GDACS_WF_1024926_7
info-gdacs@gdacs.org
2025-09-06T22:00:00-00:00
Actual
Alert
Public
1024926
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 01/09/2025, a forest fire started in Australia, until 07/09/2025.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1024926
eventid
1024926
currentepisodeid
7
glide
version
0
fromdate
Mon, 01 Sep 2025 00:00:00 GMT
todate
Sun, 07 Sep 2025 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1024926
country
Australia
eventname
severity
Green impact for forestfire in 9066 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Thu, 11 Sep 2025 19:07:10 GMT
Polygon
-17.3345193976626,123.082366582838 -17.3334355339059,123.087815533906 -17.3279865828382,123.088899397663 -17.3252806023374,123.086193417162 -17.3251105441229,123.083221523216 -17.3200744660941,123.082055533906 -17.3151106023374,123.075343417162 -17.3156114677537,123.07076698477 -17.3141196766156,123.067429741211 -17.31046,123.06908 -17.3075484732191,123.068032482137 -17.3060193976626,123.077493417162 -17.3033134171618,123.080199397663 -17.2994865828382,123.080199397663 -17.2964671568992,123.075917620532 -17.2869365828382,123.075919397663 -17.2842306023374,123.073213417162 -17.2831652277969,123.067391203018 -17.2786906023374,123.064333417162 -17.2791979980507,123.05974721149 -17.2769292584336,123.058402766105 -17.27772,123.06093 -17.275229920238,123.06515082705 -17.27663,123.06859 -17.2746255339059,123.075945533906 -17.2691765828382,123.077029397663 -17.266134915476,123.072635805347 -17.2610633408932,123.070101599256 -17.256828283897,123.077201103953 -17.2701455339059,123.080134466094 -17.27161,123.08367 -17.2690055339059,123.090835533906 -17.2633215976009,123.09187044356 -17.2605434171618,123.094939397663 -17.2559570578789,123.09443189931 -17.2507755339059,123.099945533906 -17.24724,123.10141 -17.2437044660941,123.099945533906 -17.2384265315646,123.093047484107 -17.2347497754572,123.093389795753 -17.2359493976626,123.102193417162 -17.225705261242,123.110611478403 -17.2309555339059,123.112694466094 -17.2325459391641,123.118591382952 -17.2357734171618,123.118710602337 -17.2384793976626,123.121416582838 -17.2373955339059,123.126865533906 -17.2336007993816,123.128278441791 -17.2341493976626,123.137433417162 -17.2314434171618,123.140139397663 -17.2236400800833,123.141062331343 -17.2206534171618,123.145179397663 -17.2152044660941,123.144095533906 -17.2137006023374,123.134796582838 -17.218613746751,123.131768429862 -17.2199744660941,123.128754466094 -17.2237864736847,123.127344994035 -17.2252125808914,123.124255635028 -17.2231498533992,123.121627464836 -17.2182944660941,123.120425533906 -17.21683,123.11689 -17.21474,123.09777 -17.2162044660941,123.094234466094 -17.2200049408698,123.092822700016 -17.2206951315031,123.090781162158 -17.2165865828382,123.090969397663 -17.2138806023374,123.088263417162 -17.21308,123.08253 -17.2145326145299,123.079012203213 -17.2126306023374,123.076843417162 -17.21183,123.07111 -17.2132944660941,123.067574466094 -17.2170776154917,123.066159253784 -17.2177329237378,123.064179364485 -17.2136665828382,123.064339397663 -17.2109606023374,123.061633417162 -17.21017,123.0559 -17.2116226145299,123.052382203213 -17.20934,123.0483 -17.2108044660941,123.044764466094 -17.2145722558425,123.043346198559 -17.2161242282512,123.040154352861 -17.21251,123.03543 -17.2142744660941,123.025054466094 -17.2197234171618,123.023970602337 -17.2224293976626,123.026676582838 -17.2220892840275,123.031012433188 -17.22765,123.02909 -17.2322693976626,123.032176582838 -17.2322693976626,123.036003417162 -17.229502926162,123.038721430071 -17.2300793976626,123.048863417162 -17.2273734171618,123.051569397663 -17.2242793583019,123.051715155765 -17.22573,123.05523 -17.2250012183978,123.057664504256 -17.2273642215715,123.057186589567 -17.2303665828382,123.052990602337 -17.2390447435134,123.052023847252 -17.2349344660941,123.049765533906 -17.23347,123.04623 -17.2365565828382,123.041610602337 -17.2408466752923,123.041920141524 -17.2424389098796,123.040609546409 -17.2371665828382,123.040619397663 -17.2344606023374,123.037913417162 -17.2332,123.03114 -17.2375844660941,123.021974466094 -17.24112,123.02051 -17.2446823549668,123.022014606648 -17.24738,123.02111 -17.2515452419663,123.023516890806 -17.2534333181352,123.023141329106 -17.2536406023374,123.020356582838 -17.2563465828382,123.017650602337 -17.2617955339059,123.018734466094 -17.26326,123.02227 -17.2618793976626,123.029303417162 -17.2591734171618,123.032009397663 -17.2527673550547,123.033006202602 -17.2475210901204,123.041010453591 -17.2516193976626,123.044476582838 -17.2510207637088,123.049199336187 -17.2548893976626,123.052136582838 -17.2548893976626,123.055963417162 -17.2527672922136,123.058894667416 -17.2617397130183,123.057758399463 -17.2617606023374,123.054036582838 -17.2645016239845,123.05132363222 -17.2657644660941,123.046774466094 -17.2693,123.04531 -17.2724574837689,123.046521861068 -17.2779455031307,123.03844286061 -17.2775443094366,123.034932980899 -17.2739365828382,123.034889397663 -17.2712306023374,123.032183417162 -17.2720431849702,123.027140466987 -17.2666165828382,123.028209397663 -17.26353,123.02359 -17.2649944660941,123.020054466094 -17.2704434171618,123.018970602337 -17.2731493976626,123.021676582838 -17.2723368150298,123.026719533013 -17.2738166950832,123.024836068149 -17.274936522657,123.021875268132 -17.27235,123.01759 -17.2734867255626,123.014544964462 -17.2681865828382,123.015529397663 -17.2651,123.01091 -17.2665644660941,123.007374466094 -17.2701,123.00591 -17.2748279194376,123.009542158644 -17.275879317188,123.008839637127 -17.27384,123.00492 -17.2748719818838,123.002031724455 -17.2697465828382,123.002899397663 -17.26666,122.99828 -17.2681244660941,122.994744466094 -17.27166,122.99328 -17.2751955339059,122.994744466094 -17.27666,122.99828 -17.2756280181162,123.001168275545 -17.2770793363566,123.000270217773 -17.2780448223589,122.996637677038 -17.2757006023374,122.994173417162 -17.2762753857788,122.989486358627 -17.2713065828382,122.990249397663 -17.26822,122.98563 -17.2696844660941,122.982094466094 -17.27322,122.98063 -17.2778393976626,122.983716582838 -17.2772646142212,122.988403641373 -17.2816065828382,122.982350602337 -17.2854334171618,122.982350602337 -17.2881393976626,122.985056582838 -17.2881393976626,122.988883417162 -17.2851960024816,122.991636622379 -17.2842251776411,122.995242322962 -17.2865693976626,122.997706582838 -17.2859059470483,123.002526341174 -17.2910434171618,123.001650602337 -17.29413,123.00627 -17.2910434171618,123.010889397663 -17.2868346767477,123.010634216171 -17.2868155368084,123.014102006802 -17.2911655339059,123.015404466094 -17.29263,123.01894 -17.2911655339059,123.022475533906 -17.2885962652494,123.023747797892 -17.2897720826966,123.026749376843 -17.2952134171618,123.025670602337 -17.2999355339059,123.029404466094 -17.3012325250773,123.033781953293 -17.3061855339059,123.034964466094 -17.307565225941,123.038926187975 -17.3096663313312,123.038089968401 -17.3102906023374,123.033856582838 -17.3144058745345,123.030319099746 -17.3159306023374,123.018896582838 -17.3186365828382,123.016190602337 -17.3241462170981,123.016371073513 -17.3239206023374,123.012206582838 -17.32854,123.00912 -17.3331593976626,123.012206582838 -17.331847915763,123.017807623487 -17.33319,123.02116 -17.3317255339059,123.024695533906 -17.33395,123.02937 -17.3324855339059,123.032905533906 -17.3270365828382,123.033989397663 -17.3242723311059,123.030990467898 -17.3235543794571,123.034157551805 -17.3285355339059,123.035334466094 -17.3296193976626,123.040783417162 -17.3269134171618,123.043489397663 -17.3230865828382,123.043489397663 -17.3203806023374,123.040783417162 -17.3196098818722,123.037278795716 -17.317229162224,123.043610789229 -17.3208893976626,123.046506582838 -17.3208893976626,123.050333417162 -17.3181834171618,123.053039397663 -17.3146175884635,123.053091314909 -17.3144793976626,123.056223417162 -17.3107381440416,123.05913532629 -17.3139955339059,123.060544466094 -17.3154103233844,123.063830258789 -17.3183474111796,123.060194274254 -17.31681,123.05661 -17.3182744660941,123.053074466094 -17.32181,123.05161 -17.3253455339059,123.053074466094 -17.32681,123.05661 -17.3243125888204,123.060835725746 -17.325744438516,123.063889306583 -17.3299734171618,123.063620602337 -17.3326793976626,123.066326582838 -17.3326793976626,123.070153417162 -17.3271169575251,123.074965371967 -17.3283994558771,123.079578476784 -17.3318134171618,123.079660602337 -17.3345193976626),123.082366582838 -17.3115124115365,(123.049638685091 -17.3114044166773,123.04774424173 -17.3102407276777,123.047924286136 -17.3106959905209,123.049476288854 -17.3115124115365),123.049638685091 -17.3095818559584,(123.05925467371 -17.3094613291762,123.059230699443 -17.3094513987095,123.05928062327 -17.3095818559584),123.05925467371 -17.3059592723223,(123.045175713864 -17.30537,123.04295 -17.305454774059,123.042523812025 -17.3044588812764,123.045422732471 -17.3059592723223),123.045175713864 -17.3058215267809,(123.065897517863 -17.30546,123.06408 -17.3057386012905,123.06267937673 -17.3038379721191,123.065034585131 -17.3058215267809),123.065897517863 -17.2978455031307,(123.03948286061 -17.2978174749226,123.037658046707 -17.2944865828382,123.037559397663 -17.2911826960304,123.034773164853 -17.2911793976626,123.038583417162 -17.2885307677753,123.041251077208 -17.2904050380735,123.054226585659 -17.2931933988653,123.053169106397 -17.2902706023374,123.047473417162 -17.2902706023374,123.043646582838 -17.2929765828382,123.040940602337 -17.2978455031307),123.03948286061 -17.2972175638542,(123.054622963138 -17.2969766011347,123.054670893603 -17.297081069438,123.054827241468 -17.2972175638542),123.054622963138 -17.2851740529517,(123.003363658826 -17.2837106636434,123.004269782227 -17.2830211481584,123.007489303895 -17.2844653232523,123.007955783829 -17.28413,123.00627 -17.2845106023374,123.004356582838 -17.2851740529517),123.003363658826 -17.2829844631916,(123.017157993198 -17.2822914868946,123.017295834754 -17.2823106374769,123.017392111233 -17.2829637347506,123.017262202108 -17.2829844631916),123.017157993198 -17.2735607415664,(123.056097233895 -17.2728260655334,123.05385186047 -17.2711783760155,123.05493636778 -17.2713289393614,123.056206699165 -17.2735607415664),123.056097233895 -17.2542140141716,(123.086590727393 -17.252711828214,123.085526823636 -17.251242597878,123.088114494997 -17.2538929421211,123.08899810069 -17.2542140141716),123.086590727393 -17.2367270882574,(123.083450556185 -17.2360706023374,123.079583417162 -17.2357674729941,123.077280516957 -17.23138,123.08002 -17.2281083489025,123.078731854761 -17.2289866317392,123.08609912055 -17.2312265828382,123.084090602337 -17.2367270882574),123.083450556185 -17.2283350638881,(123.089690652388 -17.22814,123.08871 -17.2276112332577,123.089207004223 -17.2283350638881,123.089690652388