GDACS_WF_1025662_1
info-gdacs@gdacs.org
2025-11-01T23:00:00-00:00
Actual
Alert
Public
1025662
Geo
Forest Fires
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green forest fire notification in Australia
On 27/10/2025, a forest fire started in Australia, until 02/11/2025.
https://www.gdacs.org/report.aspx?eventtype=WF&eventid=1025662
eventid
1025662
currentepisodeid
1
glide
version
0
fromdate
Mon, 27 Oct 2025 00:00:00 GMT
todate
Sun, 02 Nov 2025 00:00:00 GMT
eventtype
WF
alertlevel
Green
alerttype
automatic
link
https://www.gdacs.org/report.aspx?eventtype=WF&amp;eventid=1025662
country
Australia
eventname
severity
Green impact for forestfire in 34842 ha
population
0 people affected in the area
vulnerability
sourceid
GWIS
iso3
AUS
hazardcomponents
datemodified
Wed, 19 Nov 2025 09:28:12 GMT
Polygon
-19.6154193976626,131.003976582838 -19.6154193976626,131.007803417162 -19.6112166460656,131.010807123945 -19.6099755339059,131.015465533906 -19.6037334171618,131.019049397663 -19.5961044660941,131.017605533906 -19.5948969399817,131.012778275483 -19.5913834171618,131.017499397663 -19.5824765828382,131.016919397663 -19.5750206023374,131.010523417162 -19.5750206023374,131.006696582838 -19.5785792476094,131.003820996769 -19.5776509503865,131.003200728395 -19.57015,131.00515 -19.5643434386508,131.003917024629 -19.5599402558021,131.005155062381 -19.5510334171618,131.009819397663 -19.5455621258957,131.010625053694 -19.5426834171618,131.014199397663 -19.5339776216375,131.014509683534 -19.5256434171618,131.019149397663 -19.5218165828382,131.019149397663 -19.51873,131.01453 -19.5199749899118,131.005221374064 -19.5178706023374,131.001453417162 -19.5176925920006,130.99704822537 -19.5118,131.0007 -19.5076832501749,130.998365682812 -19.5055534171618,131.000209397663 -19.5017265828382,131.000209397663 -19.4990206023374,130.997503417162 -19.4990206023374,130.993676582838 -19.5017265828382,130.990970602337 -19.5063667460374,130.991514051318 -19.51464,130.98819 -19.5181755339059,130.989654466094 -19.5194474079994,130.99222177463 -19.5205802687723,130.991464821261 -19.51735,130.97971 -19.5204365828382,130.975090602337 -19.5242634171618,130.975090602337 -19.5300690496135,130.979479271605 -19.5366631475665,130.976590329783 -19.5316365828382,130.976089397663 -19.52855,130.97147 -19.5300144660941,130.967934466094 -19.5345133209084,130.966661616442 -19.5347106023374,130.963826582838 -19.5374165828382,130.961120602337 -19.5412434171618,130.961120602337 -19.543247399038,130.962775967651 -19.5460765828382,130.959450602337 -19.54987,130.95873 -19.5539154188896,130.960957562899 -19.5544306023374,130.956886582838 -19.5571365828382,130.954180602337 -19.5599187624505,130.953737332552 -19.5624465654865,130.947548201433 -19.562620316859,130.94469829143 -19.5590665828382,130.944559397663 -19.5563623429922,130.941856022236 -19.5522880629307,130.943563973612 -19.5510993976626,130.949403417162 -19.5483934171618,130.952109397663 -19.5435259164441,130.951414046609 -19.53931,130.95295 -19.5359958264921,130.951633442195 -19.53898,130.95654 -19.5358934171618,130.961159397663 -19.5283665828382,130.960429397663 -19.5256606023374,130.957723417162 -19.5270149090845,130.947077686978 -19.52095,130.94984 -19.5135285674923,130.948606770525 -19.5092534171618,130.955579397663 -19.4997422165983,130.956959776618 -19.4983255339059,130.960735533906 -19.4942855339059,130.964215533906 -19.487329828979,130.966876327679 -19.4844434171618,130.970489397663 -19.4782902878758,130.971945014379 -19.4780693976626,130.975713417162 -19.4743708019268,130.978616841109 -19.47568,130.98192 -19.4745039401219,130.988870770332 -19.4784455339059,130.990254466094 -19.4805737569427,130.997824513107 -19.4835821481619,130.998350389447 -19.48787,130.99576 -19.4914055339059,130.997224466094 -19.49287,131.00076 -19.4897834171618,131.005379397663 -19.4861375744072,131.005415399124 -19.4836534171618,131.007789397663 -19.47689,131.00933 -19.4694044660941,131.004675533906 -19.46794,131.00114 -19.4708952591447,130.996608350024 -19.469967629489,130.993500276994 -19.4647744660941,130.992365533906 -19.46331,130.98883 -19.466067294984,130.983843433415 -19.4658744551182,130.980942408105 -19.4614334171618,130.985119397663 -19.4585333950581,130.985303752075 -19.4551359895547,130.989856516187 -19.4553566654541,130.992661411608 -19.4604494636325,130.997711987051 -19.4640955339059,130.999154466094 -19.46556,131.00269 -19.4640955339059,131.006225533906 -19.4602921215973,131.007636715673 -19.4585555339059,131.012075533906 -19.4507215781113,131.013113825715 -19.4571198642305,131.015292680537 -19.4615634171618,131.014880602337 -19.4642693976626,131.017586582838 -19.4642693976626,131.021413417162 -19.4599951801274,131.024431339404 -19.4596093976626,131.029313417162 -19.4577140118223,131.031477775626 -19.4672472465874,131.032396460677 -19.4703765828382,131.028140602337 -19.48347,131.02398 -19.4870055339059,131.025444466094 -19.4882947372313,131.028098894561 -19.4925624646545,131.028614055211 -19.4938944660941,131.025744466094 -19.49743,131.02428 -19.5054555339059,131.029834466094 -19.5084561174112,131.036841185481 -19.5124634171618,131.036720602337 -19.5168289768809,131.040306121535 -19.5195865828382,131.037340602337 -19.5234134171618,131.037340602337 -19.5262793976626,131.040186582838 -19.5265030006997,131.043758231032 -19.5291365828382,131.041160602337 -19.5410905050661,131.037187186852 -19.5416206023374,131.031316582838 -19.5443265828382,131.028610602337 -19.5481534171618,131.028610602337 -19.5508593976626,131.031316582838 -19.5515793976626,131.038323417162 -19.5488734171618,131.041029397663 -19.5450794949339,131.041162813148 -19.5448693976626,131.043933417162 -19.5406355339059,131.048945533906 -19.53118,131.05123 -19.5268084996502,131.048514421709 -19.5218985573323,131.055068646296 -19.5205544269441,131.059386318913 -19.5221293976626,131.061336582838 -19.5221293976626,131.065163417162 -19.5180386231557,131.068144850317 -19.5175093976626,131.073173417162 -19.5138921436481,131.076060661234 -19.51628,131.08513 -19.5157288684234,131.090442250298 -19.5184530127553,131.091941965051 -19.5212522414677,131.091092588969 -19.51855,131.08673 -19.5217444660941,131.078024466094 -19.52528,131.07656 -19.5282513768443,131.077315149683 -19.5336144660941,131.071794466094 -19.53715,131.07033 -19.5406855339059,131.071794466094 -19.5419144404912,131.074145762379 -19.5445344660941,131.064944466094 -19.54807,131.06348 -19.5516055339059,131.064944466094 -19.55307,131.06848 -19.5499922360237,131.078311645363 -19.5489993976626,131.088523417162 -19.5440134171618,131.093529397663 -19.5405889396987,131.093609431418 -19.5419291513626,131.099702741631 -19.5541225636453,131.107594104341 -19.55658,131.10685 -19.5601155339059,131.108314466094 -19.5623292284082,131.114179073558 -19.5772055339059,131.125614466094 -19.5794493976626,131.138373417162 -19.5735718502403,131.142376712902 -19.5779285752386,131.146293541814 -19.5823734171618,131.145880602337 -19.5850793976626,131.148586582838 -19.58604,131.15416 -19.5848649030868,131.157262462322 -19.5868193976626,131.159536582838 -19.58778,131.1651 -19.5863155339059,131.168635533906 -19.58278,131.1701 -19.5778565063443,131.166822436207 -19.5780593976626,131.172413417162 -19.57344,131.1755 -19.5688206023374,131.172413417162 -19.5687990920681,131.164090743889 -19.5675362279584,131.163745524812 -19.5658955339059,131.168485533906 -19.561369888773,131.171282826973 -19.5615193976626,131.175333417162 -19.5599455339059,131.177575533906 -19.5557374791533,131.178906227286 -19.5544055339059,131.181775533906 -19.55087,131.18324 -19.5473344660941,131.181775533906 -19.5456676278729,131.176478463519 -19.5344889503399,131.173714025635 -19.5319976285962,131.17653617544 -19.532926994032,131.180008119366 -19.5368234171618,131.180100602337 -19.5395293976626,131.182806582838 -19.538421563533,131.189611025538 -19.54602,131.18699 -19.5511386980033,131.189679469109 -19.5523844660941,131.185044466094 -19.55592,131.18358 -19.5605393976626,131.186666582838 -19.5615,131.19225 -19.5600355339059,131.195785533906 -19.5556354050711,131.197078021376 -19.5469434171618,131.208719397663 -19.5348531834781,131.209004090661 -19.534593595138,131.210980948053 -19.5373795008181,131.214743389519 -19.5415293976626,131.217736582838 -19.5415293976626,131.221563417162 -19.5388234171618,131.224269397663 -19.5293265828382,131.226269397663 -19.5248040455254,131.222315706482 -19.5172744660941,131.220285533906 -19.51581,131.21675 -19.5188965828382,131.212130602337 -19.5255777847872,131.211668250014 -19.5253006023374,131.207426582838 -19.5273248263236,131.205176137477 -19.52562,131.20148 -19.5270844660941,131.197944466094 -19.53062,131.19648 -19.5336209021983,131.197223254973 -19.5290506023374,131.192773417162 -19.5287269065282,131.186714290284 -19.5261136090039,131.186805892519 -19.5215534171618,131.193329397663 -19.5172749410414,131.193027620262 -19.5144055339059,131.198095533906 -19.51087,131.19956 -19.5062506023374,131.196473417162 -19.5062506023374,131.192646582838 -19.5082903675901,131.189863800993 -19.5038265828382,131.190289397663 -19.50074,131.18567 -19.5038265828382,131.181050602337 -19.5076534171618,131.181050602337 -19.5103920978869,131.183920977968 -19.5143065828382,131.179770602337 -19.519902706621,131.178769831419 -19.5214544660941,131.174454466094 -19.5249871449695,131.172990567901 -19.5249473706276,131.171409391219 -19.5198344660941,131.169535533906 -19.51837,131.166 -19.5192367923863,131.163358948009 -19.5163165828382,131.162879397663 -19.5136106023374,131.160173417162 -19.5141183356066,131.155586706302 -19.5111965828382,131.155129397663 -19.5084906023374,131.152423417162 -19.5090090862635,131.147820616807 -19.4961265828382,131.144699397663 -19.4938815122496,131.142683217592 -19.4895365828382,131.143029397663 -19.4868306023374,131.140323417162 -19.4875581357689,131.135407752112 -19.4843765828382,131.135279397663 -19.4821361316473,131.13327013101 -19.4777865828382,131.133619397663 -19.4749967253367,131.130491739004 -19.4720865828382,131.130309397663 -19.4693806023374,131.127603417162 -19.4691593355032,131.124888966332 -19.4655506023374,131.122003417162 -19.4655506023374,131.118176582838 -19.47017,131.11509 -19.4737055339059,131.116554466094 -19.4764399328957,131.121422408903 -19.4781475651344,131.118988260703 -19.4805586680496,131.105126037783 -19.4753944660941,131.103985533906 -19.4740886055149,131.099652636231 -19.4704934474027,131.09700706414 -19.4686555339059,131.100975533906 -19.4632065828382,131.102059397663 -19.46012,131.09744 -19.4623379774882,131.091962239401 -19.4565192297003,131.08964398817 -19.4557272518655,131.090863981069 -19.4578893976626,131.093206582838 -19.4578893976626,131.097033417162 -19.4541278003713,131.099949372897 -19.4594593976626,131.103916582838 -19.4583755339059,131.109365533906 -19.4529265828382,131.110449397663 -19.4499965924433,131.106617243374 -19.4465951234105,131.105690289225 -19.4451693976626,131.114673417162 -19.4424634171618,131.117379397663 -19.4374583480689,131.116592126359 -19.4348293976626,131.128393417162 -19.4321234171618,131.131099397663 -19.4282965828382,131.131099397663 -19.4214806023374,131.126243417162 -19.4214806023374,131.122416582838 -19.4255376351776,131.117376464758 -19.42272,131.11058 -19.4241844660941,131.107044466094 -19.4296334171618,131.105960602337 -19.4358187754862,131.111408774384 -19.4382544660941,131.100974466094 -19.44179,131.09951 -19.4447100934822,131.10056324195 -19.4475820715473,131.097097521442 -19.4434306023374,131.093973417162 -19.4419,131.08453 -19.4445592716048,131.078838981729 -19.4438406023374,131.073936582838 -19.4489544660941,131.066644466094 -19.4517775926739,131.065321706628 -19.45056,131.05801 -19.4526461991284,131.052328288087 -19.4489906023374,131.049433417162 -19.448942273036,131.045849550644 -19.43115,131.04852 -19.4276144660941,131.047055533906 -19.4262231528873,131.043887764399 -19.4145465828382,131.044809397663 -19.4115331528873,131.040557764399 -19.3951665828382,131.042079397663 -19.3924606023374,131.039373417162 -19.3922765238646,131.036472007814 -19.3906894383081,131.037403895445 -19.3912693976626,131.047153417162 -19.3885634171618,131.049859397663 -19.37725,131.05145 -19.3726130696116,131.048275274197 -19.3706834171618,131.049819397663 -19.3653883343304,131.048838345375 -19.3631734171618,131.050809397663 -19.3579665828382,131.051249397663 -19.35488,131.04663 -19.3578549789374,131.039431865682 -19.3585706023374,131.031746582838 -19.3610362799577,131.029201167589 -19.3605088931388,131.027346622592 -19.3394565828382,131.029429397663 -19.3364550139926,131.025237394203 -19.3325544660941,131.023845533906 -19.3299846841031,131.015651203634 -19.3244644660941,131.013495533906 -19.318430170786,131.005012498969 -19.3144044660941,131.003645533906 -19.31294,131.00011 -19.3160265828382,130.995490602337 -19.3198534171618,130.995490602337 -19.3225190212803,130.998136155312 -19.3325256556732,130.994494994467 -19.332895188557,130.99099549975 -19.3297844660941,130.989615533906 -19.32832,130.98608 -19.3314065828382,130.981460602337 -19.3368555339059,130.982544466094 -19.337704811443,130.98834450025 -19.3435425568251,130.991504751826 -19.3464144660941,130.986434466094 -19.3499046623574,130.984979018218 -19.3494842314081,130.983374006674 -19.3451644660941,130.982065533906 -19.343969182297,130.977176729208 -19.3401706023374,130.974253417162 -19.3400488384253,130.971038731363 -19.3349706023374,130.968043417162 -19.3349706023374,130.964216582838 -19.338157434216,130.961006337589 -19.3345665828382,130.960959397663 -19.3297544660941,130.956765533906 -19.3244206023374,130.950353417162 -19.3244206023374,130.946526582838 -19.3271265828382,130.943820602337 -19.3341631641866,130.941734250343 -19.3380744660941,130.930534466094 -19.3452665828382,130.927620602337 -19.3501034171618,130.927890602337 -19.3528093976626,130.930596582838 -19.3539493976626,130.938283417162 -19.341242565784,130.957533662411 -19.3448334171618,130.957580602337 -19.3483976218898,130.960624863339 -19.3524497359111,130.961149140505 -19.3581644660941,130.953464466094 -19.3636134171618,130.952380602337 -19.3663193976626,130.955086582838 -19.3652661144991,130.960489766814 -19.3677988651535,130.964341834187 -19.3716955339059,130.965734466094 -19.3726456830361,130.971383535242 -19.3769755339059,130.973544466094 -19.3786693976626,130.976996582838 -19.3786693976626,130.980823417162 -19.3748010976955,130.983760597379 -19.3746333315159,130.986402820161 -19.3844134171618,130.984850602337 -19.3872404499518,130.988165153792 -19.3913734171618,130.987960602337 -19.3942010325526,130.991278082725 -19.4001343900892,130.992447109346 -19.4119441608767,130.991052793777 -19.4147965828382,130.987610602337 -19.4193832623396,130.988118314653 -19.4204090017387,130.98446320448 -19.4171272968275,130.981703300405 -19.4122265828382,130.982269397663 -19.4095206023374,130.979563417162 -19.40856,130.9725 -19.4100244660941,130.968964466094 -19.4159,130.96604 -19.4209089013476,130.969539098518 -19.4247634171618,130.969520602337 -19.4289386579313,130.976182885661 -19.4337455339059,130.977394466094 -19.43521,130.98093 -19.4337455339059,130.984465533906 -19.4288050921206,130.985650546448 -19.4289293976626,130.989663417162 -19.425737101315,130.992466131899 -19.4268428363209,130.997466877485 -19.4328792813697,130.99547021473 -19.4349744660941,130.984304466094 -19.4407466479945,130.983436578275 -19.4401806023374,130.977716582838 -19.4468755870198,130.970977754568 -19.44557,130.96768 -19.4468306023374,130.962606582838 -19.4510265828382,130.957290602337 -19.4548534171618,130.957290602337 -19.4583755339059,130.960724466094 -19.4597163592951,130.968257049227 -19.4644965828382,130.960900602337 -19.4683234171618,130.960900602337 -19.4713432405874,130.965184377769 -19.474020582982,130.964171601253 -19.4769065828382,130.960560602337 -19.4891109861773,130.95600602012 -19.4894906023374,130.952616582838 -19.4930650509298,130.949737853293 -19.4944344660941,130.945724466094 -19.49797,130.94426 -19.5003996383055,130.944985530278 -19.501160719902,130.943313477375 -19.4977565828382,130.943229397663 -19.4950506023374,130.940523417162 -19.4950506023374,130.936696582838 -19.4977565828382,130.933990602337 -19.5015834171618,130.933990602337 -19.504580074791,130.938157915445 -19.5071265828382,130.935690602337 -19.5109534171618,130.935690602337 -19.5139103368536,130.939658139344 -19.52129,130.93667 -19.5250121609535,130.93747605835 -19.5252006023374,130.934596582838 -19.5279065828382,130.931890602337 -19.5366370707123,130.933075951845 -19.53384,130.92865 -19.5369265828382,130.924030602337 -19.5407534171618,130.924030602337 -19.5431376354164,130.926255031606 -19.5488265828382,130.921530602337 -19.557715450882,130.923150684173 -19.5589655870198,130.919117483029 -19.5579606023374,130.913786582838 -19.5606665828382,130.911080602337 -19.5661155339059,130.912164466094 -19.56758,130.9157 -19.5662044129802,130.919102516971 -19.5672284101785,130.924337834789 -19.5708597444771,130.925054176332 -19.5743109301854,130.919663987752 -19.57231,130.91577 -19.5753521866949,130.910744905819 -19.5702165828382,130.911619397663 -19.5647698728972,130.90399209496 -19.5622434171618,130.906429397663 -19.5584165828382,130.906429397663 -19.5557106023374,130.903723417162 -19.5557106023374,130.899896582838 -19.56033,130.89681 -19.5638655339059,130.898274466094 -19.5651739510565,130.901025488984 -19.5680865828382,130.897280602337 -19.5723734171618,130.897080602337 -19.5750793976626,130.899786582838 -19.5769778133051,130.907765094181 -19.5802,130.90651 -19.5835419774475,130.907845135803 -19.5858268605001,130.902668005779 -19.5810244660941,130.901455533906 -19.5764906023374,130.894023417162 -19.5764906023374,130.890196582838 -19.5808265828382,130.885880602337 -19.5866428223631,130.88693047706 -19.5867906023374,130.883846582838 -19.5894965828382,130.881140602337 -19.5949455339059,130.882224466094 -19.596333276015,130.88537428248 -19.6008455339059,130.886644466094 -19.60231,130.89018 -19.6008455339059,130.893715533906 -19.5964196760625,130.895002903558 -19.5944155339059,130.900415533906 -19.5870831394999,130.902131994221 -19.5918855339059,130.903344466094 -19.5929693976626,130.908793417162 -19.5902634171618,130.911499397663 -19.5850080225525,130.910544864197 -19.5840289558905,130.914606396873 -19.5877455339059,130.917574466094 -19.5890580702996,130.921873802183 -19.5926934171618,130.922530602337 -19.5953993976626,130.925236582838 -19.5944420830341,130.933908923026 -19.59887,130.93194 -19.6024055339059,130.933404466094 -19.6071793976626,130.938546582838 -19.6060955339059,130.943995533906 -19.6008592321327,130.945121696237 -19.5952,130.94879 -19.5898444660941,130.946515533906 -19.5884650146003,130.943407397258 -19.5826897735887,130.946957426329 -19.5773200201301,130.952881899353 -19.5761555339059,130.957925533906 -19.5700015676998,130.961748540238 -19.5616334171618,130.972589397663 -19.5561934171618,130.975169397663 -19.5507365828382,130.975429397663 -19.544072600962,130.967034032349 -19.543283129373,130.973864383192 -19.5476793976626,130.976906582838 -19.5476793976626,130.980733417162 -19.5379898378072,130.986326434686 -19.5360055339059,130.993845533906 -19.5296067673128,130.996275273848 -19.5273590280016,130.9988815593 -19.5315801246199,131.001988553308 -19.5433065828382,130.997530602337 -19.5507972740252,130.996778498725 -19.5529365828382,130.994920602337 -19.5619911644303,130.993866963532 -19.5604191640044,130.99064825772 -19.55595,130.99351 -19.5513306023374,130.990423417162 -19.5513306023374,130.986596582838 -19.55595,130.98351 -19.5594855339059,130.984974466094 -19.5608608359956,130.98806174228 -19.56533,130.9852 -19.5688655339059,130.986664466094 -19.5702439016253,130.989767154241 -19.5727965828382,130.987290602337 -19.5766234171618,130.987290602337 -19.5796190480519,130.991452753679 -19.58636,130.98864 -19.5933534171618,130.989600602337 -19.5986893976626,130.993146582838 -19.5982493976626,130.998613417162 -19.5955434171618,131.001319397663 -19.5849832586656,131.001561790203 -19.5816707523906,131.004069003231 -19.5839197051656,131.00618819709 -19.58846,131.00322 -19.5938534171618,131.004140602337 -19.5966426923936,131.007265333729 -19.59997,131.00594 -19.6037773297153,131.007811237269 -19.6060233539344,131.007012876055 -19.6072644660941,131.002354466094 -19.6108,131.00089 -19.6154193976626),131.003976582838 -19.5931879169659,(130.935531076974 -19.592292122774,130.936492743453 -19.5927601655323,130.938103292741 -19.59267,130.93765 -19.5931879169659),130.935531076974 -19.5608915898215,(130.927182165211 -19.559314549118,130.926229315827 -19.5592040965939,130.92804596651 -19.5603334171618,130.928270602337 -19.5608915898215),130.927182165211 -19.5042418216886,(130.941324626145 -19.504129925209,130.940762084555 -19.503679280098,130.941436522625 -19.5042418216886),130.941324626145 -19.4697591980732,(130.977103158891 -19.4695566650291,130.97680004677 -19.4694855448818,130.977157591895 -19.4697591980732),130.977103158891 -19.4496376393224,(131.027070500953 -19.4489252290286,131.022069884369 -19.4445344660941,131.020775533906 -19.44307,131.01724 -19.4445344660941,131.013704466094 -19.4494584218887,131.012516174285 -19.4435606023374,131.006123417162 -19.4443274193245,130.999436752673 -19.4412534171618,131.004119397663 -19.4372766863038,131.00401924 -19.4387357712928,131.01678754723 -19.4419655339059,131.018924466094 -19.4460177612003,131.02671355029 -19.4496376393224),131.027070500953 -19.4448284001326,(130.993193476562 -19.4424659560402,130.990746327717 -19.4415783656165,130.991687685777 -19.4434025806755,130.996753247327 -19.4448284001326),130.993193476562 -19.3721609987503,(131.039156464758 -19.3715730460588,131.038276531371 -19.3693494686364,131.040315263478 -19.3716505748842,131.041226836467 -19.3721609987503),131.039156464758 -19.368176608285,(131.011217869806 -19.3680788931388,131.010726622592 -19.3669677976941,131.010652366782 -19.3671693201722,131.011418231869 -19.368176608285),131.011217869806 -19.5107993757859,(131.187910427457 -19.5104606023374,131.187403417162 -19.5104279021131,131.187239022032 -19.5098096324099,131.188406199007 -19.5107993757859),131.187910427457 -19.5485141808865,(131.139613263703 -19.5386906023374,131.132663417162 -19.53773,131.12709 -19.5402863432654,131.122824897093 -19.5410837081811,131.116059751832 -19.5390806023374,131.113823417162 -19.5378335247204,131.107275375024 -19.5350729735434,131.106392488458 -19.5350293976626,131.107766582838 -19.5339455339059,131.113215533906 -19.5287598049138,131.115275081688 -19.5331755339059,131.116564466094 -19.5342593976626,131.122013417162 -19.5315534171618,131.124719397663 -19.5253127839974,131.125351403967 -19.5297846231187,131.134335860324 -19.5342,131.13263 -19.5377355339059,131.134094466094 -19.5392,131.13763 -19.5368227245899,131.141775453591 -19.5385529641062,131.145283534594 -19.5420734725932,131.146223472593 -19.5433144660941,131.141564466094 -19.5485141808865),131.139613263703 -19.5320897137213,(131.156659236094 -19.5308898745653,131.153390083813 -19.5244712952911,131.150297232407 -19.5239102045592,131.154685817918 -19.5320897137213),131.156659236094 -19.5421312676381,(131.0759843013 -19.5420755595088,131.075704237621 -19.5420152614641,131.076007376362 -19.5421312676381),131.0759843013 -19.53846,(131.08072 -19.5344182407596,131.083489937878 -19.5333880523465,131.088523619044 -19.5372510603013,131.088150568582 -19.53846),131.08072 -19.5094646887608,(131.047629860075 -19.5081071112937,131.045605616087 -19.5069570926676,131.048519117498 -19.5071451242639,131.048800526669 -19.5094646887608),131.047629860075 -19.5077293850728,(131.056409863923 -19.5060548757361,131.054479473331 -19.4982754202648,131.056916031228 -19.4953034171618,131.060959397663 -19.4921425225038,131.061091861298 -19.4915616259208,131.063484301663 -19.4961593976626,131.066566582838 -19.4961593976626,131.070393417162 -19.4962271020346,131.073315115846 -19.498066425217,131.072475536425 -19.49721,131.06985 -19.4986744660941,131.066314466094 -19.5014035140259,131.065010420034 -19.5077293850728),131.056409863923 -19.5056513304185,(131.089987843636 -19.50028,131.09216 -19.4967444660941,131.090695533906 -19.4941728979654,131.077144884154 -19.4827565828382,131.077939397663 -19.4800506023374,131.075233417162 -19.4803003755633,131.071032770789 -19.478304456922,131.070296888551 -19.4756636429537,131.071385786559 -19.4736474679935,131.075236556785 -19.47544,131.07488 -19.4789755339059,131.076344466094 -19.4803460984968,131.079407925264 -19.4893734171618,131.080390602337 -19.4920793976626,131.083096582838 -19.4909955339059,131.088545533906 -19.48746,131.09001 -19.4843757562004,131.088847076315 -19.4831255339059,131.091305533906 -19.4794379236073,131.092739750125 -19.4797713944851,131.095617363769 -19.4822481927615,131.096769243384 -19.48689,131.09357 -19.4910407817699,131.095955249593 -19.4953834171618,131.095610602337 -19.4976115429745,131.097601422758 -19.5021016554467,131.097342970206 -19.5023106023374,131.094566582838 -19.5056513304185),131.089987843636 -19.5053845869019,(131.101383260386 -19.5048783445533,131.101007029794 -19.5049841827969,131.101539114576 -19.5051465828382,131.101430602337 -19.5053845869019),131.101383260386 -19.4756512051987,(131.084837988674 -19.4737488936944,131.084543618041 -19.4740506542429,131.089994912746 -19.4750820763927,131.089850249875 -19.4756512051987),131.084837988674 -19.4765661613161,(131.038733976028 -19.4709926644611,131.040725269584 -19.4690255339059,131.044325533906 -19.4660343371341,131.045681724612 -19.4698831903963,131.054197788323 -19.4733426373116,131.054356899122 -19.4695906023374,131.050953417162 -19.4701306023374,131.043986582838 -19.4728365828382,131.041280602337 -19.4760057617675,131.041149786546 -19.4765661613161,131.038733976028