GDACS_WF_1025260_5
info-gdacs@gdacs.org
2025-10-05T22:00:00-00:00
Actual
Alert
Public
1025260
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire alert in Australia
On 03/10/2025, a forest fire started in Australia, until 06/10/2025.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1025260
eventid
1025260
currentepisodeid
5
glide
version
0
fromdate
Fri, 03 Oct 2025 00:00:00 GMT
todate
Mon, 06 Oct 2025 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1025260
country
Australia
eventname
severity
Green impact for forestfire in 17410 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Mon, 06 Oct 2025 11:04:55 GMT
Polygon
-16.1330393976626,131.676856582838 -16.1319555339059,131.682305533906 -16.1265065828382,131.683389397663 -16.1231795274517,131.679878406315 -16.12417,131.68614 -16.1224093976626,131.693853417162 -16.1178630163663,131.697639423004 -16.1166055339059,131.702215533906 -16.11307,131.70368 -16.1084506023374,131.700593417162 -16.1084506023374,131.696766582838 -16.1107727023262,131.694317103095 -16.0996624337104,131.686035614927 -16.0972453045632,131.687442293521 -16.0992479168221,131.69167296568 -16.1045434171618,131.691590602337 -16.10763,131.69621 -16.1035174715184,131.704123991759 -16.10615,131.70844 -16.1046855339059,131.711975533906 -16.0992365828382,131.713059397663 -16.0962414568057,131.708899784411 -16.0955043341187,131.711176686157 -16.0981370621827,131.717679143724 -16.10316,131.7147 -16.1077793976626,131.717786582838 -16.1087565862318,131.725765090625 -16.1128855339059,131.727724466094 -16.1149193976626,131.730656582838 -16.11619,131.73717 -16.1131034171618,131.741789397663 -16.1048065828382,131.742729397663 -16.1021006023374,131.740023417162 -16.1009280725515,131.731702560585 -16.0968365828382,131.731879397663 -16.0939858037516,131.728445465513 -16.0898744660941,131.727095533906 -16.0860590157707,131.708388113182 -16.0816465828382,131.708779397663 -16.0789406023374,131.706073417162 -16.0804348252525,131.700350272871 -16.0790774804684,131.694792824324 -16.0772955339059,131.700375533906 -16.0718673206533,131.70146352267 -16.0715993976626,131.703943417162 -16.0688934171618,131.706649397663 -16.0650665828382,131.706649397663 -16.0623606023374,131.703943417162 -16.062542543233,131.698050744897 -16.05616,131.69891 -16.0517608996158,131.696153115338 -16.0435465828382,131.697479397663 -16.0408406023374,131.694773417162 -16.0406038685857,131.691182524773 -16.0374965828382,131.691039397663 -16.0344358229263,131.686549820617 -16.0299944660941,131.685265533906 -16.0289106023374,131.679816582838 -16.0330099796873,131.675836732754 -16.0279125832708,131.673170736933 -16.02234,131.67623 -16.0188044660941,131.674765533906 -16.01471,131.65291 -16.0161744660941,131.649374466094 -16.0213613946317,131.648238482816 -16.0210019542975,131.64406060626 -16.0126579901648,131.642114751838 -16.0128093976626,131.646383417162 -16.0101034171618,131.649089397663 -16.006672018396,131.649168054686 -16.00197,131.65267 -15.9984344660941,131.651205533906 -15.99697,131.64767 -16.0000054425219,131.643084773204 -15.9973406023374,131.640293417162 -15.9963166798286,131.63143341089 -15.9937165828382,131.631189397663 -15.9906106023374,131.628163417162 -15.9903420249974,131.617145206899 -15.9856533138755,131.616390214111 -15.9836334171618,131.618069397663 -15.9798065828382,131.618069397663 -15.9734976048528,131.607788455916 -15.9697665828382,131.607769397663 -15.9633544660941,131.602995533906 -15.96189,131.59946 -15.9630328569899,131.590275456638 -15.9573165828382,131.591759397663 -15.9526244660941,131.587645533906 -15.9501789033073,131.579606673713 -15.9463806023374,131.576683417162 -15.946560630764,131.572587151258 -15.9423144660941,131.569745533906 -15.9345606023374,131.559913417162 -15.9287068302449,131.540161446228 -15.9260465828382,131.539929397663 -15.9233406023374,131.537223417162 -15.9233406023374,131.533396582838 -15.9254977572699,131.531057315858 -15.9178665828382,131.531639397663 -15.9112944660941,131.527675533906 -15.9104678821004,131.521841536462 -15.90727,131.5172 -15.9087344660941,131.513664466094 -15.9146250011707,131.511890610482 -15.9148397053584,131.508888061032 -15.9114144660941,131.507445533906 -15.90995,131.50391 -15.9117644660941,131.497184466094 -15.9153,131.49572 -15.9224034171618,131.496650602337 -15.92549,131.50127 -15.9238492935933,131.504923293918 -15.9236417564711,131.516049751186 -15.9266255339059,131.517404466094 -15.9317393976626,131.524466582838 -15.9310951810145,131.52925755551 -15.934436376459,131.528912876809 -15.937028898396,131.523920219123 -15.93442,131.51962 -15.9351706023374,131.514516582838 -15.9378765828382,131.511810602337 -15.9409027071512,131.511619077667 -15.94254,131.4944 -15.9442384018395,131.490708155226 -15.9436606023374,131.486016582838 -15.94828,131.48293 -15.9528993976626,131.486016582838 -15.9515815981605,131.491621844774 -15.9558955339059,131.494754466094 -15.95736,131.49829 -15.9558955339059,131.501825533906 -15.9512326944043,131.503107804392 -15.9499493976626,131.515733417162 -15.9472434171618,131.518439397663 -15.9442218912932,131.518624040275 -15.943721101604,131.522009780877 -15.9463028047412,131.526446719799 -15.95073,131.52469 -15.9567117727162,131.528314363978 -15.9594933523877,131.528398926619 -15.9625031652971,131.526194086977 -15.9520144660941,131.521955533906 -15.9509306023374,131.516506582838 -15.9536365828382,131.513800602337 -15.9634934171618,131.515890602337 -15.9659264791908,131.518188131481 -15.97058,131.51493 -15.9751993976626,131.518016582838 -15.9737319537957,131.523721833941 -15.9765755339059,131.525244466094 -15.9810623483539,131.532504639894 -15.9810606023374,131.526256582838 -15.983714259285,131.523585563818 -15.9780844660941,131.521435533906 -15.9770006023374,131.515986582838 -15.9852865828382,131.510550602337 -15.9907355339059,131.511634466094 -15.9920019563608,131.514174367392 -15.9955155339059,131.515634466094 -15.99698,131.51917 -15.9955155339059,131.522705533906 -15.989315740715,131.524784436182 -15.9934093976626,131.528516582838 -15.9930393976626,131.533363417162 -15.9893054458058,131.536812501355 -15.99472,131.54637 -15.9921655339059,131.551275533906 -15.9887203582206,131.552722026632 -15.9846434171618,131.558009397663 -15.9816186219686,131.558168933165 -15.9791034171618,131.560589397663 -15.9752765828382,131.560589397663 -15.9725706023374,131.557883417162 -15.972559175052,131.554114031682 -15.9681206023374,131.551063417162 -15.9692044660941,131.545614466094 -15.9748698616738,131.542930679446 -15.9745429898447,131.537989405283 -15.9714069037616,131.536794434158 -15.96759,131.53868 -15.9644661425569,131.537490607324 -15.96064,131.53939 -15.9569160073554,131.537886260817 -15.9455926173352,131.540916596755 -15.9478593976626,131.544926582838 -15.9508907173457,131.559373659711 -15.9522544660941,131.556344466094 -15.9568512839369,131.5550911025 -15.9574206023374,131.549186582838 -15.96204,131.5461 -15.9655755339059,131.547564466094 -15.9666608772598,131.553005978724 -15.9710993976626,131.556056582838 -15.9696593976626,131.572303417162 -15.9669534171618,131.575009397663 -15.9628216296971,131.574805634488 -15.9619584069539,131.576952795435 -15.9637180010312,131.585029933883 -15.96835,131.58188 -15.9729693976626,131.584966582838 -15.971889683141,131.59819170857 -15.9774400262544,131.600777407456 -15.9788144660941,131.597694466094 -15.9829703052716,131.595161003914 -15.982063559693,131.59264926276 -15.9755306023374,131.587223417162 -15.9766144660941,131.581774466094 -15.9890334171618,131.580080602337 -15.9917393976626,131.582786582838 -15.9917341488004,131.586621272639 -15.9977155339059,131.590484466094 -16.00283870708,131.599477046737 -16.0057355339059,131.600814466094 -16.0079540799052,131.607369778293 -16.0146972326152,131.612461965408 -16.0182098334453,131.609720934621 -16.01554,131.60538 -16.0170044660941,131.601844466094 -16.0195451930944,131.600577879397 -16.01685,131.59622 -16.0183144660941,131.592684466094 -16.0237634171618,131.591600602337 -16.0265871476636,131.594898552069 -16.028772608856,131.592979403688 -16.0300044660941,131.588274466094 -16.034850074011,131.587070589923 -16.0329934617411,131.580352051061 -16.0287365828382,131.580639397663 -16.0260306023374,131.577933417162 -16.0257810308868,131.575361263248 -16.0225165828382,131.575249397663 -16.0198106023374,131.572543417162 -16.0198106023374,131.568716582838 -16.0226767032895,131.565978752399 -16.0204506023374,131.563593417162 -16.0202653015658,131.560698152725 -16.0156144660941,131.559455533906 -16.01415,131.55592 -16.0172365828382,131.551300602337 -16.0210634171618,131.551300602337 -16.0235621014279,131.553696342099 -16.0337755339059,131.557484466094 -16.0345883791596,131.563339025015 -16.0371323036751,131.564421718054 -16.04528,131.56005 -16.0539955339059,131.562094466094 -16.05546,131.56563 -16.0523699278619,131.570250091727 -16.05355,131.57336 -16.0526476930266,131.576054203326 -16.0549555339059,131.577274466094 -16.0563695492901,131.581063632846 -16.0614093976626,131.584066582838 -16.0606944861859,131.588963357798 -16.06243,131.59268 -16.055015257796,131.603047236944 -16.0617956803871,131.607142105698 -16.0648103536172,131.605575190071 -16.06176,131.60098 -16.0632244660941,131.597444466094 -16.0686734171618,131.596360602337 -16.0713793976626,131.599066582838 -16.0713793976626,131.602893417162 -16.0674396463828,131.605844809929 -16.07049,131.61044 -16.0694793976626,131.617083417162 -16.0648262385452,131.620163284429 -16.0650693976626,131.626363417162 -16.0610747105941,131.629325737337 -16.06568,131.63972 -16.0656693976626,131.645393417162 -16.0640941035206,131.647343897191 -16.0656293976626,131.657763417162 -16.0629234171618,131.660469397663 -16.0574744660941,131.659385533906 -16.05455,131.64937 -16.0565058964794,131.645506102809 -16.0549747963458,131.642166661756 -16.05186,131.64335 -16.0487483652624,131.642168774275 -16.0463060845258,131.646993480709 -16.0463890433251,131.649129457243 -16.0505434171618,131.648910602337 -16.0532493976626,131.651616582838 -16.0553687822248,131.665536222773 -16.0594734171618,131.665350602337 -16.0624478324867,131.668780901327 -16.0661526473486,131.668107395452 -16.0680249362351,131.665793017977 -16.0681006023374,131.662346582838 -16.0708065828382,131.659640602337 -16.0746334171618,131.659640602337 -16.0773393976626,131.662346582838 -16.0752010910563,131.674559864548 -16.07775,131.67882 -16.0762855339059,131.682355533906 -16.0725375859665,131.683777748222 -16.0725614657259,131.68740220012 -16.0771238707632,131.686676986225 -16.0778906023374,131.683446582838 -16.0808486574069,131.680690461588 -16.078,131.66782 -16.0787706023374,131.663936582838 -16.0818433022218,131.661157657317 -16.0811306023374,131.655586582838 -16.0856083180597,131.65252818229 -16.0886865828382,131.647950602337 -16.0941355339059,131.649034466094 -16.0956,131.65257 -16.0945585328153,131.655472471301 -16.096224185843,131.658114482176 -16.1003855339059,131.659454466094 -16.101918024093,131.665086088495 -16.10711,131.6632 -16.1146487367335,131.665175562895 -16.115804632143,131.661653402967 -16.1134617843566,131.65741335329 -16.1093265828382,131.657619397663 -16.1066206023374,131.654913417162 -16.1066206023374,131.651086582838 -16.1093265828382,131.648380602337 -16.1119053872416,131.648132353751 -16.1109445501145,131.646672990583 -16.1090334171618,131.648189397663 -16.1048365828382,131.648019397663 -16.1003244660941,131.643615533906 -16.0989828349005,131.639462467254 -16.0950365828382,131.638879397663 -16.0923306023374,131.636173417162 -16.0920747483176,131.633632847856 -16.0892006023374,131.630893417162 -16.0895728349005,131.623682467254 -16.0840044660941,131.622015533906 -16.0826643677153,131.617854761273 -16.0797806023374,131.615113417162 -16.0802516243078,131.60953390724 -16.0769,131.60316 -16.0783644660941,131.599624466094 -16.0819,131.59816 -16.0854355339059,131.599624466094 -16.0896593976626,131.606556582838 -16.0891292610758,131.611838903515 -16.0946355339059,131.612884466094 -16.0961971650995,131.619647532746 -16.10056,131.61872 -16.1040955339059,131.620184466094 -16.10556,131.62372 -16.1042969072758,131.62695415736 -16.1084134171618,131.626760602337 -16.1111193976626,131.629466582838 -16.1111193976626,131.633293417162 -16.1070004209809,131.636280460078 -16.1117454498855,131.641687009417 -16.11557,131.63979 -16.1191055339059,131.641254466094 -16.1203079192738,131.643472431215 -16.12439,131.64119 -16.1290093976626,131.644276582838 -16.1290093976626,131.648103417162 -16.1263034171618,131.650809397663 -16.1224765828382,131.650809397663 -16.1196520807262,131.647507568785 -16.1185875888204,131.648671613748 -16.1231401298675,131.655495458384 -16.1289555339059,131.656334466094 -16.1301913434259,131.661019534225 -16.1326893976626,131.663586582838 -16.1321093976626,131.671373417162 -16.1295346419423,131.673991716067 -16.1330393976626),131.676856582838 -16.1195004725483,(131.677601593685 -16.1194550606974,131.669805148028 -16.1168,131.66917 -16.1137134171618,131.673789397663 -16.1082300318938,131.673606028097 -16.1039712620551,131.674835153773 -16.1043575797631,131.675971817959 -16.1113634171618,131.675270602337 -16.1140693976626,131.677976582838 -16.1142207582967,131.681601266676 -16.1155044660941,131.678974466094 -16.1195004725483),131.677601593685 -16.1027630927242,(131.62814584264 -16.0986944710226,131.628348923215 -16.099486978092,131.63005725243 -16.1017711001144,131.630017087688 -16.1027630927242),131.62814584264 -16.0972125284816,(131.705506008241 -16.0949606023374,131.703103417162 -16.0946134171618,131.699399397663 -16.0937597356742,131.701879804098 -16.0964085431943,131.707140215589 -16.0972125284816),131.705506008241 -16.0708285342741,(131.68959779988 -16.0705680545498,131.689771846867 -16.0707421015372,131.690032326591 -16.0708285342741),131.68959779988 -16.0607835987313,(131.679709185623 -16.059666674687,131.67995959681 -16.0606714647576,131.680630976071 -16.0607835987313),131.679709185623 -16.0584407791239,(131.689352704252 -16.0582293117008,131.689394767738 -16.0583035691848,131.689444385003 -16.0584407791239),131.689352704252 -16.056793325313,(131.67968040319 -16.0546693649721,131.67775993608 -16.052835604596,131.678942777657 -16.0544334171618,131.679260602337 -16.0557365828382,131.679890602337 -16.056793325313),131.67968040319 -16.0555806882992,(131.689025232262 -16.0550980137611,131.688702719446 -16.0550113348614,131.689138483702 -16.0555806882992),131.689025232262 -16.0579152894059,(131.628654262663 -16.0558306023374,131.626363417162 -16.0535568852346,131.615859808915 -16.0477044660941,131.615045533906 -16.0453248665161,131.607428293158 -16.0412021991288,131.607352832834 -16.03699,131.60983 -16.0339549773071,131.608699964807 -16.0303471009251,131.611553653418 -16.0326593976626,131.613996582838 -16.0326593976626,131.617823417162 -16.0290386337399,131.620711359399 -16.03172,131.62506 -16.0303116404891,131.630821048132 -16.0359293976626,131.634376582838 -16.0360353495202,131.637688847439 -16.0385493976626,131.640266582838 -16.0381989735116,131.644617863965 -16.0391139154742,131.644006519291 -16.0394797932349,131.640458608363 -16.03804,131.63696 -16.0395044660941,131.633424466094 -16.0449534171618,131.632340602337 -16.0477763864589,131.635634725234 -16.0499465828382,131.633730602337 -16.0535719302276,131.633690524094 -16.0550044660941,131.629994466094 -16.0579152894059),131.628654262663 -16.0457013831975,(131.668843241887 -16.0452634171618,131.668550602337 -16.0445811513858,131.668414891237 -16.0457013831975),131.668843241887 -16.0362056010752,(131.646557394109 -16.0346635104178,131.647034095706 -16.0351837879116,131.64825193485 -16.0352306023374,131.648016582838 -16.0362056010752),131.646557394109 -16.0351453387751,(131.651414768288 -16.0351062120884,131.65121806515 -16.0350700637433,131.651399795153 -16.0351453387751),131.651414768288 -16.0298956765082,(131.657591346654 -16.0265544660941,131.656165533906 -16.02545572882,131.65079135706 -16.0239986053683,131.650501517184 -16.0256057600339,131.663566783647 -16.0286734171618,131.663780602337 -16.0298956765082),131.657591346654 -16.0373004313824,(131.597129902842 -16.035447391144,131.596430596312 -16.0349750320135,131.599998864661 -16.0371687615971,131.599388148447 -16.0373004313824),131.597129902842 -16.0289937119168,(131.565772097887 -16.0281488799017,131.565520660356 -16.0271926187983,131.56657802073 -16.0281465828382,131.565940602337 -16.0289937119168),131.565772097887 -16.0329649679864,(131.601971135339 -16.0316786337399,131.602401359399 -16.0323950226929,131.602880035193 -16.0326406023374,131.602456582838 -16.0329649679864),131.601971135339 -16.0274465828382,(131.602130602337 -16.0259428523364,131.598921447931 -16.0228448069056,131.601022120603 -16.0252733208293,131.604039313273 -16.0274465828382),131.602130602337 -16.0261265828382,(131.611290602337 -16.0246266791707,131.608090686727 -16.0215501665547,131.610179065379 -16.0239563864589,131.613194725234 -16.0261265828382),131.611290602337 -16.0257213662601,(131.620258640601 -16.0233036135411,131.617235274766 -16.0221624530509,131.618451817864 -16.0237945912165,131.621116793521 -16.0257213662601),131.620258640601 -16.0118402959232,(131.633372211131 -16.0073606023374,131.630313417162 -16.006128181939,131.629450780379 -16.0064440987342,131.632872401616 -16.0114452865651,131.635182602458 -16.0118402959232),131.633372211131 -15.9611352959058,(131.562303260071 -15.9602587160631,131.5621288975 -15.9588515526427,131.569287340847 -15.9598734171618,131.569490602337 -15.9611352959058,131.562303260071