GDACS_WF_1017837_4
info-gdacs@gdacs.org
2023-10-15T22:00:00-00:00
Actual
Alert
Public
1017837
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 09/10/2023, a forest fire started in Australia, until 16/10/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017837
eventid
1017837
currentepisodeid
4
glide
version
0
fromdate
Mon, 09 Oct 2023 00:00:00 GMT
todate
Mon, 16 Oct 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017837
country
Australia
eventname
severity
Green impact for forestfire in 18972 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Mon, 16 Oct 2023 08:21:39 GMT
Polygon
-16.4145193976626,136.134666582838 -16.4145193976626,136.138493417162 -16.4118134171618,136.141199397663 -16.4079202117657,136.14115504993 -16.4077593976626,136.144173417162 -16.4048237194415,136.14692508738 -16.4054193976626,136.151643417162 -16.4027134171618,136.154349397663 -16.3976100236541,136.153496428086 -16.3914034171618,136.160439397663 -16.3875765828382,136.160439397663 -16.3853139146929,136.158396880988 -16.3824634171618,136.161829397663 -16.3785407302161,136.161765350988 -16.3690187288446,136.167943942925 -16.3716,136.17244 -16.3685134171618,136.177059397663 -16.3628331367771,136.175629325117 -16.3597378988879,136.177080961753 -16.3585855339059,136.182185533906 -16.35505,136.18365 -16.3499623807402,136.180623499109 -16.350535396615,136.186542438207 -16.3550534171618,136.186080602337 -16.3577593976626,136.188786582838 -16.3577593976626,136.192613417162 -16.3550534171618,136.195319397663 -16.3496044660941,136.194235533906 -16.348484603385,136.188967561793 -16.3465855339059,136.192975533906 -16.3423032592048,136.194291464021 -16.3420993976626,136.197093417162 -16.3393934171618,136.199799397663 -16.3207365828382,136.195249397663 -16.31765,136.19063 -16.3196318205845,136.186748780875 -16.3188252015961,136.183517517164 -16.3149884293236,136.181542543525 -16.3167093976626,136.194493417162 -16.3140034171618,136.197199397663 -16.3095519158879,136.196782008551 -16.3119193976626,136.199746582838 -16.3119193976626,136.203573417162 -16.3084589915435,136.206429462248 -16.3059755339059,136.212915533906 -16.3005265828382,136.213999397663 -16.2975443776924,136.209904742095 -16.2951112880832,136.212095734152 -16.2981655339059,136.213464466094 -16.29963,136.217 -16.2981655339059,136.220535533906 -16.29463,136.222 -16.2910944660941,136.220535533906 -16.28963,136.217 -16.2927987119168,136.212364265848 -16.2897444660941,136.210995533906 -16.2883530740438,136.207827368026 -16.2829944660941,136.206725533906 -16.2817680775678,136.204386896759 -16.2802508217537,136.205444223277 -16.2807609178558,136.207675932417 -16.2840655339059,136.209094466094 -16.28553,136.21263 -16.2840655339059,136.216165533906 -16.2786165828382,136.217249397663 -16.2716744660941,136.213675533906 -16.27021,136.21014 -16.2716051549477,136.20500126284 -16.269609962424,136.203076203596 -16.2667434171618,136.206589397663 -16.2612944660941,136.205505533906 -16.2598304116849,136.199331638502 -16.2551765828382,136.199319397663 -16.2524706023374,136.196613417162 -16.2538463248644,136.190969452298 -16.2517906023374,136.188173417162 -16.2517578563132,136.184511208219 -16.2466765828382,136.185349397663 -16.2439706023374,136.182643417162 -16.2439706023374,136.178816582838 -16.2493947932349,136.170756295046 -16.24801,136.16734 -16.2525822063679,136.150746286664 -16.2467144660941,136.149145533906 -16.24525,136.14561 -16.2467144660941,136.142074466094 -16.2529166305049,136.137527569788 -16.2510611054921,136.133735557684 -16.2444744660941,136.131965533906 -16.2432411696904,136.127267831486 -16.2386034380251,136.123241269431 -16.2373555339059,136.127865533906 -16.2331100253286,136.130100101827 -16.2379193976626,136.134626582838 -16.2368355339059,136.140075533906 -16.22983,136.14207 -16.2258751777833,136.141287813021 -16.2290155339059,136.143574466094 -16.23048,136.14711 -16.2273934171618,136.151729397663 -16.2235665828382,136.151729397663 -16.2209206730971,136.149113319407 -16.2144644660941,136.147075533906 -16.2066306023374,136.136723417162 -16.2066306023374,136.132896582838 -16.2087845490121,136.130559459547 -16.2043591456031,136.131056409229 -16.2043193976626,136.134683417162 -16.198516260318,136.139919636802 -16.1996948443446,136.142973807375 -16.2027334171618,136.143130602337 -16.2054393976626,136.145836582838 -16.2046527043893,136.150840786848 -16.2107003982141,136.159068721218 -16.21478,136.15679 -16.2186422177043,136.158743382949 -16.2199044660941,136.156224466094 -16.22344,136.15476 -16.2269755339059,136.156224466094 -16.2348093976626,136.166706582838 -16.2344879195169,136.171957900336 -16.2375593976626,136.174736582838 -16.2375593976626,136.178563417162 -16.235470682812,136.180856953941 -16.23756,136.18481 -16.2360955339059,136.188345533906 -16.2306465828382,136.189429397663 -16.22756,136.18481 -16.2298880391177,136.180697445047 -16.2149465828382,136.178139397663 -16.2118885659863,136.173376389089 -16.2088774288959,136.171890307476 -16.20415,136.17552 -16.1969001252537,136.172940327189 -16.19415,136.17388 -16.1839444660941,136.171335533906 -16.18248,136.1678 -16.1834206023374,136.162266582838 -16.1902465828382,136.157690602337 -16.1956955339059,136.158774466094 -16.1965412270386,136.16457986469 -16.1980698747463,136.165919672811 -16.202854179719,136.165441293298 -16.1980570690726,136.155605812023 -16.1916765828382,136.154889397663 -16.18859,136.15027 -16.1908975665164,136.146171124402 -16.18971,136.14305 -16.192003739682,136.138960363198 -16.1911906023374,136.133916582838 -16.1958672956107,136.129679213152 -16.1928606023374,136.126913417162 -16.1929706023374,136.121116582838 -16.19759,136.11803 -16.2030599711225,136.121155480505 -16.2056711553117,136.118721545709 -16.1984006023374,136.113043417162 -16.1991852379431,136.108042292669 -16.1934144660941,136.102135533906 -16.1921256487686,136.097716954009 -16.186759603163,136.097533373219 -16.1857566267854,136.103520018395 -16.1898955339059,136.104864466094 -16.1943693976626,136.109846582838 -16.1931993976626,136.118083417162 -16.1904934171618,136.120789397663 -16.1876936502929,136.120993694081 -16.1879093976626,136.125143417162 -16.18329,136.12823 -16.1731006023374,136.121173417162 -16.1731006023374,136.117346582838 -16.1775697041693,136.114289895699 -16.1759106023374,136.112283417162 -16.176085375618,136.108195016139 -16.17287,136.10355 -16.1761314947355,136.097988590368 -16.1739206023374,136.095613417162 -16.1750694529575,136.09012104326 -16.1725406023374,136.087533417162 -16.17147,136.08156 -16.1767544660941,136.072534466094 -16.1803014774479,136.071072283006 -16.1792,136.06808 -16.1806644660941,136.064544466094 -16.1861134171618,136.063460602337 -16.1888193976626,136.066166582838 -16.1885614680714,136.070379436074 -16.189806430532,136.070528202356 -16.1938493125218,136.070094144793 -16.1931606023374,136.065236582838 -16.19778,136.06215 -16.2024256863442,136.065368744966 -16.2068334171618,136.064980602337 -16.2096539259519,136.06826235543 -16.2121365828382,136.065890602337 -16.2159634171618,136.065890602337 -16.2186693976626,136.068596582838 -16.2190221742173,136.072596997924 -16.224052063037,136.078400332985 -16.2235106023374,136.073026582838 -16.2262165828382,136.070320602337 -16.2364934171618,136.070700602337 -16.2414814116021,136.075830169448 -16.2444665828382,136.071720602337 -16.2557213629305,136.07335154306 -16.26295,136.07013 -16.2664855339059,136.071594466094 -16.2679108927305,136.07493339448 -16.2719555339059,136.076514466094 -16.2742767287139,136.082007812841 -16.27762,136.08885 -16.2748813821655,136.09323689488 -16.2750188111101,136.098917428169 -16.27802,136.09781 -16.2815555339059,136.099274466094 -16.28302,136.10281 -16.2815555339059,136.106345533906 -16.2761065828382,136.107429397663 -16.2734006023374,136.104723417162 -16.2739511888899,136.100072571831 -16.2647565828382,136.101989397663 -16.2588788684653,136.096743608055 -16.2617393976626,136.099866582838 -16.2606555339059,136.105315533906 -16.25712,136.10678 -16.2526796945186,136.104187387502 -16.2489240952487,136.104865989239 -16.25,136.10782 -16.24890660569,136.110800185736 -16.25147,136.11507 -16.2485952510484,136.119547854785 -16.2494788303096,136.123722168514 -16.2542034171618,136.124360602337 -16.256409380991,136.126318255006 -16.2594465828382,136.121450602337 -16.2648955339059,136.122534466094 -16.2659793976626,136.127983417162 -16.2632734171618,136.130689397663 -16.259999758648,136.130799431172 -16.2606793976626,136.135643417162 -16.2581933694951,136.138202430212 -16.2628455339059,136.139764466094 -16.2640963856442,136.142226088113 -16.26759,136.14148 -16.2711255339059,136.142944466094 -16.2742529558213,136.149282111653 -16.2834634171618,136.147530602337 -16.2892360467741,136.151987823747 -16.2931934171618,136.151900602337 -16.296045158107,136.155339370077 -16.3006334171618,136.154830602337 -16.3029207779698,136.156910074194 -16.3052142048691,136.153783053069 -16.30129,136.14864 -16.3043765828382,136.144020602337 -16.3082034171618,136.144020602337 -16.3128481780335,136.149321644574 -16.3207771978074,136.147480833535 -16.3220344660941,136.141024466094 -16.3272809419326,136.13990032751 -16.3258406023374,136.134026582838 -16.3307444660941,136.127434466094 -16.33428,136.12597 -16.3381642696301,136.127956385988 -16.3404306023374,136.119976582838 -16.3431365828382,136.117270602337 -16.3469634171618,136.117270602337 -16.3509447932349,136.120148060049 -16.35008,136.11751 -16.3515206023374,136.110316582838 -16.3551585598792,136.107425220578 -16.35255,136.10107 -16.3540144660941,136.097534466094 -16.35755,136.09607 -16.3615365683885,136.0982094869 -16.3670065828382,136.093110602337 -16.3735354873908,136.091999405679 -16.3765065828382,136.087960602337 -16.38405,136.08629 -16.3886693976626,136.089376582838 -16.3886693976626,136.093203417162 -16.3859989465154,136.095885657707 -16.3903155339059,136.098054466094 -16.39178,136.10159 -16.3903155339059,136.105125533906 -16.3869140431517,136.106779937289 -16.3870512321475,136.109870367054 -16.3917,136.10763 -16.3952355339059,136.109094466094 -16.39812,136.11438 -16.3965756099148,136.120477524578 -16.3997334171618,136.120610602337 -16.4024393976626,136.123316582838 -16.4024393976626,136.127143417162 -16.3988996449069,136.130015245276 -16.4002219192785,136.13352117132 -16.405770489059,136.133933415548 -16.4079865828382,136.131960602337 -16.4118134171618,136.131960602337 -16.4145193976626),136.134666582838 -16.3849911534069,(136.153726165413 -16.3848565828382,136.153699397663 -16.3840922123387,136.153188661623 -16.3847260853071,136.154633119012 -16.3849911534069),136.153726165413 -16.3787494671693,(136.097703926642 -16.3769865293646,136.09735325651 -16.3772607520006,136.098731866798 -16.3783685258179,136.09895221671 -16.3787494671693),136.097703926642 -16.3723438509808,(136.105408655615 -16.3720692479994,136.104028133202 -16.3716820554031,136.10460869284 -16.37182928617,136.106178756276 -16.3723438509808),136.105408655615 -16.3616791849592,(136.135379183252 -16.3616705535094,136.134150871443 -16.3587755339059,136.134604466094 -16.3598064461941,136.136147335365 -16.3616791849592),136.135379183252 -16.3554964859903,(136.133191018236 -16.3537439192825,136.132382984303 -16.349401956177,136.133701259214 -16.3490593976626,136.135423417162 -16.3456747086432,136.139709144965 -16.3480127327176,136.14349155114 -16.3499567140466,136.142146761136 -16.3517044660941,136.134604466094 -16.3554964859903),136.133191018236 -16.3405109647731,(136.181394419064 -16.3392134316115,136.177636158005 -16.3389355339059,136.179174466094 -16.3401229629511,136.181317240703 -16.3405109647731),136.181394419064 -16.3392467281043,(136.130269598091 -16.3390957303699,136.130043614012 -16.3391363126874,136.130247635099 -16.3392467281043),136.130269598091 -16.3343717423381,(136.147292272134 -16.3343384699509,136.147242476488 -16.3342182526259,136.147322803136 -16.3343717423381),136.147292272134 -16.3337017473741,(136.147437196864 -16.3306153462623,136.147388879784 -16.3321044660941,136.148504466094 -16.3337017473741),136.147437196864 -16.3317224550744,(136.155003814012 -16.3310206023374,136.153953417162 -16.3309640712801,136.153669216345 -16.330526072087,136.154324728461 -16.3317224550744),136.155003814012 -16.3139315706764,(136.180527456475 -16.3131000517827,136.176242631403 -16.308156386952,136.173671191948 -16.309367794514,136.179860578847 -16.31108,136.17952 -16.3139315706764),136.180527456475 -16.3082048841741,(136.168381389275 -16.3080622448681,136.167664293058 -16.3077652138897,136.167723376193 -16.3082048841741),136.168381389275 -16.3031883979708,(136.166161383299 -16.3023802103721,136.162798942388 -16.3017346574608,136.16333357242 -16.3019796833548,136.165674599227 -16.3031883979708),136.166161383299 -16.29853639249,(136.206395327171 -16.2979996707829,136.206050689856 -16.2981756223076,136.206935257905 -16.29853639249),136.206395327171 -16.2972714398572,(136.197975898492 -16.2942239594114,136.196986193252 -16.2945813967845,136.202718863915 -16.2957003292171,136.203179310144 -16.2972714398572),136.197975898492 -16.2940753425392,(136.16123642758 -16.293954841893,136.160630629923 -16.2919217120469,136.161855767278 -16.2918119645179,136.162407505365 -16.2940753425392),136.16123642758 -16.2932960405886,(136.196143806748 -16.2925788887011,136.1950705131 -16.2920297683019,136.195440202824 -16.2923334171618,136.195500602337 -16.2932960405886),136.196143806748 -16.2838567016885,(136.180659159562 -16.2811658289998,136.182099873791 -16.2822393976626,136.183706582838 -16.2824168125919,136.186641492081 -16.2838567016885),136.180659159562 -16.280241039104,(136.191911238617 -16.28002,136.1908 -16.2802231874081,136.189778507919 -16.2790383138454,136.190337879835 -16.2799668671409,136.191965774811 -16.280241039104),136.191911238617 -16.2766641710002,(136.180810126209 -16.275816531396,136.175038456107 -16.27333,136.17082 -16.2759321152505,136.16652431323 -16.273013331844,136.163596045738 -16.2675144660941,136.162545533906 -16.266247154806,136.160001164142 -16.2601865286974,136.164351455004 -16.2573352067651,136.169693704954 -16.25872,136.17311 -16.2633493976626,136.176266582838 -16.2633493976626,136.180093417162 -16.2615929895161,136.1821649137 -16.2628568632229,136.187133875937 -16.2650665828382,136.185170602337 -16.2686480980719,136.185121805336 -16.2716865828382,136.180260602337 -16.2766641710002),136.180810126209 -16.2711089540908,(136.19612442298 -16.2705153607817,136.194723238553 -16.2689951105438,136.195500506135 -16.2692623968116,136.198663965103 -16.2711089540908),136.19612442298 -16.257420241352,(136.129000568828 -16.257240619009,136.128731744994 -16.2572888945079,136.128974442316 -16.257420241352),136.129000568828 -16.2574311315347,(136.095566391945 -16.2562426803807,136.092295978026 -16.2498192679892,136.090387507596 -16.2509134171618,136.091020602337 -16.2538998927848,136.095136727044 -16.2574311315347),136.095566391945 -16.2424458975769,(136.103628694543 -16.2419990135675,136.098120114641 -16.23853,136.09079 -16.2402932315483,136.08478679288 -16.230930411273,136.084534270756 -16.2342955339059,136.087024466094 -16.23576,136.09056 -16.2342955339059,136.094095533906 -16.2286434171618,136.096429397663 -16.2230497380537,136.095128933087 -16.21891,136.09652 -16.2153744660941,136.095055533906 -16.214022632334,136.092086240981 -16.2092069860197,136.093011469624 -16.21062,136.09647 -16.2093767492734,136.099674461712 -16.2130855339059,136.101104466094 -16.21455,136.10464 -16.2130855339059,136.108175533906 -16.2076483808628,136.109261744436 -16.2127993976626,136.112586582838 -16.2127993976626,136.116413417162 -16.2105288446883,136.118828454291 -16.2126393976626,136.121136582838 -16.21429,136.12566 -16.2117554509879,136.129910540453 -16.218080396837,136.131556626781 -16.2200944660941,136.127584466094 -16.2243638548196,136.1262659728 -16.2256544660941,136.123604466094 -16.2286683736437,136.122243757933 -16.2282305627079,136.118088149044 -16.22552,136.11372 -16.2274244660941,136.105964466094 -16.2328734171618,136.104880602337 -16.237133740073,136.109477939099 -16.2424458975769),136.103628694543 -16.2120278257828,(136.075523002076 -16.2120114419683,136.075512054761 -16.2120207226537,136.075558711917 -16.2120278257828),136.075523002076 -16.2093455220942,(136.071995689895 -16.2093160740482,136.07184764457 -16.2092567754087,136.071936391256 -16.2093455220942),136.071995689895 -16.2057932507266,(136.101435538288 -16.2054505246489,136.101436289257 -16.2050765746884,136.101995944923 -16.2051550816093,136.102390625866 -16.2057932507266),136.101435538288 -16.2049216191372,(136.106508255564 -16.2047249183907,136.105519374134 -16.2041647620569,136.106357707331 -16.2049216191372),136.106508255564 -16.2015884521793,(136.080494952529 -16.1982244660941,136.078955533906 -16.1969513480424,136.07638197157 -16.19227,136.07978 -16.18881,136.08033 -16.1844142280454,136.078724490864 -16.1856803968369,136.080796626781 -16.1904055339059,136.082024466094 -16.1914934171618,136.088900602337 -16.1930078183135,136.089912492836 -16.19245,136.08591 -16.1939144660941,136.082374466094 -16.2015884521793),136.080494952529 -16.1847472956107,(136.113079213152 -16.184632871743,136.11305645283 -16.1842535930834,136.113624083457 -16.1843432129745,136.113683965554 -16.1847472956107),136.113079213152 -16.1980879746057,(136.072088740042 -16.1962006874782,136.071835855207 -16.1968893976626,136.072866582838 -16.1970786519576,136.07381802843 -16.1980879746057),136.072088740042 -16.1844485319286,(136.073030563926 -16.1842,136.07308 -16.1841885225521,136.073077716994 -16.184302773904,136.073248706225 -16.1844485319286,136.073030563926