GDACS_WF_1018317_2
info-gdacs@gdacs.org
2023-11-03T23:00:00-00:00
Actual
Alert
Public
1018317
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 03/11/2023, a forest fire started in Australia, until 04/11/2023.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1018317
eventid
1018317
currentepisodeid
2
glide
version
0
fromdate
Fri, 03 Nov 2023 00:00:00 GMT
todate
Sat, 04 Nov 2023 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1018317
country
Australia
eventname
severity
Green impact for forestfire in 6788 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Sun, 05 Nov 2023 09:16:10 GMT
Polygon
-21.66745,123.16043 -21.6659855339059,123.163965533906 -21.66245,123.16543 -21.6558665828382,123.164489397663 -21.6530227482429,123.161090377828 -21.6481634216916,123.163724985154 -21.6451534171618,123.167959397663 -21.6409710964824,123.167721869274 -21.63624,123.17137 -21.6327044660941,123.169905533906 -21.6316206023374,123.164456582838 -21.6347637252692,123.161663649302 -21.6360444660941,123.157204466094 -21.6418565828382,123.153570602337 -21.6503539853118,123.151621227781 -21.6465892428412,123.149299821183 -21.6437234171618,123.152809397663 -21.6382744660941,123.151725533906 -21.6371906023374,123.146276582838 -21.6399688486143,123.143556227781 -21.6335644660941,123.139585533906 -21.6323175982696,123.134956059626 -21.6281265828382,123.135199397663 -21.625880775656,123.133182115202 -21.6271393976626,123.143543417162 -21.6244334171618,123.146249397663 -21.6188603700849,123.146693111905 -21.6189065440409,123.149674755942 -21.6256695231561,123.153502008249 -21.6283765828382,123.150790602337 -21.6322034171618,123.150790602337 -21.6349093976626,123.153496582838 -21.6338255339059,123.158945533906 -21.63029,123.16041 -21.6257404768439,123.157427991751 -21.6263893976626,123.164073417162 -21.6184918505879,123.168790828291 -21.6184193976626,123.172253417162 -21.6144120269185,123.175218260277 -21.61623,123.17899 -21.6131434171618,123.183609397663 -21.6075895343367,123.182368492433 -21.5996100909936,123.183649442898 -21.5917615082745,123.186774604552 -21.5903755339059,123.189915533906 -21.5852934171618,123.193129397663 -21.5806434171618,123.194229397663 -21.5751944660941,123.193145533906 -21.5738744235739,123.190336066337 -21.5694644660941,123.189045533906 -21.5681440429716,123.18623415292 -21.5637244660941,123.184945533906 -21.5592230053522,123.17912866306 -21.54997,123.18138 -21.5464344660941,123.179915533906 -21.54497,123.17638 -21.546941860784,123.168392788196 -21.54394,123.16383 -21.54681711403,123.157704666534 -21.5456261118001,123.153103259218 -21.5428778211907,123.152148909688 -21.5407234171618,123.154029397663 -21.5368965828382,123.154029397663 -21.5318306023374,123.148593417162 -21.5318306023374,123.144766582838 -21.5350936341459,123.141949797943 -21.5325637151482,123.127756674975 -21.52934,123.12311 -21.5324265828382,123.118490602337 -21.5378755339059,123.119574466094 -21.5394643122394,123.124118108991 -21.5411793425656,123.124083031751 -21.5426344660941,123.120594466094 -21.54866,123.117 -21.5528000101597,123.119369128739 -21.5571634171618,123.119010602337 -21.5601185793384,123.122969303718 -21.5629334171618,123.123170602337 -21.565374035267,123.125479439948 -21.5684465828382,123.120930602337 -21.5738955339059,123.122014466094 -21.57536,123.12555 -21.5738955339059,123.129085533906 -21.57036,123.13055 -21.566005964733,123.127860560052 -21.5645555339059,123.131325533906 -21.5621315746093,123.132568894063 -21.5645159047166,123.144065857486 -21.5673134171618,123.144270602337 -21.5702739389875,123.148256248494 -21.572466082172,123.148339795897 -21.5739044660941,123.142634466094 -21.57744,123.14117 -21.5799291763237,123.14193531231 -21.5829703911197,123.139770714929 -21.5841144660941,123.134624466094 -21.5889503337655,123.133386955073 -21.5920839853117,123.129001227781 -21.5889444660941,123.127615533906 -21.58748,123.12408 -21.5905665828382,123.119460602337 -21.5943934171618,123.119460602337 -21.5970993976626,123.122166582838 -21.5970993976626,123.125993417162 -21.5942960146883,123.128718772219 -21.5982437777471,123.131141381024 -21.6035534171618,123.130150602337 -21.6062593976626,123.132856582838 -21.6062593976626,123.136683417162 -21.6035534171618,123.139389397663 -21.5992667731733,123.140259929151 -21.6001810455275,123.142481428693 -21.60465,123.13962 -21.6084286075762,123.14144825155 -21.6074206023374,123.135846582838 -21.6101265828382,123.133140602337 -21.6136083491462,123.132801191135 -21.6144782098215,123.131067709169 -21.6110044660941,123.129615533906 -21.60954,123.12608 -21.6126265828382,123.121460602337 -21.6164534171618,123.121460602337 -21.6191593976626,123.124166582838 -21.6192686273026,123.127444282679 -21.6230134171618,123.127460602337 -21.625259224344,123.129477884798 -21.6281988486143,123.125946227781 -21.6240006023374,123.122943417162 -21.6250844660941,123.117494466094 -21.62862,123.11603 -21.6327730511783,123.118418646002 -21.6340144660941,123.116004466094 -21.63755,123.11454 -21.641709224344,123.116937884798 -21.6429544660941,123.114504466094 -21.64649,123.11304 -21.6500255339059,123.114504466094 -21.65149,123.11804 -21.6483311513857,123.122673772219 -21.6525293976626,123.125676582838 -21.6525293976626,123.129503417162 -21.6497260146882,123.132228772219 -21.6528655339059,123.133614466094 -21.65433,123.13715 -21.6511711513857,123.141783772219 -21.6542855339059,123.143164466094 -21.65575,123.1467 -21.6525660146882,123.151338772219 -21.6543504292883,123.151819014136 -21.6613,123.14869 -21.6648355339059,123.150154466094 -21.6663,123.15369 -21.6653434243199,123.156465422186 -21.66745),123.16043 -21.6489088486143,(123.142066227781 -21.6474165828382,123.141769397663 -21.6451692428412,123.139749821183 -21.6422311513857,123.143273772219 -21.6459707571588,123.145590178817 -21.6489088486143),123.142066227781 -21.6475139853118,(123.132511227781 -21.6457138032231,123.132020450365 -21.6463793976626,123.133016582838 -21.6464157498385,123.133199337568 -21.6475139853118),123.132511227781 -21.6460688486143,(123.122956227781 -21.642330775656,123.120642115202 -21.6393911513857,123.124173772219 -21.643129224344,123.126487884798 -21.6460688486143),123.122956227781 -21.6439561967769,(123.130499549635 -21.643750775656,123.130192115202 -21.6437208966486,123.130342327116 -21.6439561967769),123.130499549635 -21.6371288486143,(123.124456227781 -21.6356365828382,123.124159397663 -21.6333969488217,123.122151353998 -21.6304611513857,123.125663772219 -21.6341930511783,123.127968646002 -21.6371288486143),123.124456227781 -21.6095000105174,(123.149908801512 -21.6093313924238,123.14622174845 -21.6081855339059,123.148155533906 -21.6064911513857,123.149253772219 -21.6095000105174),123.149908801512 -21.6001687644552,(123.146740191384 -21.5997889544725,123.145318571307 -21.5988555339059,123.146715533906 -21.5971561513857,123.147814766781 -21.6001687644552),123.146740191384 -21.5948938486143,(123.148095233219 -21.5921477550678,123.147080912996 -21.5882462880832,123.149308772219 -21.5913355339059,123.150684466094 -21.5919530511783,123.151608646002 -21.5948938486143),123.148095233219 -21.5940140310031,(123.169676553304 -21.5939954160069,123.164889059978 -21.5910360146882,123.168398772219 -21.5925534171618,123.168700602337 -21.5940140310031),123.169676553304 -21.5919632480322,(123.159695077598 -21.5918581223122,123.156973425086 -21.5913355339059,123.157755533906 -21.5896662880832,123.158848772219 -21.5919632480322),123.159695077598 -21.5887265828382,(123.168700602337 -21.5883267242344,123.168582316403 -21.5878614293394,123.169278679424 -21.5887265828382),123.168700602337 -21.5873537119168,(123.159131227781 -21.5869864647687,123.159058177781 -21.5871233470429,123.159263036582 -21.5873537119168),123.159131227781 -21.5865185706606,(123.170661320576 -21.5782035947847,123.172545672164 -21.5787555339059,123.172914466094 -21.5824937777471,123.173381381024 -21.5865185706606),123.170661320576 -21.5859337119168,(123.149591227781 -21.5815908236763,123.14878468769 -21.5806481307052,123.151075681312 -21.583019224344,123.153117884798 -21.5859337119168),123.149591227781 -21.5577504113617,(123.166528636518 -21.5571903555637,123.166417234493 -21.5571805705706,123.166466426975 -21.557629224344,123.167137884798 -21.5577504113617,123.166528636518