GDACS_WF_1020970_8
info-gdacs@gdacs.org
2024-08-11T22:00:00-00:00
Actual
Alert
Public
1020970
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 06/08/2024, a forest fire started in Australia, until 12/08/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1020970
eventid
1020970
currentepisodeid
8
glide
version
0
fromdate
Tue, 06 Aug 2024 00:00:00 GMT
todate
Mon, 12 Aug 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1020970
country
Australia
eventname
severity
Green impact for forestfire in 12219 ha
population
8 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Mon, 12 Aug 2024 08:20:03 GMT
Polygon
-17.12896,122.47026 -17.1264355339059,122.478705533906 -17.1229,122.48017 -17.1182081115875,122.478589963572 -17.1172950598075,122.484056514983 -17.1194,122.48802 -17.1168355339059,122.504325533906 -17.1113865828382,122.505409397663 -17.1083744660941,122.503305533906 -17.1069227159593,122.499833927444 -17.1022362891518,122.497380706156 -17.0983365828382,122.497429397663 -17.0957745697867,122.495669556433 -17.0934640566753,122.497842197849 -17.0975193976626,122.500816582838 -17.0975193976626,122.504643417162 -17.094907122305,122.507286785888 -17.0990862120884,122.510994668799 -17.1003944660941,122.508244466094 -17.10393,122.50678 -17.1100193976626,122.510886582838 -17.1094793976626,122.521013417162 -17.1075177365425,122.523222059353 -17.1095693976626,122.526446582838 -17.1095693976626,122.530273417162 -17.1042069057774,122.535410203421 -17.1035878325143,122.538086916154 -17.1057328140879,122.539973528768 -17.1153134171618,122.538250602337 -17.1188268845934,122.54433695613 -17.1230593976626,122.547346582838 -17.12414,122.55225 -17.1215493976626,122.564413417162 -17.1197333691594,122.566524750749 -17.12032,122.56896 -17.1180810791991,122.573758864022 -17.1164493976626,122.584893417162 -17.1096555339059,122.593765533906 -17.1037934171618,122.597849397663 -17.0999665828382,122.597849397663 -17.0920506023374,122.590853417162 -17.0920506023374,122.587026582838 -17.0944292153609,122.584539342293 -17.09254,122.58072 -17.0927998843631,122.575290034556 -17.08975,122.57643 -17.0862144660941,122.574965533906 -17.0850195220897,122.56897197144 -17.0841293976626,122.573193417162 -17.0814234171618,122.575899397663 -17.0776152623412,122.575903113247 -17.07296,122.57917 -17.0691866436492,122.577349607464 -17.0674955339059,122.583365533906 -17.0573909443875,122.586925525638 -17.0561493976626,122.592823417162 -17.0534434171618,122.595529397663 -17.0496165828382,122.595529397663 -17.0442896266339,122.590323615697 -17.0393765828382,122.591049397663 -17.03629,122.58643 -17.0404944660941,122.577214466094 -17.04403,122.57575 -17.0509337399343,122.576494816608 -17.0521744660941,122.571834466094 -17.0589561059774,122.568278078484 -17.0607444660941,122.560434466094 -17.0651134582846,122.558010213595 -17.064211973086,122.553934339334 -17.0608373047977,122.551640497142 -17.0583941974175,122.553889188078 -17.0573355339059,122.561565533906 -17.0538,122.56303 -17.0502644660941,122.561565533906 -17.0488115637468,122.558088134881 -17.0448644660941,122.556705533906 -17.0407606023374,122.549793417162 -17.0407606023374,122.545966582838 -17.0436691782672,122.543220303601 -17.0429275579092,122.540612917284 -17.0378034171618,122.546329397663 -17.0323544660941,122.545245533906 -17.02927,122.53584 -17.0302680660894,122.533002483029 -17.0262637094962,122.528462203031 -17.0205944660941,122.527525533906 -17.0118606023374,122.514163417162 -17.00975,122.50663 -17.0112144660941,122.503094466094 -17.01475,122.50163 -17.018452637337,122.503344554052 -17.0264567186607,122.5032061074 -17.0276961307242,122.501463127028 -17.0262860988662,122.497838792139 -17.0210365828382,122.498789397663 -17.0183306023374,122.496083417162 -17.0186806023374,122.489216582838 -17.0242059433247,122.485627802151 -17.0201506023374,122.482653417162 -17.0201506023374,122.478826582838 -17.02474635894,122.475744702499 -17.0277265828382,122.470590602337 -17.0315534171618,122.470590602337 -17.0344369926559,122.472984770975 -17.0408115632897,122.470377428011 -17.0348544660941,122.469025533906 -17.0313106023374,122.463893417162 -17.0303406023374,122.456936582838 -17.0350080473422,122.453580746083 -17.0373844660941,122.447304466094 -17.04092,122.44584 -17.0438052215348,122.44686994126 -17.0459944660941,122.442764466094 -17.0518265828382,122.437530602337 -17.0556534171618,122.437530602337 -17.0582335309659,122.440048210015 -17.0590206023374,122.436216582838 -17.0617265828382,122.433510602337 -17.0685055339059,122.434564466094 -17.0695893976626,122.440013417162 -17.0666355339059,122.445295533906 -17.0621093990704,122.449304130623 -17.0628593976626,122.454253417162 -17.0598555339059,122.459635533906 -17.0546844029355,122.460976940548 -17.0524593976626,122.472843417162 -17.0497534171618,122.475549397663 -17.0472113559889,122.475804954932 -17.0473393976626,122.479823417162 -17.044690229841,122.482491436644 -17.0487493976626,122.485466582838 -17.049234583688,122.491416208882 -17.0590634171618,122.490300602337 -17.0684768196644,122.499245168442 -17.0702643812221,122.498457986506 -17.06956,122.49606 -17.0710244660941,122.492524466094 -17.07456,122.49106 -17.0780610801182,122.492501444809 -17.0805144105098,122.490105508132 -17.0764706023374,122.487133417162 -17.0764706023374,122.483306582838 -17.0791174761395,122.480640096171 -17.0761344660941,122.479285533906 -17.07467,122.47575 -17.0776836493052,122.471179334966 -17.0747044660941,122.469825533906 -17.07324,122.46629 -17.0762559433247,122.461717802151 -17.0732844660941,122.460365533906 -17.07182,122.45683 -17.0748567149348,122.452243923005 -17.0718544660941,122.450885533906 -17.07039,122.44735 -17.0718544660941,122.443814466094 -17.076892332081,122.442648832431 -17.0780944660941,122.437794466094 -17.08342,122.43624 -17.0877134171618,122.437520602337 -17.0904193976626,122.440226582838 -17.0893355339059,122.445675533906 -17.0858,122.44714 -17.080127667919,122.446031167569 -17.0800093976626,122.449263417162 -17.0773532850652,122.451936076995 -17.0810146048041,122.454280835398 -17.0838765828382,122.450790602337 -17.0893255339059,122.451874466094 -17.09079,122.45541 -17.0877532850652,122.459996076995 -17.0914161376189,122.462343129418 -17.0926544660941,122.459944466094 -17.09619,122.45848 -17.1008093976626,122.461566582838 -17.1008093976626,122.465393417162 -17.0981625238605,122.468059903829 -17.1014244071001,122.469831829323 -17.1065344660941,122.464334466094 -17.11146,122.46226 -17.1160760893594,122.464306885394 -17.11981,122.46382 -17.1274955339059,122.466724466094 -17.12896),122.47026 -17.104385264693,(122.475599026704 -17.1023855928999,122.474078170677 -17.0996055894902,122.477514491868 -17.1021299496946,122.478573418029 -17.104385264693),122.475599026704 -17.0976076183372,(122.487117070696 -17.0948338623811,122.484946870582 -17.0920440566753,122.488382197849 -17.0946054302133,122.489460443567 -17.0953644660941,122.488324466094 -17.0976076183372),122.487117070696 -17.092312877695,(122.507613214112 -17.0887100355468,122.505286109378 -17.0859355894902,122.508694491868 -17.0872734171618,122.508960602337 -17.0895484316384,122.511021596603 -17.092312877695),122.507613214112 -17.0911307460777,(122.515936910794 -17.0901315683616,122.514728403397 -17.0888955339059,122.517115533906 -17.08536,122.51858 -17.0818244660941,122.517115533906 -17.08036,122.51358 -17.0833644105098,122.509015508132 -17.0793206023374,122.506043417162 -17.0793206023374,122.502216582838 -17.0819536493052,122.499559334966 -17.0790089198818,122.498228555191 -17.0756056187779,122.500852013494 -17.0749187190163,122.506676004648 -17.0782993976626,122.512616582838 -17.0813951352383,122.525561018286 -17.0873858466415,122.526441130048 -17.0873406023374,122.522546582838 -17.0909042806714,122.519669995631 -17.0911307460777),122.515936910794 -17.0905587670333,(122.529181277433 -17.0885641533585,122.528088869952 -17.0888831289791,122.529532723096 -17.0899890976283,122.531111371402 -17.0905587670333),122.529181277433 -17.0970344105098,(122.477835508132 -17.0934123295663,122.475494576563 -17.0906240566753,122.478922197849 -17.0942561376189,122.481263129418 -17.0970344105098),122.477835508132 -17.0909159433247,(122.498157802151 -17.0872823295663,122.495814576563 -17.0844963506948,122.499240665034 -17.0881299644532,122.501573890622 -17.0909159433247),122.498157802151 -17.0956374761395,(122.468370096171 -17.0919938623811,122.466026870582 -17.0892040566753,122.469462197849 -17.0929906023374,122.471036582838 -17.0956374761395),122.468370096171 -17.0894959433247,(122.488697802151 -17.0858638623811,122.486356870582 -17.0830855894902,122.489784491868 -17.0867076704337,122.492125423437 -17.0879444660941,122.489734466094 -17.0894959433247),122.488697802151 -17.0880759433247,(122.479237802151 -17.0844423295663,122.476894576563 -17.0816425238605,122.480329903829 -17.0852861376189,122.482673129418 -17.0880759433247),122.479237802151 -17.0866559433247,(122.469777802151 -17.0853065828382,122.469509397663 -17.0830146235858,122.467423043748 -17.0802263506948,122.470860665034 -17.0838676704337,122.473205423437 -17.0866559433247),122.469777802151 -17.0852567149348,(122.460303923005 -17.0838765828382,122.460029397663 -17.0815953951959,122.457959164602 -17.0788040566753,122.461402197849 -17.0824453764142,122.463756956252 -17.0852567149348),122.460303923005 -17.0456288387338,(122.457169823391 -17.0450684268031,122.457219357056 -17.0453155339059,122.458274466094 -17.0454513071633,122.458477665134 -17.0456288387338),122.457169823391 -17.1021526413046,(122.551042027373 -17.1020286310423,122.548421414317 -17.0985896266339,122.547930705716 -17.09278,122.55124 -17.0893154046832,122.549822933556 -17.0891597316505,122.551405370177 -17.0905434171618,122.551680602337 -17.0932493976626,122.554386582838 -17.0926137780381,122.559474345766 -17.0947891863068,122.559578369842 -17.0961644660941,122.555594466094 -17.1021526413046),122.551042027373 -17.1011159513808,(122.586703747141 -17.1010652218177,122.586448712404 -17.1009222757954,122.586477146136 -17.1010948185634,122.586735374637 -17.1011159513808),122.586703747141 -17.0965495915874,(122.568130139464 -17.0953534171618,122.568929397663 -17.0941385233826,122.56917105506 -17.0947301156369,122.571529965444 -17.0965495915874),122.568130139464 -17.0998500186093,(122.514500710663 -17.0991637879116,122.512955331201 -17.0987792539223,122.514323089206 -17.0991255339059,122.514554466094 -17.0998500186093,122.514500710663