GDACS_WF_1019562_3
info-gdacs@gdacs.org
2024-04-13T22:00:00-00:00
Actual
Alert
Public
1019562
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 09/04/2024, a forest fire started in Australia, until 14/04/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1019562
eventid
1019562
currentepisodeid
3
glide
version
0
fromdate
Tue, 09 Apr 2024 00:00:00 GMT
todate
Sun, 14 Apr 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1019562
country
Australia
eventname
severity
Green impact for forestfire in 10617 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Mon, 15 Apr 2024 08:17:35 GMT
Polygon
-18.03728,125.70546 -18.0337855339059,125.714725533906 -18.03025,125.71619 -18.0220815775856,125.713184097519 -18.02425,125.71719 -18.0227855339059,125.720725533906 -18.0132737283884,125.724449731368 -18.0128332859534,125.728206761136 -18.01609,125.73286 -18.0146255339059,125.736395533906 -18.0115595008181,125.737766610481 -18.0103555339059,125.745185533906 -18.00682,125.74665 -18.0004265828382,125.745769397663 -17.9977206023374,125.743063417162 -17.9974551812318,125.740570944844 -17.9913436408337,125.738031233532 -17.9863555339059,125.743425533906 -17.98282,125.74489 -17.9792844660941,125.743425533906 -17.9763506023374,125.738973417162 -17.9766225694899,125.734739555231 -17.9658406023374,125.726403417162 -17.9663287083299,125.717049385396 -17.9599260150586,125.708296527825 -17.9553465828382,125.708799397663 -17.9525378205406,125.705576698176 -17.9496634171618,125.709129397663 -17.9458365828382,125.709129397663 -17.94275,125.70451 -17.943146762699,125.694750833257 -17.9408934171618,125.696779397663 -17.93348,125.69786 -17.9299444660941,125.696395533906 -17.9285673176859,125.693298975651 -17.92542,125.69417 -17.9206044660941,125.692035533906 -17.9176206023374,125.687493417162 -17.91779,125.6792 -17.9224865828382,125.673110602337 -17.92730010078,125.673769883254 -17.9264806023374,125.668716582838 -17.9312023077079,125.665650350268 -17.9323444660941,125.660494466094 -17.935847058728,125.659036552426 -17.93325,125.64817 -17.9350444660941,125.643594466094 -17.9386294319201,125.64213983262 -17.93771,125.63942 -17.9398044660941,125.631154466094 -17.9428871809683,125.629780071306 -17.9442044660941,125.626984466094 -17.9476013843784,125.625547572361 -17.9548465828382,125.617780602337 -17.96029,125.61621 -17.9636189032211,125.617536399885 -17.9664272082448,125.615677315413 -17.96315,125.61102 -17.9654832446161,125.606903966845 -17.9650174574502,125.604876063 -17.95909,125.60822 -17.9555544660941,125.606755533906 -17.9527521272087,125.601589579195 -17.9512955339059,125.605085533906 -17.94776,125.60655 -17.9431406023374,125.603463417162 -17.9442244660941,125.598014466094 -17.94776,125.59655 -17.9520478727913,125.599140420805 -17.955510044965,125.594484326978 -17.9514906023374,125.590963417162 -17.9511004128008,125.587436809748 -17.9483665828382,125.587219397663 -17.9456606023374,125.584513417162 -17.9456606023374,125.580686582838 -17.9490035053318,125.577853910576 -17.9490212041304,125.575417111554 -17.9433306023374,125.571143417162 -17.94216,125.56508 -17.9456958858263,125.560371230416 -17.94484,125.55587 -17.9463044660941,125.552334466094 -17.9560134171618,125.550330602337 -17.9587193976626,125.553036582838 -17.9598639752701,125.560769893234 -17.9629834171618,125.560910602337 -17.9680855339059,125.564834466094 -17.96955,125.56837 -17.9667684543269,125.572785578345 -17.96805,125.57901 -17.9643318614992,125.585297476485 -17.96818,125.58354 -17.9717155339059,125.585004466094 -17.9727993976626,125.590453417162 -17.9698607412933,125.59320567977 -17.9714469267306,125.59356976522 -17.97528,125.59166 -17.9788155339059,125.593124466094 -17.9802108404346,125.597007688614 -17.9833055339059,125.598384466094 -17.9845620678631,125.602965345444 -17.9871155339059,125.604234466094 -17.9901960399528,125.609370189504 -17.9912423748556,125.6075422126 -17.98784,125.60286 -17.9889206023374,125.597136582838 -17.9912143852886,125.594706023935 -17.9891606023374,125.592243417162 -17.9891606023374,125.588416582838 -17.9918665828382,125.585710602337 -17.9955805897899,125.585688159578 -17.9957706023374,125.582816582838 -17.9984765828382,125.580110602337 -18.0097665828382,125.579920602337 -18.0152155339059,125.581004466094 -18.01668,125.58454 -18.0139128467915,125.588945961608 -18.0141493976626,125.594583417162 -18.0118309087572,125.597030484056 -18.0148893976626,125.599806582838 -18.0148893976626,125.603633417162 -18.0098405575661,125.606634578589 -18.0101662896329,125.609798886171 -18.0151834135216,125.609337644565 -18.0180765828382,125.605690602337 -18.0219034171618,125.605690602337 -18.0253808468327,125.609906428508 -18.0302055339059,125.611114466094 -18.03483,125.61995 -18.0338193976626,125.626643417162 -18.0292,125.62973 -18.0256644660941,125.628265533906 -18.018042489669,125.614906617335 -18.014843338545,125.618427315413 -18.0182193976626,125.621266582838 -18.0190159858684,125.626654625094 -18.0220255339059,125.628014466094 -18.02349,125.63155 -18.0220255339059,125.635085533906 -18.01849,125.63655 -18.0123093761137,125.632251942403 -18.0129145854982,125.638562141647 -18.0156934171618,125.638770602337 -18.0183993976626,125.641476582838 -18.0173155339059,125.646925533906 -18.0113923560855,125.647692529477 -18.0084634171618,125.651519397663 -18.0046365828382,125.651519397663 -18.0019306023374,125.648813417162 -18.0019117250926,125.645081485156 -17.9969465828382,125.644079397663 -17.9938769289522,125.63954510759 -17.9885244660941,125.637985533906 -17.98706,125.63445 -17.989646809722,125.630164540057 -17.9862126378266,125.627446124063 -17.98231,125.62946 -17.9749932584739,125.628329906629 -17.9797754934348,125.631628828504 -17.9841534171618,125.631260602337 -17.9868593976626,125.633966582838 -17.9857903463339,125.639393365541 -17.9896,125.64944 -17.9854734171618,125.655619397663 -17.9800244660941,125.654535533906 -17.97856,125.651 -17.97922064823,125.646680295262 -17.9714,125.64911 -17.9678644660941,125.647645533906 -17.9664,125.64411 -17.9687232218273,125.640000663858 -17.9656106427934,125.635215948275 -17.9628145926915,125.634306843192 -17.95973,125.63547 -17.9558254535914,125.633453267668 -17.9557575457019,125.636415619329 -17.95902,125.64107 -17.9575555339059,125.644605533906 -17.954730417993,125.645928689075 -17.9600555339059,125.647544466094 -17.961399459119,125.651685999931 -17.9642793976626,125.654426582838 -17.9623854823173,125.668577172463 -17.96589,125.67571 -17.9645009919339,125.685698293951 -17.9684234171618,125.686300602337 -17.9711293976626,125.689006582838 -17.9713879263042,125.693623705912 -17.97466,125.69828 -17.9737988673873,125.704272802296 -17.9778834171618,125.704100602337 -17.9805893976626,125.706806582838 -17.98085749339,125.709285608924 -17.9885534171618,125.710370602337 -17.9932040972056,125.714729346681 -17.9937592606186,125.710440287981 -17.9895406023374,125.707433417162 -17.9906244660941,125.701984466094 -17.99416,125.70052 -17.9976955339059,125.701984466094 -17.99916,125.70552 -17.9982807393814,125.708179712019 -18.0000652730336,125.708662250624 -18.0013144660941,125.704044466094 -18.0062458582935,125.702857653478 -18.0063206023374,125.699406582838 -18.0090265828382,125.696700602337 -18.0144755339059,125.697784466094 -18.01594,125.70132 -18.0144755339059,125.704855533906 -18.0095441417065,125.706042346522 -18.0089825351856,125.71022205835 -18.01358,125.709 -18.0189901706028,125.709868239341 -18.0169906023374,125.701496582838 -18.02161,125.69841 -18.0251455339059,125.699874466094 -18.0264592830794,125.704167705127 -18.03228,125.70046 -18.0358155339059,125.701924466094 -18.03728),125.70546 -18.0044374648144,(125.71249794165 -18.0026647269664,125.712017749376 -18.001283168641,125.716723977548 -18.00256,125.71647 -18.0038870600801,125.716733968662 -18.0044374648144),125.71249794165 -17.999156831359,(125.717846022452 -17.9965259027944,125.717830653319 -17.99685,125.71946 -17.9976206450376,125.721165116808 -17.999156831359),125.717846022452 -18.011776661455,(125.618542684587 -18.0081137103671,125.614261113829 -18.003606215161,125.614941041743 -17.9994153774627,125.617039298047 -17.9974095287713,125.622579954641 -17.9988840071687,125.627978876635 -18.00019902841,125.628122697353 -18.0027344660941,125.620734466094 -18.011776661455),125.618542684587 -18.0089654145018,(125.642457858353 -18.0087830024105,125.642494142374 -18.0089376439145,125.642597470523 -18.0089654145018),125.642457858353 -18.0017681496579,(125.59632164724 -18.000625781477,125.596940590205 -17.9994655339059,125.602005533906 -17.9981646253628,125.602874773204 -18.0002356914233,125.604648106544 -18.0017681496579),125.59632164724 -17.9870964907488,(125.62199109656 -17.9867207447598,125.621861997133 -17.9866636758308,125.622148902014 -17.9868273621734,125.622393875937 -17.9870964907488),125.62199109656 -17.9828216935852,(125.615987368882 -17.9810136371107,125.615600744838 -17.9812445583065,125.61594634283 -17.98193,125.61581 -17.9828216935852),125.615987368882 -17.9677492587067,(125.59345432023 -17.9659933774996,125.592976847692 -17.9647322187284,125.596013346579 -17.9658944660941,125.594584466094 -17.9677492587067),125.59345432023 -17.952049582007,(125.645651310925 -17.9514968487423,125.645281986365 -17.9506986768961,125.645440752616 -17.9505728092508,125.646073532 -17.952049582007),125.645651310925 -17.9368479255507,(125.687686704466 -17.9356578224526,125.686891502999 -17.9337587230944,125.687915441471 -17.9357061879831,125.688449589119 -17.9368479255507),125.687686704466 -17.9352971097478,(125.674662828139 -17.9343762950457,125.674338751774 -17.9301003703759,125.675431161305 -17.9310511901757,125.676966414595 -17.9347023447684,125.677433975106 -17.9352971097478,125.674662828139