GDACS_WF_1018212_3
info-gdacs@gdacs.org
2023-10-28T22:00:00-00:00
Actual
Alert
Public
1018212
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 26/10/2023, a forest fire started in Australia, until 29/10/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1018212
eventid
1018212
currentepisodeid
3
glide
version
0
fromdate
Thu, 26 Oct 2023 00:00:00 GMT
todate
Sun, 29 Oct 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1018212
country
Australia
eventname
severity
Green impact for forestfire in 8693 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Mon, 30 Oct 2023 09:17:05 GMT
Polygon
-23.51459,130.32906 -23.5131255339059,130.332595533906 -23.5100307881227,130.333972321791 -23.5089067804898,130.337384618648 -23.51082,130.34122 -23.5093555339059,130.344755533906 -23.50582,130.34622 -23.5014803886621,130.343552146988 -23.50274,130.35353 -23.5006655339059,130.358685533906 -23.4965699413924,130.360038597416 -23.49945,130.36452 -23.4979855339059,130.368055533906 -23.49445,130.36952 -23.4909144660941,130.368055533906 -23.48945,130.36452 -23.4917674086889,130.360414548073 -23.4874830765834,130.357875898207 -23.4863655339059,130.363155533906 -23.4817162328244,130.364806413416 -23.4793575254967,130.36992915431 -23.48063,130.3766 -23.4778616799526,130.381382374493 -23.4809331580054,130.382785876365 -23.4828906023374,130.372746582838 -23.4855965828382,130.370040602337 -23.4910455339059,130.371124466094 -23.4932993976626,130.376166582838 -23.4932993976626,130.379993417162 -23.4911891000757,130.382301375065 -23.4953993976626,130.385306582838 -23.4939648665716,130.396851770239 -23.49743,130.40561 -23.4959655339059,130.409145533906 -23.49243,130.41061 -23.4877870215961,130.407404868769 -23.4847334171618,130.409999397663 -23.4809065828382,130.409999397663 -23.4785228223218,130.407775653447 -23.4757934171618,130.410599397663 -23.4719665828382,130.410599397663 -23.4672244660941,130.406565533906 -23.4659510081333,130.402069737268 -23.4612865828382,130.402629397663 -23.4585806023374,130.399923417162 -23.4607744660941,130.389774466094 -23.4665665651502,130.388919886493 -23.4692207469687,130.385751410323 -23.46789,130.38124 -23.4709486479827,130.374998048412 -23.46989540258,130.371781745816 -23.4644144660941,130.370385533906 -23.4633306023374,130.364936582838 -23.4660365828382,130.362230602337 -23.4690352476786,130.36168130297 -23.4711444660941,130.356464466094 -23.4748212855867,130.355028103451 -23.4748239049995,130.351452986579 -23.4722666993124,130.34040729825 -23.470638154452,130.336658731407 -23.4682034432525,130.335454986542 -23.4677352234804,130.346522761823 -23.47019,130.35072 -23.4687255339059,130.354255533906 -23.4664940671862,130.355460604909 -23.4664693976626,130.359163417162 -23.4637634171618,130.361869397663 -23.4610760522136,130.362096052214 -23.4597655339059,130.366405533906 -23.4539434171618,130.371559397663 -23.4484944660941,130.370475533906 -23.4474106023374,130.365026582838 -23.4552813963242,130.358058689003 -23.4550106023374,130.353826582838 -23.457484891873,130.351275413291 -23.4536306023374,130.347893417162 -23.4536306023374,130.344066582838 -23.4563365828382,130.341360602337 -23.4594481018904,130.341218317283 -23.4533444660941,130.339765533906 -23.4522606023374,130.334316582838 -23.4549665828382,130.331610602337 -23.4593790732347,130.332001925215 -23.4607591842819,130.328954631715 -23.4602149184276,130.327943475243 -23.45551,130.33146 -23.4519744660941,130.329995533906 -23.4508906023374,130.324546582838 -23.4559387070129,130.321545275127 -23.4505944660941,130.320245533906 -23.4495106023374,130.314796582838 -23.4522165828382,130.312090602337 -23.4560434171618,130.312090602337 -23.4587581355205,130.314840511016 -23.4640055339059,130.315964466094 -23.4651015965581,130.321352089172 -23.4668951478835,130.321751894846 -23.4670178165123,130.318871408311 -23.4604426907481,130.296216199301 -23.4575379118617,130.294958426233 -23.4549155339059,130.300765533906 -23.4494665828382,130.301849397663 -23.4467606023374,130.299143417162 -23.4481062264429,130.292101315895 -23.4453906023374,130.289393417162 -23.4461483697697,130.284432503732 -23.4441703719736,130.281296517751 -23.43968,130.28419 -23.4350606023374,130.281103417162 -23.4361444660941,130.275654466094 -23.43968,130.27419 -23.4438545943986,130.27661088771 -23.4449668591678,130.272375674418 -23.4430761668061,130.270575285456 -23.4418355339059,130.272985533906 -23.4383,130.27445 -23.4336806023374,130.271363417162 -23.4336806023374,130.267536582838 -23.4363865828382,130.264830602337 -23.4402134171618,130.264830602337 -23.4424838331939,130.266884714544 -23.4431685974503,130.26530638231 -23.4410167210771,130.262430624009 -23.43693,130.26472 -23.4323106023374,130.261633417162 -23.4323106023374,130.257806582838 -23.4355361724711,130.254997249533 -23.4320144660941,130.253535533906 -23.43055,130.25 -23.4320144660941,130.246464466094 -23.4346254362204,130.24518390717 -23.4295606023374,130.242173417162 -23.4297700894967,130.238033063148 -23.4280545979142,130.234524208856 -23.42385,130.23699 -23.4192306023374,130.233903417162 -23.4203144660941,130.228454466094 -23.4236329102893,130.227033181828 -23.4266365828382,130.222830602337 -23.4292480870405,130.222588858146 -23.4292872259475,130.219294377281 -23.4227665828382,130.218879397663 -23.4175644660941,130.216085533906 -23.4161,130.21255 -23.4189852956261,130.208065098153 -23.4151106023374,130.204753417162 -23.4151106023374,130.200926582838 -23.41973,130.19784 -23.4257994904794,130.202004977912 -23.4279965828382,130.200060602337 -23.4318234171618,130.200060602337 -23.4347053536127,130.203651173135 -23.4398555339059,130.204794466094 -23.4421552523698,130.211247051882 -23.4461195020464,130.211485121719 -23.45085,130.20784 -23.4586234171618,130.209770602337 -23.4629200284507,130.212955072557 -23.4684355339059,130.213994466094 -23.4719593976626,130.220066582838 -23.472552717768,130.227549344202 -23.4760693976626,130.230416582838 -23.4749964349601,130.235849219325 -23.47599,130.23868 -23.4745255339059,130.242215533906 -23.4688043486744,130.244338684528 -23.4682337272158,130.246481224738 -23.4736355339059,130.247574466094 -23.4751,130.25111 -23.4737345220481,130.254497387682 -23.4797455339059,130.259844466094 -23.48121,130.26338 -23.4794555339059,130.267865533906 -23.474744886251,130.269096255342 -23.4740888878518,130.271333161876 -23.4754416594893,130.280194937923 -23.4787793976626,130.283026582838 -23.4789121833859,130.292608229761 -23.4814810797605,130.298306485442 -23.4863855339059,130.301284466094 -23.48785,130.30482 -23.4863855339059,130.308355533906 -23.483951798276,130.309600838697 -23.4835555242791,130.313483161876 -23.4849821447521,130.329144068255 -23.48742,130.33333 -23.4855171153472,130.340405678847 -23.4872496699327,130.353313419531 -23.4903175469491,130.347241092118 -23.48874,130.34363 -23.4910018605739,130.327658229761 -23.49001,130.32483 -23.4914744660941,130.321294466094 -23.49501,130.31983 -23.5048434171618,130.322380602337 -23.5072902503391,130.32469874146 -23.5115034171618,130.324440602337 -23.51459),130.32906 -23.4950100586076,(130.359631402584 -23.4945190496135,130.35946100055 -23.4944225913111,130.359525451927 -23.49445,130.35952 -23.4950100586076),130.359631402584 -23.4870869234166,(130.357164101793 -23.4869203300673,130.356326580469 -23.4867238198131,130.356620678847 -23.4870869234166),130.357164101793 -23.4549899960355,(130.285759274254 -23.4539804589805,130.284277829247 -23.4538311010276,130.284371847494 -23.4546293976626,130.285566582838 -23.4549899960355),130.285759274254 -23.4529079843317,(130.239250255558 -23.4525973918249,130.237688801583 -23.4399277086814,130.23506492663 -23.4388229153666,130.236451100722 -23.44246,130.24118 -23.4409955339059,130.244715533906 -23.4383845637796,130.24599609283 -23.44055,130.25 -23.4369438275289,130.254722750466 -23.4388434171618,130.255100602337 -23.4416732789229,130.258429375991 -23.4447548374377,130.256339939265 -23.4435906023374,130.250056582838 -23.4478418792503,130.24704322377 -23.44684,130.2442 -23.4483044660941,130.240664466094 -23.4529079843317),130.239250255558 -23.4602584034419,(130.324457910828 -23.4600412929871,130.324414724873 -23.4601293976626,130.324546582838 -23.4601850815724,130.324826524757 -23.4602584034419),130.324457910828 -23.4697347991298,(130.39494866219 -23.4690434348498,130.394650113507 -23.4679401936977,130.396703865516 -23.4684277245839,130.398690474475 -23.4697347991298),130.39494866219 -23.4782722054861,(130.403359421153 -23.4780556672151,130.403402493293 -23.4781771776782,130.403584346553 -23.4782006023374,130.403466582838 -23.4782722054861,130.403359421153