GDACS_WF_1021342_2
info-gdacs@gdacs.org
2024-08-16T22:00:00-00:00
Actual
Alert
Public
1021342
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Angola
On 10/08/2024, a forest fire started in Angola, until 17/08/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1021342
eventid
1021342
currentepisodeid
2
glide
version
0
fromdate
Sat, 10 Aug 2024 00:00:00 GMT
todate
Sat, 17 Aug 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1021342
country
Angola
eventname
severity
Green impact for forestfire in 8483 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AGO
hazardcomponents
datemodified
Mon, 19 Aug 2024 10:40:05 GMT
Polygon
-15.09197,16.25767 -15.0888055339059,16.2654755339059 -15.08527,16.26694 -15.077717414097,16.2652780933673 -15.0748918146832,16.2667465308958 -15.0777338276878,16.2710884229011 -15.0803934171618,16.2713206023374 -15.0830993976626,16.2740265828382 -15.0820193976626,16.2853534171618 -15.0789886167638,16.2893437888711 -15.08221,16.29399 -15.0791234171618,16.2986093976626 -15.0752965828382,16.2986093976626 -15.0725993641981,16.2959165302129 -15.0726393976626,16.3026034171618 -15.0707403066629,16.3047702513348 -15.0718,16.3077 -15.0708893976626,16.3142834171618 -15.0660169884927,16.3189139000409 -15.0692593976626,16.3217265828382 -15.0692593976626,16.3255534171618 -15.06464,16.32864 -15.0591365828382,16.3268493976626 -15.0564306023374,16.3241434171618 -15.0563112104589,16.3209168063442 -15.0515923354604,16.3175286689399 -15.04872,16.31855 -15.0451844660941,16.3170855339059 -15.04372,16.31355 -15.0449594981218,16.3103511544578 -15.0405665828382,16.3107293976626 -15.038358359433,16.3087683632994 -15.037498724063,16.3127283283327 -15.0454293976626,16.3178865828382 -15.0439290221975,16.323613838132 -15.0447593976626,16.3286834171618 -15.0344922002583,16.3351523128079 -15.0333815083839,16.3437385611255 -15.03456,16.3486 -15.0330955339059,16.3521355339059 -15.02817,16.35463 -15.0237460171951,16.3518358761639 -15.0212779746536,16.3575026426585 -15.0273855339059,16.3595144660941 -15.02885,16.36305 -15.0273855339059,16.3665855339059 -15.02385,16.36805 -15.0201353515826,16.366317470096 -15.01512,16.36796 -15.0114043185672,16.3662259240791 -15.00418,16.36849 -14.9995606023374,16.3654034171618 -14.9995606023374,16.3615765828382 -15.0016785707864,16.3592634994292 -14.9987006023374,16.3565034171618 -14.9987006023374,16.3526765828382 -15.0014065828382,16.3499706023374 -15.0054073395404,16.3500868135555 -15.0060392528208,16.3486352657089 -15.0034706023374,16.3445434171618 -15.0041396398147,16.3397152974943 -15.0024006023374,16.3367334171618 -15.00216,16.32994 -15.0068308324109,16.3218187154056 -15.0007965828382,16.3221593976626 -14.9980906023374,16.3194534171618 -14.9980620801606,16.3157699735043 -14.9940265828382,16.3159093976626 -14.9913206023374,16.3132034171618 -14.9898706023374,16.3062065828382 -14.9946638924299,16.3031214094011 -14.9955547545653,16.2974144496038 -14.9882528732671,16.2967154502243 -14.98971,16.30024 -14.9874392429518,16.3043142802974 -14.9882493976626,16.3096134171618 -14.9837655339059,16.3142755339059 -14.979950065664,16.3156843175985 -14.9782255339059,16.3232755339059 -14.9727765828382,16.3243593976626 -14.9698699420263,16.3206446296552 -14.9641444660941,16.3197455339059 -14.96268,16.31621 -14.9657665828382,16.3115906023374 -14.9708077206254,16.3124019739718 -14.9755929229049,16.3089154633474 -14.9717965828382,16.3089093976626 -14.9690906023374,16.3062034171618 -14.9690906023374,16.3023765828382 -14.9717006122338,16.29863991278 -14.96751,16.30105 -14.9628906023374,16.2979634171618 -14.9628906023374,16.2941365828382 -14.9666881853168,16.2912134691042 -14.9642006023374,16.2886534171618 -14.9650423602872,16.2835668030399 -14.9582407739103,16.2827325237354 -14.9552034171618,16.2875993976626 -14.9440965828382,16.2903393976626 -14.9392906023374,16.2856634171618 -14.9371641648595,16.2775266012832 -14.93379,16.27285 -14.9359344660941,16.2657944660941 -14.9399756475999,16.2644305795611 -14.9413544660941,16.2604644660941 -14.9470473820489,16.2573960530608 -14.9504344660941,16.2475144660941 -14.9552032475259,16.2459311200983 -14.95445,16.24346 -14.956812372115,16.239324504472 -14.95597,16.23672 -14.9574344660941,16.2331844660941 -14.96543,16.23127 -14.9721334171618,16.2326906023374 -14.9823293976626,16.2482565828382 -14.9823293976626,16.2520834171618 -14.9798234046469,16.2546557702972 -14.9810427837037,16.2584587393257 -14.9836034171618,16.2587106023374 -14.9863093976626,16.2614165828382 -14.9852255339059,16.2668655339059 -14.980966848401,16.2682672111328 -14.9828723621734,16.2703165286778 -14.9941,16.26711 -14.9976355339059,16.2685744660941 -15.00161,16.27523 -14.9974315478318,16.2821506937667 -15.0029255339059,16.2832044660941 -15.0049594229797,16.2875295664392 -15.0076244660941,16.2829044660941 -15.01116,16.28144 -15.0164634171618,16.2831406023374 -15.0191693976626,16.2858465828382 -15.0188193976626,16.2975534171618 -15.0105360536187,16.3029805913789 -15.0097527957343,16.3121920078356 -15.010394321296,16.3146998001356 -15.0131665828382,16.3116606023374 -15.0169934171618,16.3116606023374 -15.0200257498445,16.3160072660508 -15.0214706023374,16.3091065828382 -15.0241765828382,16.3064006023374 -15.0287324423645,16.3068877214044 -15.0301944660941,16.3033644660941 -15.03373,16.3019 -15.037851640567,16.3042416367006 -15.0395016028826,16.3022021991936 -15.0387006023374,16.2971765828382 -15.0414065828382,16.2944706023374 -15.0452334171618,16.2944706023374 -15.0479393976626,16.2971765828382 -15.0479752191142,16.3008233305632 -15.0510193976626,16.3035965828382 -15.0500851926884,16.3088215537096 -15.0513416888799,16.3094038543693 -15.0530744660941,16.3035244660941 -15.0583348143267,16.3020587704627 -15.0596944660941,16.2918644660941 -15.0641665828382,16.2878206023374 -15.0687839361141,16.2883488102142 -15.0688639656962,16.2847066510432 -15.0666814449562,16.2817438257635 -15.06251,16.28416 -15.0578906023374,16.2810734171618 -15.0578906023374,16.2772465828382 -15.061676652502,16.2743257631237 -15.0592006023374,16.2717734171618 -15.0592006023374,16.2679465828382 -15.06382,16.26486 -15.0673555339059,16.2663244660941 -15.0685793162485,16.2686500010708 -15.0719381853168,16.2663834691042 -15.06907,16.26191 -15.0720560885382,16.2573577504819 -15.0729006023374,16.2502565828382 -15.0756065828382,16.2475506023374 -15.0837634171618,16.2460806023374 -15.0864693976626,16.2487865828382 -15.0863998676813,16.2527834063692 -15.0905055339059,16.2541344660941 -15.09197),16.25767 -15.0724613832362,(16.2927262111289 -15.0710686853769,16.2923831175486 -15.0711455339059,16.2924344660941 -15.0722206358019,16.2940434697871 -15.0724613832362),16.2927262111289 -15.0706258912973,(16.2756919362894 -15.0680006837515,16.2724299989292 -15.064653347498,16.2746942368763 -15.0672685550438,16.2779461742365 -15.0706258912973),16.2756919362894 -15.025641371779,(16.3341619586944 -15.02219,16.32947 -15.0243162823722,16.3216278695921 -15.0213444660941,16.3202755339059 -15.0199342501555,16.3170127339492 -15.0170622102188,16.3208534316115 -15.0205293976626,16.3252365828382 -15.0198550858006,16.3387585805091 -15.0216774447444,16.3402512057677 -15.025641371779),16.3341619586944 -15.0233239828049,(16.3504041238361 -15.023269247961,16.349131046806 -15.0221494608865,16.3488833182136 -15.0224355339059,16.3490744660941 -15.0233239828049),16.3504041238361 -15.0129677897812,(16.3207665683885 -15.010705678704,16.3185601998644 -15.0085591675891,16.3211812845944 -15.0116511540407,16.3216463162643 -15.0129677897812),16.3207665683885 -14.9767276424097,(16.263140758827 -14.9727358485593,16.2615933208626 -14.9681665828382,16.2620893976626 -14.9654606023374,16.2593834171618 -14.9653960156648,16.2558812819682 -14.9642445909185,16.2577753733661 -14.96492,16.26013 -14.9675593976626,16.2630165828382 -14.9672166386929,16.2698401791709 -14.9688839354012,16.2699914667645 -14.9724844660941,16.2644644660941 -14.9767276424097),16.263140758827 -14.9746689136991,(16.2842674956987 -14.9728676188758,16.2808248641531 -14.968722683878,16.2795406081577 -14.9676476397128,16.2819731969601 -14.9707334171618,16.2821206023374 -14.9735793162485,16.2855300010708 -14.9746689136991),16.2842674956987 -14.9730006837515,(16.2893099989292 -14.9696418146832,16.2915765308958 -14.9708754507398,16.2924008201558 -14.9718731027175,16.2912048327635 -14.9730006837515,16.2893099989292