GDACS_WF_1017850_5
info-gdacs@gdacs.org
2023-10-16T22:00:00-00:00
Actual
Alert
Public
1017850
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 12/10/2023, a forest fire started in Australia, until 17/10/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1017850
eventid
1017850
currentepisodeid
5
glide
version
0
fromdate
Thu, 12 Oct 2023 00:00:00 GMT
todate
Tue, 17 Oct 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1017850
country
Australia
eventname
severity
Green impact for forestfire in 8294 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Wed, 18 Oct 2023 08:23:08 GMT
Polygon
-34.79565,117.21655 -34.7900426854909,117.225079795831 -34.79139,117.22844 -34.7899255339059,117.231975533906 -34.78639,117.23344 -34.7828544660941,117.231975533906 -34.7816091864913,117.226256276944 -34.7802461157096,117.22935473106 -34.7802190759252,117.231641207116 -34.7876555339059,117.237894466094 -34.78912,117.24143 -34.7860334171618,117.246049397663 -34.7794,117.24706 -34.7761407028951,117.245838612584 -34.7769942873372,117.252512000235 -34.7798693976626,117.256166582838 -34.78176,117.26313 -34.7762855339059,117.271445533906 -34.7728418993906,117.272891720075 -34.7747293976626,117.275956582838 -34.7747293976626,117.279783417162 -34.77011,117.28287 -34.7665744660941,117.281405533906 -34.7649006023374,117.278483417162 -34.7627,117.27107 -34.7638527236007,117.265480292846 -34.7604968610018,117.26098531277 -34.7546731193574,117.257288042977 -34.7477665828382,117.257349397663 -34.7453349319613,117.255053980458 -34.74105,117.25764 -34.7286665828382,117.253159397663 -34.72558,117.24854 -34.7276751040951,117.240312973006 -34.7251328646222,117.238005852524 -34.71796,117.24129 -34.7133406023374,117.238203417162 -34.7148093733534,117.221794778087 -34.7092514776703,117.217357181512 -34.7082993976626,117.221163417162 -34.7055934171618,117.223869397663 -34.7017665828382,117.223869397663 -34.6990606023374,117.221163417162 -34.6996271902124,117.216488624159 -34.6948544660941,117.214195533906 -34.6935225200475,117.207892956547 -34.6907,117.20345 -34.693103664466,117.199286913805 -34.6927806023374,117.194976582838 -34.6965395507906,117.192061153989 -34.6939806023374,117.189453417162 -34.69293,117.18363 -34.6950504423568,117.176009605541 -34.6923306023374,117.172643417162 -34.6934707902195,117.167156831517 -34.69254,117.16442 -34.6965065828382,117.158820602337 -34.7154953942398,117.162750147376 -34.7168544660941,117.159744466094 -34.72039,117.15828 -34.7239255339059,117.159744466094 -34.7250311291282,117.165084165706 -34.7282814815967,117.165142369598 -34.7284806023374,117.162316582838 -34.7311865828382,117.159610602337 -34.7366117362966,117.16067856504 -34.73945,117.15968 -34.7429855339059,117.161144466094 -34.7444122787467,117.164869637546 -34.7471955339059,117.166184466094 -34.74848778205,117.168854201899 -34.7539139943007,117.167320196318 -34.7541706023374,117.157346582838 -34.7572465828382,117.154440602337 -34.7606105553857,117.154348533406 -34.7607806023374,117.151376582838 -34.7634865828382,117.148670602337 -34.7672959721532,117.148667132309 -34.7678706023374,117.133936582838 -34.7710644660941,117.127784466094 -34.7746,117.12632 -34.7792193976626,117.129406582838 -34.7780318205128,117.146227143605 -34.7789296909438,117.148737079295 -34.7847593976626,117.153466582838 -34.7845393976626,117.163333417162 -34.7818334171618,117.166039397663 -34.7765404412508,117.165059753174 -34.77355,117.16616 -34.7688463453421,117.162649828642 -34.7632453223543,117.163958555434 -34.7632574496017,117.166860476776 -34.7673834171618,117.166660602337 -34.7700912410011,117.169375849927 -34.77312,117.16825 -34.7766555339059,117.169714466094 -34.7786823055187,117.179076511734 -34.7791206023374,117.170296582838 -34.7818265828382,117.167590602337 -34.7856534171618,117.167590602337 -34.7883593976626,117.170296582838 -34.7870317297945,117.18721707572 -34.788,117.19001 -34.7849164770242,117.196785266608 -34.7859435540921,117.19876075936 -34.7928234171618,117.197880602337 -34.7955293976626,117.200586582838 -34.79565),117.21655 -34.7838661414746,(117.21023880373 -34.7837797427265,117.207695552108 -34.7803744616474,117.207514480678 -34.7799245457224,117.208187827444 -34.7824655339059,117.209454466094 -34.7838661414746),117.21023880373 -34.7806975093269,(117.217638420535 -34.7753944660941,117.216525533906 -34.77393,117.21299 -34.7751554542776,117.209812172556 -34.7740453312355,117.209501607427 -34.7719638446883,117.214501205515 -34.7738465980898,117.216149463466 -34.780680038921,117.219033749803 -34.7806975093269),117.217638420535 -34.767671466758,(117.194407936647 -34.7624838205111,117.194324326138 -34.7640255339059,117.195354466094 -34.7667818717246,117.196123208542 -34.767671466758),117.194407936647 -34.7654130728378,(117.207315600863 -34.7636613333004,117.205439026811 -34.7609420476395,117.207579180643 -34.76262,117.20807 -34.7654130728378),117.207315600863 -34.7619261794889,(117.194175673862 -34.7611194426459,117.193636629537 -34.7610470055725,117.194000795297 -34.7619261794889),117.194175673862 -34.7607525503983,(117.169859523224 -34.7579860056993,117.170329803682 -34.7583534723353,117.172242816786 -34.7606162127331,117.170544938953 -34.7607525503983),117.169859523224 -34.7559252273787,(117.222043114681 -34.7558286679478,117.21996232236 -34.7538712978159,117.219298322714 -34.7539864988867,117.221722522394 -34.7559252273787),117.222043114681 -34.7550132816787,(117.205011917944 -34.7536039625549,117.200870194504 -34.74897,117.20403 -34.7412316802499,117.201381941821 -34.7407337290949,117.205570882502 -34.7419206258948,117.208622599796 -34.7431144660941,117.207724466094 -34.7502565828382,117.204390602337 -34.7550132816787),117.205011917944 -34.7516687021841,(117.216571677286 -34.7513680525151,117.213850482727 -34.7498975983857,117.21498792627 -34.7497191426564,117.215909231266 -34.7516687021841),117.216571677286 -34.7474907497936,(117.241902958998 -34.7472164129632,117.241230441991 -34.7467577314623,117.241412245834 -34.7471331444788,117.241974091118 -34.7474907497936),117.241902958998 -34.7410079165376,(117.239427632575 -34.7372623937027,117.238792191739 -34.7366,117.24457 -34.7363728504477,117.245711957915 -34.7382276570117,117.245512595321 -34.7410079165376),117.239427632575 -34.7548033698096,(117.19764025824 -34.7536592947634,117.197090166453 -34.7539560374451,117.198959805496 -34.7539706023374,117.198886582838 -34.7548033698096),117.19764025824 -34.7469298138741,(117.181258102281 -34.7443006023374,117.178603417162 -34.74388221795,117.174675798101 -34.7369245669823,117.173053779955 -34.7337134171618,117.175410602337 -34.7368,117.18003 -34.733915125756,117.18551192542 -34.7384155339059,117.186784466094 -34.73988,117.19032 -34.7372811557245,117.194613501174 -34.7390883197501,117.195238058179 -34.74371,117.19214 -34.7466437737152,117.193202382789 -34.7469298138741),117.181258102281 -34.7349938944922,(117.214688600967 -34.7323206023374,117.210633417162 -34.730463501027,117.202946249843 -34.7294808942783,117.204984106833 -34.7282624270931,117.214411812814 -34.7285427228811,117.215820954898 -34.73241,117.21386 -34.7349938944922),117.214688600967 -34.7316261724711,(117.175064576445 -34.7310947316067,117.174958866285 -34.7311351851338,117.175162239899 -34.7316261724711),117.175064576445 -34.731114874244,(117.18712807458 -34.7266144660941,117.185855533906 -34.7254758132017,117.180682026424 -34.7216506023374,117.177753417162 -34.7218688708718,117.167985834294 -34.7185936655896,117.16792268687 -34.7173355339059,117.172495533906 -34.71243,117.17464 -34.7115266617558,117.177335746732 -34.7127400988682,117.18003694291 -34.7152855339059,117.181304466094 -34.71811,117.18706 -34.7162593976626,117.193493417162 -34.7122543034636,117.196457807444 -34.7147093976626,117.200576582838 -34.7144596885842,117.204777133207 -34.7157640834976,117.205097910792 -34.7169544660941,117.200184466094 -34.7247525699418,117.197302705711 -34.7276765828382,117.193500602337 -34.7310465922642,117.193409734216 -34.72988,117.19032 -34.731114874244),117.18712807458 -34.7077032475259,(117.187610441251 -34.707056594789,117.186381356091 -34.6994604492094,117.192368846011 -34.7020193976626,117.194976582838 -34.7026359491437,117.195903530157 -34.7045944660941,117.189194466094 -34.7077032475259,117.187610441251