GDACS_WF_1023992_2
info-gdacs@gdacs.org
2025-05-29T22:00:00-00:00
Actual
Alert
Public
1023992
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Russian Federation
On 28/05/2025, a forest fire started in Russian Federation, until 30/05/2025.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1023992
eventid
1023992
currentepisodeid
2
glide
version
0
fromdate
Wed, 28 May 2025 00:00:00 GMT
todate
Fri, 30 May 2025 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1023992
country
Russian Federation
eventname
severity
Green impact for forestfire in 5235 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
RUS
hazardcomponents
datemodified
Tue, 03 Jun 2025 19:04:39 GMT
Polygon
53.31929,117.37453 53.3261547478757,117.384446091392 53.3259326612841,117.388553494791 53.3202406023374,117.393206582838 53.3210806023374,117.402783417162 53.3310265965626,117.413677955341 53.3287806023374,117.416076582838 53.3287249676557,117.419623722729 53.3240406023374,117.423166582838 53.3240406023374,117.426993417162 53.3273087312928,117.429811215942 53.3267706023374,117.434443417162 53.3307344660941,117.438995533906 53.33427,117.44046 53.3378055339059,117.438995533906 53.3391928067713,117.435071923433 53.34218,117.43617 53.3457155339059,117.434705533906 53.34718,117.43117 53.346026176363,117.428099375385 53.34811,117.42415 53.3466455339059,117.420614466094 53.34311,117.41915 53.3395744660941,117.420614466094 53.3383322997714,117.42303242358 53.3366650323443,117.421706277271 53.3380308611723,117.416134213794 53.34085,117.41712 53.3443855339059,117.415655533906 53.34585,117.41212 53.3447593771171,117.409143961998 53.3479523153946,117.405071640464 53.3547824186872,117.41267369167 53.3498506023374,117.417026582838 53.3498506023374,117.420853417162 53.3525565828382,117.423559397663 53.3563079472271,117.423574409566 53.3574206023374,117.429513417162 53.3632478581945,117.43557157224 53.3628288535394,117.436769748958 53.3590565828382,117.436780602337 53.3563506023374,117.439486582838 53.3572375278732,117.44464079503 53.3541806023374,117.447416582838 53.3541806023374,117.451243417162 53.3588,117.45433 53.3623355339059,117.452865533906 53.3638,117.44933 53.3625324721268,117.44608920497 53.3657511464606,117.442500251042 53.3680744660941,117.446795533906 53.37161,117.44826 53.3751455339059,117.446795533906 53.3765942546354,117.443180842707 53.3780368248829,117.443572118896 53.3806641220092,117.446020788534 53.3774844660941,117.447414466094 53.3762369401223,117.449859368356 53.3708444660941,117.450954466094 53.369593113288,117.453418607151 53.3642044660941,117.454514466094 53.3631206023374,117.459963417162 53.3658265828382,117.462669397663 53.370353022018,117.462201936643 53.3730265828382,117.464859397663 53.3781700722306,117.463979636872 53.3838234171618,117.465369397663 53.3869036600235,117.460781873214 53.3923355339059,117.457045533906 53.3940711022504,117.451953627623 53.3999355339059,117.446205533906 53.4014,117.44267 53.3999355339059,117.439134466094 53.3968527394324,117.437760055472 53.3932955339059,117.427164466094 53.38976,117.4257 53.3868616617558,117.426541939951 53.3879629177479,117.422329474005 53.3925293976626,117.419253417162 53.3927334743761,117.41645254576 53.3973,117.41946 53.4019193976626,117.416373417162 53.4019193976626,117.412546582838 53.3992134171618,117.409840602337 53.3937644660941,117.410924466094 53.3924765256239,117.41534745424 53.3889214247806,117.412541184898 53.3988493976626,117.406243417162 53.3981515442432,117.401372171389 53.4012455339059,117.399995533906 53.4055993976626,117.394213417162 53.4046806362848,117.389011559266 53.4077493976626,117.386233417162 53.4068365341869,117.3810403861 53.4098993976626,117.378263417162 53.4079037574417,117.367070992811 53.4113,117.36239 53.4078623920513,117.357700779102 53.4087893976626,117.352486582838 53.4045227153713,117.34947015945 53.4056993976626,117.343516582838 53.4029934171618,117.340810602337 53.3991665828382,117.340810602337 53.3962506023374,117.344196582838 53.3967644796987,117.348792488982 53.3929929782666,117.350660309077 53.39418,117.34754 53.3927155339059,117.344004466094 53.3860265828382,117.342280602337 53.3833206023374,117.344986582838 53.3833206023374,117.348813417162 53.3891256256813,117.352529184276 53.3858070785615,117.356581132929 53.38208,117.35483 53.3785444660941,117.356294466094 53.3773008656735,117.360940366723 53.3721044660941,117.362074466094 53.3688273086846,117.367087700121 53.3638239678549,117.366839621069 53.3640806849214,117.365549017222 53.3684255339059,117.364245533906 53.36989,117.36071 53.3690293976626,117.355016582838 53.3660819236373,117.352262566289 53.3666893976626,117.347526582838 53.36207,117.34444 53.3585344660941,117.345904466094 53.357376153481,117.350979137486 53.3542377953314,117.349112723987 53.3528355339059,117.345264466094 53.3473865828382,117.344180602337 53.3446806023374,117.346886582838 53.3449873475013,117.351172493742 53.3434600761813,117.352173854331 53.340986259379,117.35298517994 53.3397455339059,117.350574466094 53.33621,117.34911 53.3316127113781,117.352163494321 53.3261444660941,117.353234466094 53.32468,117.35677 53.325396837012,117.359186627913 53.3226206023374,117.361906582838 53.323114520068,117.369763817496 53.3207544660941,117.370994466094 53.31929),117.37453 53.3381852521243,(117.363393908609 53.3388037406211,117.35827482006 53.3400130887689,117.36063857442 53.3404599353695,117.367524583626 53.3396854890768,117.369337210044 53.3381852521243),117.363393908609 53.3503749587923,(117.371891025755 53.35352,117.36726 53.3516255373609,117.35859311357 53.3539414296621,117.361086091392 53.3548165828382,117.371460602337 53.3508679671437,117.373224038848 53.3503749587923),117.371891025755 53.358163846519,(117.352420862514 53.35840211208,117.352777452126 53.3582278830337,117.352742795814 53.358163846519),117.352420862514 53.3609272988958,(117.40528369498 53.3611393880263,117.402602549082 53.36744,117.40711 53.3717775662896,117.404445207619 53.3718306023374,117.408863417162 53.3745365828382,117.411569397663 53.3783634171618,117.411569397663 53.3812877773653,117.407765548258 53.3826136163149,117.408029274022 53.3840344660941,117.411345533906 53.3865585752194,117.412608815102 53.3801165828382,117.412640602337 53.3751644660941,117.415464466094 53.3734247123994,117.422715762379 53.3706234171618,117.419530602337 53.3656507209457,117.420296242776 53.3648311461209,117.418676609499 53.3686793976626,117.415743417162 53.3686793976626,117.411916582838 53.3635318224301,117.408935061051 53.3609272988958),117.40528369498 53.3703698876064,(117.428819827827 53.3717464060879,117.428019040452 53.3729906023374,117.430786582838 53.3737457453646,117.438789157293 53.3708521418055,117.43413842776 53.3703698876064),117.428819827827 53.3828258779908,(117.446309211466 53.3828624510114,117.44630193664 53.382859667056,117.446315932529 53.3828258779908),117.446309211466 53.3677650374658,(117.382793411286 53.3699773001558,117.382032441655 53.370476837012,117.383356627913 53.3687844660941,117.384454466094 53.3677650374658),117.382793411286 53.3741690608901,(117.392622198921 53.3771219415997,117.388985706817 53.3810565828382,117.394339397663 53.3905835235825,117.391886462883 53.3907065828382,117.393010602337 53.3880006023374,117.395716582838 53.3894161352767,117.401387148169 53.3879314862053,117.402182277155 53.3805634171618,117.394570602337 53.3746775486807,117.396047791513 53.3741690608901),117.392622198921 53.384753162988,(117.370163372087 53.3867147478757,117.372096091392 53.386216502981,117.374815153247 53.3853104762709,117.375465267574 53.384753162988),117.370163372087 53.3864885930174,(117.362058908609 53.3869529214385,117.360468867071 53.3875417162453,117.361020967971 53.3869726570101,117.362783361569 53.3864885930174),117.362058908609 53.3951188286911,(117.369480536281 53.3952826168737,117.368582882518 53.3959187010389,117.369192550796 53.3955765828382,117.369260602337 53.3951188286911),117.369480536281 53.3994348144774,(117.3591559116 53.4003731904566,117.357544507281 53.4026076079487,117.359089220898 53.3999171134092,117.360328653255 53.3994348144774),117.3591559116 53.3998113488154,(117.37967501208 53.4007115003498,117.37833959142 53.4015734658131,117.3796296139 53.4000724767122,117.38046506961 53.3998113488154,117.37967501208