GDACS_WF_1024690_5
info-gdacs@gdacs.org
2025-08-22T22:00:00-00:00
Actual
Alert
Public
1024690
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 15/08/2025, a forest fire started in Australia, until 23/08/2025.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1024690
eventid
1024690
currentepisodeid
5
glide
version
0
fromdate
Fri, 15 Aug 2025 00:00:00 GMT
todate
Sat, 23 Aug 2025 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1024690
country
Australia
eventname
severity
Green impact for forestfire in 7428 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Mon, 25 Aug 2025 19:10:25 GMT
Polygon
-15.7609593976626,128.228643417162 -15.7582534171618,128.231349397663 -15.7544265828382,128.231349397663 -15.7523917725046,128.229647894302 -15.7486392096721,128.231812472619 -15.7473055339059,128.236005533906 -15.7421906321113,128.237155844194 -15.7376634171618,128.243569397663 -15.7322144660941,128.242485533906 -15.7303494494651,128.23591522828 -15.7281357936977,128.239556630374 -15.7282693976626,128.243583417162 -15.7255634171618,128.246289397663 -15.7217365828382,128.246289397663 -15.7188406637553,128.242628531427 -15.7133608617469,128.240846761286 -15.7132343057915,128.242694132026 -15.7160734171618,128.242890602337 -15.7198093976626,128.246836582838 -15.7192893976626,128.254403417162 -15.7165834171618,128.257109397663 -15.7137964144708,128.257316233034 -15.7136293976626,128.260303417162 -15.7096342367324,128.263265831594 -15.7083655339059,128.267785533906 -15.7029165828382,128.268869397663 -15.6982180460588,128.261059523536 -15.69387,128.26374 -15.6903344660941,128.262275533906 -15.68887,128.25874 -15.6915088759372,128.254419750525 -15.6895806023374,128.252233417162 -15.6887760182384,128.246445096559 -15.6849644660941,128.245035533906 -15.6812798118767,128.238249169852 -15.6779934171618,128.242079397663 -15.6725444660941,128.240995533906 -15.67108,128.23746 -15.6715806023374,128.233176582838 -15.6742865828382,128.230470602337 -15.6769035881028,128.230229952375 -15.6778714704167,128.226957523862 -15.6726644660941,128.225825533906 -15.6712369300737,128.222104339982 -15.6661144660941,128.220955533906 -15.6620744660941,128.217355533906 -15.6607245637096,128.213244049338 -15.6563044660941,128.211955533906 -15.65278,128.20219 -15.6552306023374,128.194996582838 -15.6579365828382,128.192290602337 -15.6675834171618,128.193900602337 -15.6702893976626,128.196606582838 -15.6708712576189,128.200807662834 -15.6753265828382,128.194830602337 -15.6791534171618,128.194830602337 -15.6812995704272,128.196698742172 -15.6892978638042,128.195102248172 -15.6887014134908,128.190350402804 -15.6816934171618,128.194299397663 -15.6762444660941,128.193215533906 -15.67433,128.18584 -15.6778877889393,128.17947373409 -15.6739688295734,128.1787829924 -15.6727655339059,128.181005533906 -15.66923,128.18247 -15.6661723812017,128.181324866572 -15.6610965828382,128.182159397663 -15.6583906023374,128.179453417162 -15.6596775447501,128.173868773274 -15.6562206023374,128.171013417162 -15.6562206023374,128.167186582838 -15.66084,128.1641 -15.6643755339059,128.165564466094 -15.6656208857986,128.167998438522 -15.6668244660941,128.165774466094 -15.67036,128.16431 -15.6738955339059,128.165774466094 -15.6752219545133,128.170004001527 -15.6785203052172,128.17007208122 -15.679142235515,128.167665021117 -15.6750506023374,128.164683417162 -15.6750506023374,128.160856582838 -15.6777565828382,128.158150602337 -15.6815834171618,128.158150602337 -15.6842893976626,128.160856582838 -15.684027764485,128.165074978883 -15.686118080437,128.165821443285 -15.6885065828382,128.163590602337 -15.6923334171618,128.163590602337 -15.6979515031168,128.169740820029 -15.7077555339059,128.172564466094 -15.7091293976626,128.179953417162 -15.7064234171618,128.182659397663 -15.7005610973085,128.182927217407 -15.7023509889889,128.185917022445 -15.70667,128.18328 -15.7109228936738,128.185818070857 -15.7169465828382,128.180480602337 -15.7195447220047,128.180236199675 -15.7209144660941,128.176224466094 -15.7236243584824,128.174924230309 -15.72077,128.17046 -15.7238565828382,128.165840602337 -15.7276834171618,128.165840602337 -15.7304186906467,128.168693848614 -15.7334065828382,128.164570602337 -15.7372334171618,128.164570602337 -15.74032,128.16919 -15.7381428114541,128.173201759823 -15.7383810769233,128.17593896026 -15.7392765828382,128.175340602337 -15.7431034171618,128.175340602337 -15.7458093976626,128.178046582838 -15.7458093976626,128.181873417162 -15.7434893976626,128.186273417162 -15.7399355339059,128.191525533906 -15.7369113974317,128.192888276726 -15.7357655339059,128.198025533906 -15.73223,128.19949 -15.7286944660941,128.198025533906 -15.72723,128.19449 -15.7286944660941,128.190954466094 -15.7311356461452,128.189707680516 -15.73115986774,128.186110549304 -15.7293325471083,128.184150682812 -15.7253843824598,128.185867111005 -15.7249165315208,128.192843998701 -15.72713,128.19688 -15.7252310463455,128.200705849212 -15.7297986275657,128.204295259324 -15.7328265828382,128.199970602337 -15.7381375674684,128.200962279868 -15.7376706023374,128.196436582838 -15.7403765828382,128.193730602337 -15.7442034171618,128.193730602337 -15.7470459945618,128.197123301824 -15.7498865828382,128.193740602337 -15.7553355339059,128.194824466094 -15.75849,128.20474 -15.7539087861495,128.222456583024 -15.75634,128.22173 -15.7598755339059,128.223194466094 -15.7609593976626),128.228643417162 -15.7399399398777,(128.202677642164 -15.7388924325316,128.201977720132 -15.7393593976626,128.202676582838 -15.7393816959282,128.20278868379 -15.7399399398777),128.202677642164 -15.7341738411443,(128.225078059374 -15.732103295534,128.221295682812 -15.7288425758879,128.22339035773 -15.7313417058844,128.225968187053 -15.7335934533416,128.226607444376 -15.7341738411443),128.225078059374 -15.7307424776502,(128.213936997221 -15.7305379308871,128.213977684102 -15.7305981963196,128.214280658892 -15.730727413735,128.214087271363 -15.7307424776502),128.213936997221 -15.7281082745498,(128.176408160449 -15.7279055572126,128.174930968426 -15.7265956415176,128.175295769691 -15.7279855339059,128.176224466094 -15.7281082745498),128.176408160449 -15.7121994890285,(128.235088656331 -15.7120350896698,128.235121357397 -15.7121063642724,128.235228027378 -15.7121994890285),128.235088656331 -15.7113915082376,(128.194181718124 -15.710269184429,128.191720274166 -15.7044039170846,128.19266375394 -15.70659,128.20419 -15.7035034171618,128.208809397663 -15.6869435089252,128.20463393787 -15.68323,128.20673 -15.6877434171618,128.207030602337 -15.6904493976626,128.209736582838 -15.6903256745259,128.216258378267 -15.6931655339059,128.217584466094 -15.69463,128.22112 -15.6929124358649,128.22504169913 -15.6963725320065,128.225066556785 -15.6976944660941,128.220814466094 -15.70123,128.21935 -15.7047655339059,128.220814466094 -15.7060070810215,128.223229310616 -15.7107692182477,128.22216982921 -15.7101494113936,128.214009790791 -15.70742,128.20689 -15.7093906023374,128.196416582838 -15.7113915082376),128.194181718124 -15.7022636660186,(128.233958835731 -15.7011329189785,128.229330689384 -15.6994374679935,128.228993443215 -15.6981155339059,128.233245533906 -15.69458,128.23471 -15.6897793976626,128.231223417162 -15.6889229014859,128.232505254276 -15.6933239817616,128.242384903441 -15.6983804156898,128.241565449632 -15.6980406023374,128.236966582838 -15.7022636660186),128.233958835731 -15.6985330660894,(128.256709015671 -15.6973728481552,128.254097872777 -15.6965611240628,128.254640249475 -15.6974055339059,128.255204466094 -15.6985330660894),128.256709015671 -15.6851943254741,(128.218931621733 -15.6823544660941,128.217605533906 -15.68102776381,128.214762585443 -15.6802893976626,128.216466582838 -15.6801585295833,128.225192476138 -15.6827262527854,128.225038275763 -15.6851943254741),128.218931621733 -15.6656486488362,(128.170761135693 -15.6655791142014,128.170411561478 -15.6641724552499,128.172771226726 -15.6648848932427,128.172912939453 -15.6656486488362,128.170761135693