GDACS_WF_1020337_42
info-gdacs@gdacs.org
2024-08-06T22:00:00-00:00
Actual
Alert
Public
1020337
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in United States
On 19/07/2024, a forest fire started in United States, until 07/08/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1020337
eventid
1020337
currentepisodeid
42
glide
version
0
fromdate
Fri, 19 Jul 2024 00:00:00 GMT
todate
Wed, 07 Aug 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1020337
country
United States
eventname
severity
Green impact for forestfire in 20076 ha
population
66 people affected in the area
vulnerability
sourceid
GWIS
iso3
USA
hazardcomponents
datemodified
Wed, 07 Aug 2024 15:31:27 GMT
Polygon
47.91961,-118.75034 47.9204406023374,-118.745126582838 47.9253485193662,-118.739122671964 47.926933090027,-118.73340797802 47.9258306023374,-118.727946582838 47.93045,-118.72486 47.9339855339059,-118.726324466094 47.9354186247667,-118.729702266051 47.9383365828382,-118.725930602337 47.94146275435,-118.725791231839 47.9428444660941,-118.717144466094 47.9504365828382,-118.714450602337 47.95818,-118.71271 47.9617155339059,-118.714174466094 47.96318,-118.71771 47.9612236857725,-118.722251968151 47.9639265828382,-118.719550602337 47.971930447896,-118.717182653417 47.9719506023374,-118.703316582838 47.974425330601,-118.700765120142 47.9743106023374,-118.696766582838 47.9770165828382,-118.694060602337 47.9868265828382,-118.690360602337 47.9944134171618,-118.690460602337 47.9971193976626,-118.693166582838 47.9975380011237,-118.698623666413 48.001960298807,-118.695321891211 48.0037606023374,-118.687446582838 48.0113465828382,-118.679660602337 48.0167955339059,-118.680744466094 48.0194501251889,-118.688169097238 48.0225265828382,-118.683600602337 48.0297061670621,-118.681556761175 48.0267344660941,-118.680165533906 48.02527,-118.67663 48.0283565828382,-118.672010602337 48.0363054226444,-118.671339284037 48.04276,-118.66838 48.0520352035283,-118.672635613113 48.0583665828382,-118.665930602337 48.0621934171618,-118.665930602337 48.0663803504119,-118.672371919422 48.0710093976626,-118.675456582838 48.0707069866435,-118.684484030649 48.0727193976626,-118.686726582838 48.0727314032544,-118.690493060976 48.0762293976626,-118.693356582838 48.0757725196741,-118.697867183392 48.07852,-118.70226 48.0767470796848,-118.706001636427 48.07856,-118.70977 48.0775893976626,-118.715833417162 48.0733919253544,-118.720658522437 48.0752779282028,-118.737841929314 48.0778784673576,-118.738427839294 48.0815365828382,-118.733870602337 48.0910734171618,-118.734200602337 48.0971755339059,-118.739014466094 48.0985008780426,-118.743249413311 48.1054055339059,-118.745744466094 48.1064893976626,-118.751193417162 48.1024888435975,-118.754156904355 48.1028042340315,-118.755769372149 48.1047719122736,-118.760142846906 48.10844,-118.75848 48.1130593976626,-118.761566582838 48.1130593976626,-118.765393417162 48.1113892961132,-118.767407245476 48.1119572076865,-118.772624595118 48.11503,-118.77847 48.1139616390762,-118.781412720625 48.1148993976626,-118.792233417162 48.1097224040904,-118.799467338143 48.1100893976626,-118.803843417162 48.1073834171618,-118.806549397663 48.1035565828382,-118.806549397663 48.1006769089089,-118.802970201329 48.0957476586249,-118.804651770888 48.0926634171618,-118.809259397663 48.0872144660941,-118.808175533906 48.0857943678973,-118.804416947518 48.0836562729927,-118.804657758963 48.0819915029988,-118.807233399473 48.08345,-118.81076 48.0825782981831,-118.813408399473 48.08539,-118.81911 48.0840993976626,-118.824563417162 48.0805567146055,-118.827435828149 48.0800418205128,-118.831398365531 48.0812796674111,-118.835053585802 48.0844955339059,-118.836454466094 48.0859566021744,-118.84028491083 48.0901993976626,-118.843296582838 48.0901993976626,-118.847123417162 48.0874934171618,-118.849829397663 48.08145,-118.85115 48.0779144660941,-118.849685533906 48.0764839776628,-118.845479182754 48.0722206023374,-118.842463417162 48.0710073144488,-118.828018853464 48.06718,-118.82992 48.0636444660941,-118.828455533906 48.0609325443264,-118.818611756875 48.0547858828964,-118.820231797812 48.0548268448728,-118.824426898258 48.0583334171618,-118.824490602337 48.0610393976626,-118.827196582838 48.0599555339059,-118.832645533906 48.0545065828382,-118.833729397663 48.0514474872198,-118.829248187586 48.0488170284766,-118.830755765716 48.0487793976626,-118.834393417162 48.0460734171618,-118.837099397663 48.0404242378949,-118.836270897242 48.04141,-118.83909 48.0399455339059,-118.842625533906 48.0334012880832,-118.846661157707 48.0359255339059,-118.847924466094 48.03739,-118.85146 48.0346960033718,-118.855817079943 48.0352419449181,-118.857949504368 48.0399593976626,-118.861016582838 48.0398672164561,-118.8692150874 48.0430755339059,-118.870614466094 48.0444910281921,-118.873903802096 48.0478540441366,-118.874981565578 48.044,-118.86716 48.0456444660941,-118.854764466094 48.0552134171618,-118.853080602337 48.0596193976626,-118.858416582838 48.0601293976626,-118.867923417162 48.0554155339059,-118.875715533906 48.0496059558634,-118.876558434422 48.0501,-118.88986 48.0470134171618,-118.894479397663 48.0415644660941,-118.893395533906 48.0388617727162,-118.884615636022 48.0370186803345,-118.885455437141 48.0369293976626,-118.888833417162 48.0342234171618,-118.891539397663 48.0211557190441,-118.895030276334 48.0210793976626,-118.898473417162 48.0183734171618,-118.901179397663 48.0022865828382,-118.904189397663 47.9992,-118.89957 48.0006644660941,-118.896034466094 48.0031556565507,-118.894777732828 48.0014734615048,-118.890601504261 47.9986844660941,-118.889285533906 47.997322255558,-118.886264073405 47.9933044660941,-118.884895533906 47.992029431182,-118.880407665137 47.98623,-118.87201 47.9882023622785,-118.868135100713 47.9853006023374,-118.864363417162 47.9853006023374,-118.860536582838 47.9880065828382,-118.857830602337 47.9918334171618,-118.857830602337 47.9965009464487,-118.862901140957 47.9964364069826,-118.856604151441 47.9934151697119,-118.854429503698 47.99014,-118.85572 47.9866044660941,-118.854255533906 47.98514,-118.85072 47.987931615978,-118.846297692892 47.9884169831859,-118.84193356063 47.9845065828382,-118.841989397663 47.9815877235603,-118.838213203279 47.9764744660941,-118.836295533906 47.97453,-118.82756 47.9764444660941,-118.823004466094 47.9809944660941,-118.818664466094 47.9867333994729,-118.817774362323 47.9933988747873,-118.814367623913 47.9936606023374,-118.811856582838 47.9963665828382,-118.809150602337 48.0006859710194,-118.809125414868 47.99931,-118.80542 48.0016985784481,-118.80126699396 48.00032,-118.79786 48.0010896086757,-118.795336234528 47.9996762622689,-118.796723044431 48.0000193976626,-118.801063417162 47.9954,-118.80415 47.9918644660941,-118.802685533906 47.9905225843323,-118.799766273055 47.98305,-118.80081 47.9795144660941,-118.799345533906 47.97687,-118.79217 47.9790331753683,-118.787739123663 47.97482,-118.78088 47.9775290037309,-118.7700095184 47.9739303054814,-118.764726253524 47.9715478533302,-118.766787937358 47.97301,-118.77032 47.9715455339059,-118.773855533906 47.9549663616594,-118.783903476971 47.9570693976626,-118.786206582838 47.9570693976626,-118.790033417162 47.95245,-118.79312 47.9478306023374,-118.790033417162 47.9480362695522,-118.785898780099 47.9456006023374,-118.783373417162 47.9454488844002,-118.780309320416 47.9351665828382,-118.781529397663 47.9321099263082,-118.777060449711 47.9232944660941,-118.773065533906 47.9214,-118.76382 47.9230794529575,-118.760140816464 47.9207006023374,-118.757653417162 47.91961),-118.75034 47.9286405470425,(-118.759419183536 47.9292401018271,-118.759819793235 47.9328562430912,-118.758880992013 47.930899168264,-118.755579372715 47.9286405470425),-118.759419183536 47.9374785341973,(-118.745120392398 47.9470494783699,-118.754528332859 47.948795156108,-118.750547177547 47.94751,-118.74728 47.9486139773415,-118.744283975639 47.9461406023374,-118.741733417162 47.9464710032574,-118.737412102917 47.9447015335538,-118.736306938018 47.9434055339059,-118.738995533906 47.9388216520675,-118.740251470631 47.9374785341973),-118.745120392398 47.9483950844527,(-118.768474194295 47.9488021353778,-118.77321156262 47.9519521331496,-118.771288705584 47.95098,-118.76849 47.9537944660941,-118.761314466094 47.95984,-118.76031 47.9596461121482,-118.752708812017 47.9568826804832,-118.749562655514 47.9573193976626,-118.755443417162 47.9551855339059,-118.760005533906 47.9506323117794,-118.762442053278 47.9505993976626,-118.766103417162 47.9483950844527),-118.768474194295 47.9899531240166,(-118.717071720181 47.99067726379,-118.720835697354 47.9910858917413,-118.7214472523 47.9927929734824,-118.720591510184 47.9899531240166),-118.717071720181 47.9901797758533,(-118.834170067885 47.99087171312,-118.835205625185 47.9914041135338,-118.834849886602 47.9903352041161,-118.833937453051 47.9901797758533),-118.834170067885 47.9971507510748,(-118.867726357695 47.9994798336159,-118.870268480043 47.9998465247955,-118.86875827026 47.9973890535513,-118.866558859043 47.9971507510748),-118.867726357695 47.9981411252127,(-118.818742376087 47.998190719048,-118.818991701134 47.9986942587067,-118.818729238657 47.99828,-118.81877 47.9981411252127),-118.818742376087 48.0227780440021,(-118.854898236804 48.0257660977687,-118.855873799595 48.0268708066119,-118.8543500027 48.0235776238985,-118.853178233552 48.0234293976626,-118.853923417162 48.0227780440021),-118.854898236804 48.0241233766831,(-118.713465061968 48.0271171633295,-118.716043714116 48.0327662772829,-118.714313794254 48.0304906023374,-118.709443417162 48.0301158901855,-118.707559611962 48.0278619500585,-118.708464297318 48.0241233766831),-118.713465061968 48.0306965469354,(-118.699758265953 48.0322241098145,-118.703560388038 48.0352182468549,-118.702551531638 48.0403322320849,-118.697858056322 48.0306965469354),-118.699758265953 48.0265925911304,(-118.863200413274 48.0285644305732,-118.86500581224 48.0299610404949,-118.862932522381 48.0283365828382,-118.862609397663 48.0265925911304),-118.863200413274 48.0517793094326,(-118.734111946959 48.0528149574556,-118.734803944845 48.0524868961071,-118.733154669071 48.0517793094326,-118.734111946959