GDACS_WF_1022419_10
info-gdacs@gdacs.org
2024-09-28T22:00:00-00:00
Actual
Alert
Public
1022419
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Tanzania
On 24/09/2024, a forest fire started in Tanzania, until 29/09/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1022419
eventid
1022419
currentepisodeid
10
glide
version
0
fromdate
Tue, 24 Sep 2024 00:00:00 GMT
todate
Sun, 29 Sep 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1022419
country
Tanzania
eventname
severity
Green impact for forestfire in 12097 ha
population
3 people affected in the area
vulnerability
sourceid
GWIS
iso3
TZA
hazardcomponents
datemodified
Sun, 29 Sep 2024 19:04:27 GMT
Polygon
-8.14668,37.58495 -8.14387553390593,37.5902955339059 -8.13975341716183,37.5925493976626 -8.12371658283817,37.5949993976626 -8.11955060233744,37.5906334171618 -8.11976955469252,37.5858143387327 -8.1123598347366,37.5845877290919 -8.11015555561157,37.5869505612635 -8.11426939766256,37.5899365828382 -8.11579939766256,37.5978134171618 -8.11309341716182,37.6005193976626 -8.10447,37.60074 -8.09668446609407,37.5966655339059 -8.09555699499446,37.589421826444 -8.08971,37.59225 -8.08223658283817,37.5909193976626 -8.07921381366677,37.5866208129671 -8.07572446609407,37.5851655339059 -8.07426,37.58163 -8.07770446609407,37.5739344660941 -8.08047834129349,37.5726215033364 -8.08050060233744,37.5689065828382 -8.082469710388299,37.5666929647673 -8.07698658283818,37.5657593976626 -8.07428060233744,37.5630534171618 -8.07428060233744,37.5592265828382 -8.07848510415707,37.5553977983755 -8.06619658283818,37.5531993976626 -8.05841236979509,37.544876834873 -8.05504172085487,37.5480190824994 -8.05854,37.55845 -8.05558846164348,37.563928969454 -8.05718939766256,37.5658965828382 -8.05718939766256,37.5697234171618 -8.05448341716182,37.5724293976626 -8.05065658283817,37.5724293976626 -8.04795060233744,37.5697234171618 -8.04777029927921,37.5668030275234 -8.04145373928861,37.5655927680186 -8.04286939766256,37.5712634171618 -8.03912534033336,37.574175883982 -8.03880780484814,37.5819443165127 -8.041,37.58881 -8.04008939766256,37.5942034171618 -8.03511303540237,37.5988306122845 -8.03476128969072,37.6047741260195 -8.0390405436173,37.6029226193376 -8.04195658283817,37.5991606023374 -8.04578341716183,37.5991606023374 -8.04887,37.60378 -8.04673553390593,37.6121455339059 -8.03866,37.61788 -8.03057446609407,37.6162955339059 -8.02911,37.61276 -8.02977683773569,37.6090620702473 -8.02228,37.61031 -8.01844468197928,37.6088507367737 -8.0078,37.61468 -8.00426446609407,37.6132155339059 -8.0028,37.60968 -8.00607943036178,37.6032553394237 -8.00544699457131,37.6014487182185 -8.00204060233744,37.5986034171618 -8.00192497692608,37.595357871035 -7.99918103192084,37.5911462813961 -7.99324446609407,37.5893855339059 -7.99178,37.58585 -7.99486658283818,37.5812306023374 -8.00673577402468,37.5825121771429 -8.00761503753656,37.580872524714 -7.99364658283818,37.5782993976626 -7.99059442130565,37.5738530475893 -7.98574446609407,37.5723255339059 -7.98053886252327,37.5650284373798 -7.97615,37.56777 -7.96394658283818,37.5656993976626 -7.96124060233744,37.5629934171618 -7.96291446609407,37.5537944660941 -7.96645,37.55233 -7.97035307664281,37.5543445326721 -7.97233446609407,37.5478944660941 -7.97587,37.54643 -7.98048939766256,37.5495165828382 -7.9802991405632,37.5546156876552 -7.99011437173449,37.5611322515884 -7.99318658283817,37.5564406023374 -7.99863553390593,37.5575244660941 -8.0001,37.56106 -7.99770267965816,37.5652188471866 -7.99870780926082,37.5657211713724 -8.00153049630151,37.5596998642305 -8.00053060233744,37.5543765828382 -8.00566411027532,37.5493299751432 -8.00331,37.5452 -8.00421060233744,37.5402865828382 -8.00787408917989,37.5373901424842 -8.0054,37.53318 -8.0066592225923,37.5282721063958 -8.00336446609407,37.5268555339059 -8.0019,37.52332 -8.00333060233744,37.5153665828382 -8.00603658283817,37.5126606023374 -8.00986341716182,37.5126606023374 -8.01603553390593,37.5175744660941 -8.01706288959901,37.5231079874554 -8.02038640963155,37.5249596566118 -8.02448,37.52266 -8.02763726543495,37.5238111735217 -8.02892446609407,37.5193844660941 -8.03721,37.51708 -8.04074553390593,37.5185444660941 -8.04206844468833,37.5213683533913 -8.04357446609407,37.5102444660941 -8.04711,37.50878 -8.05127677250466,37.5111891814185 -8.05343658283818,37.5093006023374 -8.0572634171618276,37.5093006023374 -8.05996939766256,37.5120065828382 -8.05936745028069,37.5167342950823 -8.06859341716182,37.5177106023374 -8.07129939766256,37.5204165828382 -8.07021553390593,37.5258655339059 -8.0646215140322788,37.528605122395 -8.08435553390593,37.5324544660941 -8.08582,37.53599 -8.08488686877351,37.540927134027 -8.09005939766256,37.5458165828382 -8.0897268605281685,37.551661797879 -8.09968036390879,37.5533330597702 -8.10521584246066,37.5505655393854 -8.10253060233744,37.5478734171618 -8.10244548719767,37.5444744855417 -8.09992,37.54023 -8.10130174717609,37.5368182637034 -8.100652590339239,37.5326593224275 -8.09806,37.52837 -8.09952134745149,37.5194323345267 -8.09194060233744,37.5139834171618 -8.0927306023374381,37.5055565828382 -8.09468446609407,37.5025644660941 -8.09822,37.5011 -8.10712553390593,37.5057444660941 -8.10843100731632,37.5100793101976 -8.11641341716182,37.5106406023374 -8.11929684419797,37.5142386668134 -8.1241306023374378,37.5110365828382 -8.12875,37.50795 -8.13228553390593,37.5094144660941 -8.13375,37.51295 -8.13183939766256,37.5239734171618 -8.12909075069673,37.5268838171641 -8.13069939766256,37.5288565828382 -8.13069939766256,37.5326834171618 -8.1260799999999982,37.53577 -8.12119629667966,37.5323653674631 -8.12057058995917,37.5361050374723 -8.12057796890211,37.5389778660764 -8.12259658283818,37.5373006023374 -8.12642341716183,37.5373006023374 -8.129509999999998,37.54192 -8.12642341716183,37.5465393976626 -8.12259658283818,37.5465393976626 -8.11984969078162,37.5436277408815 -8.11745568281197,37.5460675209304 -8.11917,37.54977 -8.1166311410068879,37.559204652778 -8.11884265155272,37.5592352440201 -8.1196706023374379,37.5539565828382 -8.12429,37.55087 -8.12890939766256,37.5539565828382 -8.12863284601216,37.5595595196596 -8.13258658283817,37.5560906023374 -8.1380355339059278,37.5571744660941 -8.1395,37.56071 -8.13857937930316,37.5664224158811 -8.14312341716182,37.5666706023374 -8.14621,37.57129 -8.1447455339059278,37.5748255339059 -8.1397372202949079,37.5765502841855 -8.13944053821213,37.5797262689579 -8.14521553390593,37.5814144660941 -8.14668),37.58495 -8.12465761560226,(37.5704915462224 -8.1243016631762988,37.5702537064153 -8.12403306515018,37.5703673154135 -8.12465761560226),37.5704915462224 -8.11447835712872,(37.5711661310135 -8.11189972005929,37.5711161292139 -8.1126183368237,37.5715962935847 -8.11274658283818,37.5715106023374 -8.11447835712872),37.5711661310135 -8.10724444438843,(37.5875594387365 -8.10489846384566,37.5866525665919 -8.1040444139164887,37.5865775523148 -8.10518734569084,37.5887398210137 -8.10724444438843),37.5875594387365 -8.10427074839297,(37.5759581367443 -8.10420952044745,37.5756503230758 -8.10386857045362,37.5758781385782 -8.10427074839297),37.5759581367443 -8.09974142954638,(37.5764818614218 -8.09256223260909,37.5782730084185 -8.09477553390593,37.5794744660941 -8.09755993025144,37.5798202350376 -8.09974142954638),37.5764818614218 -8.08898776739091,(37.5786169915815 -8.0874033819868583,37.57822589285 -8.08771553390593,37.5784344660941 -8.08833585379489,37.5789746344779 -8.08898776739091),37.5786169915815 -8.07705795886836,(37.5427544072504 -8.0752199999999981,37.54312 -8.07341939766256,37.5429265828382 -8.07623729819188,37.5433998202517 -8.07705795886836),37.5427544072504 -8.07071341716182,(37.5402206023374 -8.07044750686354,37.5392637542398 -8.0701613372040182,37.5392068315554 -8.06998837285501,37.5400763820579 -8.07071341716182),37.5402206023374 -8.06024848596772,(37.533004877605 -8.06007099697727,37.5330401823603 -8.0599256990866088,37.5337706441841 -8.0602152925687083,37.5338282479092 -8.06024848596772),37.533004877605 -8.05480430091339,(37.5369993558159 -8.05461505472638,37.5369617124088 -8.05476665750631,37.5371886020029 -8.05480430091339),37.5369993558159 -8.05112494527362,(37.5347282875912 -8.05099318213621,37.5345310901205 -8.05089233499685,37.5346820185304 -8.05112494527362),37.5347282875912 -8.04033324610543,(37.549976572458 -8.03723115252561,37.5497756785254 -8.03750925616134,37.5511737999163 -8.04007,37.5513 -8.04033324610543),37.549976572458 -8.03685626071139,(37.5646272319814 -8.03221208805629,37.5589339435786 -8.02670256588072,37.5563122160662 -8.0246142237319,37.5582519047885 -8.02591057074213,37.5586257450801 -8.03236553390593,37.5603444660941 -8.03347911907136,37.5656439975496 -8.03685626071139),37.5646272319814 -8.02979279959947,(37.5776671768256 -8.02969303559859,37.577647332532 -8.02974489123674,37.5779080284295 -8.02979279959947),37.5776671768256 -8.02168199854291,(37.5431749684623 -8.02018,37.53861 -8.02096090953089,37.5312065210591 -8.02034542506738,37.5333334461266 -8.01957939766256,37.5389234171618 -8.01586977956082,37.5418290335938 -8.02168199854291),37.5431749684623 -8.0216457762681,(37.5585880952115 -8.01625149058291,37.5576755799019 -8.01593939766256,37.5599334171618 -8.01905094378655,37.561567053417 -8.0216457762681),37.5585880952115 -8.02038841238724,(37.5667317611032 -8.02005905621345,37.566382946583 -8.019720795122,37.5671704432143 -8.01981509726492,37.5676445321016 -8.02038841238724),37.5667317611032 -8.01499026546374,(37.5783287162392 -8.01498625372329,37.575631452142 -8.01391563364229,37.5756755882832 -8.01362939766256,37.5780634171618 -8.01499026546374),37.5783287162392 -8.01369588535247,(37.5919261540407 -8.01279341716183,37.5925193976626 -8.01253387863063,37.5925954082322 -8.01302806722712,37.5929256144955 -8.01369588535247),37.5919261540407 -8.01281060233744,(37.5509965828382 -8.01018574929872,37.5498268902664 -8.00941588972468,37.5499800248568 -8.01156279185357,37.5530682943024 -8.01281060233744,37.5509965828382