GDACS_WF_1019366_5
info-gdacs@gdacs.org
2024-03-10T23:00:00-00:00
Actual
Alert
Public
1019366
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Myanmar
On 01/03/2024, a forest fire started in Myanmar, until 11/03/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1019366
eventid
1019366
currentepisodeid
5
glide
version
0
fromdate
Fri, 01 Mar 2024 00:00:00 GMT
todate
Mon, 11 Mar 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1019366
country
Myanmar
eventname
severity
Green impact for forestfire in 11106 ha
population
11 people affected in the area
vulnerability
sourceid
GWIS
iso3
MMR
hazardcomponents
datemodified
Tue, 12 Mar 2024 09:20:14 GMT
Polygon
21.8678806023374,93.9797765828382 21.8678806023374,93.9836034171618 21.8705865828382,93.9863093976626 21.8757978922154,93.986012494347 21.8833065828382,93.9905193976626 21.8883554412509,93.9897028672712 21.8953755859074,93.9910921831767 21.8983065828382,93.9949293976625 21.9027834171618,93.9945793976625 21.905671518279,93.9909578349944 21.9088961960027,93.9919490938282 21.9086306023374,93.9961734171618 21.9122526740564,93.9990616195355 21.91032,94.00291 21.9124431669138,94.0068856637225 21.9115806023374,94.0120034171618 21.9142865828382,94.0147093976626 21.922113222933,94.0148089238657 21.9151044660941,94.0169044660941 21.9140206023374,94.0223534171618 21.9182944660941,94.0272355339059 21.92183,94.0287 21.9258734171618,94.0282493976625 21.9285793976626,94.0255434171618 21.9282993976626,94.0180665828382 21.922766777067,94.0147810761343 21.9259055339059,94.0133955339059 21.9275936176231,94.0071291946434 21.9326157006798,94.0002409095696 21.9386589462976,93.9966497975381 21.9483874588096,93.9984888649429 21.9490862482256,94.0006756109627 21.9469461958846,94.0041345873374 21.9440934171618,94.0006906023374 21.9346265828382,93.9999406023374 21.9308406023374,94.0039965828382 21.9308406023374,94.0078234171618 21.9335465828382,94.0105293976626 21.9366536465958,94.0109703003504 21.9396865828382,94.0158593976626 21.9435134171618,94.0158593976626 21.9463271377366,94.0126117712325 21.94912,94.01358 21.9523196228039,94.0123399825286 21.9556007224623,94.0144089703075 21.9532406023374,94.0170965828382 21.95112,94.02785 21.9559746816251,94.0344257232783 21.9563006023374,94.0414034171618 21.96092,94.04449 21.9644555339059,94.0430255339059 21.9657081901358,94.0405548400949 21.96914,94.04195 21.9757355339059,94.0404355339059 21.9772,94.0369 21.9760707852129,94.033866205132 21.9802145856226,94.0301436657795 21.9848244660941,94.0359755339059 21.9902734171618,94.0370593976625 21.9929793976626,94.0343534171618 21.9924132185513,94.0292834468009 21.9972134171618,94.0277193976626 21.9999193976626,94.0250134171618 21.9988355339059,94.0195644660941 21.9915213217645,94.0144340780178 21.99233,94.01188 21.9906439463006,94.0081964059897 21.99354,94.00137 21.9882427859847,93.9931590849825 21.9904193976626,93.9906034171618 21.9904193976626,93.9867765828382 21.9842955339059,93.9778144660941 21.981609266257,93.9765189295617 21.9808897613836,93.9718071600249 21.9951767951514,93.9741479100142 21.9963444660941,93.9791755339059 22.0017934171618,93.9802593976626 22.0044993976626,93.9775534171618 22.0044993976626,93.9737265828382 22.0017934171618,93.9710206023374 21.9987132048486,93.9708720899858 21.9988191965521,93.9684207662914 22.0010748732532,93.9645340683206 22.00572,93.96775 22.0092555339059,93.9662855339059 22.0112391982957,93.9634162429552 22.0126944660941,93.9669055339059 22.0169197416012,93.9682328018652 22.0198488226111,93.9720942124446 22.0163344660941,93.9735544660941 22.0128206023374,93.9787565828382 22.0138744660941,93.9851955339059 22.023,93.99031 22.0265355339059,93.9888455339059 22.0277510470518,93.9865615709882 22.0297165828382,93.9881593976626 22.0335434171618,93.9881593976626 22.0362493976626,93.9854534171618 22.0357073858272,93.9806735769268 22.0390355339059,93.9786855339059 22.0405,93.97515 22.0390355339059,93.9716144660941 22.035630847788,93.9701760272433 22.03756,93.96633 22.0368293976626,93.9605465828382 22.0323865535509,93.956679240234 22.0391955339059,93.9531255339059 22.0406071216302,93.9469450173322 22.0462034171618,93.9482493976626 22.04929,93.94363 22.0424255339059,93.9314644660941 22.0369765828382,93.9303806023375 22.0342706023374,93.9330865828382 22.0342029179445,93.9365731447402 22.0311905734079,93.936646047843 22.0318693976626,93.9314065828382 22.02725,93.92832 22.0204006023374,93.9324965828382 22.01971,93.93757 22.0231495759747,93.942259612363 22.0225911033251,93.9435173449422 22.0159534171618,93.9372706023374 22.0086392423109,93.9389612697313 22.0034334171618,93.9338506023374 21.9992989235903,93.9340561736746 22.0029655339059,93.9312655339059 22.00443,93.92773 22.0029655339059,93.9241944660941 21.99943,93.92273 21.9920144660941,93.9273044660941 21.9907834209129,93.9320134861737 21.9836006023374,93.9392965828382 21.9836006023374,93.9431234171618 21.9863545321016,93.9458389353641 21.9824383780068,93.9454455359732 21.9830093976626,93.9381465828382 21.9803034171618,93.9354406023375 21.977244113682,93.9352879309603 21.97925,93.92973 21.9771271136272,93.9257545237291 21.9781172885424,93.9201038336253 21.9836534171618,93.9190693976626 21.9863593976626,93.9163634171618 21.98703,93.91013 21.9839434171618,93.9055106023374 21.9791566229853,93.9058048062063 21.97524,93.90377 21.9706206023374,93.9068565828382 21.9720444452383,93.9147646449337 21.9665606449051,93.9185832928851 21.9585365828382,93.9187406023375 21.95501,93.92413 21.9580965828382,93.9287493976626 21.9671293550949,93.9263767071149 21.9700042892616,93.927257320834 21.9690106023374,93.9337834171618 21.9739915854104,93.93679807619 21.9725952331801,93.9379872658551 21.9673665828382,93.9370506023375 21.9645411732372,93.9403569934702 21.9623729547934,93.9403342919935 21.9577834171618,93.9365706023375 21.9522919312616,93.9377181239694 21.94731,93.93571 21.9417865828382,93.9374506023374 21.9390806023374,93.9401565828382 21.9319344660941,93.9428344660941 21.93047,93.94637 21.9319344660941,93.9499055339059 21.9363445799704,93.9533045143798 21.9377144660941,93.9573155339059 21.94125,93.95878 21.9453173454815,93.9574817286066 21.9452902641543,93.961932367957 21.9410746928765,93.9671498458386 21.9381565828382,93.9673306023375 21.9353600097658,93.9704920224512 21.9339355339059,93.9659544660941 21.9284865828382,93.9648706023374 21.9234044660941,93.9691744660941 21.9211559333095,93.975039351054 21.9135611240628,93.9732841119985 21.91655,93.96873 21.9134634171618,93.9641106023374 21.9096365828382,93.9641106023374 21.9067957202233,93.9674946810175 21.9031934171618,93.9645806023374 21.8993665828382,93.9645806023374 21.89628,93.9692 21.8982244660941,93.9738155339059 21.902803780735,93.9758996100207 21.9010025558245,93.9775106618382 21.8930765828382,93.9772406023374 21.8887445587491,93.9823571327288 21.8838734171618,93.9779606023374 21.8725,93.97669 21.8678806023374),93.9797765828382 21.9134192595675,(93.9811142691951 21.9142706023374,93.9827834171618 21.9201565828382,93.9883893976626 21.9250118168805,93.9877022429393 21.9242650099983,93.9888749708204 21.9189198653365,93.9903306769991 21.9174555339059,93.9867944660941 21.9141785110669,93.9853814210483 21.9134192595675),93.9811142691951 21.9163173259436,(93.9981083804645 21.9172923951663,93.9970369624228 21.9174906023374,93.9980334171618 21.9180084883447,93.9988084883447 21.9163173259436),93.9981083804645 21.9288420693873,(93.9773316548752 21.929044158207,93.9772283315881 21.92887259141,93.9774850994451 21.9288420693873),93.9773316548752 21.9461458525238,(93.9463336357276 21.9467765828382,93.9459293976626 21.9472325290166,93.9460200909963 21.9467946334445,93.9467671372794 21.9461458525238),93.9463336357276 21.9539294119911,(93.9866244214994 21.9571855339059,93.9852155339059 21.9585817473159,93.9813368705858 21.9605844660941,93.9826655339059 21.9616644511764,93.9833871568672 21.9585036652141,93.9882495198551 21.9550368022564,93.989261189908 21.9539294119911),93.9866244214994 21.9590192775377,(94.0136810296925 21.9627219842013,94.0117368101268 21.9633606023374,94.0135334171618 21.9642990003574,94.0149378290462 21.9622012293879,94.0156016322903 21.9590192775377),94.0136810296925 21.968631960258,(93.9465410968808 21.9710811371535,93.9463117315448 21.9712406023374,93.9471134171618 21.9691092108188,93.948243298569 21.968631960258),93.9465410968808 22.0203917476372,(93.9492462878069 22.0226288966749,93.9463326550578 22.0231627167033,93.9474200541271 22.0235393907257,93.9508458231822 22.0209086484473,93.9506174639924 22.0203917476372,93.9492462878069