GDACS_WF_1020641_7
info-gdacs@gdacs.org
2024-08-05T22:00:00-00:00
Actual
Alert
Public
1020641
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Mozambique
On 31/07/2024, a forest fire started in Mozambique, until 06/08/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1020641
eventid
1020641
currentepisodeid
7
glide
version
0
fromdate
Wed, 31 Jul 2024 00:00:00 GMT
todate
Tue, 06 Aug 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1020641
country
Mozambique
eventname
severity
Green impact for forestfire in 9503 ha
population
16 people affected in the area
vulnerability
sourceid
GWIS
iso3
MOZ
hazardcomponents
datemodified
Mon, 12 Aug 2024 08:43:56 GMT
Polygon
-13.96375,38.99692 -13.9622855339059,39.0004555339059 -13.9573505984682,39.0016416417284 -13.9608355339059,39.0041844660941 -13.9623,39.00772 -13.9594689628535,39.0121686474903 -13.9602693976626,39.0171934171618 -13.9575634171618,39.0198993976626 -13.9510265828382,39.0203093976626 -13.9454906023374,39.0131234171618 -13.9454906023374,39.0092965828382 -13.9485215187247,39.006525968571 -13.9458506023374,39.0038434171618 -13.9458506023374,39.0000165828382 -13.9485565828382,38.9973106023374 -13.9527941257256,38.9969683964811 -13.9538748459743,38.9921535581394 -13.94898,38.99449 -13.9451883635728,38.9926422493967 -13.9437155339059,38.9992855339059 -13.9395757904743,39.0006298152529 -13.9384455339059,39.0058455339059 -13.93491,39.00731 -13.9315603480277,39.0059697362431 -13.9260765828382,39.0064493976626 -13.9180233087983,38.998885005917 -13.9160193129696,39.0063361340053 -13.9190493976626,39.0091065828382 -13.9190493976626,39.0129334171618 -13.9163442386822,39.0156388487402 -13.9143493976626,39.0268434171618 -13.9105478488849,39.0297673197422 -13.9127393976626,39.0386034171618 -13.9100334171618,39.0413093976626 -13.906661216965,39.041399830013 -13.9069403015534,39.0439261601319 -13.90976,39.04294 -13.9132955339059,39.0444044660941 -13.9170493976626,39.0490665828382 -13.9170493976626,39.0528934171618 -13.9088774785505,39.0584088115228 -13.9101493976626,39.0639834171618 -13.9064955339059,39.0702355339059 -13.89802,39.07515 -13.8888665828382,39.0734093976626 -13.8861606023374,39.0707034171618 -13.8861330702857,39.0670149958092 -13.8814465828382,39.0675893976626 -13.87836,39.06297 -13.8798244660941,39.0594344660941 -13.8848565828382,39.0553706023374 -13.894073046174,39.0559357191241 -13.8922406023374,39.0538134171618 -13.891523141162,39.0453981936239 -13.8855177009663,39.0414485997598 -13.8854993976626,39.0451834171618 -13.8827934171618,39.0478893976626 -13.87986,39.04867 -13.8763244660941,39.0472055339059 -13.87486,39.04367 -13.8757241248672,39.0410329402337 -13.87341,39.03669 -13.8748744660941,39.0331544660941 -13.8781529784846,39.0317411247581 -13.8775559951347,39.0296309597621 -13.8738744660941,39.0281955339059 -13.872500103266,39.0251129797076 -13.86929,39.02636 -13.8652912811956,39.0242023287177 -13.8591,39.02625 -13.8539744660941,39.0233155339059 -13.85228,39.01929 -13.8532854755786,39.0158024487011 -13.8509944660941,39.0145855339059 -13.84953,39.01105 -13.8505706023374,39.0053865828382 -13.8536688766298,39.0026025702506 -13.8475565828382,39.0024193976626 -13.8420906023374,38.9956134171618 -13.8442844660941,38.9830444660941 -13.8499740429595,38.9797358471409 -13.8529165828382,38.9758406023374 -13.860083923062,38.9752918021928 -13.8640637227124,38.9720104872873 -13.861226934742,38.9676754100924 -13.8581434171618,38.9722793976626 -13.85221,38.97255 -13.8486744660941,38.9710855339059 -13.84721,38.96755 -13.8485906023374,38.9606365828382 -13.8512965828382,38.9579306023374 -13.8561746028161,38.9586329821361 -13.8572744660941,38.9532644660941 -13.86081,38.9518 -13.8667955339059,38.9546044660941 -13.8680876823954,38.9590062990986 -13.870005982455,38.9599240400588 -13.87447,38.95707 -13.8780055339059,38.9585344660941 -13.8791405770203,38.9643202921854 -13.88669,38.9596 -13.8955034171618,38.9611406023374 -13.9010293976626,38.9683165828382 -13.9010293976626,38.9721434171618 -13.8990873194633,38.974990814617 -13.8999394247422,38.9790489067047 -13.9053370613358,38.9802976709253 -13.9063517298362,38.9801641591883 -13.9049706023374,38.9745165828382 -13.9086074903085,38.9716254333287 -13.9037044660941,38.9693055339059 -13.90224,38.96577 -13.9032606023374,38.9585165828382 -13.9070353903479,38.9555980033054 -13.9045037944846,38.9534813277171 -13.90003,38.95635 -13.8964944660941,38.9548855339059 -13.8924606023374,38.9487534171618 -13.8935444660941,38.9433044660941 -13.8991,38.94048 -13.9109120692198,38.9437788814454 -13.90822,38.93741 -13.9096844660941,38.9338744660941 -13.91322,38.93241 -13.9157361028804,38.93319330406 -13.9185965828382,38.9297106023374 -13.9231469350562,38.9301940415386 -13.9245644660941,38.9268944660941 -13.9281,38.92543 -13.9327193976626,38.9285165828382 -13.93498,38.93476 -13.9341051569435,38.9374131006701 -13.9369493976626,38.9401465828382 -13.9395770554048,38.9500646497303 -13.9432734171618,38.9500906023374 -13.9459793976626,38.9527965828382 -13.9459793976626,38.9566234171618 -13.9432734171618,38.9593293976626 -13.9377866219848,38.9581888961939 -13.93475,38.95932 -13.9304301032755,38.9566816519917 -13.9261765828382,38.9569293976626 -13.92309,38.95231 -13.9257471891182,38.9427530376775 -13.9198448368858,38.9419806044417 -13.9185555339059,38.9446355339059 -13.9156679307802,38.9459711185546 -13.91656,38.94865 -13.9148993461896,38.9553664237118 -13.9161047958839,38.9568505782914 -13.9187265828382,38.9542706023374 -13.9225534171618,38.9542706023374 -13.9252593976626,38.9569765828382 -13.9242938830547,38.9622484118879 -13.9353555339059,38.9667244660941 -13.93682,38.97026 -13.9359017025723,38.9773155415149 -13.93893,38.97619 -13.9480534171618,38.9776606023374 -13.951130279423,38.9823288686405 -13.9569255339059,38.9837144660941 -13.95839,38.98725 -13.9570251540257,38.9906364418606 -13.9610455339059,38.9920044660941 -13.96375),38.99692 -13.936697931744,(38.9921787414889 -13.933375814545,38.9896554371072 -13.9288755423082,38.9908762226952 -13.9289916765066,38.9937836591457 -13.9352922968955,38.9951854453826 -13.936697931744),38.9921787414889 -13.9346309550406,(38.9835828588634 -13.9340782974277,38.9804444584851 -13.9317066981756,38.9814393746112 -13.934284185455,38.9838145628928 -13.9346309550406),38.9835828588634 -13.9281650788914,(38.9814250972649 -13.91983036213,38.9798250143226 -13.919568438062,38.9816814065267 -13.9212234171618,38.9820106023374 -13.9281650788914),38.9814250972649 -13.9140656461761,(38.9899119993003 -13.9107993976626,38.9870434171618 -13.9101747985329,38.9879781958187 -13.9125674302121,38.9912337062253 -13.9140656461761),38.9899119993003 -13.9020115884191,(38.9991071436051 -13.8969306023374,38.9945034171618 -13.8984624669022,38.9887551215243 -13.8951090989733,38.9868138251946 -13.8955293976626,38.9927634171618 -13.8914906263387,38.9957345062404 -13.8921109267757,38.9988523334398 -13.8967934171618,38.9982806023374 -13.9010468102863,39.0018354889838 -13.9020115884191),38.9991071436051 -13.9019762914309,(39.004680030719 -13.9014106023374,39.0038334171618 -13.9013431897137,39.0034945110162 -13.9010715792223,39.0048599891663 -13.9019762914309),39.004680030719 -13.8979806023374,(39.0265565828382 -13.8972692515742,39.0237758864662 -13.8954197611323,39.0252384316115 -13.8977787764415,39.0275712301355 -13.8979806023374),39.0265565828382 -13.8979184207777,(39.0081000108337 -13.8942184122499,39.0078769389497 -13.8916021021346,39.0094348108843 -13.8932841142014,39.0120438486143 -13.8961665828382,39.0084506023374 -13.8979184207777),39.0081000108337 -13.8898448144734,(39.0240663268314 -13.88846,39.02065 -13.889240053769,39.0181387615239 -13.8874793976626,39.0187165828382 -13.8876035311303,39.0219193560772 -13.8898448144734),39.0240663268314 -13.8853622990337,(39.0411514002402 -13.8852020560359,39.0383141957113 -13.8836092702962,39.0371239418635 -13.8832455112733,39.0389526819651 -13.8853622990337),39.0411514002402 -13.8818864270936,(38.9949153185255 -13.8790104475914,38.9940155899645 -13.87476,38.99655 -13.8701406023374,38.9934634171618 -13.8701406023374,38.9896365828382 -13.8729723666103,38.9869055823895 -13.8728306023374,38.9828665828382 -13.8779027142559,38.9798700504644 -13.8778331928059,38.9747939957383 -13.8729768237449,38.9726789689625 -13.8669062772876,38.9723995127127 -13.8693893976626,38.9749565828382 -13.8693893976626,38.9787834171618 -13.8670663532512,38.981233527948 -13.8658355339059,38.9885255339059 -13.8623,38.98999 -13.8597520572119,38.9891854211938 -13.86364,38.99571 -13.8602355339059,39.0022655339059 -13.8589986661151,39.0030919825417 -13.8638793976626,39.0061265828382 -13.8629974202672,39.0153857031417 -13.8661687188044,39.0175476712823 -13.867878165127,39.0166408314169 -13.8654444660941,39.0153955339059 -13.86398,39.01186 -13.8669544660941,39.0006444660941 -13.87049,38.99918 -13.8784419143438,39.0010270057191 -13.8785506023374,38.9977465828382 -13.8818864270936),38.9949153185255 -13.8621223176046,(38.9629137009014 -13.8620720411949,38.9629037003017 -13.8620981740212,38.9630350788914 -13.8621223176046),38.9629137009014 -13.8613231931169,(38.9669206663782 -13.8611380525292,38.9671977488487 -13.861203065258,38.9675245899076 -13.8613231931169),38.9669206663782 -13.9524677790184,(39.006876517915 -13.9524550957793,39.0068790407681 -13.9524658481102,39.0068862252459 -13.9524677790184,39.006876517915