GDACS_WF_1022497_14
info-gdacs@gdacs.org
2024-10-04T22:00:00-00:00
Actual
Alert
Public
1022497
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 30/09/2024, a forest fire started in Australia, until 05/10/2024.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1022497
eventid
1022497
currentepisodeid
14
glide
version
0
fromdate
Mon, 30 Sep 2024 00:00:00 GMT
todate
Sat, 05 Oct 2024 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1022497
country
Australia
eventname
severity
Green impact for forestfire in 15496 ha
population
119 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Sat, 05 Oct 2024 19:04:31 GMT
Polygon
-14.7093093976626,132.071286582838 -14.7083293976626,132.080363417162 -14.7056234171618,132.083069397663 -14.702883464167,132.083285591801 -14.7015255339059,132.086285533906 -14.6970396496979,132.088208049171 -14.6941834171618,132.091669397663 -14.6819577239155,132.089964449994 -14.6789834171618,132.094019397663 -14.6751565828382,132.094019397663 -14.6704283890573,132.086374908588 -14.6635106023374,132.080903417162 -14.6633879351063,132.076352626423 -14.65999,132.06999 -14.6643030942226,132.064010203421 -14.6589588031897,132.056214256623 -14.6558776255073,132.057251679953 -14.6562032650018,132.060484227113 -14.6586493976626,132.063016582838 -14.6586493976626,132.066843417162 -14.6559434171618,132.069549397663 -14.6514962679529,132.069619855848 -14.6481169165989,132.074086331786 -14.6539534171618,132.072960602337 -14.6566593976626,132.075666582838 -14.6566593976626,132.079493417162 -14.6539534171618,132.082199397663 -14.648263295534,132.080754596656 -14.6457805518849,132.08227926064 -14.6453438651723,132.08759428721 -14.65002,132.08539 -14.6546393976626,132.088476582838 -14.6546393976626,132.092303417162 -14.6496391927959,132.096781986542 -14.6533355339059,132.098214466094 -14.6570693976626,132.103326582838 -14.6570693976626,132.107153417162 -14.6542526848018,132.109881423698 -14.6536493976626,132.114503417162 -14.6486534171618,132.118849397663 -14.6454597910592,132.118975350609 -14.6416434171618,132.124039397663 -14.6378165828382,132.124039397663 -14.6336475304997,132.121294030849 -14.6313455339059,132.127725533906 -14.6203355339059,132.137045533906 -14.6168,132.13851 -14.6128385506747,132.136408106435 -14.6110155339059,132.141775533906 -14.6057534171618,132.145379397663 -14.6005636310796,132.145223880351 -14.6003393976626,132.147923417162 -14.5976334171618,132.150629397663 -14.5938065828382,132.150629397663 -14.5911006023374,132.147923417162 -14.5911006023374,132.144096582838 -14.5938065828382,132.141390602337 -14.5973894330545,132.141342070881 -14.5992817057172,132.136382676143 -14.5987606023374,132.131066582838 -14.6015331825719,132.126956115482 -14.6033850481913,132.11663767848 -14.5993806023374,132.113673417162 -14.5997084641682,132.106722825642 -14.5961306023374,132.103843417162 -14.5971700151003,132.094649808474 -14.5929665828382,132.094009397663 -14.5902606023374,132.091303417162 -14.5910777258958,132.086253671012 -14.5892069935721,132.08256953338 -14.5845656342359,132.080903130713 -14.5832855339059,132.085365533906 -14.57975,132.08683 -14.5751306023374,132.083743417162 -14.5762144660941,132.078294466094 -14.57975,132.07683 -14.5835343657641,132.078666869287 -14.5835708309945,132.07662980762 -14.5771906023374,132.068033417162 -14.578011066789,132.062978671012 -14.57561,132.05664 -14.5770744660941,132.053104466094 -14.5805199796716,132.051529466624 -14.5805506023374,132.047856582838 -14.5832565828382,132.045150602337 -14.5870834171618,132.045150602337 -14.5920548314108,132.048798274454 -14.5980248576977,132.047136283277 -14.6007665828382,132.044250602337 -14.6045934171618,132.044250602337 -14.6099293976626,132.048956582838 -14.6084552962509,132.065681302401 -14.6099840018799,132.066562852758 -14.612524153137,132.049837456674 -14.6100306023374,132.047273417162 -14.6098737979284,132.042622962105 -14.6041013629305,132.041029046609 -14.60105,132.04217 -14.5943144660941,132.039835533906 -14.5930704503921,132.035191721038 -14.5899506023374,132.032403417162 -14.5901230870753,132.02779907391 -14.5838965828382,132.027859397663 -14.5793306023374,132.022333417162 -14.5793306023374,132.018506582838 -14.5820365828382,132.015800602337 -14.5888234171618,132.015780602337 -14.5917137054455,132.019413160634 -14.5940565828382,132.017250602337 -14.5983666780648,132.017326153706 -14.5981447557166,132.015643750819 -14.5919965828382,132.016249397663 -14.5892906023374,132.013543417162 -14.5892906023374,132.009716582838 -14.5935097140754,132.006145696146 -14.59055,132.00108 -14.5917797140754,131.995385696146 -14.5896406023374,131.980186582838 -14.60033,131.97239 -14.6043670601282,131.974605053128 -14.6125334171618,131.973960602337 -14.6157913259763,131.978834205579 -14.62302,131.97469 -14.6281034171618,131.976280602337 -14.6308995411937,131.979439764972 -14.6369934171618,131.979190602337 -14.6396993976626,131.981896582838 -14.6386795380309,131.987249744964 -14.6406252132235,131.987193244566 -14.6420644660941,131.983784466094 -14.6456,131.98232 -14.6528955339059,131.984304466094 -14.6558,131.98941 -14.6535155339059,131.996365533906 -14.6488934171618,131.999449397663 -14.6424427258326,132.000978362742 -14.6476493976626,132.004386582838 -14.6470835223015,132.010603060092 -14.6510768405434,132.012385606998 -14.6547,132.01079 -14.6576034168975,132.011832099012 -14.6588844660941,132.007374466094 -14.6632388298525,132.006072875384 -14.6662165828382,132.002000602337 -14.6747634171618,132.002920602337 -14.6774693976626,132.005626582838 -14.6776038099253,132.008777681085 -14.6848755339059,132.010934466094 -14.68634,132.01447 -14.685059668373,132.017729957201 -14.6886955339059,132.019174466094 -14.6900776868377,132.022296183788 -14.69463,132.01931 -14.6992493976626,132.022396582838 -14.6992493976626,132.026223417162 -14.6965434171618,132.028929397663 -14.6927165828382,132.028929397663 -14.6897123131623,132.024723816212 -14.687633731475,132.026955007608 -14.6924793976626,132.029996582838 -14.6908889780508,132.042364862314 -14.6933465828382,132.040030602337 -14.6991734171618,132.040650602337 -14.7060593976626,132.049096582838 -14.7052283761642,132.058592230552 -14.70914,132.06378 -14.7058729284527,132.068435299099 -14.7093093976626),132.071286582838 -14.7029570715473,(132.068544700901 -14.7024863005917,132.068451058736 -14.7024120881438,132.068824149906 -14.7029570715473),132.068544700901 -14.6973293725422,(132.063029852901 -14.6942846490882,132.057825286309 -14.6932755339059,132.059335533906 -14.6929512966841,132.066113365517 -14.6973293725422),132.063029852901 -14.69424238316,(132.049447583425 -14.6917244660941,132.048185533906 -14.6902610219492,132.044655137686 -14.6895529694983,132.045714813064 -14.6895393976626,132.049473417162 -14.6884863868905,132.051049359151 -14.692963765384,132.052056149028 -14.69424238316),132.049447583425 -14.6785129280521,(132.070576907472 -14.6779824405163,132.059195053734 -14.6727423554195,132.059719437614 -14.67413,132.06314 -14.6724955339059,132.066994466094 -14.6737642477456,132.071514113039 -14.6785129280521),132.070576907472 -14.6768785000378,(132.080251799526 -14.67626765758,132.080130295406 -14.6764516109427,132.081055091412 -14.6768785000378),132.080251799526 -14.6713576445805,(132.058730562386 -14.6711344984653,132.058396600624 -14.6711769057774,132.058609796579 -14.6713576445805),132.058730562386 -14.6701855015347,(132.056393399376 -14.6701651275363,132.056290972369 -14.6700782941129,132.056232952131 -14.6701855015347),132.056393399376 -14.6572157121568,(132.040190904111 -14.65348,132.03166 -14.6555906636691,132.020612835981 -14.6523734171618,132.023939397663 -14.6486334171618,132.024729397663 -14.6423414297154,132.02340472711 -14.6409655339059,132.027385533906 -14.6374048972219,132.029888862737 -14.6422334171618,132.031560602337 -14.6447146218141,132.033930182008 -14.6496034171618,132.033220602337 -14.6523093976626,132.035926582838 -14.652437370902,132.039110052241 -14.6572157121568),132.040190904111 -14.6388632758572,(132.105051389955 -14.6365293946317,132.100467776793 -14.6362993976626,132.103723417162 -14.6353439575302,132.10515333437 -14.6388632758572),132.105051389955 -14.6246387104156,(132.076047734541 -14.6213866853098,132.077371148768 -14.62147,132.07779 -14.6244596530422,132.076947916746 -14.6246387104156),132.076047734541 -14.6227065828382,(132.119779397663 -14.6210019885278,132.11943658044 -14.6215669115369,132.121120645718 -14.6226894372014,132.120897361481 -14.6227065828382),132.119779397663 -14.6228741344258,(132.066500192806 -14.6196039005198,132.063803047759 -14.61984,132.06499 -14.6190265828382,132.067840602337 -14.6226168696617,132.067793550114 -14.6228741344258),132.066500192806 -14.6222903395126,(132.051194046668 -14.6214913410428,132.05077854003 -14.6217383223232,132.052020198775 -14.6222903395126),132.051194046668 -14.6210451752045,(132.054738514591 -14.6205908300264,132.055418490203 -14.6209588301757,132.055172600365 -14.6210451752045),132.054738514591 -14.6112032242049,(132.072975520567 -14.6111309820779,132.072927249921 -14.6111180088058,132.072992470963 -14.6112032242049,132.072975520567