GDACS_WF_1022250_6
info-gdacs@gdacs.org
2024-09-18T22:00:00-00:00
Actual
Alert
Public
1022250
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Portugal
On 16/09/2024, a forest fire started in Portugal, until 19/09/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1022250
eventid
1022250
currentepisodeid
6
glide
version
0
fromdate
Mon, 16 Sep 2024 00:00:00 GMT
todate
Thu, 19 Sep 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1022250
country
Portugal
eventname
severity
Green impact for forestfire in 7966 ha
population
5113 people affected in the area
vulnerability
sourceid
GWIS
iso3
PRT
hazardcomponents
datemodified
Sat, 21 Sep 2024 19:07:14 GMT
Polygon
41.0878606023374,-8.05469341716183 41.0886506023374,-8.04743658283818 41.0913565828382,-8.04473060233744 41.0974634171618,-8.04505060233744 41.1008493976626,-8.04864658283818 41.1008493976626,-8.05247341716183 41.096131260674,-8.05614233655797 41.09248,-8.05778 41.0878606023374,-8.05469341716183
Polygon
40.98145,-8.07296 40.9836844660941,-8.06615446609407 40.98722,-8.06469 40.9904680101028,-8.06596234883093 40.9945175967806,-8.06249374931621 40.9955544660941,-8.05697446609407 41.00033,-8.0548 41.0049493976626,-8.05788658283817 41.0054,-8.06201 41.0036920457425,-8.06570822749535 41.0096832614743,-8.06963594840348 41.0176244660941,-8.05348446609407 41.0262797687495,-8.05142993100473 41.0289633091445,-8.04230488856452 41.0282006023374,-8.03733658283817 41.0315090234101,-8.0339504431673 41.03025,-8.02587 41.0317144660941,-8.02233446609407 41.0355761179072,-8.02093486888496 41.0377244660941,-8.01578446609407 41.040748738094,-8.01442169631607 41.0420444660941,-8.01173446609407 41.0468765785222,-8.01052790550334 41.0509565828382,-8.00407060233744 41.0593734171618,-8.00448060233744 41.0627336566501,-8.00667289423789 41.065816707117,-8.00423327370173 41.0615406023374,-7.99950341716182 41.0615406023374,-7.99567658283817 41.0638633476348,-7.99322667191366 41.06007,-7.98267 41.0615344660941,-7.97913446609407 41.0658660877203,-7.97767952742331 41.0716844660941,-7.96656446609407 41.08074,-7.9625 41.0895745587491,-7.96509031486496 41.0945234171618,-7.96434060233744 41.0973775696421,-7.96779149368256 41.1018255339059,-7.96907446609407 41.10329,-7.97261 41.1011252585072,-7.97661344296802 41.1020493976626,-7.98327341716182 41.0987734171618,-7.98690939766256 41.0917309574516,-7.99009604883022 41.0943793976626,-7.99321658283817 41.0968,-8.00417 41.0935024541297,-8.00883136081871 41.0929793976626,-8.01488341716182 41.0912257706513,-8.01695305540514 41.0920361154882,-8.02142718381726 41.0969955339059,-8.02430446609407 41.0981515270208,-8.02939079839037 41.1007665828382,-8.02748060233744 41.1052376833221,-8.02791108722287 41.1075373468635,-8.02326113509222 41.1068306023374,-8.01837658283817 41.1095365828382,-8.01567060233744 41.1169968617778,-8.01674340290676 41.1193465828382,-8.01457060233744 41.12809,-8.01376 41.1325292644701,-8.01657699446423 41.1372934171618,-8.01688060233744 41.14178,-8.0234 41.1403155339059,-8.02693553390593 41.1378780268086,-8.02818158888805 41.1463834171618,-8.03108060233744 41.1496493976626,-8.03532658283818 41.1496493976626,-8.03915341716183 41.1470597555567,-8.04178166283236 41.1447255339059,-8.05283553390593 41.14119,-8.0543 41.1353735206678,-8.05073710590435 41.1300765828382,-8.05171939766256 41.1273706023374,-8.04901341716183 41.1278909011706,-8.04396535389721 41.1245184907618,-8.04191237186384 41.1198049635602,-8.04161324834534 41.11613442354,-8.04492424036479 41.1134455339059,-8.05609553390593 41.1084534171618,-8.05881939766256 41.1046265828382,-8.05881939766256 41.1019206023374,-8.05611341716182 41.1016906023374,-8.05007658283817 41.1054344660941,-8.04397446609407 41.1104494541534,-8.04210891217976 41.1090068592175,-8.03826414941057 41.1069353065226,-8.03455831806005 41.1039655339059,-8.04336553390593 41.0985165828382,-8.04444939766256 41.0958106023374,-8.04174341716183 41.0954784729792,-8.03238920160963 41.09394090157,-8.03274434273025 41.0940893976626,-8.03679341716182 41.0913834171618,-8.03949939766256 41.0875565828382,-8.03949939766256 41.0850503690605,-8.03725048841785 41.0844893976626,-8.04187341716183 41.0809807167543,-8.04597361304801 41.0827093976626,-8.04802658283817 41.0827093976626,-8.05185341716182 41.0780351869797,-8.05522713927365 41.0809093976626,-8.05796658283817 41.0809093976626,-8.06179341716182 41.0782034171618,-8.06449939766256 41.075501474006,-8.06472315242779 41.0765193976626,-8.07007341716183 41.0727400072415,-8.07299291217098 41.0746193976626,-8.07514658283817 41.0746193976626,-8.07897341716182 41.07,-8.08206 41.0633944660941,-8.07917553390593 41.0614551521467,-8.06895355161959 41.0573844660941,-8.06759553390593 41.0561100596301,-8.06310450571578 41.0503544660941,-8.06222553390593 41.04872,-8.05768 41.0497588371708,-8.05347737069475 41.04583,-8.055 41.0411838415062,-8.05177888137808 41.0404972916334,-8.05313091622312 41.0451388000608,-8.05994205373405 41.0509993976626,-8.06526658283818 41.0499155339059,-8.07071553390593 41.0442805870013,-8.0716766177677 41.0461693976626,-8.07383658283817 41.0462943606603,-8.07703518574835 41.0499934171618,-8.07706060233744 41.0526993976626,-8.07976658283818 41.0523699737896,-8.08408643482846 41.05449,-8.08806 41.0528312705832,-8.092876893086 41.05613,-8.10001 41.0532093976626,-8.10830341716182 41.0508584523759,-8.11077217071678 41.0514493976626,-8.11548341716182 41.0487434171618,-8.11818939766256 41.0432944660941,-8.11710553390593 41.0421016204791,-8.11220447163848 41.0394565828382,-8.11196939766256 41.0367506023374,-8.10926341716183 41.03571,-8.10192 41.0387147789575,-8.09633695252565 41.0355959328054,-8.09058003707588 41.0244765828382,-8.09351939766256 41.0132497725269,-8.08600815184301 41.0130793976626,-8.09134341716183 41.00846,-8.09443 41.0049244660941,-8.09296553390593 41.0038406023374,-8.08751658283817 41.0072976243122,-8.08466121089984 41.0016206023374,-8.07968341716182 41.0006716394592,-8.07447381528353 40.9945865828382,-8.07412939766256 40.9918779021131,-8.07140984221718 40.9910693976626,-8.07487341716183 40.9883634171618,-8.07757939766256 40.9829144660941,-8.07649553390593 40.98145,-8.07296
Polygon
41.0460033257318,-8.04476658800431 41.0486034171618,-8.04501060233744 41.0513093976626,-8.04771658283818 41.0513811628292,-8.05118262930525 41.0536919341274,-8.04878825544997 41.0518744660941,-8.04766553390593 41.0505679953845,-8.04333570356405 41.0464212614897,-8.04364021954095 41.0460033257318,-8.04476658800431
Polygon
41.0659469799007,-8.0633539807845 41.0691501357695,-8.06409949840049 41.0699865828382,-8.06354060233744 41.072688525994,-8.06331684757221 41.071596876104,-8.06142277035666 41.0659469799007,-8.0633539807845
Polygon
41.0835793682807,-7.98067469550585 41.0845093976626,-7.98206658283817 41.086603973117,-7.98327264412892 41.0904860967332,-7.9789146157617 41.0870298172065,-7.977901160036 41.0835793682807,-7.98067469550585
Polygon
41.1075823166779,-8.03160891277713 41.1076146934774,-8.03177168193995 41.1076798896591,-8.03167410895878 41.1075823166779,-8.03160891277713
Polygon
41.1159263277171,-8.02616699930034 41.1188434171618,-8.02639060233744 41.1213940267363,-8.02821729567526 41.1216226820807,-8.02411785804873 41.1190131382222,-8.02358659709324 41.1159263277171,-8.02616699930034