GDACS_WF_1019673_14
info-gdacs@gdacs.org
2024-05-19T22:00:00-00:00
Actual
Alert
Public
1019673
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 08/05/2024, a forest fire started in Australia, until 20/05/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1019673
eventid
1019673
currentepisodeid
14
glide
version
0
fromdate
Wed, 08 May 2024 00:00:00 GMT
todate
Mon, 20 May 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1019673
country
Australia
eventname
severity
Green impact for forestfire in 16380 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Tue, 21 May 2024 09:07:03 GMT
Polygon
-18.00468,128.05734 -18.0032155339059,128.060875533906 -18.0003400630008,128.062208705306 -17.9985955339059,128.067885533906 -17.9934954681813,128.071803892537 -17.99482,128.07513 -17.9933555339059,128.078665533906 -17.9879065828382,128.079749397663 -17.9851731843563,128.076905577662 -17.98119,128.07904 -17.9767073138018,128.076158020327 -17.9766393976626,128.079643417162 -17.973937142334,128.082346908582 -17.9767,128.08675 -17.9750576173004,128.09105252543 -17.9787593976626,128.093956582838 -17.9776755339059,128.099405533906 -17.9724833517706,128.102670257779 -17.9688934171618,128.107239397663 -17.9641965828382,128.107099397663 -17.9592483182136,128.104537486993 -17.9517834171618,128.110809397663 -17.9463454412509,128.109732867271 -17.9430848160713,128.110905099368 -17.9421155339059,128.116525533906 -17.9351307412934,128.121116472498 -17.9382093976626,128.123896582838 -17.9382093976626,128.127723417162 -17.9316586081039,128.136444925987 -17.9355830371828,128.135122103822 -17.9357106023374,128.131936582838 -17.9384165828382,128.129230602337 -17.94418,128.130785097863 -17.94101,128.12502 -17.9440965828382,128.120400602337 -17.9479234171618,128.120400602337 -17.9501650042128,128.122411568925 -17.9567634171618,128.121950602337 -17.9594693976626,128.124656582838 -17.96041,128.13031 -17.9573557712928,128.13575754723 -17.95927,128.14574 -17.9563693976626,128.152743417162 -17.9534134971805,128.155499109838 -17.9540415656938,128.158816503045 -17.9575765828382,128.155290602337 -17.9610669011626,128.155223665143 -17.9640865828382,128.150940602337 -17.9679134171618,128.150940602337 -17.9709440464485,128.155278702501 -17.9745157106713,128.153274450776 -17.9746806023374,128.150276582838 -17.9773865828382,128.147570602337 -17.9829873656717,128.14888169839 -17.9867544211998,128.146064272215 -17.9839,128.1416 -17.9869865828382,128.136980602337 -17.9908134171618,128.136980602337 -17.9939,128.1416 -17.9924355339059,128.145135533906 -17.9896755788002,128.146445727785 -17.9921493976626,128.148996582838 -17.9921493976626,128.152823417162 -17.9874204032718,128.155888199855 -17.9871793976626,128.158503417162 -17.9843871322469,128.161226560799 -17.9836960244287,128.169353024312 -17.9870655339059,128.170784466094 -17.98853,128.17432 -17.9870655339059,128.177855533906 -17.9816165828382,128.178939397663 -17.9789106023374,128.176233417162 -17.9787308210484,128.173310404413 -17.9735881318984,128.179049248076 -17.97524,128.18271 -17.9737755339059,128.186245533906 -17.97024,128.18771 -17.9644346212451,128.185910361921 -17.9599382403306,128.188888415278 -17.9561030955311,128.191958265243 -17.9551893976626,128.198753417162 -17.9508534171618,128.203989397663 -17.9470265828382,128.203989397663 -17.9436130319968,128.199341476384 -17.9387865828382,128.200009397663 -17.9360806023374,128.197303417162 -17.93341,128.18892 -17.9348744660941,128.185384466094 -17.9383101853814,128.183939854362 -17.9366358781243,128.179547167934 -17.92919,128.18289 -17.9207893951774,128.177109030899 -17.9191555339059,128.183455533906 -17.91562,128.18492 -17.911649600702,128.182804711854 -17.9104793976626,128.187753417162 -17.9077734171618,128.190459397663 -17.900054587651,128.189574020561 -17.89591,128.19195 -17.8870444660941,128.189055533906 -17.88558,128.18552 -17.8870444660941,128.181984466094 -17.89514152773,128.180101749192 -17.8921906023374,128.176263417162 -17.8915106023374,128.168696582838 -17.8942165828382,128.165990602337 -17.9006915610846,128.165327777579 -17.9035084346863,128.161592864622 -17.9015306023374,128.159373417162 -17.90048,128.15376 -17.9019444660941,128.150224466094 -17.9042525471999,128.149004155542 -17.903178186913,128.14497498592 -17.8985365828382,128.145519397663 -17.8958306023374,128.142813417162 -17.8958306023374,128.138986582838 -17.8978922608996,128.135972844562 -17.8947865828382,128.135829397663 -17.8920880746851,128.13313460032 -17.8905055470425,128.13595597872 -17.8927993976626,128.138386582838 -17.8927993976626,128.142213417162 -17.88818,128.1453 -17.8835195659159,128.142007113139 -17.8811234171618,128.144249397663 -17.87215,128.14546 -17.8676736495605,128.14258750246 -17.8613065828382,128.142909397663 -17.8574710383212,128.139755326797 -17.8560255339059,128.143195533906 -17.85249,128.14466 -17.8478009622738,128.14122331292 -17.84519,128.14207 -17.8416544660941,128.140605533906 -17.84019,128.13707 -17.8416544660941,128.133534466094 -17.8471034171618,128.132450602337 -17.8498790377262,128.13550668708 -17.8491406023374,128.129616582838 -17.8518465828382,128.126910602337 -17.8556734171618,128.126910602337 -17.8584496978448,128.129970005721 -17.86273,128.12929 -17.8665979298998,128.131251931854 -17.8703023261968,128.127401743941 -17.8654906023374,128.124353417162 -17.8665744660941,128.118904466094 -17.87866,128.11342 -17.8821955339059,128.114884466094 -17.8834709204792,128.117469433058 -17.8852229598097,128.116017067128 -17.8863597346745,128.112430732547 -17.8846011456399,128.110722736807 -17.88169,128.11177 -17.8781544660941,128.110305533906 -17.8740606023374,128.103823417162 -17.8724159298991,128.096294173696 -17.8681182287113,128.096169998449 -17.8651555339059,128.102445533906 -17.8597065828382,128.103529397663 -17.8551806023374,128.098423417162 -17.8560845738673,128.093243693837 -17.8505644660941,128.090705533906 -17.8492175970014,128.087761200049 -17.8466330600009,128.088920152671 -17.84792,128.09219 -17.846383339796,128.095773772468 -17.84714,128.09825 -17.8440534171618,128.102869397663 -17.8369165828382,128.102599397663 -17.8322089195239,128.098221851582 -17.8314155339059,128.104105533906 -17.8218,128.10574 -17.8182644660941,128.104275533906 -17.815080918369,128.098976530717 -17.8107806023374,128.095953417162 -17.8118644660941,128.090504466094 -17.8154,128.08904 -17.8186961597748,128.090344521413 -17.8193111398192,128.087192034308 -17.8155344660941,128.085775533906 -17.81407,128.08224 -17.8155344660941,128.078704466094 -17.8221985025711,128.073550453591 -17.81926,128.06903 -17.8223465828382,128.064410602337 -17.8261734171618,128.064410602337 -17.836316196962,128.073312946692 -17.8379444660941,128.070274466094 -17.84621,128.06554 -17.8562185746884,128.071659685314 -17.8542006023374,128.069413417162 -17.8548691103056,128.064586089961 -17.8532144049681,128.062381167303 -17.8473865828382,128.063349397663 -17.8443,128.05873 -17.8457644660941,128.055194466094 -17.8519470922078,128.052633251484 -17.8549865828382,128.048250602337 -17.8588134171618,128.048250602337 -17.8651555339059,128.052734466094 -17.8670287082211,128.060508407975 -17.87624,128.05663 -17.8797755339059,128.058094466094 -17.8808593976626,128.063543417162 -17.8781534171618,128.066249397663 -17.8751284829638,128.06641227437 -17.8744599747156,128.073258328961 -17.8796555339059,128.075324466094 -17.8813009537257,128.081808233225 -17.8838553858569,128.081739874918 -17.88051,128.07034 -17.8819744660941,128.066804466094 -17.8874234171618,128.065720602337 -17.8904921795206,128.0702504104 -17.8938099487891,128.067878976935 -17.89174,128.06076 -17.8948265828382,128.056140602337 -17.90077,128.05497 -17.9073834171618,128.058230602337 -17.9100893976626,128.060936582838 -17.9100893976626,128.064763417162 -17.9071455339059,128.068525533906 -17.9033620435018,128.069940678386 -17.9031193976626,128.079213417162 -17.8957885791558,128.086012064175 -17.899074989992,128.089729618485 -17.9042665828382,128.084900602337 -17.9121234171618,128.084160602337 -17.9150399401906,128.087925051604 -17.9170165828382,128.086310602337 -17.9208434171618,128.086310602337 -17.9235493976626,128.089016582838 -17.9240899420481,128.092477804877 -17.92557125303,128.092696846197 -17.9270144660941,128.089054466094 -17.9310363911057,128.086648598182 -17.9276306023374,128.083803417162 -17.9287144660941,128.078354466094 -17.9341634171618,128.077270602337 -17.9371303923839,128.081288691908 -17.9426153522863,128.07757 -17.9399344660941,128.076275533906 -17.9385431474898,128.073107737264 -17.93394,128.07617 -17.9293206023374,128.073083417162 -17.9293206023374,128.069256582838 -17.9338572660508,128.066186456806 -17.9297106023374,128.062873417162 -17.92866,128.05727 -17.9320352244863,128.052593187944 -17.9320806023374,128.047506582838 -17.9347865828382,128.044800602337 -17.9386134171618,128.044800602337 -17.9449655339059,128.048804466094 -17.9466818179279,128.054045442618 -17.9505682815714,128.055733001246 -17.9514806023374,128.049146582838 -17.9561,128.04606 -17.9601834845899,128.048344532245 -17.9652434171618,128.047520602337 -17.9679493976626,128.050226582838 -17.9680557970343,128.053518511399 -17.9703204412509,128.054413383603 -17.97357,128.05314 -17.9761826143554,128.053987790966 -17.9774744660941,128.049584466094 -17.98101,128.04812 -17.9845455339059,128.049584466094 -17.9859407001555,128.052771606155 -17.99051,128.04976 -17.9940455339059,128.051224466094 -17.9955090821055,128.054755385433 -17.9961444660941,128.053804466094 -18.0015934171618,128.052720602337 -18.00468),128.05734 -17.9765432836226,(128.072263923292 -17.9708617626559,128.072433730663 -17.9739334171618,128.073110602337 -17.9765026861982,128.075611979673 -17.9765432836226),128.072263923292 -17.9696836388997,(128.082199387278 -17.9659705280187,128.079682287665 -17.96609,128.08156 -17.9654393976626,128.084876582838 -17.9696836388997),128.082199387278 -17.9683082373441,(128.072746269337 -17.9669665828382,128.072479397663 -17.966220583079,128.07198093656 -17.9670702741684,128.073573449885 -17.9683082373441),128.072746269337 -17.9668959433246,(128.063287802151 -17.9628406023374,128.060313417162 -17.9627342029657,128.057021488601 -17.9603847017637,128.056069916772 -17.957471806371,128.060027065027 -17.9641107256579,128.066700063788 -17.9668959433246),128.063287802151 -17.965019416921,(128.07090906344 -17.9646992743421,128.070429936212 -17.9646527088163,128.070664036919 -17.965019416921),128.07090906344 -17.9596260959921,(128.093108380529 -17.9530876638932,128.0876118811 -17.9477702365554,128.087810931816 -17.9438191583096,128.09103921155 -17.94508,128.09427 -17.9419564225442,128.101179352059 -17.9467345587491,128.102387132729 -17.9509944660941,128.097844466094 -17.9596260959921),128.093108380529 -17.9576062956149,(128.076694657538 -17.9575493417509,128.076408331128 -17.9574346554779,128.076579971265 -17.9576062956149),128.076694657538 -17.954982080791,(128.069531827817 -17.9423081820721,128.061024557382 -17.9395546544125,128.060237111229 -17.9383155339059,128.064905533906 -17.9348627339492,128.066353543194 -17.9374755339059,128.067634466094 -17.9388668525102,128.070802262736 -17.94347,128.06774 -17.9470055339059,128.069204466094 -17.9484091254343,128.072433962892 -17.9494444660941,128.070884466094 -17.954982080791),128.069531827817 -17.9341510218761,(128.107602687351 -17.9334262865267,128.105372971479 -17.931704596656,128.107393839844 -17.9323626496935,128.108377909368 -17.9341510218761),128.107602687351 -17.9314680683202,(128.150676157076 -17.9301426476263,128.151198603248 -17.93094,128.15104 -17.931378351587,128.151127193552 -17.9314680683202),128.150676157076 -17.929714555333,(128.098583959872 -17.9293909555783,128.09735945173 -17.92925874697,128.097333153803 -17.9290776520325,128.098457271928 -17.929714555333),128.098583959872 -17.9238299653703,(128.160429680598 -17.9235674268027,128.160036763865 -17.9234752355177,128.160500240753 -17.9238299653703),128.160429680598 -17.9211565539431,(128.12761923698 -17.9200481875159,128.125898700868 -17.9177934171618,128.127929397663 -17.9139665828382,128.127929397663 -17.9112606023374,128.125223417162 -17.9123444660941,128.119774466094 -17.91588,128.11831 -17.9182975039,128.119027422328 -17.9140544660941,128.116115533906 -17.912795710348,128.111545824243 -17.90953,128.11283 -17.9060960109032,128.111433383978 -17.9034234171618,128.114089397663 -17.8991733216794,128.113806583598 -17.8997530835646,128.118042494782 -17.9041055339059,128.119344466094 -17.9054920657699,128.123271801833 -17.9095493976626,128.126246582838 -17.909721766712,128.129206859432 -17.9116455040795,128.129825593896 -17.91418,128.12903 -17.9174768183068,128.13033496143 -17.9211565539431),128.12761923698 -17.9199406048226,(128.175520969101 -17.9197084298616,128.173766253249 -17.9154516682585,128.17253936487 -17.9156727862061,128.17365099986 -17.9199406048226),128.175520969101 -17.9210670001496,(128.106767754568 -17.9183488740331,128.10585392929 -17.9167635755579,128.107744386042 -17.9198132976458,128.108167657857 -17.9210670001496),128.106767754568 -17.9146364244421,(128.108655613958 -17.9143546254787,128.108711667257 -17.914324289652,128.108864175757 -17.9146364244421),128.108655613958 -17.8940927885166,(128.110738955895 -17.8933013602892,128.11021014046 -17.8927725448541,128.111001568687 -17.8940927885166),128.110738955895 -17.8865343896216,(128.08291152573 -17.8860246141431,128.082810125082 -17.8862855339059,128.082984466094 -17.8863855931671,128.083134215361 -17.8865343896216),128.08291152573 -17.8620577174567,(128.075920796751 -17.8616278349033,128.075835287795 -17.8616636482221,128.076015333507 -17.8620577174567),128.075920796751 -17.8816760647031,(128.12763458957 -17.8797635452056,128.127129621105 -17.8800723047801,128.128103931854 -17.8816377033183,128.127827445275 -17.8816760647031),128.12763458957 -17.8981896198696,(128.180798630305 -17.89768,128.1809 -17.89716847227,128.180798250808 -17.898070145069,128.181400729311 -17.8981896198696),128.180798630305 -17.9703663380484,(128.160256695778 -17.9699459535515,128.158481297499 -17.965160344263,128.16039298209 -17.9654062026667,128.162371004248 -17.9703663380484),128.160256695778 -17.9419511528869,(128.151597999079 -17.9412939947443,128.151551284039 -17.9411576802703,128.153254827196 -17.9412906023374,128.152586582838 -17.9419511528869,128.151597999079