GDACS_WF_1025619_1
info-gdacs@gdacs.org
2025-11-10T23:00:00-00:00
Actual
Alert
Public
1025619
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire notification in Australia
On 28/10/2025, a forest fire started in Australia, until 11/11/2025.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1025619
eventid
1025619
currentepisodeid
1
glide
version
0
fromdate
Tue, 28 Oct 2025 00:00:00 GMT
todate
Tue, 11 Nov 2025 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1025619
country
Australia
eventname
severity
Green impact for forestfire in 19257 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Wed, 19 Nov 2025 09:22:43 GMT
Polygon
-17.1887593976626,138.669163417162 -17.1860534171618,138.671869397663 -17.1822265828382,138.671869397663 -17.1775059385227,138.664187941205 -17.1731034171618,138.671509397663 -17.16764,138.67254 -17.1629625107585,138.669161371073 -17.1592569808244,138.670311932389 -17.1516734171618,138.682839397663 -17.1478465828382,138.682839397663 -17.1438112735541,138.679697690648 -17.1417402974834,138.684341527407 -17.1427993976626,138.689753417162 -17.13818,138.69284 -17.1335606023374,138.689753417162 -17.13228,138.68219 -17.1349870426866,138.676259659564 -17.1336234953769,138.67534856638 -17.1295793123752,138.675986974254 -17.1300993976626,138.682863417162 -17.1273934171618,138.685569397663 -17.1193765828382,138.684769397663 -17.1132055584845,138.680700852087 -17.10871,138.68269 -17.0987255945599,138.680742853039 -17.0979117252616,138.681874896624 -17.1001155339059,138.683074466094 -17.10158,138.68661 -17.0984934171618,138.691229397663 -17.0930444660941,138.690145533906 -17.09158,138.68661 -17.0930408685253,138.683079850236 -17.0915605003869,138.683374313767 -17.0914793976626,138.686793417162 -17.0887734171618,138.689499397663 -17.0833244660941,138.688415533906 -17.08186,138.68488 -17.0830722172727,138.681721983134 -17.0818277479903,138.681630476535 -17.0806655339059,138.686685533906 -17.0752165828382,138.687769397663 -17.07213,138.68315 -17.0743252675745,138.679126160156 -17.0735129266619,138.677960775661 -17.07009,138.67935 -17.0639865828382,138.678139397663 -17.0612806023374,138.675433417162 -17.0625506023374,138.661016582838 -17.0645544660941,138.657914466094 -17.0702810737699,138.657016126552 -17.0726293604721,138.654246063196 -17.0689365828382,138.654219397663 -17.0622244660941,138.650765533906 -17.06037,138.64055 -17.0618344660941,138.637014466094 -17.06537,138.63555 -17.0733334171618,138.636620602337 -17.0753923885609,138.638358265288 -17.0820533334427,138.63744263122 -17.0789465828382,138.637299397663 -17.0743456569757,138.63240636799 -17.07051,138.63432 -17.0642144660941,138.631955533906 -17.0631306023374,138.626506582838 -17.0668221791138,138.623604555049 -17.0617606023374,138.619773417162 -17.0617606023374,138.615946582838 -17.06638,138.61286 -17.0835834171618,138.616120602337 -17.0863735352424,138.61852154306 -17.0879204298657,138.617517902374 -17.0891744660941,138.612924466094 -17.0920011622102,138.611600996603 -17.08755,138.6058 -17.0892448839532,138.599201736297 -17.0883306023374,138.594006582838 -17.0910365828382,138.591300602337 -17.0948634171618,138.591300602337 -17.0978591148849,138.596376910328 -17.1035834171618,138.597110602337 -17.1113066591068,138.604625131805 -17.1164365828382,138.599110602337 -17.1202634171618,138.599110602337 -17.1231747262181,138.602848839194 -17.1260255768639,138.598437566113 -17.1188344660941,138.596505533906 -17.11737,138.59297 -17.1181708442759,138.587586733506 -17.1098744660941,138.584045533906 -17.1087096506873,138.579003554266 -17.10392,138.58029 -17.0979365828382,138.579359397663 -17.0909306023374,138.574483417162 -17.0931396317227,138.560210004123 -17.09005,138.55559 -17.0924653425804,138.547960133691 -17.0894465828382,138.547799397663 -17.0867406023374,138.545093417162 -17.0873620381734,138.536572918537 -17.0818406023374,138.531743417162 -17.0818157707264,138.528041419777 -17.0776634171618,138.530709397663 -17.07245,138.53164 -17.0689144660941,138.530175533906 -17.0678306023374,138.524726582838 -17.0705365828382,138.522020602337 -17.0748292587066,138.52127314683 -17.0704544660941,138.519195533906 -17.0692539171109,138.516986800914 -17.0642944660941,138.515635533906 -17.06283,138.5121 -17.0646265182853,138.508342595913 -17.0609665828382,138.508309397663 -17.0582606023374,138.505603417162 -17.0593444660941,138.500154466094 -17.0684095817916,138.497319264234 -17.0709110170532,138.495093861709 -17.0677189198366,138.492912009452 -17.0641565828382,138.492859397663 -17.0614506023374,138.490153417162 -17.0612506023374,138.484736582838 -17.0655695683291,138.481709759575 -17.0584144660941,138.474835533906 -17.0573306023374,138.469386582838 -17.06934,138.4607 -17.0728755339059,138.462164466094 -17.0741881908582,138.466463196094 -17.0848170159089,138.468827595213 -17.08925,138.46602 -17.093272773904,138.468213672283 -17.0952461127554,138.46581428503 -17.0903244660941,138.464625533906 -17.08886,138.46109 -17.0903244660941,138.457554466094 -17.09386,138.45609 -17.0973955339059,138.457554466094 -17.0987238872446,138.46040571497 -17.1036455339059,138.461594466094 -17.10511,138.46513 -17.1026069057511,138.469359523052 -17.1036480481705,138.474771452879 -17.1080455339059,138.476064466094 -17.1093262593174,138.47867627321 -17.1091306023374,138.473316582838 -17.1130644660941,138.467384466094 -17.1166,138.46592 -17.1212836191105,138.46932944586 -17.1268655339059,138.470324466094 -17.1289455339059,138.475604466094 -17.1328855339059,138.478824466094 -17.1341644817791,138.483292663078 -17.1385693976626,138.486336582838 -17.1385693976626,138.490163417162 -17.1358634171618,138.492869397663 -17.1315852770537,138.492567844778 -17.1286534171618,138.496409397663 -17.1248265828382,138.496409397663 -17.1223922562536,138.494109975978 -17.1203432868389,138.501650857608 -17.1246665828382,138.497390602337 -17.1302322043522,138.498649075756 -17.13487,138.49547 -17.1436192157876,138.50050970488 -17.1480134171618,138.500130602337 -17.1534155339059,138.502994466094 -17.15488,138.50653 -17.1532493976626,138.514643417162 -17.1492861099465,138.517599491617 -17.1582434171618,138.519320602337 -17.1629252328308,138.525291232229 -17.1642944660941,138.522234466094 -17.1696068065245,138.519289493208 -17.1708344660941,138.516944466094 -17.1762834171618,138.515860602337 -17.1789893976626,138.518566582838 -17.1785537831536,138.523045360346 -17.1818893976626,138.525876582838 -17.1818893976626,138.529703417162 -17.1764481351003,138.533115156618 -17.1751855339059,138.537665533906 -17.1715372237092,138.539107567401 -17.1703855339059,138.544215533906 -17.16685,138.54568 -17.1631902395717,138.544029615777 -17.1622193976626,138.548913417162 -17.1595134171618,138.551619397663 -17.1556865828382,138.551619397663 -17.1513468281997,138.54807838227 -17.1497602525663,138.55845601761 -17.1544234171618,138.559540602337 -17.1607735690045,138.564668503269 -17.1630744660941,138.556814466094 -17.1685234171618,138.555730602337 -17.1730022114898,138.562227703216 -17.1795,138.56038 -17.1830355339059,138.561844466094 -17.1841193976626,138.567293417162 -17.1801551652781,138.570249679523 -17.1760955339059,138.584985533906 -17.17256,138.58645 -17.1700838957352,138.585693422161 -17.1653634171618,138.591179397663 -17.1582165828382,138.590649397663 -17.1534618041813,138.588095025329 -17.15015,138.58941 -17.1391988900843,138.588327384543 -17.14363,138.5952 -17.1416855339059,138.602455533906 -17.13815,138.60392 -17.1343436567901,138.603309544527 -17.1303155339059,138.609815533906 -17.1261864362238,138.611161932824 -17.1226834171618,138.616539397663 -17.118906138575,138.616549254911 -17.1096834171618,138.622129397663 -17.10577202124,138.622072895409 -17.1032989098239,138.624126044072 -17.1032293976626,138.627603417162 -17.1010355339059,138.630765533906 -17.0967894895933,138.633968658407 -17.0990619311384,138.636439592876 -17.10456,138.63292 -17.1089586552144,138.634734666626 -17.1155665828382,138.629840602337 -17.125331284537,138.628549167878 -17.1282565828382,138.624740602337 -17.1330560995774,138.625390527949 -17.1365765828382,138.621540602337 -17.1424073531006,138.620417429994 -17.1448265828382,138.618140602337 -17.1486534171618,138.618140602337 -17.15174,138.62276 -17.1488101728792,138.627501044642 -17.1554855339059,138.630524466094 -17.1570693976626,138.639533417162 -17.1543634171618,138.642239397663 -17.1498128729368,138.641755830166 -17.1465855339059,138.649805533906 -17.14305,138.65127 -17.1384306023374,138.648183417162 -17.1385034888127,138.642933007344 -17.1359755339059,138.648315533906 -17.1314848990342,138.649590018606 -17.1364993976626,138.652766582838 -17.1364993976626,138.656593417162 -17.1343673749531,138.658915891327 -17.1402470106843,138.659811806568 -17.1403806023374,138.656656582838 -17.1443444660941,138.652254466094 -17.15059,138.65012 -17.1541255339059,138.651584466094 -17.1557872549761,138.654495752047 -17.16039,138.6536 -17.1656207189751,138.655683614532 -17.1700765828382,138.651750602337 -17.175750063894,138.653170498968 -17.17913,138.65181 -17.1826655339059,138.653274466094 -17.1886193976626,138.663186582838 -17.1887593976626),138.669163417162 -17.1761640614773,(138.661062058795 -17.1761099515331,138.660689970264 -17.1755944660941,138.660345533906 -17.1750156488696,138.660246228195 -17.1761640614773),138.661062058795 -17.148833033144,(138.663199373673 -17.1474820470587,138.662809451313 -17.1466035270533,138.663251038638 -17.1481943769763,138.663599619857 -17.148833033144),138.663199373673 -17.1400697359547,(138.638170491294 -17.1393504141502,138.636245909602 -17.1361002956188,138.63491642837 -17.1352055339059,138.636255533906 -17.1328799219699,138.637619607716 -17.1370555339059,138.639314466094 -17.1383165111873,138.641826992656 -17.1400697359547),138.638170491294 -17.1219835948342,(138.647082905516 -17.11662,138.64813 -17.1094791613706,138.644630026666 -17.1135595987625,138.64973114797 -17.1151134530116,138.650204488815 -17.1171765828382,138.648460602337 -17.1213556799952,138.648695976838 -17.1219835948342),138.647082905516 -17.1149256698356,(138.661945197245 -17.1143708612003,138.661574485967 -17.1145793976626,138.661886582838 -17.1149256698356),138.661945197245 -17.1110959507423,(138.671120479158 -17.1081840902089,138.669868086123 -17.10588,138.67134 -17.1065028299277,138.672313664251 -17.1110959507423),138.671120479158 -17.098056001597,(138.666115366569 -17.0966452046554,138.662821633468 -17.0916265828382,138.663099397663 -17.0888943047447,138.660261210235 -17.0837365828382,138.659819397663 -17.0788186762711,138.655513116762 -17.0795893976626,138.656666582838 -17.0839030659141,138.663795139996 -17.0929559358295,138.667163302612 -17.098056001597),138.666115366569 -17.162176074336,(138.539040713614 -17.1604364425354,138.539463077419 -17.1617555339059,138.540344466094 -17.162176074336),138.539040713614 -17.1480190856946,(138.577998839264 -17.1471075816665,138.57581194314 -17.1404965828382,138.574429397663 -17.1382469085821,138.572406327717 -17.1368303433883,138.574049863923 -17.1389288808127,138.578698907274 -17.1426,138.57724 -17.1480190856946),138.577998839264 -17.142061087427,(138.529878907882 -17.1418571017738,138.529742609027 -17.1417242209679,138.529716177391 -17.1419033692763,138.529984291782 -17.142061087427),138.529878907882 -17.1371674145601,(138.551721225936 -17.1285206023374,138.542913417162 -17.1286448359072,138.535904594673 -17.12576,138.53142 -17.1277716217893,138.524008247704 -17.1226844660941,138.521085533906 -17.1209382507835,138.515786059956 -17.1172429921644,138.512951230844 -17.1152955339059,138.519385533906 -17.1098465828382,138.520469397663 -17.10676,138.51585 -17.1082964593064,138.511915044366 -17.1035944660941,138.510375533906 -17.0988910921176,138.504217554878 -17.09525,138.50584 -17.0897335831794,138.50377253293 -17.0918655339059,138.505554466094 -17.0961155339059,138.509384466094 -17.1014820063725,138.519825985792 -17.1071755339059,138.522424466094 -17.1105228643908,138.528230025946 -17.1135555339059,138.529594466094 -17.1195634083263,138.541384232161 -17.1266055339059,138.542834466094 -17.1277800392435,138.547827731162 -17.1315555339059,138.549244466094 -17.1329755893843,138.552556732758 -17.1354680669049,138.553566158056 -17.1371674145601),138.551721225936 -17.1339711099156,(138.586142615457 -17.1332517109338,138.586006688368 -17.1335735046575,138.58622170406 -17.1339711099156),138.586142615457 -17.1310846296996,(138.564373821862 -17.1236430900807,138.567929525493 -17.1278907773274,138.568389790998 -17.1291694519859,138.568624553205 -17.1310846296996),138.564373821862 -17.1252144106157,(138.556803267242 -17.1248318324753,138.556547636701 -17.1251678125962,138.557050466487 -17.1252144106157),138.556803267242 -17.1233769099193,(138.568010474507 -17.122827108268,138.568119836855 -17.1231246587776,138.568179023331 -17.1233769099193),138.568010474507 -17.116357107822,(138.55065261023 -17.1153463974301,138.550362319836 -17.1156147981011,138.551711661129 -17.116357107822),138.55065261023 -17.109695357981,(138.541579123549 -17.1087155339059,138.543045533906 -17.1090410825733,138.544631276797 -17.109695357981),138.541579123549 -17.1010534347015,(138.533667248786 -17.0981467577445,138.529807801005 -17.0963193569117,138.529290752289 -17.09654,138.5304 -17.0961838486713,138.53219049364 -17.0994655339059,138.533604466094 -17.100687616946,138.535921458101 -17.1010534347015),138.533667248786 -17.0936431190898,(138.524472132117 -17.0919216689065,138.522572375471 -17.0917861426908,138.525448960825 -17.0934534171618,138.525780602337 -17.0936431190898),138.524472132117 -17.1339288425687,(138.523088407516 -17.1334377512244,138.52235343738 -17.1332183782107,138.522681752296 -17.1339288425687),138.523088407516 -17.1220194431468,(138.490385144432 -17.1212248543533,138.490616415703 -17.1211373022989,138.491056569603 -17.1217877437464,138.492030024022 -17.1220194431468),138.490385144432 -17.1192221513327,(138.503852896437 -17.1182510706121,138.504443195171 -17.1185368405434,138.504878536513 -17.1192221513327),138.503852896437 -17.1127412815526,(138.486936548577 -17.1094744660941,138.485525533906 -17.1081937406826,138.48291372679 -17.10507,138.48529 -17.1053268400548,138.48812921463 -17.1101655339059,138.489334466094 -17.1115974982509,138.493584215361 -17.1127412815526),138.486936548577 -17.0886155119732,(138.494304634382 -17.0845884845476,138.494565530467 -17.0863910441839,138.497198141199 -17.0880406023374,138.497916582838 -17.0886155119732),138.494304634382 -17.0774300726584,(138.521229519109 -17.0769407412933,138.52132685317 -17.0773928245262,138.521416778116 -17.0774300726584),138.521229519109 -17.0675686330254,(138.507151989124 -17.0665941875296,138.506958159863 -17.0660834817147,138.507447404087 -17.0675686330254),138.507151989124 -17.0925005104067,(138.633681341593 -17.0902406023374,138.631273417162 -17.0900637998304,138.628335429064 -17.0879500008413,138.62797163614 -17.0854366665573,138.63465736878 -17.0885434171618,138.634800602337 -17.0902149213729,138.63577147664 -17.0925005104067),138.633681341593 -17.0760314630351,(138.624648270507 -17.0751054939585,138.624074081827 -17.0735081997832,138.625425430912 -17.0755144660941,138.627384466094 -17.0760314630351),138.624648270507 -17.0775513237289,(138.654406883238 -17.0768834171618,138.653960602337 -17.0755647844111,138.653698309975 -17.0775513237289),138.654406883238 -17.0738052155888,(138.653811690025 -17.0734726094214,138.653745530545 -17.0731906395279,138.653933936804 -17.0738052155888,138.653811690025