GDACS_WF_1025027_17
info-gdacs@gdacs.org
2025-09-17T22:00:00-00:00
Actual
Alert
Public
1025027
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Brazil
On 09/09/2025, a forest fire started in Brazil, until 18/09/2025.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1025027
eventid
1025027
currentepisodeid
17
glide
version
0
fromdate
Tue, 09 Sep 2025 00:00:00 GMT
todate
Thu, 18 Sep 2025 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1025027
country
Brazil
eventname
severity
Green impact for forestfire in 10170 ha
population
5 people affected in the area
vulnerability
sourceid
GWIS
iso3
BRA
hazardcomponents
datemodified
Fri, 19 Sep 2025 19:06:22 GMT
Polygon
-9.11972939766256,-47.1193534171618 -9.1197,-47.10859 -9.11890939766256,-47.1013465828382 -9.11344527335432,-47.0959930578798 -9.11258939766256,-47.0875365828382 -9.10442341716183,-47.0794206023374 -9.09752151086306,-47.0798904921984 -9.09239341716182,-47.0747006023374 -9.08926700926718,-47.0745612788583 -9.08854655829665,-47.0690204900675 -9.09189,-47.06434 -9.08908823372554,-47.0598425889691 -9.09307939766256,-47.0562434171618 -9.09307995396779,-47.0524193795735 -9.09643939766256,-47.0495834171618 -9.09643939766256,-47.0457565828382 -9.09373341716183,-47.0430506023374 -9.08990658283818,-47.0430506023374 -9.08565446609407,-47.0454844660941 -9.08438781838306,-47.0500145001694 -9.08225955448171,-47.0500488378416 -9.08076382093605,-47.0494997267804 -9.08175,-47.04668 -9.08028553390593,-47.0431444660941 -9.07675,-47.04168 -9.07349755203032,-47.0429553141188 -9.07262179374016,-47.0361336988286 -9.07573,-47.03151 -9.07312963500288,-47.0272154827122 -9.07809553390593,-47.0260355339059 -9.07956,-47.0225 -9.07809553390593,-47.0189644660941 -9.07281304985957,-47.0178474899881 -9.06925567504453,-47.0151361173382 -9.06795553390593,-47.0107744660941 -9.06442,-47.00931 -9.06088446609407,-47.0107744660941 -9.05959754037751,-47.0134174442487 -9.05244,-47.01282 -9.04890446609407,-47.0142844660941 -9.04689,-47.02132 -9.04783994154421,-47.0240854934996 -9.04544060233744,-47.0265865828382 -9.04415921656197,-47.0342325716343 -9.04107658283817,-47.0343806023374 -9.03561716545825,-47.0387692042846 -9.03115085122994,-47.0397351578218 -9.02708341716182,-47.0352606023374 -9.02325658283817,-47.0352606023374 -9.02055060233744,-47.0379665828382 -9.02111143611051,-47.0426327642185 -9.01981570036843,-47.0443590888651 -9.0194419851544,-47.0354318129883 -9.02116576343329,-47.0322645793982 -9.02561341716182,-47.0326793976626 -9.02831939766256,-47.0299734171618 -9.02831939766256,-47.0261465828382 -9.02561341716182,-47.0234406023374 -9.02178658283817,-47.0234406023374 -9.01882423656671,-47.0274354206018 -9.01437658283817,-47.0270206023374 -9.01095729636036,-47.0327043963327 -9.00214,-47.03115 -8.99125446609407,-47.0337444660941 -8.99017060233744,-47.0391934171618 -8.99817717358295,-47.0446043876516 -8.99402,-47.05222 -8.99629446609407,-47.0600655339059 -9.0016391571709,-47.0611701362642 -9.00295446609407,-47.0654555339059 -9.00686151680051,-47.0668461007137 -9.00756060233744,-47.0719634171618 -9.01026658283818,-47.0746693976626 -9.01409341716183,-47.0746693976626 -9.02235174717895,-47.0703901506363 -9.02410045446917,-47.0795819739359 -9.02109,-47.08465 -9.02342045446917,-47.0976019739359 -9.01762,-47.10667 -9.01905060233744,-47.1155934171618 -9.02289725000821,-47.1185262904697 -9.02452446609407,-47.1237255339059 -9.02806,-47.12519 -9.03526983298217,-47.1226902539244 -9.03808446609407,-47.1268955339059 -9.04162,-47.12836 -9.04515553390593,-47.1268955339059 -9.04686269685519,-47.121887808968 -9.04994341716183,-47.1217393976626 -9.05264939766256,-47.1190334171618 -9.05264939766256,-47.1152065828382 -9.04827632981676,-47.112168998047 -9.04729290429031,-47.109198969247 -9.05226939766256,-47.1061834171618 -9.05118553390593,-47.1007344660941 -9.04765,-47.09927 -9.04411446609407,-47.1007344660941 -9.04265,-47.10427 -9.04365709570969,-47.107121030753 -9.04172897695811,-47.1073624959125 -9.03777277178318,-47.1018946233013 -9.04130939766256,-47.0990234171618 -9.04239648721776,-47.090791109774 -9.04725341716182,-47.0914793976626 -9.05034,-47.08686 -9.04725341716182,-47.0822406023374 -9.04342658283817,-47.0822406023374 -9.04114658221685,-47.084164168652 -9.04222974475911,-47.0791099681799 -9.04707341716182,-47.0797893976626 -9.04988015449062,-47.076576878381 -9.05619463016271,-47.0769954974419 -9.05366060233744,-47.0795865828382 -9.05239,-47.08513 -9.05635446609407,-47.0947555339059 -9.05989,-47.09622 -9.06359416177972,-47.0955250236033 -9.0645969787588,-47.097825346588 -9.06565551456778,-47.1067500221018 -9.06184060233744,-47.1096765828382 -9.06173080293443,-47.1129514182869 -9.05922060233744,-47.1155265828382 -9.05922060233744,-47.1193534171618 -9.06192658283818,-47.1220593976626 -9.06531850703305,-47.1221459066659 -9.06497060233744,-47.1264934171618 -9.06929984871452,-47.1295222853209 -9.06937060233744,-47.1329934171618 -9.07321446609407,-47.1376055339059 -9.07866341716183,-47.1386893976626 -9.08136939766256,-47.1359834171618 -9.08136939766256,-47.1321565828382 -9.07613431988149,-47.1266148866022 -9.07773645499069,-47.1252453773306 -9.08182,-47.12753 -9.08523497754492,-47.126146087091 -9.08492060233744,-47.1304434171618 -9.08762658283817,-47.1331493976626 -9.09307553390593,-47.1320655339059 -9.09454,-47.12853 -9.09364110231517,-47.1258408990345 -9.09631939766256,-47.1231534171618 -9.09650777362885,-47.1202736127729 -9.10427514706221,-47.1222872589702 -9.10024060233744,-47.1258865828382 -9.10132446609407,-47.1313355339059 -9.10486,-47.1328 -9.10792228286668,-47.1316517501407 -9.11099658283817,-47.1362093976626 -9.11605341716183,-47.1368693976626 -9.11914,-47.13225 -9.11798939766256,-47.1265565828382 -9.11436656147812,-47.1236682284028 -9.11972939766256),-47.1193534171618 -9.1037284900222,(-47.098789373357 -9.08440658283818,-47.1020806023374 -9.07863060233744,-47.1102765828382 -9.0784526121074,-47.1132085998491 -9.07448,-47.11109 -9.07134470430796,-47.1121696305859 -9.07085448543222,-47.1093399778982 -9.07358553390593,-47.1080355339059 -9.07643939766256,-47.1030534171618 -9.07653886437666,-47.091602108472 -9.07993658283817,-47.0955693976626 -9.08719341716182,-47.0961393976626 -9.09272553390593,-47.0918655339059 -9.09391966549047,-47.0869709366442 -9.09605326872587,-47.0888461853425 -9.09724446609407,-47.0937555339059 -9.1037284900222),-47.098789373357 -9.09359222637115,(-47.1166163872271 -9.09241434945104,-47.1163820929404 -9.09341290528754,-47.1157148792617 -9.09359222637115),-47.1166163872271 -9.08977565054896,(-47.1166279070596 -9.08708060233744,-47.1193265828382 -9.08708060233744,-47.1231534171618 -9.08612502245508,-47.124913912909 -9.08554877636804,-47.116551908873 -9.08977565054896),-47.1166279070596 -9.06985357045581,(-47.0898434316115 -9.06963704758427,-47.0899881075688 -9.06907259725178,-47.0898758314169 -9.06971177977565,-47.0897486901079 -9.06985357045581),-47.0898434316115 -9.06175342644954,(-47.0779229672184 -9.05880536983729,-47.0766045025581 -9.06019341716183,-47.0768806023374 -9.06175342644954),-47.0779229672184 -9.05073358431198,(-47.0479427988454 -9.04976493308782,-47.0504626131478 -9.04951289552206,-47.04919553474 -9.0502898665727,-47.0480310597913 -9.05073358431198),-47.0479427988454 -9.04276977910734,(-47.0603972829735 -9.04113824405931,-47.0647659359779 -9.0414,-47.06345 -9.0410779051004,-47.059592102532 -9.04276977910734),-47.0603972829735 -9.03498220153146,(-47.0487451174028 -9.03295,-47.05266 -9.0344910532967,-47.0569219197582 -9.02663860725047,-47.0586641100927 -9.02659464840816,-47.0558148938833 -9.02906939766256,-47.0532634171618 -9.02898043067433,-47.0493034343309 -9.03498220153146,-47.0487451174028