GDACS_WF_1018226_3
info-gdacs@gdacs.org
2023-10-28T22:00:00-00:00
Actual
Alert
Public
1018226
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 25/10/2023, a forest fire started in Australia, until 29/10/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1018226
eventid
1018226
currentepisodeid
3
glide
version
0
fromdate
Wed, 25 Oct 2023 00:00:00 GMT
todate
Sun, 29 Oct 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1018226
country
Australia
eventname
severity
Green impact for forestfire in 7620 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Mon, 30 Oct 2023 09:22:58 GMT
Polygon
-17.13553,125.89761 -17.1340655339059,125.901145533906 -17.1305430498586,125.902607404222 -17.1295893976626,125.910813417162 -17.1268834171618,125.913519397663 -17.1222859574535,125.913004482243 -17.1220993976626,125.915893417162 -17.1193934171618,125.918599397663 -17.1127563205631,125.919260682037 -17.1097034171618,125.924049397663 -17.1049223466546,125.923411797429 -17.1026959317365,125.925182712585 -17.1023322779301,125.92872829192 -17.10424,125.93256 -17.1003015358002,125.93843389346 -17.0994293976626,125.944213417162 -17.0967234171618,125.946919397663 -17.0932984776967,125.94699933952 -17.0917693976626,125.955793417162 -17.0859980791345,125.959395148654 -17.0858093976626,125.962273417162 -17.0821077950838,125.96739466155 -17.0840632391098,125.969615895097 -17.08772,125.96797 -17.0912555339059,125.969434466094 -17.0923393976626,125.974883417162 -17.08772,125.97797 -17.0830967608902,125.974864104903 -17.0760642988808,125.97918641743 -17.0763142022501,125.989800174375 -17.0807555339059,125.991084466094 -17.08222,125.99462 -17.0807555339059,125.998155533906 -17.0751929491387,125.999546540653 -17.0740924012715,126.009311919343 -17.0750918778598,126.010556618468 -17.0814634171618,126.010300602337 -17.0843831778243,126.014081328288 -17.0875198155774,126.012917919811 -17.0895290448091,126.009325780675 -17.0894406023374,126.005366582838 -17.09406,126.00228 -17.0975241174983,126.003696747176 -17.1021234171618,126.003180602337 -17.1040391243738,126.00470385528 -17.1089334171618,126.003990602337 -17.1116393976626,126.006696582838 -17.1116393976626,126.010523417162 -17.107595275619,126.013495570565 -17.11042,126.01794 -17.1089555339059,126.021475533906 -17.10542,126.02294 -17.1017061261443,126.021392908591 -17.10514,126.02808 -17.1036755339059,126.031615533906 -17.0998588878518,126.033336566585 -17.0989955339059,126.039115533906 -17.09546,126.04058 -17.0919244660941,126.039115533906 -17.09046,126.03558 -17.0926717684352,126.022735094788 -17.0855665828382,126.022529397663 -17.0826468221757,126.018748671712 -17.07955,126.01992 -17.0763073472593,126.018651230844 -17.0712534171618,126.024249397663 -17.0664187070733,126.023575956607 -17.0665393976626,126.027583417162 -17.0638334171618,126.030289397663 -17.05481,126.03199 -17.0500881039899,126.028388123171 -17.0450865828382,126.028769397663 -17.0422785159509,126.025550194239 -17.0372665828382,126.025929397663 -17.0313675209304,126.021305139734 -17.02707,126.02391 -17.0235344660941,126.022445533906 -17.0224506023374,126.016996582838 -17.0259103278966,126.01290096989 -17.0211646105181,126.00866900852 -17.0192355339059,126.015455533906 -17.0157,126.01692 -17.0121644660941,126.015455533906 -17.0107,126.01192 -17.0127044660941,126.004754466094 -17.0164375441493,126.003329293974 -17.0194665828382,125.998420602337 -17.0237760984799,125.998743119683 -17.0257706023374,125.990766582838 -17.0296878547082,125.986788783712 -17.0308044660941,125.981504466094 -17.03434,125.98004 -17.0390830322762,125.981123935534 -17.0421365828382,125.976670602337 -17.0475855339059,125.977754466094 -17.04905,125.98129 -17.0482834956135,125.983934292897 -17.0548534171618,125.986120602337 -17.0575593976626,125.988826582838 -17.0575593976626,125.992653417162 -17.0548249687938,125.995365056395 -17.0552469341246,125.996994593012 -17.0596634171618,125.996600602337 -17.0622481639198,125.99912514372 -17.062831208784,125.995876897152 -17.0601106023374,125.991843417162 -17.0601106023374,125.988016582838 -17.0628165828382,125.985310602337 -17.0664182978528,125.985265823323 -17.0672713616234,125.982992381202 -17.06625,125.98012 -17.0681209550406,125.976312858863 -17.0682345222627,125.969822343941 -17.0667,125.96624 -17.0700012457599,125.961577903227 -17.0673306023374,125.958663417162 -17.0673204503409,125.954887620371 -17.06491,125.95072 -17.0680677178427,125.946086452705 -17.0671835386304,125.944385171559 -17.0580844660941,125.942105533906 -17.0570006023374,125.936656582838 -17.0597065828382,125.933950602337 -17.0652375991601,125.935157285426 -17.070757805456,125.933861990593 -17.0695506023374,125.926846582838 -17.07417,125.92376 -17.0787893976626,125.926846582838 -17.0777466556241,125.932233990906 -17.0797839777335,125.935123435938 -17.0849455339059,125.936264466094 -17.0863046109819,125.940329826373 -17.0905535933711,125.939701072441 -17.0911931545637,125.936659019029 -17.0880144660941,125.935265533906 -17.08655,125.93173 -17.0886344660941,125.925034466094 -17.0920257884823,125.923598685454 -17.08906,125.91906 -17.0920577018982,125.914499990683 -17.0871144660941,125.913315533906 -17.08565,125.90978 -17.0872744660941,125.904954466094 -17.0901818559584,125.903614945618 -17.0844644660941,125.901695533906 -17.083,125.89816 -17.0860865828382,125.893540602337 -17.0918805022369,125.893952827371 -17.0947965828382,125.890190602337 -17.0992820849301,125.889338497649 -17.0986506023374,125.884566582838 -17.1037476704693,125.879211038574 -17.10075,125.87194 -17.103432589248,125.867590542224 -17.1024,125.86231 -17.1038644660941,125.858774466094 -17.1074,125.85731 -17.1133413103592,125.858572875704 -17.1134906023374,125.855496582838 -17.1161965828382,125.852790602337 -17.1216455339059,125.853874466094 -17.1227293976626,125.859323417162 -17.1188702191511,125.862258783009 -17.12175,125.86674 -17.1201515787671,125.874921648915 -17.12432,125.87251 -17.1289393976626,125.875596582838 -17.1289393976626,125.879423417162 -17.126362093924,125.882043418599 -17.12796,125.88684 -17.126846092408,125.889850886032 -17.1285903368536,125.893008139344 -17.13053,125.89261 -17.1340655339059,125.894074466094 -17.13553),125.89761 -17.1159897808489,(125.861891216991 -17.1159686896408,125.861877124296 -17.1159721888975,125.861894716248 -17.1159897808489),125.861891216991 -17.1154612571389,(125.898592067339 -17.11267,125.89417 -17.1146868687613,125.890265362432 -17.1120965828382,125.890019397663 -17.1109766258092,125.8892710663 -17.1140859924384,125.899990213101 -17.1154612571389),125.898592067339 -17.1117914829558,(125.880984463561 -17.1113475383163,125.87886182893 -17.1085723295307,125.880398961426 -17.1098354056014,125.88282088771 -17.1117914829558),125.880984463561 -17.1104633741908,(125.8889189337 -17.1093906023374,125.887313417162 -17.1092345943986,125.88652911229 -17.1079873717555,125.887900868135 -17.1104633741908),125.8889189337 -17.0965509485419,(125.900784684568 -17.0962814675626,125.899724759598 -17.0955394977631,125.899577172629 -17.09526,125.90081 -17.0965509485419),125.900784684568 -17.0937425870125,(125.914123137369 -17.093359728461,125.913867319463 -17.0926522981018,125.914340009317 -17.0937425870125),125.914123137369 -17.0841498631965,(125.944952319587 -17.0841453890181,125.943870173627 -17.0827576550578,125.944531934742 -17.0832034171618,125.944620602337 -17.0841498631965),125.944952319587 -17.0799423449422,(125.944508065258 -17.0799219569871,125.944504009842 -17.0799157067952,125.944513363915 -17.0799423449422),125.944508065258 -17.0768442932048,(125.947066636085 -17.0737522821573,125.947643547295 -17.07491,125.95072 -17.0745395496591,125.952582379629 -17.0765844133004,125.954912071547 -17.0768442932048),125.947066636085 -17.0664736865168,(126.009979536898 -17.0620244660941,126.008435533906 -17.0606197522745,126.00520039497 -17.0605534171618,126.009040602337 -17.06364,126.01366 -17.061889023864,126.017386973796 -17.0623442474224,126.020754388059 -17.0648412929267,126.021724043393 -17.06361,126.01445 -17.0664736865168,126.009979536898