123.896503417162 -17.6978252490562,123.896599422336 -17.698712074584),123.896423021771 -17.6949142715933,(123.878846532625 -17.6942278163569,123.877819179763 -17.6940930211282,123.878297790608 -17.6949142715933,123.878846532625